Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Premesse

Configurazione

Esempio di rete

Configurazione per IPSec con accesso di livello 2 o porta trunk

Configurazione per IPSec tramite porta di routing

Verifica

Risoluzione dei problemi

Comandi per la risoluzione dei problemi

Informazioni correlate

Introduzione

In questo documento viene descritto come creare un tunnel IPSec da LAN a LAN tra uno switch Cisco Catalyst serie 6500 con IPSec VPN Service Module (W) e un firewall Cisco PIX.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Software Cisco IOS® versione 12.2(14)SY2 per Catalyst serie 6000 Supervisor Engine, con IPSec VPN Service Module

- Software Cisco PIX Firewall versione 6.3(3)

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Premesse

Il Catalyst 6500 VPN Service Module ha due porte Gigabit Ethernet (GE) senza connettori visibili esternamente. Queste porte sono indirizzabili solo a scopo di configurazione. La porta 1 è sempre la porta interna. Questa porta gestisce tutto il traffico da e verso la rete interna. La seconda porta (porta 2) gestisce tutto il traffico da e verso la WAN o le reti esterne. Queste due porte sono sempre configurate in modalità trunking 802.1Q. Il modulo del servizio VPN utilizza una tecnica chiamata Bump In The Wire (BITW) per il flusso dei pacchetti.

I pacchetti vengono elaborati da una coppia di VLAN, una sul layer 3 all'interno della VLAN e una sul layer 2 all'esterno della VLAN. I pacchetti, dall'interno all'esterno, vengono instradati alla VLAN interna tramite un metodo denominato EARL (Encoded Address Recognition Logic). Dopo aver crittografato i pacchetti, il modulo del servizio VPN utilizza la VLAN esterna corrispondente. Nel processo di decrittografia, i pacchetti dall'esterno all'interno vengono collegati al modulo del servizio VPN utilizzando la VLAN esterna. Dopo che il modulo del servizio VPN ha decrittografato il pacchetto e mappato la VLAN alla VLAN interna corrispondente, EARL instrada il pacchetto alla porta LAN appropriata. Il layer 3 all'interno della VLAN e il layer 2 all'esterno della VLAN sono uniti al comando crypto connect vlan. Sugli switch Catalyst serie 6500 sono disponibili tre tipi di porte:

- Porte di routing: per impostazione predefinita, tutte le porte Ethernet sono porte di routing in Cisco IOS. A queste porte è associata una VLAN nascosta.

- Porte di accesso: a queste porte è associata una VLAN esterna o VLAN Trunk Protocol (VTP). È possibile associare più porte a una VLAN definita.

- Porte trunk: queste porte trasportano molte VLAN esterne o VTP, sulle quali tutti i pacchetti sono incapsulati con un'intestazione 802.1Q.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete:

Configurazione per IPSec con accesso di livello 2 o porta trunk

Per configurare IPSec con l'ausilio di una porta di accesso di livello 2 o di una porta trunk per l'interfaccia fisica esterna, eseguire la procedura seguente.

1. Aggiungere le VLAN interne alla porta interna del modulo di servizio VPN.

Si supponga che il modulo del servizio VPN si trovi sullo slot 4. Usare la VLAN 100 come VLAN interna e la VLAN 209 come VLAN esterna. Configurare le porte GE del modulo di servizio VPN nel modo seguente:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Aggiungere l'interfaccia VLAN 100 e l'interfaccia a cui viene terminato il tunnel (in questo caso interfaccia VLAN 209, come mostrato di seguito).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface Vlan209

no ip address

crypto connect vlan 100

3. Configurare la porta fisica esterna come porta di accesso o porta trunk (in questo caso, Fast Ethernet 2/48, come mostrato di seguito).

!--- This is the configuration that uses an access port.

interface FastEthernet2/48

no ip address

switchport

switchport access vlan 209

switchport mode access

!--- This is the configuration that uses a trunk port.

interface FastEthernet2/48

no ip address switchport

switchport trunk encapsulation dot1q

switchport mode trunk

4. Creare il NAT di bypass. Aggiungere queste voci all'istruzione no nat per esentare le connessioni tra queste reti:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

5. Creare la configurazione crittografica e l'elenco di controllo di accesso (ACL) che definisce il traffico da crittografare.

