Sommario

Introduzione

Come ripristinare IC3000 dalla console

Soluzione

Introduzione

In questo documento viene descritto come ripristinare l'IC3000 utilizzando la console.

Come ripristinare IC3000 dalla console

In alcuni casi, IC3000 non è più avviabile ed è bloccato in rommon>, ma non è in grado di avviare l'immagine.

In questo caso, la console seriale/USB può visualizzare questo output:

autoboot: Restarting the system.

Rom image verified correctly

Cisco Systems ROMMON, Version 1.0.0(IC3000), RELEASE SOFTWARE

Copyright (c) 1994-2018  by Cisco Systems, Inc.

Compiled Thu 09/06/2018 11:38:52.09 by builders

Current image running: Boot ROM1

Last reset cause: LocalSoft

DIMM Slot 0 : Present

Platform IC3000-2C2F-K9 with 8192 Mbytes of main memory

MAC Address: 00:00:00:00:00:00

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

Warning: filesystem is not clean

Directory .boot_string not found

Unable to locate .boot_string directory

Unable to load .boot_string

Attempt autoboot: "boot disk0:"

Warning: filesystem is not clean

Warning: filesystem is not clean

File size is 0x01360000

Located IC3000-K9-1.0.1.SPA

Image size 20316160 inode num 12, bks cnt 4960 blk size 8*512

#######################################################################################################################################################################################################

Signature verification failed for key# 1

Failed to validate digital signature

Signature verification failed for key# 1

Signature verification failed for key# 2

Failed to validate digital signature

LFBFF signature verification failed!!

No kernel found to launch.

boot: cannot determine first file name on device "disk0:/"

autoboot: All boot attempts have failed.

autoboot: Restarting the system.

Quando si interrompe il processo di avvio e si tenta di avviare l'immagine, presente su disco0:, è possibile che venga visualizzato lo stesso output di cui sopra e che il dispositivo sia fondamentalmente in una sorta di bootloop.

Soluzione

Per ripristinare IC3000, è necessario soddisfare i seguenti prerequisiti:

- Connettività IP alla porta di gestione

- Server TFTP, raggiungibile dalla rete tramite la porta di gestione

- Immagine IC3000, disponibile per il download all'indirizzo: https://software.cisco.com/download/home/286321941/type/286322235

- Connessione console alla connessione seriale o USB su IC3000

I seguenti passaggi consentono di riportare IC3000 in uno stato utilizzabile:

1. Scaricare l'immagine IC3000 dall'URL fornito sopra e renderla disponibile sul server TFTP

2. Collegarsi alla console IC3000 e interrompere il processo di avvio premendo ESC quando viene visualizzato questo messaggio:

Use BREAK or ESC to interrupt boot.

Use SPACE to begin boot immediately.

3. Dopo aver interrotto la normale sequenza di avvio, viene visualizzato il prompt rommon>:

rommon 1 >

4. Configurare l'indirizzo IP e il gateway per IC3000 sulla porta di gestione. Anche se non è richiesto alcun gateway, è necessario impostare un valore:

rommon 1 > address 192.168.100.2

rommon 2 > netmask 255.255.255.0

rommon 3 > gateway 192.168.100.1

5. Verificare la connettività al server TFTP:

rommon 4 >  ping 192.168.100.1

Sending 10, 32-byte ICMP Echoes to 192.168.100.1 timeout is 4 seconds

?!!!!!!!!!

Success rate is 90 percent (9/10)

6. Impostare l'indirizzo e il nome del file del server TFTP da scaricare:

rommon 5 > server 192.168.100.1

rommon 6 > file IC3000-K9-1.0.1.SPA

7. Avviare il download e l'avvio dell'immagine dal server TFTP:

rommon 7 > tftpdnld

ADDRESS: 192.168.100.2

NETMASK: 255.255.255.0

GATEWAY: 192.168.100.1

SERVER: 192.168.100.1

IMAGE: IC3000-K9-1.0.1.SPA

MACADDR: 00:00:00:00:00:00

VERBOSITY: Progress

RETRY: 40

PKTTIMEOUT: 7200

BLKSIZE: 1460

CHECKSUM: Yes

PORT: GbE/0

PHYMODE: Auto Detect

Receiving IC3000-K9-1.0.1.SPA from 192.168.100.1!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

File reception completed.

