Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Output di esempio del comando

Risoluzione dei problemi

Comandi per la risoluzione dei problemi

Informazioni correlate

Introduzione

Questo documento offre una configurazione di esempio per crittografare il traffico dalla rete dietro il router 1 alla rete dietro il router 2 (nell'esempio, gli 0 loopback sono usati come reti). Se il collegamento primario (Ethernet) tra il router 1 e il router 2 si interrompe, il traffico IP Security (IPSec) continua a passare attraverso il collegamento secondario (ISDN). Esistono diversi modi per conseguire tale obiettivo; è possibile utilizzare dialer watch, l'interfaccia di backup, il circuito a richiesta e l'interfaccia statica mobile. In questa configurazione di esempio viene illustrato il meccanismo di controllo dialer. Per ulteriori informazioni su altre funzionalità, vedere Valutazione delle interfacce di backup, route statiche mobili e Dialer Watch per il backup DDR.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Cisco 2621 e 3640 Router

- Software Cisco IOS® versione 12.3(3)

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Questo documento utilizza l'impostazione di rete mostrata nel diagramma qui:

Configurazioni

Questo documento utilizza le configurazioni mostrate di seguito:

- Router 1 (2621)

- Router 2 (3640)

Router 1 (2621)

r1#show running-config

Building configuration...

Current configuration : 2244 bytes

!

version 12.3

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname r1

!

boot-start-marker

boot-end-marker

!

!

username r2 password 0 cisco

!--- This is the username for remote router (Router 2) !--- and shared secret. Shared secret (used for Challenge Handshake !--- Authentication Protocol [CHAP]) must be the same on both sides.

no aaa new-model

ip subnet-zero

ip tcp synwait-time 5

!

!

no ip domain lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh break-string

no ftp-server write-enable

!

!

!

crypto isakmp policy 10

hash md5

authentication pre-share

crypto isakmp key cisco address 222.222.222.222

!

!

crypto ipsec transform-set abc esp-des esp-md5-hmac

!

crypto map cisco local-address Loopback1

crypto map cisco 10 ipsec-isakmp

set peer 222.222.222.222

!--- Peer address, Loopback 1 of Router 2

set transform-set abc

match address 101

!--- Networks to encrypt (Loopback 0 on both ends)

!

isdn switch-type basic-ts013

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

!

!

!

!

interface Loopback0

!--- Network to encrypt

ip address 11.11.11.11 255.255.255.0

!

interface Loopback1

!--- Used for peer address for IPSec

ip address 111.111.111.111 255.255.255.0

!

interface FastEthernet0/0

!--- Primary link

ip address 10.1.1.1 255.255.255.0

no ip route-cache

!--- Enable process switching

no ip mroute-cache

duplex auto

speed auto

crypto map cisco

!--- Apply crypto map on primary interface

!

interface BRI0/0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool-member 1

isdn switch-type basic-ts013

no cdp enable

!

interface Dialer1

!--- Backup link

ip address 20.1.1.1 255.255.255.0

encapsulation ppp

no ip route-cache

!--- Enable process switching

ip ospf cost 9999

!--- Increase the cost so that when primary comes up again, !--- Open Shortest Path First (OSPF) routes are !--- preferred using the primary link (due to better cost).

no ip mroute-cache

dialer idle-timeout 180

dialer pool 1

dialer string 94134028

dialer watch-group 1

!--- Enable dialer watch on this backup interface. !--- Watch the route specified with the dialer watch-list 1 command.

dialer-group 1

!--- Apply interesting traffic defined in dialer list 1.

no peer neighbor-route

ppp authentication chap

crypto map cisco

!--- Apply crypto map on backup interface.

!

router ospf 1

!--- OSPF advertising Loopback 0, Loopback 1, !--- primary, and secondary links.

log-adjacency-changes

network 10.1.1.0 0.0.0.255 area 0

network 11.11.11.0 0.0.0.255 area 0

network 20.1.1.0 0.0.0.255 area 0

network 111.111.111.0 0.0.0.255 area 0

!

ip http server

no ip http secure-server

ip classless

!

