Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Procedura di recupero della password per Virtual 9800 (9800-CL)

Procedura di recupero della password dell'appliance tramite ROMMON

Procedura di recupero della password dell'accessorio tramite USB

Avviare il WLC da ROMMON

Carica immagine tramite USB

Carica immagine da TFTP

Risoluzione dei problemi

Altri comandi utili di ROMMON

Informazioni correlate

Introduzione

Questo documento descrive come ripristinare un controller Catalyst 9800 in modalità ROMMON e senza immagine nella memoria flash.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Catalyst Wireless Controller 9800

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Catalyst 9800 versione 16.10.1

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Procedura di recupero della password per Virtual 9800 (9800-CL)

Passaggio 1. Riavviare 9800-CL. Viene visualizzata rapidamente una schermata di selezione di avvio:

Passaggio 2. Premere C in questa schermata per visualizzare il prompt di grub.

Passaggio 3. È possibile modificare il registro di configurazione in tale prompt con il comando config 0x2142.

Passaggio 4. Premere il tasto ESC per tornare al prompt di selezione di avvio e scegliere packages.conf di avviare sull'immagine normale.

Passaggio 5. Il WLC viene avviato senza configurazione. Recuperatelo.

Passaggio 6. Non dimenticare di ripetere la procedura dal passaggio 1 e di impostare nuovamente il registro di configurazione sul valore originale di 0x2002 in modo che la configurazione venga salvata e caricata al riavvio.

Procedura di recupero della password dell'appliance tramite ROMMON

Passaggio 1. Invia tasto di interruzione quando #### viene stampato sulla console per il sistema che carica l'immagine. Quindi, il sistema interrompe il processo di avvio e passa al prompt ROMMON. È possibile eseguire questa operazione premendo break o ctrl+break sulla tastiera. È anche possibile inviare l'interruzione dal programma terminale (ad esempio, Putty Special Command > Break, Teraterm Control > Send Break).

Attenzione: il recupero della password richiede che il sistema sia scartato in ROMMON. Nel Cisco IOS® classico, l'impostazione del registro di configurazione determina se il sistema può tornare a ROMMON. Un registro di configurazione di 0x2102 impedirebbe la restituzione a ROMMON quando viene emessa un'interruzione. Per impostazione predefinita, su tutti gli accessori 9800 (9800-40, 9800-80, 9800-L) il registro di configurazione è impostato su 0x2102. Tuttavia, poiché eseguono Cisco IOS XE® basato su Linux, questo viene ignorato e l'unico modo per impedire la restituzione a ROMMON è configurare il comando no service password-recovery.

Avvertenza: su 9800-L con ROMMON precedente alla 16.12(3r), questo bit nel registro di configurazione impedisce l'accesso a ROMMON per eseguire il recupero della password.

Correzione: se si esegue un ROMMON precedente, aggiornare ROMMON con le istruzioni documentate all'indirizzo: Upgrade Field Programmables for Cisco Catalyst 9800-L Wireless Controller

Soluzione. Se non è possibile eseguire l'aggiornamento, modificare il registro di configurazione in 0x2002 come soluzione e impedire il blocco di ROMMON.

File size is 0x01d191f3 Located C9800-rpboot.16.10.01.SPA.pkg Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512 ################################################################################ ################################################################################ ################################################################################ ########################################################## Boot image size = 30511603 (0x1d191f3) bytes ROM:RSA Self Test Passed ROM:Sha512 Self Test Passed Package header rev 3 structure detected Calculating SHA-1 hash...done validate_package_cs: SHA-1 hash: calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 expected e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 Validating main package signatures monitor: command "boot" aborted due to user interrupt rommon 1 >

Passaggio 2. Modificare il registro di configurazione in 0x2142 con il comando delconfreg 0x2142 prompt ROMMON.

rommon 1 > confreg 0x2142 You must reset or power cycle for new config to take effect

Passaggio 3. Per salvare la modifica apportata alla configurazione di rommon, eseguire sync al prompt di rommon, reset  rommon per applicare la modifica dal prompt di rommon.

