内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

VRF の設定

マルチプロトコル BGP（MP-BGP）の設定

確認

BGP のネクストホップ アドレス

ラベル インポジション

CE ルータにアドバタイズされる IPv6 プレフィクス

トラブルシュート

BGP 機能ネゴシエーション

関連情報

概要

IP バージョン 6（IPv6）は、IP バージョン 4（IPv4）を置き換えるために設計された、新しいバージョンの IP であり、現在、世界中で広く導入および使用されています。IPv6 の主な利点は、インターネット対応機器の急増に伴うインターネットの拡大に対応するために必要なより大きなアドレス レンジを利用できることです。

IPv6 VPN は IPv6 インターフェイス、または PE ルータを介してサービス プロバイダー（SP）のバックボーンへのサブインターフェイスを介して接続されます。サイトは IPv4 と IPv6 の両方に対応できます。各 IPv6 VPN には独自のアドレス レンジがあります。ここでは、特定のアドレスが、別の VPN 内にある異なるシステムを表します。これは、ルート識別子（RD）を IP アドレスに付加する、新しいアドレス ファミリである VPN-IPv6 または VPNv6 アドレス ファミリによって行われます。

VPNv6 アドレスは、8 バイトの RD で始まり、16 バイトの IPv6 アドレスで終わる 24 バイトの数列です。サイトが IPv4 と IPv6 に対応している場合、IPv4 アドレスと IPv6 アドレスの両方のアドバタイズに同じ RD を使用できます。

前提条件

要件

このドキュメントに特有の要件はありません。

注：一部のプラットフォーム（7600シリーズルータなど）でIPv6仮想ルーティングおよび転送(VRF)をサポートするには、グローバル設定でmls ipv6 vrfを設定する必要があります。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

VRF の設定

CE1 ルータ

ipv6 unicast-routing

ipv6 cef

!

interface Serial 0/0

ipv6 address 2001:1::1/124

!

interface Loopback 0

ipv6 address ABCD::1/128

!

CE2 ルータ

ipv6 unicast-routing

ipv6 cef

!

interface Serial 0/0

ipv6 address 2001:2::1/124

!

interface Loopback 0

ipv6 address ABCD::2/128

!

6VPE1 ルータ

ipv6 unicast-routing

ipv6 cef

!

mpls label protocol ldp

mpls ldp router-id Loopback 0 force

! !----- The VRF is defined with vrf definition

and is made IPv6 aware !

vrf definition CUST1

rd 1:1

!

address-family ipv6

route-target import 1:1

route-target export 1:1

exit-address-family

!

interface Serial 0/0

vrf forwarding CUST1

ipv6 address 2001:1::2/124

!

interface Loopback 0

ip address 1.1.1.1 255.255.255.255

ip ospf 1 area 0

!

6VPE2 ルータ

ipv6 unicast-routing

ipv6 cef

!

mpls label protocol ldp

mpls ldp router-id Loopback 0 force

!

vrf definition CUST1

rd 1:1

!

address-family ipv6

route-target import 1:1

route-target export 1:1

exit-address-family

!

interface Serial 0/0

vrf forwarding CUST1

ipv6 address 2001:2::2/124

!

interface Loopback 0

ip address 3.3.3.3 255.255.255.255

ip ospf 1 area 0

!

マルチプロトコル BGP（MP-BGP）の設定

iBGP 接続用にアドレス ファミリ VPNv6 が 6VPE ルータ上で設定されています。6VPE ルータと CE ルータ間に eBGP 接続があります。

CE1 ルータ

router bgp 65101

neighbor 2001:1::2 remote-as 100

!

address-family ipv6

neighbor 2001:1::2 activate

network ABCD::1/128

exit-address-family

!

6VPE1 ルータ

router bgp 100

neighbor 3.3.3.3 remote-as 100

neighbor 3.3.3.3 update-source Loopback 0

!

address-family vpnv6

neighbor 3.3.3.3 activate

exit-address-family

!

address-family ipv6 vrf CUST1

neighbor 2001:1::1 remote-as 65101

neighbor 2001:1::1 activate

redistribute connected

exit-address-family

!