!

access-list 101 permit ip host 11.11.11.11 host 22.22.22.22

!--- Access control list (ACL) 101 is the !--- IPSec traffic used in match address.

access-list 110 deny   ip any any

!--- ACL 110 is for the dialer list to mark !--- all IP traffic uninteresting. The dialer watch will !--- trigger the ISDN backup when the route is lost.

dialer watch-list 1 ip 222.222.222.222 255.255.255.255

!--- This defines the route(s) to be watched. !--- This exact route (including subnet mask) !--- must exist in the routing table. !--- Use the dialer watch-group 1 command to apply this !--- list to the backup interface.

dialer watch-list 1 delay route-check initial 10

dialer-list 1 protocol ip list 110

!--- Interesting traffic is defined by ACL 110. !--- This is applied to Dialer1 using dialer group 1.

!

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

logging synchronous

escape-character 27

line aux 0

line vty 0 4

login

!

end

Router 2 (3640)

r2#show running-config

Building configuration...

Current configuration : 2311 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname r2

!

boot-start-marker

boot-end-marker

!

username r1 password 0 cisco

!--- This is the username for remote router (Router 1) !--- and shared secret. Shared secret (used for CHAP) !--- must be the same on both sides.

no aaa new-model

ip subnet-zero

ip tcp synwait-time 5

!

!

no ip domain lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh break-string

no ftp-server write-enable

!

!

!

crypto isakmp policy 10

hash md5

authentication pre-share

crypto isakmp key cisco address 111.111.111.111

!

!

crypto ipsec transform-set abc esp-des esp-md5-hmac

!

!

crypto map cisco local-address Loopback1

crypto map cisco 10 ipsec-isakmp

set peer 111.111.111.111

!--- Peer address, Loopback 1 of Router 1

set transform-set abc

match address 101

!--- Networks to encrypt (Loopback 0 on both ends)

!

isdn switch-type basic-ts013

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

!

!

!

!

interface Loopback0

ip address 22.22.22.22 255.255.255.0

!--- Network to encrypt

!

interface Loopback1

ip address 222.222.222.222 255.255.255.0

!--- Used for peer address for IPSec.

!

interface BRI0/0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool-member 1

isdn switch-type basic-ts013

!

interface Ethernet0/0

!--- Primary link

ip address 10.1.1.2 255.255.255.0

no ip route-cache

!--- Enable process switching.

no ip mroute-cache

half-duplex

crypto map cisco

!--- Apply crypto map on primary interface.

!

interface Dialer1

ip address 20.1.1.2 255.255.255.0

encapsulation ppp

no ip route-cache

ip ospf cost 9999

no ip mroute-cache

dialer pool 1

dialer idle-timeout 600

dialer remote-name r1

!--- Dialer for the BRI interface of the remote router !--- without a dial string.

dialer-group 1

!--- Apply interesting traffic defined in dialer list 1.

ppp authentication chap

crypto map cisco

!--- Apply crypto map on backup interface.

!

router ospf 1

log-adjacency-changes

network 10.1.1.0 0.0.0.255 area 0

network 20.1.1.0 0.0.0.255 area 0

network 22.22.22.0 0.0.0.255 area 0

network 222.222.222.0 0.0.0.255 area 0

!

no ip http server

no ip http secure-server

ip classless

!

!

access-list 101 permit ip host 22.22.22.22 host 11.11.11.11

access-list 110 deny   ospf any any

!--- Mark OSPF as uninteresting. !--- This will not allow OSPF hellos !--- to try to bring the link up.

access-list 110 permit ip any any

dialer-list 1 protocol ip list 110

!--- Interesting traffic is defined by ACL 110. !--- This is applied to Dialer1 using dialer group 1.