rommon 2 > sync rommon 3 > reset Resetting ....... Initializing Hardware ... System integrity status: 90170200 12030107 System Bootstrap, Version 16.10(2r), RELEASE SOFTWARE Copyright (c) 1994-2018 by cisco Systems, Inc. Current image running: Boot ROM0 Last reset cause: LocalSoft C9800-40-K9 platform with 33554432 Kbytes of main memory File size is 0x000015c9 Located packages.conf Image size 5577 inode num 874834, bks cnt 2 blk size 8*512 # File size is 0x01d191f3 Located C9800-rpboot.16.10.01.SPA.pkg Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512 ################################################################################ ################################################################################ ################################################################################ ########################################################## Boot image size = 30511603 (0x1d191f3) bytes ROM:RSA Self Test Passed ROM:Sha512 Self Test Passed Package header rev 3 structure detected Calculating SHA-1 hash...done validate_package_cs: SHA-1 hash: calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 expected e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 Validating main package signatures RSA Signed RELEASE Image Signature Verification Successful. Image validated Jun 21 02:30:21.565: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:24.561: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Both links down, not waiting for other chassis Chassis number is 1 Jun 21 02:30:25.327: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:27.293: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:33.770: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:37.045: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Restricted Rights Legend Use, duplication, or disclosure by the Government is subject to restrictions as set forth in subparagraph (c) of the Commercial Computer Software - Restricted Rights clause at FAR sec. 52.227-19 and subparagraph (c) (1) (ii) of the Rights in Technical Data and Computer Software clause at DFARS sec. 252.227-7013. Cisco Systems, Inc. 170 West Tasman Drive San Jose, California 95134-1706 Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOS XE), Version 16.10.1, R ELEASE SOFTWARE (fc4) Technical Support: http://www.cisco.com/techsupport Copyright (c) 1986-2018 by Cisco Systems, Inc. Compiled Mon 19-Nov-18 08:27 by mcpre PLEASE READ THE FOLLOWING TERMS CAREFULLY. INSTALLING THE LICENSE OR LICENSE KEY PROVIDED FOR ANY CISCO SOFTWARE PRODUCT, PRODUCT FEATURE, AND/OR SUBSEQUENTLY PROVIDED SOFTWARE FEATURES (COLLECTIVELY, THE "SOFTWARE"), AND/OR WITH SUCH SOFTWARE CONSTITUTES YOUR FULL ACCEPTANCE OF THE FOLLOWING TERMS. YOU MUST NOT PROCEED FURTHER IF YOU ARE NOT WILLING TO BE BOUND BY ALL THE TERMS SET FORTH HEREIN. Your use of the Software is subject to the Cisco End User License Agreement (EULA) and any relevant supplemental terms (SEULA) found at http://www.cisco.com/c/en/us/about/legal/cloud-and-software/software-terms.html. You hereby acknowledge and agree that certain Software and/or features are licensed for a particular term, that the license to such Software and/or features is valid only for the applicable term and that such Software and/or features may be shut down or otherwise terminated by Cisco after expiration of the applicable license term (for example, 90-day trial period). Cisco reserves the right to terminate any such Software feature electronically or by any other means available. While Cisco may provide alerts, it is your sole responsibility to monitor your usage of any such term Software feature to ensure that your systems and networks are prepared for a shutdown of the Software feature. cisco C9800-40-K9 (1GL) processor (revision 1GL) with 7866660K/6147K bytes of me mory. FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled Processor board ID TTM22500DAL 1 Virtual Ethernet interface 4 Ten Gigabit Ethernet interfaces 32768K bytes of non-volatile configuration memory. 33554432K bytes of physical memory. 26255359K bytes of eUSB flash at bootflash:. 234365527K bytes of SATA hard disk at hard disk:. 0K bytes of WebUI ODM Files at webui:. Base Ethernet MAC Address : D4:C9:3C:CC:F2:E0 Installation mode is INSTALL Press RETURN to get started! *Jun 21 02:31:00.165: %IOS XE_PLATFORM-3-WDC_NOT_FOUND: WDC returned length: 0 *Jun 21 02:31:00.185: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled features is not allowedAdding registry invocations for the WLC platform *Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_READY: Smart Agent for Licensing is ini tialized *Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_ENABLED: Smart Agent for Licensing is e nabled *Jun 21 02:31:01.743: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled features is not allowed *Jun 21 02:31:04.732: mcp_pm_subsys_init : Init done sucessfullyRA Tracing tool registry return: 0SID Manager, starting initialization ... *Jun 21 02:31:05.511: Notifications initializedSID Manager, completed initializa tion ... *Jun 21 02:31:07.298: %SPANTREE-5-EXTENDED_SYSID: Extended SysId enabled for typ e vlan *Jun 21 02:31:08.999: %CRYPTO-4-AUDITWARN: Encryption audit check could not be p erformed *Jun 21 02:31:09.081: %VOICE_HA-7-STATUS: CUBE HA-supported platform detected. *Jun 21 02:31:09.317: %IOSXE_VMAN-3-MSGINITFAIL: Failed to initialize required V irt-manager resource: Initalize MQIPC *Jun 21 02:31:09.333: mcp_pm_init_done : Called *Jun 21 02:31:09.338: %LINK-3-UPDOWN: Interface Lsmpi0, changed state to up *Jun 21 02:31:09.345: %LINK-3-UPDOWN: Interface EOBC0, changed state to up *Jun 21 02:31:09.