CE2 ルータ

router bgp 65102

neighbor 2001:2::2 remote-as 100

!

address-family ipv6

neighbor 2001:2::2 activate

network ABCD::2/128

exit-address-family

!

6VPE2 ルータ

router bgp 100

neighbor 1.1.1.1 remote-as 100

neighbor 1.1.1.1 update-source Loopback 0

!

address-family vpnv6

neighbor 1.1.1.1 activate

exit-address-family

!

address-family ipv6 vrf CUST1

neighbor 2001:2::1 remote-as 65102

neighbor 2001:2::1 activate

redistribute connected

exit-address-family

!

確認

BGP のネクストホップ アドレス

6VPE2#

show bgp vpnv6 unicast vrf CUST1

BGP table version is 30, local router ID is 3.3.3.3

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 1:1 (default for vrf CUST1)

*>i2001:1::/124     ::FFFF:1.1.1.1           0    100      0 ?

*> 2001:2::/124     ::                       0         32768 ?

*>iABCD::1/128      ::FFFF:1.1.1.1           0    100      0 65101 i

*> ABCD::2/128      2001:2::1                0             0 65102 i

6VPE2# show bgp vpnv6 unicast vrf CUST1 ABCD::1/128

BGP routing table entry for [1:1]ABCD::1/128, version 30

Paths: (1 available, best #1, table CUST1)

Advertised to update-groups:

2

65101

::FFFF:1.1.1.1 (metric 3) from 1.1.1.1 (1.1.1.1)

Origin IGP, metric 0, localpref 100, valid, internal, best

Extended Community: RT:1:1

mpls labels in/out nolabel/20

ラベル インポジション

接続されている CE ルータからのパケットを 6VPE ルータが受信すると、6VPE ルータはその CE ルータに対応する VRF テーブルで、パケットの IPv6 宛先アドレスをルックアップします。これにより、6VPE ルータで VPNv6 経路を検出できます。VPNv6 経路には、関連付けられている MPLS ラベル（トップ ラベル）と、関連付けられている BGP ネクストホップ ラベル（ボトム ラベル）があります。

6VPE2# show bgp vpnv6 unicast vrf CUST1 ABCD::1/128

BGP routing table entry for [1:1]ABCD::1/128, version 30

Paths: (1 available, best #1, table CUST1)

Advertised to update-groups:

2

65101

::FFFF:1.1.1.1 (metric 3) from 1.1.1.1 (1.1.1.1)

Origin IGP, metric 0, localpref 100, valid, internal, best

Extended Community: RT:1:1

mpls labels in/out nolabel/20

6VPE2#

show ip cef 1.1.1.1

1.1.1.1/32

nexthop 10.2.2.1 FastEthernet2/0 label 16

6VPE2#

show ipv6 cef vrf CUST1 ABCD::1/128 detail

ABCD::1/128, epoch 0

recursive via 1.1.1.1 label 20

nexthop 10.2.2.1 FastEthernet2/0 label 16

CE ルータにアドバタイズされる IPv6 プレフィクス

show ipv6 route bgpコマンドは、ルータによって学習されたBGPルートを表示します。

CE1# show ipv6 route bgp

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   2001:2::/124 [20/0]

via FE80::C808:17FF:FE2C:0, Serial0/0

B   ABCD::2/128 [20/0]

via FE80::C808:17FF:FE2C:0, Serial0/0

CE2# show ipv6 route bgp

IPv6 Routing Table - 6 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   2001:1::/124 [20/0]

via FE80::C809:14FF:FEB4:0, Serial0/0

B   ABCD::1/128 [20/0]

via FE80::C809:14FF:FEB4:0, Serial0/0

トラブルシュート

このセクションは、設定のトラブルシューティングを行う際に参照してください。

BGP 機能ネゴシエーション

MP-BGP は MP_REACH NLRI 内で IPv6 VPN 経路をアドバタイズするために使用されます。

注：使用されるアドレスファミリ識別子/後続のアドレスファミリ識別子(AFI/SAFI)は2/128です。AFI = 2の値はIPv6を表し、SAFI = 128の値はMPLS VPNv6と表記されます。

