Sommario

Introduzione

Come utilizzare il protocollo SNMP per ricaricare uno switch?

Informazioni correlate

Introduzione

Questo documento contiene le risposte alle domande frequenti e guida gli utenti a trovare risorse utili sui problemi di SNMP e SNMP relativi alle apparecchiature Cisco.

D. Come utilizzare il protocollo SNMP per ricaricare uno switch?

A. Attenersi alla seguente procedura:

sysReset = .1.3.6.1.4.1.9.2.9.9 from the CISCO-STACK-MIB.my sysReset OBJECT-TYPE

-- FROM CISCO-STACK-MIB

SYNTAX Integer { other(1), reset(2), resetMinDown(3) }

MAX-ACCESS read-write

STATUS Current

DESCRIPTION "Writing reset(2) to this object resets the control logic of all modules in the system. Writing

resetMinDown(3) to this object resets the system with the minimal system down time. The resetMinDown(3) is

only supported in systems with redundant supervisors."

::= { iso(1) org(3) dod(6) internet(1) private(4) enterprises(1) cisco(9) workgroup(5) ciscoStackMIB(1) systemGrp(1) 9 }

Sullo switch Cisco, è necessario impostare il comando set snmp community read-write private per supportare il comando reload.

In questo esempio il router viene ricaricato con l'indirizzo IP 10.16.99.55:

# ./snmpset 10.16.99.55 private .1.3.6.1.4.1.9.2.9.9.0 i 2

Questa è una spiegazione delle variabili usate in precedenza:

10.16.99.55 = ip address of your switch

private = R/W SNMP Community string of your switch .

1.3.6.1.4.1.9.2.9.9.0 = the instance of sysReset Object

i = Integer as defined SYNTAX in the MIB

2 = reload command as defined in the MIB

Informazioni correlate

- Suggerimenti tecnici per i servizi applicativi IP

- Supporto tecnico – Cisco Systems