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface VoIP-Null0 , changed state to up *Jun 21 02:31:09.346: %LINEPROTO-5-UPDOWN: Line protocol on Interface LI-Null0, changed state to up *Jun 21 02:31:09.346: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state to down *Jun 21 02:31:09.351: %LINK-3-UPDOWN: Interface LIIN0, changed state to up *Jun 21 02:30:33.738: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e xecutable used for process bt_logger *Jun 21 02:30:37.011: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e xecutable used for process bt_logger *Jun 21 02:30:39.576: %CMFP-6-CRYPTO_MODULE: Chassis 1 R0/0: cman_fp: Crypto Har dware Module is present *Jun 21 02:31:01.754: %LMRP-3-RTU_UNINITIALIZED: Chassis 1 R0/0: lman: RTU not y et initialized: stack enabled 0 *Jun 21 02:31:09.489: %SMART_LIC-6-HA_ROLE_CHANGED: Smart Agent HA role changed to Active. *Jun 21 02:31:10.295: %IOSXE_MGMTVRF-6-CREATE_SUCCESS_INFO: Management vrf Mgmt- intf created with ID 1, ipv4 table-id 0x1, ipv6 table-id 0x1E000001 *Jun 21 02:31:10.344: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha nged state to down *Jun 21 02:31:10.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface Lsmpi0, ch anged state to up *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface EOBC0, cha nged state to up *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth ernet0, changed state to down *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface LIIN0, cha nged state to up *Jun 21 02:31:10.966: %ONEP_BASE-6-SS_ENABLED: ONEP: Service set Base was enable d by Default *Jun 21 02:31:12.842: %SYS-6-STARTUP_CONFIG_IGNORED: System startup configuratio n is ignored based on the configuration register setting. *Jun 21 02:31:12.854: %IOSXE_OIR-6-REMSPA: SPA removed from subslot 0/0, interfa ces disabled *Jun 21 02:31:12.913: %SPA_OIR-6-OFFLINECARD: SPA (BUILT-IN-4X10G/1G) offline in subslot 0/0 *Jun 21 02:31:12.919: %IOSXE_OIR-6-INSCARD: Card (fp) inserted in slot F0 *Jun 21 02:31:12.920: %IOSXE_OIR-6-ONLINECARD: Card (fp) online in slot F0 *Jun 21 02:31:12.946: %IOSXE_OIR-6-INSCARD: Card (cc) inserted in slot 0 *Jun 21 02:31:12.946: %IOSXE_OIR-6-ONLINECARD: Card (cc) online in slot 0 *Jun 21 02:31:13.111: % Redundancy mode change to SSO *Jun 21 02:31:13.112: %VOICE_HA-7-STATUS: NONE->SSO; SSO mode can not take effe ct until after a platform reload. *Jun 21 02:31:13.231: %IOSXE_OIR-6-INSSPA: SPA inserted in subslot 0/0 *Jun 21 02:31:14.793: %SYS-5-RESTART: System restarted -- Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOSXE), Version 16.10.1, R ELEASE SOFTWARE (fc4) Technical Support: http://www.cisco.com/techsupport Copyright (c) 1986-2018 by Cisco Systems, Inc. Compiled Mon 19-Nov-18 08:27 by mcpre *Jun 21 02:31:14.834: %CRYPTO-6-ISAKMP_ON_OFF: ISAKMP is OFF *Jun 21 02:31:14.834: %CRYPTO-6-GDOI_ON_OFF: GDOI is OFF *Jun 21 02:31:16.976: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state to up *Jun 21 02:31:17.079: %SYS-6-BOOTTIME: Time taken to reboot after reload = 325 seconds *Jun 21 02:31:17.977: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth ernet0, changed state to up *Jun 21 02:31:21.579: %SPA_OIR-6-ONLINECARD: SPA (BUILT-IN-4X10G/1G) online in s ubslot 0/0 *Jun 21 02:31:21.638: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li nk down due to remote fault *Jun 21 02:31:21.708: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/1, li nk down due to local fault *Jun 21 02:31:21.748: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/2, li nk down due to local fault *Jun 21 02:31:21.788: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/3, li nk down due to local fault *Jun 21 02:31:21.855: %PNP-6-PNP_DISCOVERY_STOPPED: PnP Discovery stopped (Start up Config Present) *Jun 21 02:31:23.541: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed state to down *Jun 21 02:31:23.571: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/1, changed state to down *Jun 21 02:31:23.572: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/2, changed state to down *Jun 21 02:31:23.575: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/3, changed state to down *Jun 21 02:31:24.680: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li nk down due to local fault *Jun 21 02:31:23.618: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0, changed state to down *Jun 21 02:31:29.036: %PKI-2-NON_AUTHORITATIVE_CLOCK: PKI functions can not be i nitialized until an authoritative time source, like NTP, can be obtained. *Jun 21 02:31:29.491: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed state to up *Jun 21 02:31:30.492: %LINEPROTO-5-UPDOWN: Line protocol on Interface TenGigabit Ethernet0/0/0, changed state to up *Jun 21 02:31:29.491: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0, changed state to up *Jun 21 02:31:30.495: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha nged state to up *Jun 21 02:31:37.119: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU DI_LEGACY has been generated or imported by pki-sudi *Jun 21 02:31:39.050: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU DI has been generated or imported by pki-sudi

Passaggio 4. A questo punto il sistema si avvia senza alcuna configurazione. Ignora configurazione di avvio guidata.

Passaggio 5. Dopo l'accensione del sistema, copiare la configurazione di avvio su running-config.

Passaggio 6. Riconfigurare la password di abilitazione o le credenziali di accesso e verificare se è possibile accedere al dispositivo tramite telnet o ssh.

C9800-40#telnet 172.22.175.1 Trying 172.22.175.1 ... Open User Access Verification Username: admin Password: C9800-40#

Passaggio 7. Modificare config-register in 0x2002.

C9800-40(config)#config-register 0x2002

Nota: non utilizzare 0x2102. Con 0x2102 non è più consentito inviare messaggi di interruzione.

Passaggio 8. Salvare la configurazione.

C9800-40#write memory Building configuration... [OK]

Procedura di recupero della password dell'accessorio tramite USB

Avviare il WLC da ROMMON

Se il sistema rimane bloccato in ROMMON e l'avvio non funziona:

rommon 12 > boot File size is 0x0001dfe6 Located memleak.tcl Image size 122854 inode num 12, bks cnt 30 blk size 8*512 ## Boot image size = 122854 (0x1dfe6) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd50b000 File size is 0x00000023 Located pnp-tech-time Image size 35 inode num 13, bks cnt 1 blk size 8*512 Boot image size = 35 (0x23) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd4d3000 File size is 0x0001ad3f Located pnp-tech-discovery-summary Image size 109887 inode num 14, bks cnt 27 blk size 8*512 # Boot image size = 109887 (0x1ad3f) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd49b000 File size is 0x00000268 Located vlan.dat Image size 616 inode num 15, bks cnt 1 blk size 8*512 Boot image size = 616 (0x268) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd463000 boot: cannot determine first file name on device "bootflash:/" rommon 13 >