!

line con 0

exec-timeout 0 0

logging synchronous

escape-character 27

line aux 0

line vty 0 4

login

!

end

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Output di esempio del comando

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

- Tabella di routing del router 1 (2621) - collegamento principale attivo

r1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1,

L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route,

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

222.222.222.0/32 is subnetted, 1 subnets

O       222.222.222.222 [110/2] via 10.1.1.2, 00:00:25, FastEthernet0/0

20.0.0.0/24 is subnetted, 1 subnets

C       20.1.1.0 is directly connected, Dialer1

22.0.0.0/32 is subnetted, 1 subnets

O       22.22.22.22 [110/2] via 10.1.1.2, 00:00:25, FastEthernet0/0

111.0.0.0/24 is subnetted, 1 subnets

C       111.111.111.0 is directly connected, Loopback1

10.0.0.0/24 is subnetted, 1 subnets

C       10.1.1.0 is directly connected, FastEthernet0/0

11.0.0.0/24 is subnetted, 1 subnets

C       11.11.11.0 is directly connected, Loopback0

- Tabella di routing del router 2 (3640) - collegamento principale attivo

r2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1,

L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route,

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set.

C    222.222.222.0/24 is directly connected, Loopback1

20.0.0.0/24 is subnetted, 1 subnets

C       20.1.1.0 is directly connected, Dialer1

22.0.0.0/24 is subnetted, 1 subnets

C       22.22.22.0 is directly connected, Loopback0

111.0.0.0/32 is subnetted, 1 subnets

O       111.111.111.111 [110/11] via 10.1.1.1, 00:06:22, Ethernet0/0

10.0.0.0/24 is subnetted, 1 subnets

C       10.1.1.0 is directly connected, Ethernet0/0

11.0.0.0/32 is subnetted, 1 subnets

O       11.11.11.11 [110/11] via 10.1.1.1, 00:06:23, Ethernet0/0

- Router adiacente OSPF del router 1 (2621): collegamento primario attivo

r1#show ip ospf neighbor

Neighbor ID     Pri   State      Dead Time   Address    Interface

222.222.222.222   1   FULL/DR    00:00:33    10.1.1.2   FastEthernet0/0

- Router adiacente OSPF del router 2 (3640): collegamento primario attivo

r2#show ip ospf neighbor

Neighbor ID     Pri   State      Dead Time   Address    Interface

111.111.111.111   1   FULL/BDR   00:00:31    10.1.1.1   Ethernet0/0

- Tabella di routing del router 1 (2621) - collegamento principale non attivo

r1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

I - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2,

ia - IS-IS inter area, * - candidate default,

U - per-user static route, o - ODR,

P - periodic downloaded static route

Gateway of last resort is not set.

222.222.222.0/32 is subnetted, 1 subnets

O       222.222.222.222 [110/10000] via 20.1.1.2, 00:00:09, Dialer1

20.0.0.0/24 is subnetted, 1 subnets

C       20.1.1.0 is directly connected, BRI0/0

20.0.0.0/24 is subnetted, 1 subnets

C       20.1.1.0 is directly connected, Dialer1

22.0.0.0/32 is subnetted, 1 subnets

O       22.22.22.22 [110/10000] via 20.1.1.2, 00:00:09, Dialer1

111.0.0.0/24 is subnetted, 1 subnets

C       111.111.111.0 is directly connected, Loopback1

10.0.0.0/24 is subnetted, 1 subnets

O       10.1.1.0 [110/10009] via 20.1.1.2, 00:00:09, Dialer1

11.0.0.0/24 is subnetted, 1 subnets

C       11.11.11.0 is directly connected, Loopback0

- Tabella di routing del router 2 (3640) - collegamento principale non disponibile

r2#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

I - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2,

ia - IS-IS inter area, * - candidate default,

U - per-user static route, o - ODR,

P - periodic downloaded static route

Gateway of last resort is not set.

C    222.222.222.0/24 is directly connected, Loopback1

20.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C       20.1.1.0/24 is directly connected, Dialer1

