内容

概要

はじめに

表記法

前提条件

使用するコンポーネント

コンフィギュレーション

ネットワーク図

コンフィギュレーション

確認

関連情報

概要

一般にブリッジはオープン システム インターコネクション（OSI）参照モデルのデータリンク層（レイヤ 2）で動作します。ブリッジは、フレームのメディア アクセス コントロール（MAC）アドレスに基づいて着信フレームをフィルタ、転送、フラッディングします。

ブリッジングは、ケーブルモデムがオンラインになると得られるデフォルト設定です。

ブリッジングアプリケーションでは、Cisco uBR900シリーズケーブルアクセスルータは、Cisco IOS®ソフトウェアリリース12.0.5T1以降を実行している場合、イーサネットポート上で最大254台のデバイスに対してトランスペアレントブリッジとして機能します。以前のバージョンのCisco IOSソフトウェアでは、Cisco uBR900シリーズルータのイーサネットポートで最大3つのデバイスがサポートされています。

この設定は、Cisco IOSソフトウェアリリース12.0(7)Tが稼働するuBR904と、Cisco IOSソフトウェアリリース12.1(2)Tが稼働するCisco uBR7223でテストされています。

はじめに

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

前提条件

このドキュメントに関しては個別の前提条件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco IOSソフトウェアリリース12.0(7)Tが稼働するuBR904

- Cisco IOSソフトウェアリリース12.1(2)Tが稼働するCisco uBR7223

コンフィギュレーション

ネットワーク図

コンフィギュレーション

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

uBR900

Current configuration:

!

! No configuration change since last restart

!version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

!

!

!

!

!

clock timezone - 0

ip subnet-zero

no ip routing

!--- Router is operating in bridging mode.

!

!

!

!

!

interface Ethernet0

ip address 10.1.1.26 255.255.255.0

no ip directed-broadcast

no ip route-cache

bridge-group 59

bridge-group 59 spanning-disabled

!

interface cable-modem0

ip address negotiated

no ip directed-broadcast

no ip route-cache

cable-modem downstream saved channel 453000000 28 1

cable-modem mac-timer t2 60000

bridge-group 59

bridge-group 59 spanning-disabled

!

ip default-gateway 10.1.1.10

ip classless

no ip http server

!

!

line con 0

transport input none

line vty 0 4

!

end

Router#

注：上記の設定は、ケーブルモデムの電源を入れ、オンラインステータスを取得した後に取得されたものです。工場出荷時のデフォルト（デフォルト）以降、設定変更はありません。また、旧バージョンのCisco IOSでは、ケーブルインターフェイスは「ip address negotiated」ではなく実際のIPアドレスを示すことに注意してください。

uBR7200

Current configuration:

!

! Last configuration change at 16:55:41 UTC Mon Nov 20 2000

! NVRAM config last updated at 16:55:12 UTC Mon Nov 20 2000

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname sniper

!

boot system flash ubr7200-ik1s-mz_121-2_T.bin

no logging buffered

enable password cisco

!

no cable qos permission create

no cable qos permission update

cable qos permission modems

!

!

!

ip subnet-zero

no ip domain-lookup

!

no lane client flush

!

!

!

!

interface FastEthernet0/0

no ip address

shutdown

half-duplex

!

interface Ethernet1/0

ip address 172.17.110.139 255.255.255.224

!

interface Ethernet1/1

no ip address

shutdown

!

interface Ethernet1/2

no ip address

shutdown

!

interface Ethernet1/3

no ip address

shutdown

!

interface Ethernet1/4

no ip address

shutdown

!

interface Ethernet1/5

no ip address

shutdown

!

interface Ethernet1/6

no ip address

shutdown

!

interface Ethernet1/7

no ip address

shutdown

!

interface Cable2/0

ip address 10.10.1.1 255.255.255.0 secondary

ip address 10.1.1.10 255.255.255.0

no keepalive

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 451250000

cable upstream 0 frequency 28000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.17.110.136

!

interface Cable3/0

no ip address

no keepalive

shutdown

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.17.110.129

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0

exec-timeout 0 0

password cisco

login

line vty 1 4

password cisco

login

!

end

確認

注：特定のshowコマンドは、Output Interpreter Tool(登録ユーザ専用)でサポートされています。このツールを使用すると、showコマンド出力の分析を表示できます。

Cisco uBR7200でshow cable modemコマンドを実行すると、このCisco uBR7200に接続されているケーブルモデムのステータスが表示されます。上のuBR7200ルータからの出力は次のとおりです。

sniper#sh cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable2/0/U0 11   online     2287    0.25  5   0   10.1.1.25       0050.7366.2223

Cable2/0/U0 12   online     2812    0.25  5   0   10.1.1.28       0001.9659.4415

Cable2/0/U0 13   online     2810   -0.50  5   0   10.1.1.20       0030.96f9.65d9

Cable2/0/U0 14   online     2290    0.50  5   0   10.1.1.26       0050.7366.2221

Cable2/0/U0 15   online     2292    0.25  5   0   10.1.1.30       0050.7366.1fb9

Cable2/0/U0 16   online     2815    0.00  5   0   10.1.1.27       0001.9659.4461

状態が「online」と表示されない場合は、これをトラブルシューティングする必要があります。Cisco uBR900から、debug cable-modem mac log verboseと入力できます。トラブルシューティングの詳細については、「uBRケーブルモデムがオンラインにならない場合のトラブルシューティング」を参照してください。

関連情報

- ケーブル モデムに関するサポート ページ

- Cisco uBR904 ケーブル モデムのブリッジング機能とルーティング機能

- トラブルシューティング：uBR ケーブル モデムがオンラインにならない場合

- テクニカルサポート - Cisco Systems