Sommario

Introduzione

Risoluzione dei problemi relativi a un piano di controllo N7K intermittente o non reattivo

1. Il problema intermittente si verifica in un determinato ciclo?

2. Come risolvere il problema?

Introduzione

In questo documento viene descritto come risolvere i problemi relativi a un modulo hardware in un Nexus 7k quando non risponde o è intermittente.

Risoluzione dei problemi relativi a un piano di controllo N7K intermittente o non reattivo

1. Il problema intermittente si verifica in un determinato ciclo?

Passaggio 1. Eseguire una procedura dettagliata sui vari ID utente SNMP V3 e/o sulle stringhe della community SNMP V2, ovvero una procedura guidata per il nome host mib.

Eseguite questa operazione in un ciclo continuo.

- Se gli snmpwalks rispondono in modo coerente senza problemi, molto probabilmente non è il vostro problema.

- Se gli snmpwalks rispondono in modo coerente per 30 secondi e poi tutto d'un tratto si arrestano e diventano intermittenti per dire altri 30 secondi e poi ripetere il ciclo - questa è un'indicazione seria

Passaggio 2. SSH al controller di dominio primario in questione che dispone di snmpwalks intermittenti non rispondenti per il nome host del Passaggio 1.

- Nello stesso momento in cui le snmpwalks non rispondono con il nome dell'host, usare il comando show running-configuration nella finestra ssh.

- Se si visualizza la configurazione in esecuzione in pausa - si tratta di un'indicazione grave

Con entrambi i passi 1 e 2. influenzati contemporaneamente nel ciclo di 60 secondi, questo sembra essere un guasto hardware all'interno del control plane N7K, in quanto il N7K esegue un controllo diagnostico dello stato dell'hardware in modo coerente. Quando si osservano 30 secondi di reattività e 30 secondi di non reattività e poi il ciclo si ripete, questa è una chiara indicazione del controllo di integrità della diagnostica hardware che analizza tutto l'hardware. I 30 secondi di tempi di risposta corrispondono alla scansione dell'hardware valido e i 30 secondi di assenza di risposta corrispondono all'hardware guasto.

Passaggio 3. Se il passo 2. mostra chiaramente un guasto hardware, procedere come segue:

- mostra il modulo in tutti i controller di dominio virtuali attivi per visualizzare eventuali test di diagnostica non riusciti

- Soprattutto, e solo nell'amministratore VDC-1 (cioè VDC-1), visualizzare il file di log e cercare gli errori EOBC (cioè, gli errori EOBC vengono registrati solo nell'amministratore VDC-1)

Nota: EOBC è il processo del control plane interno che N7K utilizza per comunicare tra SUP/Fabric Modules/Line Card. Se questo processo EOBC è influenzato in qualche modo, il modulo associato illustrato nel file di registro VDC-1 dell'amministratore è probabilmente la causa della reattività intermittente osservata nei test precedenti, in quanto la SUP ha perso comunicazioni coerenti al 100% con il modulo associato illustrato nel file di registro VDC-1 dell'amministratore e sta tentando di recuperare/comunicare con esso causando la reattività intermittente con altri processi del control plane.

Esempio:

lab-sw01-admin-vdc-1# show logging logfile | inc EOBC

2022 Feb 22 19:46:15 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:15 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:16 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:16 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:21 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:21 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:22 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:23 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:23 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:24 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:24 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

2022 Feb 22 19:46:26 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure on standby sup in device DEV_EOBC_MAC (device error 0xc0a0504f)

2022 Feb 22 19:46:26 lab-sw01-admin-vdc-1 %MODULE-4-MOD_WARNING: Module 8 (Serial number: JAA00000000) reported warning 8/1-8/0 due to EOBC heartbeat failure in device DEV_EOBC_MAC (device error 0xc0a0514d)

Questo output di log mostra chiaramente che il modulo 8 ha un errore di battito cardiaco EOBC con SUP in standby ed è in uno stato non integro e richiede un'azione immediata.

2. Come risolvere il problema?

Passaggio 1. Eseguire un modulo show e acquisire i dati per riferimento:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 N77-SUP2E active *

6 0 Supervisor Module-2 N77-SUP2E ha-standby

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

5 8.4(4) 1.3

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Nota: tutti i moduli sono online (ossia ok) e il modulo 5 è il SUP attivo (ossia attivo *) con il modulo 6 come SUP in standby ad alta disponibilità (ossia ha-standby). Anche se ci sono AVVERTENZE EOBC sul Modulo 8 nel file di log VDC di amministrazione, questo output mostra il Modulo 8 come OK.

