内容

概要

Cisco UBR7200 シリーズのケーブルインターフェイスの基本設定を教えて下さい。

Cisco UBR7100 シリーズのケーブルインターフェイスの基本設定を教えて下さい。

ケーブル モデム ターミネーション システム（CMTS）で Time of Day（ToD）、トリビアル ファイル転送プロトコル（TFTP）、およびダイナミック ホスト コンフィギュレーション プロトコル（DHCP）をすべて実行するには、どのように設定するのですか。

Cisco CMTS をブリッジとして設定できますか。

Cisco CMTS は PPPoE をサポートしますか。

DOCSIS1.0 でのベースライン プライバシはどのように設定するのですか。

Cisco CMTS でのバンドルはどのように設定するのですか。

関連情報

概要

このドキュメントでは、ケーブル モデム ターミネーション システム（CMTS）に関する FAQ への回答が示されています。

Q. Cisco uBR7200シリーズのケーブルインターフェイスの基本的な設定例を教えてください。

A.次には、設定例を示します。

interface Cable4/0

ip address 10.1.1.1 255.255.0.0

!--- For the cm to talk to the CMTS. Usually this address is private.

!

ip address 200.1.1.1 255.255.0.0 secondary

!--- For the PCs to talk to the CMTS. Usually this address is public so !--- that the PCs can go to the Internet.

!

load-interval 30

no ip directed-broadcast

cable helper-address 200.1.162.170

!--- Specify the IP address of the DHCP server.

no keepalive

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- This is cosmetic on uBR7200 but must match the upconverter for the !--- uBR7200 platforms so that you know the exact value on the upconverter.

Cable upstream 0 power-level 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port Upstream 0. Enter this command to turn the port on.

Cable upstream 0 frequency 37008000

!--- Upstream frequency. Make sure that this frequency is set to a clean !--- part of the spectrum and is set after careful analysis of your cable !--- plant.

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

Q. Cisco uBR7100シリーズのケーブルインターフェイスの基本的な設定例を教えてください。

A.次には、設定例を示します。

interface Cable1/0

ip address 111.111.111.111 255.255.255.0 secondary

!--- For the PCs to communicate with the CMTS. Usually this address !--- is public so that the PCs can go to the Internet.

ip address 10.4.1.1 255.255.255.0

!--- For the cm to talk to the CMTS. Usually this address is private.

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- Needs to be set to the center frequency of the downstream channel.

no cable downstream rf-shutdown

!--- Enables the integrated upconverter.

cable downstream rf-power 51

!--- Sets the RF power output level on the integrated upconverter !--- (default=50dBmV).

cable upstream 0 frequency 32000000

!--- Upstream frequency, you need to make sure that this frequency is set !--- to a clean part of the spectrum and is set after careful analysis !--- of your cable plant.

cable upstream 0 power-level 0

!--- Default.

cable upstream 0 timing-adjust threshold 0

!--- Default.

cable upstream 0 timing-adjust continue 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port upstream 0. Must enter this command to turn the port on.

Cable upstream 1 timing-adjust threshold 0

cable upstream 1 timing-adjust continue 0

cable upstream 1 shutdown

cable upstream 2 timing-adjust threshold 0

cable upstream 2 timing-adjust continue 0

cable upstream 2 shutdown

cable upstream 3 timing-adjust threshold 0

cable upstream 3 timing-adjust continue 0

cable upstream 3 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

!

Q. Time of Day(ToD)、Trivial File Transfer Protocol(TFTP)、およびDynamic Host Configuration Protocol(DHCP)を1つにまとめて実行するようにCMTSを設定するにはどうすればよいのですか。

A.最初に、このセクションの設定を使用する際に、最新の12.x ECバージョンがあることを確認してください。

DISCOVER パケットでは他のマシンの補助は必要としないため、設定に cable helper address 文は不要です。DISCOVER パケットは CMTS にあります。

uBR7200の設定内に作成された2つの設定ファイルを次に示します。1つの設定ファイルはplatinum.cmと呼ばれて、もう1つのファイルはdisable.cmと呼ばれる。CMTS に DOCSIS コンフィギュレーション ファイルを作成すると、このファイルをフラッシュにコピーしたり、TFTP を使用する必要はありません。このコンフィギュレーションがあると、外部の DOCSIS コンフィギュレーション ファイルを置く必要はありません。

cable config-file disable.cm

access-denied

service-class 1 max-upstream 1

service-class 1 max-downstream 1600

cpe max 1

timestamp

!

cable config-file platinum.cm

service-class 1 max-upstream 128

service-class 1 guaranteed-upstream 10

service-class 1 max-downstream 10000

service-class 1 max-burst 1600

cpe max 10

timestamp

注：インターフェイスの下にあるIP helper addressコマンドが、設定した外部DHCPサーバを指している場合、ケーブルモデムは外部DHCPサーバから設定を取得します。

ダイナミックに platinum.cm コンフィギュレーション ファイルを参照するケーブル モデムのポリシーを次に示します。

ip dhcp pool cm-platinum

network 10.1.4.0 255.255.255.0

bootfile platinum.cm

next-server 10.1.4.1

default-router 10.1.4.1

option 7 ip 10.1.4.1

option 4 ip 10.1.4.1

option 2 hex ffff.8f80

lease 7 0 10

次に示すのは、アドレスを取得する PC 用のポリシーです。

ip dhcp pool pcs-c4

network 172.16.29.0 255.255.255.224

next-server 172.16.29.1

default-router 172.16.29.1

dns-server 172.16.30.2

domain-name cisco.com

lease 7 0 10

disable.cm にマッピングされた特定のケーブル モデムの MAC アドレスに対するスタティック バインディングを次に示します。

ip dhcp pool cm-0010.7bed.9b45

host 10.1.4.65 255.255.255.0

client-identifier 0100.107b.ed9b.45

bootfile disable.cm

フラッシュ上の silver.cm コンフィギュレーション ファイルにマッピングされた特定のケーブル モデムの MAC アドレスに対するスタティック バインディングを次に示します。

ip dhcp pool cm-0010.7bed.9b23

host 10.1.4.66 255.255.255.0

client-identifier 0100.107b.ed9b.23

bootfile silver.cm

.cm ファイルがフラッシュにあって、TFTP サーバにない場合は、tftp server slot0:silver.cm alias silver.cm 文を使用します。