C       20.1.1.1/32 is directly connected, Dialer1

22.0.0.0/24 is subnetted, 1 subnets

C       22.22.22.0 is directly connected, Loopback0

111.0.0.0/32 is subnetted, 1 subnets

O       111.111.111.111 [110/10000] via 20.1.1.1, 00:00:07, Dialer1

10.0.0.0/24 is subnetted, 1 subnets

C       10.1.1.0 is directly connected, Ethernet0/0

11.0.0.0/32 is subnetted, 1 subnets

O       11.11.11.11 [110/10000] via 20.1.1.1, 00:00:08, Dialer1

- Router adiacente OSPF del router 1 (2621): collegamento primario non attivo

r1#show ip ospf neighbor

Neighbor ID     Pri   State      Dead Time   Address     Interface

222.222.222.222   0   FULL/  -   00:00:32    20.1.1.2    Dialer1

- Router adiacente OSPF del router 2 (3640): collegamento primario non attivo

r2#show ip ospf neighbor

Neighbor ID     Pri   State      Dead Time   Address     Interface

111.111.111.111   0   FULL/  -   00:00:31    20.1.1.1    Dialer1

Il comando debug dialer e diversi output del comando show visualizzati qui mostrano che il collegamento primario ha avuto esito negativo e il dialer watch riconosce la route persa. Il router avvia quindi il collegamento di backup e l'OSPF converge attraverso il collegamento secondario. Ogni volta che scade il timeout di inattività, il router controlla se il collegamento primario è inattivo. Se il collegamento primario risulta attivo, dialer watch disconnette il collegamento di backup dopo la scadenza del timer di disattivazione e interrompe la chiamata e OSPF converge tramite il collegamento primario come di consueto.

Di seguito vengono riportati gli output dei comandi debug e show del router 1 (2621) quando il collegamento primario diventa inattivo e viene riattivato.

r1#show debug

Dial on demand:

Dial on demand events debugging is on

r1#

03:00:21: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to down

!--- Primary link was brought down manually when you disable the switch ports.

03:00:21: %OSPF-5-ADJCHG: Process 1, Nbr 222.222.222.222 on FastEthernet0/0

from FULL to DOWN, Neighbor Down: Interface down or detached

!--- Primary link goes down. !--- OSPF loses neighbor adjacency.

r1#

!--- Dialer watch kicks in.

03:00:21: DDR: Dialer Watch: watch-group = 1

03:00:21: DDR:    network 222.222.222.222/255.255.255.255 DOWN,

03:00:21: DDR:    primary DOWN

03:00:21: DDR: Dialer Watch: Dial Reason: Primary of group 1 DOWN

03:00:21: DDR: Dialer Watch: watch-group = 1,

03:00:21: BR0/0 DDR: rotor dialout [best]

least recent failure is also most recent failure

03:00:21: BR0/0 DDR: rotor dialout [best] also has most recent failure

03:00:21: BR0/0 DDR: rotor dialout [best]

03:00:21: DDR:    dialing secondary by dialer string 94134028 on Di1

03:00:21: BR0/0 DDR: Attempting to dial 94134028

03:00:21: DDR: Dialer Watch: watch-group = 1

r1#

03:00:21: DDR:    network 222.222.222.222/255.255.255.255 DOWN,

03:00:21: DDR:    primary DOWN

03:00:21: DDR: Dialer Watch: Dial Reason: Secondary of group 1 AVAILABLE

03:00:21: DDR: Dialer Watch: watch-group = 1,

03:00:21: DDR: Dialer Watch: watch-group = 1

03:00:21: DDR:    network 222.222.222.222/255.255.255.255 DOWN,

03:00:21: DDR:    primary DOWN

03:00:21: DDR: Dialer Watch: Dial Reason: Secondary of group 1 AVAILABLE

03:00:21: DDR: Dialer Watch: watch-group = 1,

03:00:21: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0/0, TEI 82 changed to up

03:00:94489280514: %LINK-3-UPDOWN: Interface BRI0/0:1, changed state to up

03:00:94489280516: BR0/0:1 DDR: Dialer Watch: resetting call in progress

03:00:94489280512: BR0/0:1: interface must be fifo queue, force fifo

03:00:94489280512: %DIALER-6-BIND: Interface BR0/0:1 bound to profile Di1

r1#

03:00:22: BR0/0:1 DDR: Remote name for r2

03:00:22: BR0/0:1 DDR: dialer protocol up

03:00:23: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:1,

changed state to up

r1#

03:00:28: %ISDN-6-CONNECT: Interface BRI0/0:1 is now connected to 94134028 r2

!--- Backup link is now connected to Router 2.

r1#

03:00:31: %OSPF-5-ADJCHG: Process 1, Nbr 222.222.222.222 on Dialer1

from LOADING to FULL, Loading Done

!--- OSPF converges over the backup link.

r1#

r1#show dialer

BRI0/0 - dialer type = ISDN

Dial String   Successes   Failures   Last DNIS   Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0/0:1 - dialer type = ISDN

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: Dialing on watched route loss

!--- Dial reason is the lost route.

