内容

はじめに

前提条件

背景説明

BGPピア用に実装された設定の特定

基本的なBGP出力について

関連情報

はじめに

このドキュメントでは、ボーダーゲートウェイプロトコル(BGP)のトラブルシューティングを実行する手順と、Nexusの基本的な出力について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Nexus スイッチ

- BGP

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

BGPは、自律システム(AS)間でルーティング情報と到達可能性情報を交換できるようにするために大規模ネットワークで使用される外部ゲートウェイプロトコルです。インターネットグローバルルーティングシステムを動かすコアルーティングプロトコルである。

BGPピア用に実装された設定の特定

Nexus 9300でBGP機能が有効になっていることを確認します。

BGPプロセスの設定を特定し、理解する。

switch# show running-config bgp

!Command: show running-config bgp

!Running configuration last done at: Tue Jul 18 19:45:05 2023

!Time: Tue Jul 18 19:45:44 2023

version 10.2(4) Bios:version 05.47

feature bgp

router bgp 64512                              -> The AS number of the local BGP speaker.

router-id 172.17.255.255                    -> BGP speaker identifier.

address-family ipv4 unicast                 -> Global address family configuration.

network 10.100.1.0/24                     -> Specifies a network as local to this autonomous system and adds it to the BGP routing table.

redistribute direct route-map permit_all     -> Routes redistribution from other routing protocols (OSPF, EIGRP, IS-IS, Static)

neighbor 10.1.1.1                            -> IP address of the remote BGP peer.

remote-as 64512                           -> The AS number of the remote BGP peer.*

address-family ipv4 unicast               -> Local address family configuration.

prefix-list allow_in in                 -> Prefix-list applied at the inbound of the BGP peer. **

prefix-list allow_out out               -> Prefix-list applied at the outbound of the BGP peer. **

soft-reconfiguration inbound always     -> Store the inbound BGP route updates.

neighbor 172.18.255.255

remote-as 65535

update-source loopback10                  -> Interface used to source BGP updates.

ebgp-multihop 3                           -> Maximum hops to reach peer IP address, it modifies the TTL of the BGP packets

address-family ipv4 unicast

route-map block_route in                -> Route-map applied at the inbound of the BGP peer. **

route-map no_local out                  -> Route-map applied at the outbound of the BGP peer. **

soft-reconfiguration inbound always

注：ローカルとリモートで設定された同じASNがiBGPセッションを識別し、設定された異なるASNがeBGPセッションを識別します。

ルートマップには、同じピアに適用されるプレフィックスリストよりも高い階層値があります。

基本的なBGP出力について

BGPピアステータス

switch# show ip bgp summary

BGP summary information for VRF default, address family IPv4 Unicast

BGP router identifier 172.17.255.255, local AS number 64512 -> Local BGP ID and ASN

BGP table version is 67, IPv4 Unicast config peers 2, capable peers 2

20 network entries and 19 paths using 5424 bytes of memory

BGP attribute entries [6/2112], BGP AS path entries [2/20]

BGP community entries [0/0], BGP clusterlist entries [0/0]

13 received paths for inbound soft reconfiguration

12 identical, 0 modified, 1 filtered received paths using 96 bytes

Neighbor       V AS     MsgRcvd   MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

10.1.1.1       4 64512   346      334     67      0     0 05:25:12 8    -> BGP peer IP address, remote ASN, Time session has been established or down, amount of prefixes received.

172.18.255.255 4 65535   334      327     67      0     0 05:18:00 8

注:Up/Downセクションには、BGPピアセッションがアップまたはダウンした時間が表示されます。

State/PfxRcdセクション：セッションが現在あるBGPの状態を表示します。このコマンドは、状態が確立されたときにピアから学習されたプレフィックスの数を示します。

BGPの状態

Idle

これは、BGPが「開始イベント」を待機する最初の状態です。startイベントは、ユーザが新しいBGPネイバーを設定するか、確立されたBGPピアリングをリセットしたときに発生します。

[Connect]

BGPはTCP 3ウェイハンドシェイクの完了を待機しています。成功すると、OpenSentステートに移行します。障害が発生した場合は、アクティブ状態に戻ります。

アクティブ

BGPは別のTCP 3ウェイハンドシェイクを試行して、リモートBGPネイバーとの接続を確立します。成功すると、はOpenSent状態に移行します。ConnectRetryタイマーの期限が切れると、Connect状態に戻ります。

開封済み

この状態では、BGPはリモートBGPネイバーからのOpenメッセージを待機します。

OpenConfirm

BGPは、リモートBGPネイバーからのキープアライブメッセージを待機します。

設立

BGPネイバー/アジャセンシー関係が確立され、BGPルータは更新パケットを送信してルーティング情報を交換します。

BGPピア情報を理解します。

switch# show ip bgp neighbors 10.1.1.1

BGP neighbor is 10.1.1.1, remote AS 64512, ibgp link, Peer index 3             -> Peer IP address, remote ASN, type of bgp peering.

BGP version 4, remote router ID 172.16.255.255                               -> BGP version, Peer Router ID

Neighbor previous state = OpenConfirm                                        -> Previous BGP state

BGP state = Established, up for 00:05:29                                     -> Current BGP state and amount of time on it

Neighbor vrf: default                                                        -> VRF used for the peering.

Peer is directly attached, interface Ethernet1/49                            -> Interface used to source the updates

Last read 00:00:28, hold time = 180, keepalive interval is 60 seconds        -> Amount of time from last keepalive received and BGP timers (default)

Last written 00:00:28, keepalive timer expiry due 00:00:31                   -> Amount of time from last keepalive sent

Received 363 messages, 0 notifications, 0 bytes in queue

Sent 354 messages, 1 notifications, 0(0) bytes in queue

Enhanced error processing: On

0 discarded attributes

Connections established 2, dropped 1                                         -> Counters informing the amount of times the BGP seesion has gone up/down

Last update recd 00:05:28, Last update sent  = 00:05:28                      -> Timer of the last major bgp table update sent and received.

Last reset by us 00:06:21, due to holdtimer expired error                   -> Last reset timer and reset reason.

Last error length sent: 0

Reset error value sent: 0

Reset error sent major: 4 minor: 0

Notification data sent:

Last reset by peer never, due to No error

Last error length received: 0

Reset error value received 0

Reset error received major: 0 minor: 0

Notification data received:

Neighbor capabilities:

Dynamic capability: advertised (mp, refresh, gr) received (mp, refresh, gr)

Dynamic capability (old): advertised received

Route refresh capability (new): advertised received

Route refresh capability (old): advertised received

4-Byte AS capability: advertised received

Address family IPv4 Unicast: advertised received

Graceful Restart capability: advertised received

Graceful Restart Parameters:

Address families advertised to peer:

IPv4 Unicast

Address families received from peer:

IPv4 Unicast

Forwarding state preserved by peer for:

Restart time advertised to peer: 120 seconds

Stale time for routes advertised by peer: 300 seconds

Restart time advertised by peer: 120 seconds

Extended Next Hop Encoding Capability: advertised received

Receive IPv6 next hop encoding Capability for AF:

IPv4 Unicast  VPNv4 Unicast

Message statistics:

Sent               Rcvd

Opens:                         2                  2

Notifications:                 1                  0

Updates:                      22                 20

Keepalives:                  340                339

Route Refresh:                 1                  0

Capability:                    2                  2

Total:                       354                363

Total bytes:                7949               7524

Bytes in queue:                0                  0

For address family: IPv4 Unicast

BGP table version 88, neighbor version 88

8 accepted prefixes (8 paths), consuming 2176 bytes of memory

0 received prefixes treated as withdrawn

11 sent prefixes (11 paths)                                                  -> Amount of prefixes advertises to peer.

Inbound soft reconfiguration allowed(always)

Third-party Nexthop will not be computed.

Inbound ip prefix-list configured is allow_in, handle obtained

Outbound ip prefix-list configured is allow_out, handle obtained

Last End-of-RIB received 00:00:01 after session start

Last End-of-RIB sent 00:00:01 after session start

First convergence 00:00:01 after session start with 11 routes sent

Local host: 10.1.1.2, Local port: 28262

Foreign host: 10.1.1.1, Foreign port: 179

fd = 73

BGPテーブルについて

この出力には、BGPテーブルで学習されたすべてのプレフィックスのステータス、ネクストホップ、メトリック、ローカルプリファレンス、重み、およびAS-pathが表示されます。

switch# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 88, Local Router ID is 172.17.255.255

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.0/30        0.0.0.0                  0        100      32768 ?

*>i10.100.1.0/24      10.1.1.1                          100          0 i

*>i10.100.2.0/24      10.1.1.1                          100          0 i

*>i10.100.3.0/24      10.1.1.1                          150          0 i

*>i10.100.4.0/24      10.1.1.1                 0        100          0 ?

*>i10.100.5.0/24      10.1.1.1                 0        100          0 ?

*>i10.100.6.0/24      10.1.1.1                 0        100          0 ?

*>i10.100.7.0/24      10.1.1.1                 0        100          0 ?

*>i10.100.8.0/24      10.1.1.1                 0        100          0 ?

*>r172.17.255.255/32  0.0.0.0                  0        100      32768 ?

*>e172.30.1.0/24      172.18.255.255           0                     0 65535 ?

*>e172.30.2.0/24      172.18.255.255           0                     0 65535 ?

*>e172.30.3.0/24      172.18.255.255           0                     0 65535 ?

*>e172.30.4.0/24      172.18.255.255           0                     0 65535 ?

*>e172.30.5.0/24      172.18.255.255           0                     0 65535 65534 65533 ?

*>e172.30.6.0/24      172.18.255.255           0                     0 65535 65534 65533 ?

*>e172.30.7.0/24      172.18.255.255           0                     0 65535 65534 65533 ?

*>e172.30.8.0/24      172.18.255.255           0                     0 65535 65534 65533 ?

*>r192.168.1.0/30     0.0.0.0                  0        100      32768 ?

プレフィックスは特定のBGPネイバーにアドバタイズされます。

switch# show ip bgp neighbors 172.18.255.255 advertised-routes

Peer 172.18.255.255 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 172.17.255.255

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop        Metric    LocPrf    Weight Path

*>i10.100.1.0/24   10.1.1.1                  100       0 i

*>i10.100.2.0/24   10.1.1.1                  100       0 i

*>i10.100.3.0/24   10.1.1.1                  150       0 i

*>i10.100.4.0/24   10.1.1.1        0         100       0 ?

*>i10.100.5.0/24   10.1.1.1        0         100       0 ?

*>i10.100.6.0/24   10.1.1.1        0         100       0 ?

*>i10.100.7.0/24   10.1.1.1        0         100       0 ?

*>i10.100.8.0/24   10.1.1.1        0         100       0 ?

フィルタ（プレフィックスリストまたはルートマップ）*の前にBGPピアから受信したプレフィックス

switch# show ip bgp neighbors 172.18.255.255 received-routes

Peer 172.18.255.255 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 172.17.255.255

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network                Next Hop         Metric      LocPrf         Weight Path

* e172.18.255.255/32   172.18.255.255    0                         0 65535 ?

*>e172.30.1.0/24       172.18.255.255    0                         0 65535 ?

*>e172.30.2.0/24       172.18.255.255    0                         0 65535 ?

*>e172.30.3.0/24       172.18.255.255    0                         0 65535 ?

*>e172.30.4.0/24       172.18.255.255    0                         0 65535 ?

*>e172.30.5.0/24       172.18.255.255    0                         0 65535 65534 65533 ?

*>e172.30.6.0/24       172.18.255.255    0                         0 65535 65534 65533 ?

*>e172.30.7.0/24       172.18.255.255    0                         0 65535 65534 65533 ?

*>e172.30.8.0/24       172.18.255.255    0                         0 65535 65534 65533 ?

注 Soft-reconfiguration inboundをネイバーで設定する必要がある

フィルタ後にBGPピアから受信したプレフィクス（プレフィックスリストまたはルートマップ）

switch# show ip bgp neighbors 172.18.255.255 routes

Peer 172.18.255.255 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 172.17.255.255

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop          Metric     LocPrf      Weight Path

*>e172.30.1.0/24   172.18.255.255    0                      0 65535 ?

*>e172.30.2.0/24   172.18.255.255    0                      0 65535 ?

*>e172.30.3.0/24   172.18.255.255    0                      0 65535 ?

*>e172.30.4.0/24   172.18.255.255    0                      0 65535 ?

*>e172.30.5.0/24   172.18.255.255    0                      0 65535 65534 65533 ?

*>e172.30.6.0/24   172.18.255.255    0                      0 65535 65534 65533 ?

*>e172.30.7.0/24   172.18.255.255    0                      0 65535 65534 65533 ?

*>e172.30.8.0/24   172.18.255.255    0                      0 65535 65534 65533 ?

特定のプレフィックスの詳細パス情報。

switch# show ip bgp 172.30.6.0

BGP routing table information for VRF default, address family IPv4 Unicast

BGP routing table entry for 172.30.6.0/24, version 28                                          -> Prefix and mask

Paths: (3 available, best #3)                                                                  -> Number of possible paths and which one is selected as best option

Flags: (0x8000001a) (high32 00000000) on xmit-list, is in urib, is best urib route, is in HW

Path type: external, path is valid, not best reason: Router Id, no labeled nexthop

AS-Path: 65535 65534 65533 , path sourced external to AS                                       -> As Path to reach the prefix*

172.20.255.255 (metric 0) from 172.20.255.255 (172.20.255.255)                                 -> Next hop towards the prefix

Origin incomplete, MED 0, localpref 100, weight 0

Path type: external, path is valid, not best reason: newer EBGP path, no labeled nexthop

AS-Path: 65535 65534 65533 , path sourced external to AS

172.19.255.255 (metric 0) from 172.19.255.255 (172.19.255.255)

Origin incomplete, MED 0, localpref 100, weight 0

Advertised path-id 1

Path type: external, path is valid, is best path, no labeled nexthop, in rib                  -> Path selection motive

AS-Path: 65535 65534 65533 , path sourced external to AS

172.18.255.255 (metric 0) from 172.18.255.255 (172.18.255.255)

Origin incomplete, MED 0, localpref 100, weight 0

Path-id 1 advertised to peers:                                                               -> BGP peers were the prefix is advertised

10.1.1.2

注:*AS-Pathは、プレフィクスが発信された場所に到達するために通過するASNを表します。

**AS-Pathは右から左に読み取ります。

BGPでのベストパス選択プロセスを確認するには、「BGPでベストパスを選択する」を参照してください。

関連情報

- シスコのテクニカルサポートとダウンロード