Sommario

Introduzione

Premesse

Tabella di riepilogo SMU

FPD Upgrade MOP

Scenario d'uso. Sistema con Cisco IOS-XR release 7.1.2. e SMUS attivato

VM XR

sysadmin

Verifica delle versioni FPD sugli RP

Controllare l'area ATM su entrambi gli RP (valutare la rimozione della sezione)

RP0

RP1

Output di esempio della memoria TAM danneggiata

Esegui aggiornamento IOFPGA su entrambi i RP

Verifica

Ricaricare gli RP attivi e in standby per completare l'aggiornamento IOFPGA

Verifica versione ADM

Esegui altro aggiornamento FPD su entrambi i RP

1. ADM

2. BIOS

3. SATA

Verifica degli aggiornamenti

Procedura del ciclo di alimentazione per completare un altro aggiornamento FPD

Verifica versioni FPD

Verifica versione ADM

Aggiorna altri FPD in altre posizioni (se presenti)

Introduzione

In questo documento viene descritto come evitare situazioni in cui il processore di routing (RP) Cisco NCS 560 non risponde dopo un ricaricamento o un ciclo di alimentazione.

Premesse

Nella maggior parte dei casi, le installazioni di NCS 560 si trovano in località remote, in gran numero, e dove l'intervento umano deve essere ridotto al minimo.

In queste implementazioni è inoltre importante soddisfare i requisiti obbligatori di installazione SMU in base alla versione installata.

Nota: Da Cisco IOS XR release 7.2.2 in poi, non è più necessario installare le SMU separatamente.

Tabella di riepilogo SMU

Versione IOS XR

SMU

Collegamento

Note

6.6.3

CSCvt69762 (sysadmin)

CSCvt26907 (sysadmin)

CSCv8895 (sysadmin)

CSCvw42910 XR

CSCvw5238 XR

collegamento

7.0.1

CSCvw42910 XR

CSCvw5238 XR

CSCvt69762 (sysadmin)

collegamento

È obbligatorio passare alla release di manutenzione estesa (EMR) della stessa release secondaria. Ad esempio, IOS XR 7.0.2.

In questa release non è disponibile alcuna soluzione per il danneggiamento dell'area TAM.

7.0.2

CSCvt69762 (sysadmin)

CSCvt26907 (sysadmin)

CSCv48056 (sysadmin)

CSCvw42910 XR

CSCvw5238 XR

collegamento

7.1.1

CSCv41516 (sysadmin)

CSCvt69762 (sysadmin)

CSCvt26907 (sysadmin)

CSCvw42910 XR

CSCvw5238 XR

collegamento

È consigliabile passare alla release EMR della stessa release secondaria. Ad esempio, IOS XR 7.1.2.

7.1.2

CSCv41516 (sysadmin)

CSCvt69762 (sysadmin)

CSCvt26907 (sysadmin)

CSCvw42910 XR

CSCvw5238 XR

collegamento

7.2.1

CSCv41516 (sysadmin)

CSCvt69762 (sysadmin)

CSCvt26907 (sysadmin)

CSCvw42910 XR

CSCvw5238 XR

collegamento

FPD Upgrade MOP

Gli FPD devono essere aggiornati per garantire che la versione dei FPD sia sempre uguale o superiore alla versione minima richiesta per quella versione di Cisco IOS® XR.

ADM

1.06

IOFPGA

0.64

BIOS

0.16

Il presente documento presuppone che:

- RP0 è l'RP attivo

- RP1 è l'RP in standby

il prompt per le varie posizioni in modo che tutti i comandi per navigare nelle varie posizioni siano omessi.

1. XR - RP0

RP/0/RP0/CPU0:ios#

2. XR - RP1

RP/0/RP1/CPU0:ios#

3. sysadmin - RP0

sysadmin-vm:0_RP0#

4. sysadmin - RP1

sysadmin-vm:0_RP1#

5. sysadmin - shell RP0

[sysadmin-vm:0_RP0:~]$

6. sysadmin - shell RP1

[sysadmin-vm:0_RP1:~]$

Scenario d'uso. Sistema con Cisco IOS-XR release 7.1.2. e SMUS attivato

Prima di eseguire questo processo, le SMU devono essere attive e dedicate al sistema.

VM XR

RP/0/RP0/CPU0:ios#show install active summary

Active Packages: 10

ncs560-xr-7.1.2 version=7.1.2 [Boot image]

ncs560-mcast-2.0.0.0-r712

ncs560-mgbl-2.0.0.0-r712

ncs560-mpls-1.0.0.0-r712

ncs560-mpls-te-rsvp-2.0.0.0-r712

ncs560-ospf-2.0.0.0-r712

ncs560-k9sec-2.1.0.0-r712

ncs560-iosxr-fwding-2.1.0.1-r712.CSCvp67225

ncs560-os-support-2.1.0.1-r712.CSCvv41516

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .xr

sysadmin

sysadmin-vm:0_RP0# show install active summary

Active Packages: 4

ncs560-sysadmin-7.1.2 version=7.1.2 [Boot image]

ncs560-sysadmin-ncs560-7.1.2.1-r712.CSCvv41516

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .admin

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .host

Verifica delle versioni FPD sugli RP

RP/0/RP0/CPU0:ios#show hw-module fpd

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               NEED UPGD  0.53    0.53

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP0      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/RP1      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               NEED UPGD  0.53    0.53

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP1      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Controllare l'area ATM su entrambi gli RP (valutare la rimozione della sezione)

È importante garantire che la zona ATM non sia corrotta; in caso contrario, un aggiornamento IOFPGA, FPD e i successivi ricaricamenti potrebbero portare a una RMA. Con questo MOP, poiché FPD versione 0.64 o superiore è in uso, questo processo di aggiornamento IOFPGA FPD e il ricaricamento RP portano al recupero del danneggiamento del TAM.