Interface bound to profile Di1

Time until disconnect 154 secs

!--- Idle timeout is ticking.

Current call connected 00:00:25

Connected to 94134028 (r2)

BRI0/0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Di1 - dialer type = DIALER PROFILE

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String      Successes   Failures    Last DNIS   Last status

94134028                45         24    00:00:27       successful   Default

r1#show isdn active

-----------------------------------------------------------------------------

ISDN ACTIVE CALLS

-----------------------------------------------------------------------------

Call    Calling     Called     Remote  Seconds Seconds Seconds Charges

Type    Number      Number     Name    Used    Left    Idle    Units/Currency

-----------------------------------------------------------------------------

Out   ---N/A---   94134028         r2       37     142      37      0

-----------------------------------------------------------------------------

r1#show dialer

BRI0/0 - dialer type = ISDN

Dial String      Successes   Failures    Last DNIS   Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0/0:1 - dialer type = ISDN

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: Dialing on watched route loss

Interface bound to profile Di1

Time until disconnect 47 secs

!--- Idle timeout is ticking.

Current call connected 00:02:12

Connected to 94134028 (r2)

BRI0/0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Di1 - dialer type = DIALER PROFILE

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String   Successes   Failures   Last DNIS   Last status

94134028             45         24   00:02:14    successful   Default

r1#show dialer

BRI0/0 - dialer type = ISDN

Dial String      Successes   Failures    Last DNIS   Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0/0:1 - dialer type = ISDN

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: Dialing on watched route loss

Interface bound to profile Di1

Time until disconnect 0 secs

!--- Idle timeout is ticking.

Current call connected 00:02:59

Connected to 94134028 (r2)

BRI0/0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Di1 - dialer type = DIALER PROFILE

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String   Successes   Failures   Last DNIS   Last status

94134028             45         24   00:03:05    successful   Default

r1#

03:03:22: BR0/0:1 DDR: idle timeout

!--- Idle timed out. !--- Dialer watch checks lost routes !--- again and reset the idle time since primary is not up yet.

03:03:22: DDR: Dialer Watch: watch-group = 1

03:03:22: DDR:    network 222.222.222.222/255.255.255.255 UP,

03:03:22: DDR:    primary DOWN

!--- Primary link is still down.

r1#

r1#show dialer

BRI0/0 - dialer type = ISDN

Dial String    Successes   Failures    Last DNIS   Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0/0:1 - dialer type = ISDN

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: Dialing on watched route loss

Interface bound to profile Di1

Time until disconnect 154 secs

!--- Idle timeout was reset by dialer watch.

Current call connected 00:03:25

Connected to 94134028 (r2)

BRI0/0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Di1 - dialer type = DIALER PROFILE

Idle timer (180 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String   Successes   Failures   Last DNIS   Last status

94134028             45         24   00:03:28    successful   Default

r1#

03:04:59: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to up

!--- Primary link was brought up manually when the switch ports are enabled.

r1#

r1#

03:05:50: %OSPF-5-ADJCHG: Process 1, Nbr 222.222.222.222 on FastEthernet0/0

from LOADING to FULL, Loading Done

r1#

r1#show ip ospf neigh

Neighbor ID     Pri   State      Dead Time   Address     Interface

222.222.222.222   0   FULL/  -   00:00:02    20.1.1.2    Dialer1

!--- OSPF over secondary link is still up because !--- the call is not terminated yet, waiting for idle timeout.

222.222.222.222   1   FULL/DR    00:00:38    10.1.1.2    FastEthernet0/0

!--- OSPF is now starts to converge over primary link.

r1#

r1#show ip route 222.222.222.222

!--- The watched route is now learned through the primary link. !--- Check the cost.