Una volta completato il trasferimento dell'immagine, IC3000 si avvia immediatamente dall'immagine:

File reception completed.

Boot buffer bigbuf=348bd018

Boot image size = 102729968 (0x61f88f0) bytes

[image size]      102729968

[MD5 signaure]    294a052497277c330d6b2159cf37f1ab

LFBFF signature verified.

[    4.446627] sd 2:0:0:0: [sdb] No Caching mode page found

[    4.510305] sd 2:0:0:0: [sdb] Assuming drive cache: write through

INIT: version 2.88 booting

Starting udev

Populating dev cache

INIT: Entering runlevel: 5postinsts/000-monit...

Configuring network interfaces... Setting bridge MAC address to: 00:b8:b3:80:02:c0

done.

Starting system message bus: dbus.

Checking and Mounting BOOT filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

BOOT was not cleanly unmounted, check forced.

BOOT: Inode 12, i_size is 20316160, should be 20447232.  FIXED.

BOOT: Inode 12, i_blocks is 39728, should be 39984.  FIXED.

BOOT: 12/244320 files (0.0% non-contiguous), 22254/976892 blocks

Checking and Mounting BOOT filesystem...Done

Checking GOLDEN filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

GOLDEN was not cleanly unmounted, check forced.

GOLDEN: 12/122160 files (8.3% non-contiguous), 33504/488448 blocks

Checking GOLDEN filesystem...Done

Checking and Mounting SYSTEM filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

SYSTEM: clean, 11/535392 files, 71084/2139136 [   21.111486] fpga_i2c_init_module: FPGA base address = ffffc90001078000

blocks

Checking and Mounting SYSTEM filesystem...Done

Checking and Mounting IOX filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

IOX: clean, 11/5865472 files, 415148/23442851 blocks

Checking and Mounting IOX filesystem...Done

Checking and Mounting LOG filesystem...

fsck (busybox 1.24.1, 2018-09-13 06:16:00 UTC)

LOG: clean, 11/244800 files, 33670/977949 blocks

Checking and Mounting LOG filesystem...Done

0x0000

Authenticating ACT2...ACT2 success

System initializing...

System Type Fiber.

Mounting cgroups...Done

Checking if cgroup is provided by kernel...Yes.

Checking if cgroup is mounted...Yes.

Checking if lssubsys is available...Yes.

Checking if platform defines cgroup parameters...Yes.

Tweaking base cgroup parameters...Done.

Checking if subsystems needed by IOx exist...

Setting up cpu cgroup parameters...

Setting cpu.shares for apphosting.partition to 921...OK

Setting cpu.shares for host to 100...OK

Setting cpu.shares for host/caf to 100...OK

Setting cpuset values for apphosting.partition...OK

Setting up memory cgroup parameters...

Setting memory.limit_in_bytes for apphosting.partition to 6589061529...OK

Setting memory.limit_in_bytes for host to 1647265382...OK

Setting memory.limit_in_bytes for host/caf to 1317812305...OK

OpenBSD Secure Shell server not in use (/etc/ssh/sshd_not_to_be_run)

Starting atd: OK

starting DNS forwarder and DHCP server: dnsmasq... done.

Starting ntpd: done

Starting system log daemon...0

Starting kernel log daemon...0

Network mgmt starting with factory default configuration

User mgmt starting with factory default configuration

Starting konfd: OK

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed                                   [ ok ]

* Starting libvirt log management daemon: virtlogd                      [ ok ]

Starting crond: OK

Starting Monit 5.14 daemon with http interface at /var/run/monit.sock

ic3k>