La memoria flash non ha immagini da cui avviare:

rommon 13 > dir bootflash: File System: EXT2/EXT3 11 16384 drwx------ lost+found 850305 4096 drwxr-xr-x .installer 588673 4096 drwxrwxrwx .prst_sync 948417 4096 drwxr-xr-x .rollback_timer 1381745 4096 drwxr-xr-x dc_profile_dir 12 122854 -rw-r--r-- memleak.tcl 506913 4096 drwxr-x--- vman_fdb 670433 4096 drwxr-xr-x .dbpersist 793073 4096 drwxr-xr-x onep 13 35 -rw-r--r-- pnp-tech-time 14 109887 -rw-r--r-- pnp-tech-discovery-summary 15 616 -rw-r--r-- vlan.dat

Per recuperare la casella, è possibile:

- Caricamento di un'immagine tramite un'unità penna USB.

- Caricamento di un'immagine tramite Gigabit0 (interfaccia di gestione fuori banda).

Carica immagine tramite USB

Passaggio 1. Disporre di un'unità penna USB con il file .bin da caricare sul controller 9800. (sugli switch 9800-80, a causa dell'ID bug Cisco CSCvn82287, non è possibile riconoscere un'unità flash USB 3.0 in ROMMON).

Nota: la procedura è la stessa nel caso di un 9800-CL virtuale, ma è necessario collegare l'unità USB su VMhost e mapparla alla VM.

Passaggio 2. Collegare il driver USB alla porta USB 0 del modello 9800.

Vista frontale:

Passaggio 3. Eseguire il login dalla console al controller e accertarsi che sia in grado di leggere l'USB.

rommon 19 > dir usb0: File System: FAT32 ! !--Output omitted-- ! 335644 1009389904-rw- <filename>SSA.bin

Passaggio 4. Configurare lo switch 9800 per l'avvio dall'immagine USB.

rommon 21 > boot usb0:<filename>.bin Located qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin, start cluster is 335644 ########################################################################################################

########################################################################################################

########################################################################################################

Passaggio 5. Una volta avviato il modello 9800, copiare l'immagine dall'USB alla memoria bootflash:

WLC# copy usb0:<filename>.bin bootflash:

Destination filename [qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Passaggio 6. Cambiare il modello 9800 dalla modalità bundle alla modalità di installazione.

Quando si avvia il controller da una porta USB, viene avviato in modalità Bundle:

! !--Output omitted-- ! FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled Processor board ID TTM22071510 1 Virtual Ethernet interface 4 Ten Gigabit Ethernet interfaces 32768K bytes of non-volatile configuration memory. 33554432K bytes of physical memory. 26910719K bytes of eUSB flash at bootflash:. 234365527K bytes of SATA hard disk at hard disk:. 15243680K bytes of USB flash at usb0:. 0K bytes of WebUI ODM Files at webui:. Base Ethernet MAC Address : 00:A3:8E:23:A2:40 Installation mode is BUNDLE %INIT: waited 0 seconds for NVRAM to be available

Dalla versione 16.12, nell'interfaccia utente è possibile scegliere di passare alla modalità INSTALL al successivo aggiornamento. Fornire tutti i file software, inclusa la release corrente, per passare alla modalità INSTALL.

Passaggio 7. Modificare la variabile di avvio se non punta già a un file packages.conf.

WLC#configure terminal Enter configuration commands, one per line. End with CNTL/Z. WLC(config)#no boot system  WLC(config)#boot system bootflash:packages.conf WLC(config)#end WLC#write Building configuration... [OK] WLC#show boot BOOT variable = flash:packages.conf,12; CONFIG_FILE variable does not exist BOOTLDR variable does not exist Configuration register is 0x2102 Standby not ready to show bootvar

Verificare che il registro di configurazione sia 0x2002.