ご使用の uBR72xx のフラッシュに DOCSIS コンフィギュレーション ファイルを置くには、次の手順を実行します。

1. uBR7200で、copy tftp slot:0:コマンドを入力し、Enterキーを押します。パーサーにより、リモート ホスト名の入力を求められます。

2. .cm ファイルを置いてある TFTP サーバのアドレスを指定します。パーサーにより、ソース ファイル名の入力を求められます。

3. .cm ファイル名を入力して、Enter キーを押します。

4. show slot0:コマンドを使用して、DOCSISコンフィギュレーションファイルが存在するかどうかを確認し、そのサイズがTFTPサーバのサイズと一致するかどうかを確認します。

Q. Cisco CMTSをブリッジとして設定できますか。

A. uBR72xxシリーズをブリッジとして設定することはできません。ただし、サービス業向けに設計された uBR7100 シリーズではブリッジングをサポートしているため、ラップトップ上で固定 IP アドレスを使用するような場合に、出張時にインターネット接続を行うことができます。詳細は、『UBR 7100 をブリッジ モードに設定』を参照してください。

Q. Cisco CMTSはPPPoEをサポートしていますか。

A. Cisco uBR7200シリーズルータは、Point-to-Point Protocol over Ethernet(PPPoE)終端をサポートしていますが、PPPoE転送はサポートしていません。PPPoE終端は、現在Cisco IOS®ソフトウェアリリース12.1(5)Tで使用できます。

PPPoE を使用すると、ケーブル インターフェイスに直接接続することができます。PPPoE ではサービス プロバイダ向けに digital-subscriber line（DSL; デジタル加入者線）をサポートしています。Cisco uBR7200 シリーズ ルータのケーブル インターフェイスで PPPoE をサポートすると、ケーブル モデムの背後にある customer premises equipment（CPE; 顧客宅内機器）で PPP を使用できるようになります。これによって IP アドレスを取得して、その後のすべてのデータ トラフィックにそのアドレスを使用するという、ダイヤルアップ PPP クライアントのようなメカニズムが使用できます。PPP ダイヤルアップ セッションでは、PPPoE セッションが認証されて、PPPoE クライアントとサーバ間で IP アドレスがネゴシエートされます。Cisco uBR7200 シリーズ ルータか Home Gateway のいずれかをサーバにできます。詳細は、『L2TP トンネリングを使用した uBR7100 CMTS での PPPoE 終端の設定』を参照してください。

Q. DOCSIS 1.0でベースラインプライバシを設定するにはどうすればよいのですか。

A.このような設定の前提条件を次に示します。

- CM と CMTS に K1 イメージが必要です。

- コンフィギュレーション ファイル エディタが必要です。

次の手順を実行して、コンフィギュレーション ファイル エディタでベースライン プライバシーをイネーブルにします。

1. CPE DOCSIS コンフィギュレータを開きます。

2. バージョン V2.0.4 あるいはバージョン 3.0.a を使用している場合は、DOCSIS コンフィギュレーション ファイルを編集して、Baseline Privacy Enable フィールドの値を 0 から 1 に変更します。0 がデフォルト値で、これはベースライン プライバシーがイネーブルにはなっていないことを示しています。

次の点に留意してください。

- DOCSIS コンフィギュレーション ファイルを tftpboot ディレクトリに置く必要がある。

- tftpboot ディレクトリは TFTP サーバにある。

- TFTP サーバは CMTS の FE ポートに接続されているか、CMTS の LAN 上にある。

CM がリブートされると、新しく作成した DOCSIS コンフィギュレーション ファイルのパラメータがロードされます。CM では、CMTS とのベースライン プライバシー インターフェイス（BPI）のネゴシエートが行われます。show cable modem コマンドを発行すると、CM は次のように登録されていると表示されます。単に online ではなく、online(PT)。(PT)が表示されない場合は、CMとCMTSにK1イメージがあり、Class-of-Service Privacyが= 1に有効になっているかどうかを再確認する必要があります。使用方法の詳細については、『Building DOCSIS 1.0 Configuration Files Using Cisco DOCSIS Configurator』(登録Configuratorおのみ)ををを参照) CPEコンフィギュレータV3.2ツール。

Q. Cisco CMTSでバンドリングを設定するにはどうすればよいのですか。

A.基本的なバンドル構成を次に示します。

hostname 7246VXR

!

interface Ethernet2/0

ip address 172.16.135.11 255.255.255.128

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.30.1 255.255.255.0

!--- IP address configured.

ip helper-address 172.16.135.20

!--- IP address of DHCP server.

no ip route-cache cef

no keepalive

cable bundle 1 master

!--- Master interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!

interface Cable5/0

no ip address

load-interval 30

no keepalive

cable bundle 1

!--- Slave interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

cable upstream 0 channel-width 1600000 3200000

no cable upstream 0 shutdown

no cable upstream 1 shutdown

no cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

この設定の検証とトラブルシューティングの詳細は、『ケーブル インターフェイスのバンドリングの設定例と検証』を参照してください。

関連情報

- テクニカル サポートとドキュメント – Cisco Systems