Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Nozioni di base

Configurazione

Esempio di rete

Configurazioni

Verifica

Catalyst 2948G show Comandi

Catalyst 2948G-L3 show Comandi

Risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene descritta e fornita una configurazione di esempio di Fast EtherChannel (FEC) e trunking 802.1Q, tra uno switch Catalyst 2948G-L3 con software Cisco IOS® e gli switch CatalystOS (tutti i modelli, inclusi gli switch Catalyst serie 4000, 5000 e 6000).

Prerequisiti

Requisiti

Per un elenco degli switch Catalyst che supportano gli incapsulamenti trunking 802.1Q e ISL, fare riferimento ai requisiti di sistema per l'implementazione del trunking.

Esistono alcune linee guida per la configurazione di EtherChannel e del trunking. Consultare la documentazione del software dello switch. Ad esempio, se si esegue il software CatalystOS (CatOS) versione 8.2.x su uno switch Catalyst 6500/6000, fare riferimento alla Guida alla configurazione del software Catalyst serie 6500, versione 8.2 ed esaminare attentamente le linee guida e le restrizioni alla configurazione nelle sezioni Configurazione dei trunk VLAN Ethernet e Configurazione di EtherChannel.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Catalyst 2948G con CatOS 7.1.2 installato (solo 802.1Q)

- Catalyst 2948G-L3 con software Cisco IOS versione 12.0(14)W5(20) installato

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Nozioni di base

L'uso di EtherChannel può fornire maggiore larghezza di banda e ridondanza. EtherChannel è utile perché consente di scalare la larghezza di banda senza aumentare la complessità del progetto. Lo Spanning-tree tratta il bundle EtherChannel come un singolo collegamento, in modo che non vengano introdotti loop. I protocolli di routing considerano anche EtherChannel come un'unica interfaccia di routing con un indirizzo IP comune. Il bundling EtherChannel fornisce fino a 1600 Mbps FEC (Fast EtherChannel), full duplex o 16 Gbps Gigabit EtherChannel (GEC). Il trunking trasferisce il traffico da diverse VLAN su un collegamento point-to-point tra i due dispositivi. Due metodi di trunking sono l'Inter-Switch Link Protocol (ISL, un protocollo proprietario Cisco) o 802.1Q (uno standard IEEE). Questo documento tratta in modo specifico del trunking 802.1Q.

Configurazione

In questa sezione, le configurazioni presentate includeranno un trunk FEC e 802.1Q a quattro porte tra lo switch 2948G-L3 e uno switch CatOs.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete:

Configurazioni

Nel documento vengono usate queste configurazioni:

- Catalyst 2948G

- Catalyst 2948G-L3

Catalyst 2948G

CatOS (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default

configurations.

............

.......................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Nov 21 2002, 15:24:27

!

#version 7.1(2)

!

!

#system web interface version(s)

set prompt CatOS

!

#test

!

#frame distribution method

set port channel all distribution mac both

!

#ip

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

set interface sl0 down

set interface me1 down

set ip alias default         0.0.0.0

set ip alias cat             10.10.10.2

!

#spantree

#vlan                         <VlanID>

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

!--- Ports 2/1 to 2/4 are assigned to a port channel.

#port channel

set port channel 2/1-4 29

!

#multicast filter

set igmp filter disable

!

#module 1 : 0-port Switching Supervisor

!

!--- The trunking mode is specified as 802.1Q, because it !--- is the only encapsulation that is supported on the !--- 2948G. The mode is set to nonegotiate, because the !--- 2948G-L3 does not support Dynamic Trunking Protocol (DTP).

#module 2 : 50-port 10/100/1000 Ethernet

set trunk 2/1  nonegotiate 802.1Q 1-1005

set trunk 2/2  nonegotiate 802.1Q 1-1005

set trunk 2/3  nonegotiate 802.1Q 1-1005

set trunk 2/4  nonegotiate 802.1Q 1-1005

!--- The channel mode is set to on, because 2948G-L3 !--- does not support Port Aggregation Protocol (PAgP).

set port channel 2/1-4 mode on

end

Catalyst 2948G-L3

2948G-L3# show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

enable secret 5 $1$bNvR$33puy1WCyrdKMvlnj61Js.

!

ip subnet-zero

!

!

!--- The logical port-channel interface must be created !--- before you put the physical interfaces into the !--- channel group.interface port-channel1.

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Specify the native VLAN: VLAN 1 in this example, !--- which is the default. For performance and security !--- reasons, it is recommended that you keep the user !--- traffic off of the native or management VLAN.

interface Port-channel1.1

encapsulation 802.1Q 1 native

ip address 10.10.10.2 255.255.255.0

no ip redirects

no ip directed-broadcast

!

interface Port-channel1.2

encapsulation 802.1Q 2

ip address 10.10.11.2 255.255.255.0

no ip directed-broadcast

!