RP0

sysadmin-vm:0_RP0# show control-driver info location 0/RP0

...

Card view from local RP:

TAM Memory is not corrupted

Can proceed with IOFPGA upgrade if required

...

RP1

sysadmin-vm:0_RP0# show control-driver info location 0/RP1

...

Card view from local RP:

TAM Memory is not corrupted

Can proceed with IOFPGA upgrade if required

...

Nota: Se la memoria ATM è danneggiata, non vi sono problemi se la versione IOFPGA di destinazione è 0.64 o superiore.

Output di esempio della memoria TAM danneggiata

sysadmin-vm:0_RP1# show control-driver info location 0/RP0

<snip>

Card view from local RP:

TAM Memory is corrupted

Do not proceed with IOFPGA upgrade

<snip>

Nota: Se tutti i prerequisiti menzionati nel presente documento sono soddisfatti, è possibile procedere con l'aggiornamento. Il termine "Non procedere con l'aggiornamento IOFPGA" si riferisce alla versione IOFPGA precedente alla 0.64.

Esegui aggiornamento IOFPGA su entrambi i RP

RP/0/RP0/CPU0:ios#upgrade hw-module location all fpd IOFPGA

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP0/CPU0:RONALDO-RF2a#0/RP0/ADMIN0:Oct 16 15:19:26.609 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              IOFPGA               FALSE

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              IOFPGA               FALSE

Verifica

RP/0/RP0/CPU0:ios#show hw-module fpd

Fri Oct 16 15:22:11.256 CEST

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               RLOAD REQ  0.53    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP0      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/RP1      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               RLOAD REQ  0.53    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP1      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Ricaricare gli RP attivi e in standby per completare l'aggiornamento IOFPGA

Ricaricare prima l'RP in standby:

sysadmin-vm:0_RP0# hw-module location 0/RP1 reload

Reload hardware module ? [no,yes] yes

Una volta ripristinata la ridondanza, ricaricare l'RP attivo (RP0) (si attiva un failover):

sysadmin-vm:0_RP0# hw-module location 0/RP0 reload

Reload hardware module ? [no,yes] yes

Verifica versione ADM

Sul nuovo RP attivo (RP1):

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.2

Bootloader Version : 0.0.9

Config Version : 1.4

Sul nuovo RP in standby (RP0):

[sysadmin-vm:0_RP0:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.2

Bootloader Version : 0.0.9

Config Version : 1.4

Esegui altro aggiornamento FPD su entrambi i RP

1. ADM

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPd ADM

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 15:57:14.332 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              ADM                  FALSE

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              ADM                  FALSE

2. BIOS

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPD PRIMARY-BIOS

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              PRIMARY-BIOS         FALSE

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              PRIMARY-BIOS         FALSE

3. SATA

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPD SATA

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              SATA                 FALSE

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              SATA                 FALSE

Verifica degli aggiornamenti

RP/0/RP1/CPU0:ios#show hw-module fpd

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  RLOAD REQ  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         RLOAD REQ  0.15    0.16

0/RP0      N560-RSP4-E           0.0   SATA                 RLOAD REQ  1.30    2.10

0/RP1      N560-RSP4-E           0.0   ADM                  RLOAD REQ  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         RLOAD REQ  0.15    0.16

0/RP1      N560-RSP4-E           0.0   SATA                 RLOAD REQ  1.30    2.10

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Procedura del ciclo di alimentazione per completare un altro aggiornamento FPD

Nota: Se la versione del firmware ADM è 1.14.2, è necessario sincronizzare tutti i file system su tutte le VM/host prima di utilizzare lo script di ricaricamento.

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.1 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.4 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.4 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.1 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.1 chvrf 0 ssh 10.0.2.2 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.1 chvrf 0 ssh 10.0.2.2 sync

Nota: Non è disponibile alcun output per questi comandi.

Per ricaricare lo chassis:

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/reboot_system.sh

Initiating power-cycle of 0/RP0

Initiating power-cycle of 0/RP1

Nota: Se la versione del firmware ADM è la 1.14.3, gli FPD sull'RP richiedono un ricaricamento.

Innanzitutto, ricaricare il RP di standby (RP0):

sysadmin-vm:0_RP1# hw-module location 0/RP0 reload

Reload hardware module ? [no,yes] yes

Una volta ripristinata la ridondanza, ricaricare l'RP attivo (RP1) (viene attivato un failover):

sysadmin-vm:0_RP1# hw-module location 0/RP1 reload

Reload hardware module ? [no,yes] yes

Verifica versioni FPD

RP/0/RP0/CPU0:ios#show hw-module fpd

Fri Oct 16 16:24:18.849 CEST

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  CURRENT    1.06    1.06

0/RP0      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         CURRENT    0.16    0.16

0/RP0      N560-RSP4-E           0.0   SATA                 CURRENT    2.10    2.10

0/RP1      N560-RSP4-E           0.0   ADM                  CURRENT    1.06    1.06

0/RP1      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         CURRENT    0.16    0.16

0/RP1      N560-RSP4-E           0.0   SATA                 CURRENT    2.10    2.10

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Verifica versione ADM

[sysadmin-vm:0_RP0:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.3

Bootloader Version : 0.0.9

Config Version : 1.6

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.3

Bootloader Version : 0.0.9

Config Version : 1.6

Aggiorna altri FPD in altre posizioni (se presenti)

RP/0/RP0/CPU0:ios#upgrade hw-module location 0/5 FPD IMFPGA

Fri Oct 16 16:28:15.006 CEST

upgrade command issued (use "show hw-module fpd" to check upgrade status)