debug ip bgp

21:10:10.387: BGP: 3.3.3.3 went from Active to OpenSent

21:10:10.391: BGP: 3.3.3.3 sending OPEN, version 4, my as: 100, holdtime 180

seconds

21:10:10.395: BGP: 3.3.3.3 send message type 1, length (incl. header) 61

21:10:10.579: BGP: 3.3.3.3 rcv message type 1, length (excl. header) 42

21:10:10.579: BGP: 3.3.3.3 rcv OPEN, version 4, holdtime 180 seconds

21:10:10.583: BGP: 3.3.3.3 rcv OPEN w/ OPTION parameter len: 32

21:10:10.583: BGP: 3.3.3.3 rcvd OPEN w/ optional parameter type 2 (Capability)

len 6

21:10:10.583: BGP: 3.3.3.3 OPEN has CAPABILITY code: 1, length 4

21:10:10.587: BGP: 3.3.3.3 OPEN has MP_EXT CAP for afi/safi: 1/1

21:10:10.587: BGP: 3.3.3.3 rcvd OPEN w/ optional parameter type 2 (Capability)

len 6

21:10:10.587: BGP: 3.3.3.3 OPEN has CAPABILITY code: 1, length 4

21:10:10.587: BGP: 3.3.3.3 OPEN has MP_EXT CAP for afi/safi: 2/128

21:10:10.591: BGP: 3.3.3.3 rcvd OPEN w/ optional parameter type 2 (Capability)

len 2

21:10:10.591: BGP: 3.3.3.3 OPEN has CAPABILITY code: 128, length 0

21:10:10.591: BGP: 3.3.3.3 OPEN has ROUTE-REFRESH capability(old) for all

address-families

21:10:10.591: BGP: 3.3.3.3 rcvd OPEN w/ optional parameter type 2 (Capability)

len 2

21:10:10.595: BGP: 3.3.3.3 OPEN has CAPABILITY code: 2, length 0

21:10:10.595: BGP: 3.3.3.3 OPEN has ROUTE-REFRESH capability(new) for all

address-families

21:10:10.595: BGP: 3.3.3.3 rcvd OPEN w/ optional parameter type 2 (Capability)

len 6

21:10:10.595: BGP: 3.3.3.3 OPEN has CAPABILITY code: 65, length 4

21:10:10.599: BGP: 3.3.3.3 OPEN has 4-byte ASN CAP for: 100

BGP: 3.3.3.3 rcvd OPEN w/ remote AS 100, 4-byte remote AS 100

21:10:10.599: BGP: 3.3.3.3 went from OpenSent to OpenConfirm

21:10:10.603: BGP: 3.3.3.3 went from OpenConfirm to Established

21:10:10.603: %BGP-5-ADJCHANGE: neighbor 3.3.3.3 Up

21:10:11.547: %BGP-5-ADJCHANGE: neighbor 2001:1::1 vpn vrf CUST1 Up

6VPE1# show bgp vpnv6 unicast all neighbors

BGP neighbor is 3.3.3.3,  remote AS 100, internal link

BGP version 4, remote router ID 3.3.3.3

BGP state = Established, up for 00:05:32

Last read 00:00:30, last write 00:00:20, hold time is 180, keepalive interval

is 60 seconds

Neighbor capabilities:

Route refresh: advertised and received(new)

New ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Address family VPNv6 Unicast: advertised and received

! !---output omitted !

BGP neighbor is 2001:1::1,  vrf CUST1,  remote AS 65101, external link

BGP version 4, remote router ID 10.210.0.1

BGP state = Established, up for 00:05:54

Last read 00:00:54, last write 00:00:43, hold time is 180, keepalive interval

is 60 seconds

Neighbor capabilities:

Route refresh: advertised and received(new)

New ASN Capability: advertised

Address family IPv6 Unicast: advertised and received

! !---output omitted !

関連情報

- IP ルーティングに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems