内容

概要

前提条件

要件

使用するコンポーネント

表記法

トポロジ ダイアグラム

設定

設定

確認

トラブルシュート

関連情報

概要

この設定では、2 つの異なる X.25 リソースがあります（この設定では、エンド デバイスをシミュレートするために dspu ホストを使用しています）。 ダウンストリーム物理ユニット（DSPU）の詳細については、次のドキュメントを参照してください。

- DSPUおよびSNAサービスポイントサポートの設定

- 下流物理ユニット（DPUF）に関する FAQ

これらの2つのエンドデバイスは、X.25を介してメインフレームサイトの異なるアダプタと通信します。リモートX.25リソースは、異なる宛先アドレス（長さとアドレスが異なる）に設定されています。 X.121宛先アドレスがルータの「qllc dlsw subaddress」に一致するすべての着信コールは、Data Link Switching Plus(DLSw+)(ID.STN IND)にディスパッチされます。 DLSw+がプール内の仮想MACアドレスに関する「Can You Reach」の問い合わせを受信すると、Qualified Logical Link Control（QLLC；修飾論理リンク制御）コードは、指定された仮想MACアドレスにマッピングされるX.1221221121アドレス21121112111111112211111121111111011000000000000000000000000000000着信コールが受信されると、QLLCは仮想MACアドレスを持つID.STN.INDをプールからDLSw+に送信します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco IOS® ソフトウェアリリース12.2(6a)はPath(Cisco 2612)で使用されました

- Cisco IOSソフトウェアリリース12.0(20)は、Namur & Goode(Cisco 2500、Cisco 4000)で使用されました

- Cisco IOSソフトウェアリリース12.1(7)はNele(Cisco 4500)で使用されました

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

トポロジ ダイアグラム

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

設定

メインフレームのMACアドレスは次のとおりです。

- 4000.7507.0000

- 4000.7507.ffff

このドキュメントで使用する設定を次に示します。

- Cisco 7507(Meatfeast)

- Cisco 2612（パス）

- Cisco 4500(Nesle)

- Cisco 2500（名前）

- Cisco 4000（グード）

Cisco 7507(Meatfeast)

source-bridge ring-group 100

dlsw local-peer peer-id 10.48.64.75 promiscuous

!

interface Channel4/2

ip address 10.48.64.225 255.255.255.240

no keepalive

lan TokenRing 0

source-bridge 88 1 100

adapter 0 4000.7507.0000

adapter 1 4000.7507.ffff

Cisco 2612（パス）

!

source-bridge ring-group 200

dlsw local-peer peer-id 10.48.64.40

dlsw remote-peer 0 tcp 10.48.64.75

!

interface Ethernet0/0

ip address 10.48.64.40 255.255.255.0

half-duplex

!

interface Serial0/0

no ip address

!

interface TokenRing0/0

no ip address

ring-speed 16

!

interface Serial0/1

no ip address

encapsulation x25

x25 alias .*

!--- It is used against the destination !--- address of a received call.

x25 htc 10

x25 win 7

x25 wout 7

qllc accept-all-calls

qllc dlsw subaddress 123456789012345 vmacaddr 4000.3333.0000 2 partner 4000.7507.0000

qllc dlsw subaddress 2224 vmacaddr 4000.2222.0000 2 partner 4000.7507.ffff

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

Cisco 4500(Nesle)

!

x25 routing

!

!

!

interface Ethernet0

ip address 10.48.64.34 255.255.255.0

media-type 10BaseT

!

interface Ethernet1

no ip address

shutdown

media-type 10BaseT

!

interface Ethernet2

no ip address

media-type 10BaseT

!

interface Serial0

no ip address

encapsulation x25 dce

clockrate 250000

!

interface Serial1

no ip address

!

interface Serial2

no ip address

encapsulation x25 dce

no ip mroute-cache

clockrate 250000

!

interface Serial3

no ip address

encapsulation x25 dce

clockrate 250000

!

interface TokenRing0

no ip address

ring-speed 16

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

x25 route input-interface Serial2 interface Serial0

x25 route input-interface Serial3 interface Serial0

x25 route 555 interface Serial2

x25 route 666 interface Serial3

!

line con 0

exec-timeout 0 0

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password 7 071836

login

!

ntp clock-period 17179258

ntp server 10.48.64.100

end

Cisco 2500（名前）

hostname namur

!

logging buffered 150000 debugging

enable password 7 120E12

!

dspu host OZDEN xid-snd 00000000 x25 2224 qllc 12 interface Serial1

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 555

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 12

dspu start OZDEN

!

interface TokenRing0

no ip address

no ip directed-broadcast

shutdown

!