1. Creare un ACL crittografico (in questo caso, ACL 100 - Traffico interessante) che definisca il traffico dalla rete interna 192.168.5.0/24 alla rete remota 192.168.6.0/24, come mostrato di seguito:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Definire le proposte di criteri ISAKMP (Internet Security Association and Key Management Protocol), ad esempio:

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Utilizzare questo comando (in questo esempio) per utilizzare e definire le chiavi già condivise:

crypto isakmp key cisco address 10.66.79.73

4. Definire le proposte IPSec nel modo seguente:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Creare l'istruzione per la mappa crittografica, nel modo seguente:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

6. Applicare la mappa crittografica all'interfaccia VLAN 100, nel modo seguente:

interface vlan100

crypto map cisco

Vengono utilizzate le seguenti configurazioni:

- Catalyst 6500

- PIX Firewall

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that Internet Key Exchange (IKE) !--- is used to establish the IPSec !--- security associations (SAs) to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the outside Layer 2 port that allows !--- VLAN 209 traffic to enter.

interface FastEthernet2/48

no ip address

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the Interface VLAN (IVLAN).

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The Port VLAN (PVLAN) configuration is handled transparently by !--- the VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port !--- of the VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

interface Vlan209

no ip address

crypto connect vlan 100

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration. access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX Firewall

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Configurazione per IPSec tramite porta di routing

Per configurare IPSec con l'ausilio di una porta di routing di layer 3 per l'interfaccia fisica esterna, eseguire la procedura seguente.

1. Aggiungere le VLAN interne alla porta interna del modulo di servizio VPN.

Si supponga che il modulo del servizio VPN si trovi sullo slot 4. Usare la VLAN 100 come VLAN interna e la VLAN 209 come VLAN esterna. Configurare le porte GE del modulo di servizio VPN nel modo seguente:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Aggiungere l'interfaccia VLAN 100 e l'interfaccia a cui viene terminato il tunnel (in questo caso Fast Ethernet 2/48, come mostrato di seguito).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface FastEthernet2/48

no ip address

crypto connect vlan 100

3. Creare il NAT di bypass. Aggiungere queste voci all'istruzione no nat per esentare le connessioni tra queste reti:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

4. Creare la configurazione crittografica e l'ACL che definisce il traffico da crittografare.

1. Creare un ACL (in questo caso, ACL 100) che definisca il traffico dalla rete interna 192.168.5.0/24 alla rete remota 192.168.6.0/24, come mostrato di seguito:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Definire le proposte di policy ISAKMP nel modo seguente:

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Utilizzare questo comando (in questo esempio) per utilizzare e definire le chiavi già condivise:

crypto isakmp key cisco address 10.66.79.73

4. Definire le proposte IPSec nel modo seguente:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Creare l'istruzione per la mappa crittografica, nel modo seguente:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

5. Applicare la mappa crittografica all'interfaccia VLAN 100, nel modo seguente:

interface vlan100

crypto map cisco

Vengono utilizzate le seguenti configurazioni:

- Catalyst 6500

- PIX Firewall

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that IKE is used to establish the !--- IPSec SAs to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the secure port that is configured in routed port mode. !--- This routed port mode does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path. This is the Layer 2 port VLAN on which the !--- outside port of the VPN service module also belongs.

!

interface FastEthernet2/48

no ip address

crypto connect vlan 100

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the IVLAN.

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The PVLAN configuration is handled transparently by the !--- VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port of the !--- VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.6.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration.

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX Firewall

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Lo strumento Output Interpreter (solo utenti registrati) (OIT) supporta alcuni comandi show. Usare l'OIT per visualizzare un'analisi dell'output del comando show.

- show crypto ipsec sa: visualizza le impostazioni utilizzate dalle associazioni di protezione IPSec correnti.

- show crypto isakmp sa: visualizza tutte le associazioni di protezione IKE correnti in un peer.

- show crypto vlan: visualizza la VLAN associata alla configurazione crittografica.

- show crypto eli: visualizza le statistiche del modulo del servizio VPN.

Per ulteriori informazioni sulla verifica e la risoluzione dei problemi relativi a IPSec, consultare il documento sulla risoluzione dei problemi di protezione IP - descrizione e uso dei comandi di debug.

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione.

Comandi per la risoluzione dei problemi

Nota: prima di usare i comandi di debug, consultare le informazioni importanti sui comandi di debug.

- debug crypto ipsec: visualizza le negoziazioni IPSec della fase 2.

- debug crypto isakmp: visualizza le negoziazioni ISAKMP della fase 1.

- debug crypto engine: visualizza il traffico crittografato.

- clear crypto isakmp: cancella le SA correlate alla fase 1.

- clear crypto sa: cancella le SA relative alla fase 2.

Per ulteriori informazioni sulla verifica e la risoluzione dei problemi relativi a IPSec, consultare il documento sulla risoluzione dei problemi di protezione IP - descrizione e uso dei comandi di debug.

Informazioni correlate

- Pagina di supporto per IPSec

- Configurazione di IPSec Network Security

- Configurazione del protocollo di protezione di Internet Key Exchange

- Supporto tecnico – Cisco Systems