!--- Specify all of the physical ports that are part !--- of the logical port channel interface.

interface FastEthernet1

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet4

no ip address

no ip directed-broadcast

channel-group 1

!

!--- Output suppressed.

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Catalyst 2948G show Comandi

- show port channel: visualizza le informazioni di EtherChannel. Vengono inoltre visualizzate le informazioni relative al bilanciamento del carico o allo schema di distribuzione dei frame, alla porta e al canale della porta.

!--- Verify that the port channel is UP (connected, on) and that !--- all the physical ports are members (channel ID).

CatOS (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      29   801

2/2  connected  on                      29   801

2/3  connected  on                      29   801

2/4  connected  on                      29   801

Port  Device-ID                       Port-ID                Platform

----- ------------------------------- ---------------------- --------------

2/1  2948G-L3                        FastEthernet1          cisco Cat2948G

2/2   Not directly connected to switch

2/3  2948G-L3                        FastEthernet3          cisco Cat2948G

2/4  2948G-L3                        FastEthernet4          cisco Cat2948G

Nota: è normale che la porta 2/2 non sia collegata direttamente allo switch. L'output del comando show port channel sullo switch collegato a un router in genere ha questo aspetto. Poiché il router non partecipa al protocollo PAgP (utilizzato per negoziare i canali) e il channeling è attivo, le porte mostrano le informazioni sui router adiacenti FEC utilizzando i dati Cisco Discovery Protocol (CDP). Il software Cisco IOS invia pacchetti CDP sia sull'interfaccia del canale che sulle interfacce fisiche. Su una delle porte Catalyst vengono rilevati più router adiacenti CDP e viene segnalato che non sono connessi direttamente allo switch. Questo è un problema cosmetico e ulteriori informazioni sono disponibili nell'ID bug Cisco CSCdp04017 (solo utenti registrati).

- show port channel statistics: visualizza il gruppo Admin del canale della porta e indica se PAgP è in uso sul canale della porta.

Verificare che PAgP non sia in uso sui collegamenti.

CatOS (enable) show port channel status

Port  Admin   PAgP Pkts   PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts

Group   Transmitted Received  InFlush   RetnFlush OutFlush  InError

----- ------- ----------- --------- --------- --------- --------- ---------

2/1       29           0         0         0         0         0         0

2/2       29           0         0         0         0         0         0

2/3       29           0         0         0         0         0         0

2/4       29           0         0         0         0         0         0

- show trunk: visualizza la modalità trunking, l'incapsulamento e la VLAN nativa.

Verificare che il trunking sia abilitato sulle interfacce fisiche e sull'interfaccia del canale della porta. Verificare inoltre che la modalità di trunking sia impostata correttamente su non negoziazione.

Nota: su un trunk 802.1Q, la VLAN nativa deve corrispondere su entrambi i lati.

CatOS (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      nonegotiate  802.1Q          trunking      1

2/2      nonegotiate  802.1Q          trunking      1

2/3      nonegotiate  802.1Q          trunking      1

2/4      nonegotiate  802.1Q          trunking      1

Port      Vlans allowed on trunk

--------  -----------------------------------------------------------------

2/1      1-1005

2/2      1-1005

2/3      1-1005

2/4      1-1005

Port      Vlans allowed and active in management domain

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Catalyst 2948G-L3 show Comandi

- show interfaces port-channel 1: fornisce lo stato del canale della porta e delle porte che sono membri del gruppo di canali della porta.

Verificare che tutte le interfacce fisiche che fanno parte di EtherChannel possano essere viste come membri.

2948G-L3# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0008.a308.1c07 (bia 0000.0000.0000)

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 4

Member 0 : FastEthernet2

Member 1 : FastEthernet1

Member 2 : FastEthernet4

Member 3 : FastEthernet3

Last input 00:00:00, output 00:00:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596128 packets input, 50714549 bytes, 0 no buffer

Received 7 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

44294 packets output, 17498215 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

- show cdp neighbors: elenca tutti i dispositivi Cisco connessi direttamente che vengono rilevati tramite CDP.

Verificare che lo switch sull'altra estremità sia visibile attraverso tutte le porte fisiche.

2948G-L3# show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

JAB032400H2      Port-channel1.1    126         T S       WS-C2948  2/3

JAB032400H2      Port-channel1.1    124         T S       WS-C2948  2/4

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/1

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/2

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.

Informazioni correlate

- Configurazione di ISL e trunking 802.1q tra uno switch CatOS e un router esterno (routing tra VLAN)

- Configurazioni di esempio Catalyst 2948G-L3 - Connessione di una VLAN, più VLAN e layer di distribuzione multi VLAN al core di rete

- Risoluzione dei problemi hardware per gli switch Catalyst serie 2948G-L3/4908G-L3

- Supporto dei prodotti LAN

- Supporto della tecnologia di switching LAN

- Documentazione e supporto tecnico – Cisco Systems