Cisco 4000（グード）

dspu host GOODE xid-snd 11132323 x25 123456789012345 qllc 20 interface Serial1

!

interface Ethernet0

ip address 10.48.64.17 255.255.255.0

no ip directed-broadcast

media-type 10BaseT

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 666

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 20

dspu start GOODE

!

確認

このセクションでは、設定がアクティブであることを確認するための情報を提供します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show llc2：ルータでアクティブなLLC2接続を表示します。

- show version：ソフトウェアバージョン情報を表示します。

- show dlsw peer:dlswピア接続情報を表示します。

- show dlsw circuit detail:DLSW回線の詳細を表示します。

- show qllc serial 0/1:QLLC serial 0/1に関する情報を表示します。

- show x25 interface serial 0/1:X.25シリアルインターフェイス0/1の回線とプロトコルのステータスを表示します。

- show x25 route:X.25ルーティングテーブルを表示します。

- show x25 interface serial 0:X.25シリアルインターフェイス0の回線とプロトコルのステータスを表示します。

- show dspu:DSPU機能のステータスを表示します。

- show x25 interface serial 1:X.25シリアルインターフェイス1の回線とプロトコルのステータスを表示します。

肉食

#show llc2

....

Channel4/2 DTE: 4000.7507.ffff 4000.2222.0000 04 04 state NORMAL

V(S)=1, V??)=1, Last N??)=1, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5430/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Channel4/2 DTE: 4000.7507.0000 4000.3333.0000 04 04 state NORMAL

V(S)=6, V??)=6, Last N??)=6, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5630/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

パソス

pathos#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.2(6a), RELEASE SOFTWARE (fc1)

Copyright ??) 1986-2001 by cisco Systems, Inc.

Compiled Sat 01-Dec-01 22:30 by pwade

Image text-base: 0x80008088, data-base: 0x810616B4

pathos#show dlsw peer

Peers:                state     pkts_rx   pkts_tx  type  drops ckts TCP   uptime

TCP 10.48.64.75     CONNECT        118        91  conf      0    2   0 00:32:12

Total number of connected peers: 1

Total number of connections:     1

pathos#show dlsw circuit detail

Index           local addr(lsap)    remote addr(dsap)  state          uptime

234881048       4000.2222.0000(04)  4000.7507.ffff(04) CONNECTED      00:29:50

PCEP: 81C25730   UCEP: 81D88528

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:19; Rx CW:20, Granted:39; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             429/453        Info-frames:           1/1

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

1426063385      4000.3333.0000(04)  4000.7507.0000(04) CONNECTED      00:29:49

PCEP: 81D081B4   UCEP: 81D108B0

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:34; Rx CW:20, Granted:34; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             554/513        Info-frames:           6/6

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

Total number of circuits connected: 2

pathos#show qllc serial 0/1

Interface Serial0/1

vc 2 66620

Circuit State P4/D1, Logical Link State QLOpened 4000.3333.0000(04)->4000.7507.0000(04)

0 packets held

vc 1 55512

Circuit State P4/D1, Logical Link State QLOpened 4000.2222.0000(04)->4000.7507.ffff(04)

0 packets held

pathos#

pathos#show x25 interface  serial 0/1

SVC 1,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 55512 <-->

qllc 4000.2222.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 66620 <-->

qllc 4000.3333.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

pathos#

ネスル

nesle#show x25 route

#  Match                         Substitute          Route to

1  input-int Serial2                                 Serial0

2  input-int Serial3                                 Serial0

3  dest 555                                          Serial2

4  dest 666                                          Serial3

nesle#show x25 interface serial 0

SVC 1,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 55512 <--> 2224 from Serial2 SVC 10

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 66620 <--> 123456789012345 from Serial3 SVC 1024

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 2

SVC 10,  State: D1,  Interface: Serial2

Started 00:32:51, last input 00:32:50, output 00:32:50

Connects 55512 <--> 2224 to Serial0 SVC 1

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 3

SVC 1024,  State: D1,  Interface: Serial3

Started 00:32:53, last input 00:32:52, output 00:32:52

Connects 66620 <--> 123456789012345 to Serial0 SVC 2

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

ナモル

namur#show dspu

dspu host OZDEN Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 8 FRAMES SENT 8

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 0

namur#show x25 interface serial 1

SVC 10,  State: D1,  Interface: Serial1

Started 00:34:55, last input 00:34:54, output 00:34:54

Connects 2224 <-->

qllc

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

namur#

グード

goode#show dspu

dspu host GOODE Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 18 FRAMES SENT 18

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 5

goode#show x25 interface serial 1

SVC 1024,  State: D1,  Interface: Serial1

Started 00:41:25, last input 00:41:25, output 00:41:25

Connects 123456789012345 <-->

qllc

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

goode#

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- Data-Link Switching Plus(DLSw+)テクノロジーに関するサポートページ

- IBMテクノロジーのサポート

- テクニカル サポートとドキュメント – Cisco Systems