Passaggio 8. Ricaricare il WLC:

WLC#reload

In seguito, il controller si avvia in modalità di installazione.

WLC#show version

! !--Output omitted-- !

Installation mode is INSTALL Configuration register is 0x2002

Carica immagine da TFTP

Per caricare un'immagine dalla rete, è necessario che la porta di gestione Gigabit Ethernet0 sia fisicamente collegata a una porta di accesso.

Da ROMMON, è possibile verificare le variabili in qualsiasi momento con il comando set.

rommon 1 > set PS1=rommon ! > ?=0 DEFAULT_GATEWAY=10.1.1.1 ETHER_SPEED_MODE=4 TFTP_RETRY_COUNT=36 SWITCH_NUMBER=1 DLC_DONE=TRUE RET_2_RTS= RET_2_RCALTS= MCP_STARTUP_TRACEFLAGS=00000000:00000000 TFTP_MACADDR=00:db:ad:ba:d0:52 IP_SUBNET_MASK=255.255.255.0 IP_ADDRESS=10.1.1.152 TFTP_SERVER=10.1.1.1 TFTP_FILE=C9800-80-universalk9_wlc.BLD_V1610_1_THROTTLE_LATEST_20181016_174328_2.bin BSI=0 RANDOM_NUM=1650632109

È quindi possibile impostare le variabili una alla volta. Non è necessario digitare set prima del nome della variabile come per altri dispositivi ROMMON. Evitare errori di battitura quando si digita il nome della variabile, in quanto non vi è alcuna verifica di alcun tipo.

rommon 2 > IP_ADDRESS=10.48.71.113 rommon 3 > IP_SUBNET_MASK=255.255.255.128 rommon 4 > DEFAULT_GATEWAY=10.48.71.5

Una volta definite le impostazioni IP, è possibile avviare il sistema da un'immagine TFTP con il comando seguente:

rommon 5 > boot tftp://10.48.39.33/C9800-80-universalk9_wlc.16.10.01.SPA.bin IP_ADDRESS: 10.48.71.113 IP_SUBNET_MASK: 255.255.255.128 DEFAULT_GATEWAY: 10.48.71.5 TFTP_SERVER: 10.48.39.33 TFTP_FILE: C9800-80-universalk9_wlc.16.10.01.SPA.bin TFTP_MACADDR: 70:6d:15:35:99:ff TFTP_VERBOSE: Progress TFTP_RETRY_COUNT: 36 TFTP_TIMEOUT: 7200 TFTP_BLKSIZE: 1460 TFTP_CHECKSUM: Yes ETHER_PORT: 3 ETHER_SPEED_MODE: 1000MB/HD link up Receiving C9800-80-universalk9_wlc.16.10.01.SPA.bin from 10.48.39.33

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Si finisce sulla riga di comando di Cisco IOS. Non dimenticare di copiare effettivamente l'immagine Cisco IOS sulla memoria flash o sul disco rigido e di impostare correttamente la variabile di avvio. È possibile riprendere la procedura dall'USB, precedente al punto 6, una volta che il file è stato copiato nella memoria flash o sul disco rigido:

Risoluzione dei problemi

Se si continua a visualizzare il messaggio rommon "Please reset before booting" (Reimposta prima di avviare) quando si tenta di eseguire l'avvio da un file in memoria, USB o TFTP come segue:

rommon 4 > boot bootflash:C9800-L-universalk9_wlc.V176_1.SPA.bin Please reset before booting

Tutto ciò che occorre fare è annullare il registro di configurazione e reimpostarlo. Il problema si risolve dopo il riavvio ed è possibile eseguire l'avvio da qualsiasi origine.

confreg 0x0 reset

Altri comandi utili di ROMMON

Il comandodev elenca i dispositivi di storage disponibili (bootflash, hard disk, usb e così via).

Il comando showmon mostra la versione di ROMMON.

Informazioni correlate

- Supporto tecnico Cisco e download