Routing entry for 222.222.222.222/32

Known via "ospf 1", distance 110, metric 2, type intra area

Last update from 10.1.1.2 on FastEthernet0/0, 00:00:16 ago

Routing Descriptor Blocks:

* 10.1.1.2, from 222.222.222.222, 00:00:16 ago, via FastEthernet0/0

Route metric is 2, traffic share count is

r1#

03:06:22: BR0/0:1 DDR: idle timeout

!--- Idle timed out. !--- Dialer watch checks lost routes. Since primary is up, !--- it tears down the call.

03:06:22: DDR: Dialer Watch: watch-group = 1

03:06:22: DDR:    network 222.222.222.222/255.255.255.255 UP,

03:06:22: DDR:    primary UP

03:06:22: BR0/0:1 DDR: disconnecting call

03:06:22: BR0/0:1 DDR: Dialer Watch: resetting call in progress

03:06:22: DDR: Dialer Watch: watch-group = 1

03:06:22: DDR:    network 222.222.222.222/255.255.255.255 UP,

03:06:22: DDR:    primary UP

03:06:22: %ISDN-6-DISCONNECT: Interface BRI0/0:1

disconnected from 94134028 r2,

call lasted 360 seconds

03:06:96677768412: %LINK-3-UPDOWN: Interface BRI0/0:1, changed state to down

03:06:94489281195: BR0/0 DDR: has total 0 call(s), dial_out 0, dial_in 0

r1#

03:06:94489280544: %DIALER-6-UNBIND: Interface BR0/0:1

unbound from profile Di1

03:06:23: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0/0:1,

changed state to down

r1#

03:06:37: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR0/0,

TEI 82 changed to down

r1#

03:07:01: %OSPF-5-ADJCHG: Process 1, Nbr 222.222.222.222 on Dialer1

from FULL to DOWN, Neighbor Down: Dead timer expired

!--- OSPF neighbor is down because the secondary link is down. !--- Dead timer has expired.

r1#

r1#show ip ospf neigh

Neighbor ID     Pri   State       Dead Time   Address     Interface

222.222.222.222   1   FULL/DR     00:00:38    10.1.1.2    FastEthernet0/0

!--- OSPF neighbor is through the primary link only.

r1#u all

All possible debugging has been turned off

r1#

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione. Per informazioni sulla risoluzione dei problemi generali con i livelli ISDN 1, 2 e 3, consultare il documento sull'uso del comando show isdn status per la risoluzione dei problemi BRI.

Comandi per la risoluzione dei problemi

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

Nota: prima di usare i comandi di debug, consultare le informazioni importanti sui comandi di debug.

I comandi di debug possono essere eseguiti su entrambi i peer IPSec.

- debug crypto isakmp: visualizza gli errori durante la fase 1.

- debug crypto ipsec: visualizza gli errori durante la fase 2.

- debug crypto engine: visualizza le informazioni provenienti dal crypto engine.

I comandi show possono essere eseguiti su entrambi i peer IPSec.

- show crypto isakmp sa: visualizza tutte le associazioni di sicurezza (SA) IKE (Internet Key Exchange) correnti in un peer.

- show crypto ipsec sa: visualizza le impostazioni utilizzate dalle associazioni di protezione [IPSec] correnti.

- show crypto engine connections active: visualizza le connessioni correnti e le informazioni relative ai pacchetti crittografati e decrittografati.

I comandi clear possono essere utilizzati per cancellare le associazioni di protezione.

- clear crypto isakmp: cancella le associazioni di sicurezza della fase uno.

- clear crypto sa: cancella le associazioni di sicurezza della fase due.

Informazioni correlate

- Pagina di supporto per IPSec

- Configurazione e risoluzione dei problemi di backup DDR

- Valutazione delle interfacce di backup, percorsi statici mobili e Dialer Watch per il backup DDR

- Configurazione di Dial Backup con Dialer Watch

- Uso del comando show isdn status per la risoluzione dei problemi BRI

- Supporto tecnico – Cisco Systems