Passaggio 2. Eseguire un ricaricamento dello switch o uno switchover del supervisore (ossia, entrambi all'interno del VDC di amministrazione):

lab-sw01-admin-vdc-1# reload

- system (ie supervisor) switchover -

NOTE: preferred method as this is a non-impacting procedure to the box with regards to active data flows

lab-sw01-admin-vdc-1# system switchover

Nota: in entrambi i casi, prima di eseguire un ricaricamento o un cambio del sistema, accertarsi di essere su entrambe le console supervisor in modo da poter controllare in prima persona tutto l'output del supervisor.

Passaggio 3. Nel caso in cui il sospetto sia relativo al modulo 8, è probabile che sulla console venga visualizzato un messaggio di errore del modulo 8 al passaggio al sistema (supervisore):

lab-sw01-admin-vdc-1(standby) login: 2022 Feb 23 02:09:45 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %KERN-2-SYSTEM_MSG: [12392164.927835] Switchover started by redundancy driver - kernel

2022 Feb 23 02:09:45 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %SYSMGR-2-HASWITCHOVER_PRE_START: This supervisor is becoming active (pre-start phase).

2022 Feb 23 02:09:45 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %SYSMGR-2-HASWITCHOVER_START: Supervisor 6 is becoming active.

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth0/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %SYSMGR-2-SWITCHOVER_OVER: Switchover completed.

2022 Feb 23 02:09:47 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %PLATFORM-1-PFM_ALERT: Disabling ejector based shutdown on sup in slot 6

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth1/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth2/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth3/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth4/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth5/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth6/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth7/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth8/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth9/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth10/8 return status No card found in slot

2022 Feb 23 02:09:46 lab-sw01-vdc-2 %$ VDC-2 %$ %ELTM-2-ELTM_INTF_TO_LTL: Failed to get LTL for interface lc-eth11/8 return status No card found in slot

Passaggio 4. Eseguire più moduli show e verificare se e quando il modulo 8 torna online:

Module 5 dropped out and is powered-up:

Module 8 dropped out and is powered-up:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module powered-up

Mod Power-Status Reason

--- ------------ ---------------------------

8 powered-up Unknown. Issue show system reset mod ...

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

lab-sw01-admin-vdc-1# 2022 Feb 23 02:11:11 lab-sw01-vdc-2 %$ VDC-2 %$ %PLATFORM-2-MOD_DETECT: Module 8 detected (Serial number JAA00000000) Module-Type 10/40 Gbps Ethernet Module Model N77-F324FQ-25

2022 Feb 23 02:11:11 lab-sw01-vdc-2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRUP: Module 8 powered up (Serial number JAA00000000)

2022 Feb 23 02:11:11 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %PLATFORM-2-MOD_DETECT: Module 8 detected (Serial number JAA00000000) Module-Type 10/40 Gbps Ethernet Module Model N77-F324FQ-25

2022 Feb 23 02:11:11 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %PLATFORM-2-MOD_PWRUP: Module 8 powered up (Serial number JAA00000000)

Module 8 is pwr-cycled:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module pwr-cycld

Mod Power-Status Reason

--- ------------ ---------------------------

8 pwr-cycld Unknown. Issue show system reset mod ...

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 powered-up

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 8 is checked by epld auto-upgrade and is good to go:

lab-sw01-admin-vdc-1# 2022 Feb 23 02:13:06 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %USER-2-SYSTEM_MSG: <<%EPLD_AUTO-2-AUTO_UPGRADE_CHECK>> Automatic EPLD upgrade check for module 8: EPLD versions are up to date. - epld_auto

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 powered-up

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 8 moves to testing by the hardware diagnostics:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 testing

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 8 moves to initializing after passing hardware diagnostics:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 initializing

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 8 comes online:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 powered-up

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 5 SUP going active:

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 N77-SUP2E inserted

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

5 8.4(4) 1.3

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

Module 5 SUP becomes ha-standby:

2022 Feb 23 02:16:38 lab-sw01-admin-vdc-1 %$ VDC-1 %$ %PLATFORM-1-PFM_ALERT: Enabling ejector based shutdown on sup in slot 6

lab-sw01-admin-vdc-1# show module

Mod Ports Module-Type Model Status

--- ----- ----------------------------------- ------------------ ----------

1 12 100 Gbps Ethernet Module N77-F312CK-26 ok

2 12 100 Gbps Ethernet Module N77-F312CK-26 ok

3 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

4 48 1/10 Gbps Ethernet Module N77-F348XP-23 ok

5 0 Supervisor Module-2 N77-SUP2E ha-standby

6 0 Supervisor Module-2 N77-SUP2E active *

7 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

8 24 10/40 Gbps Ethernet Module N77-F324FQ-25 ok

Mod Sw Hw

--- --------------- ------

1 8.4(4) 1.5

2 8.4(4) 1.5

3 8.4(4) 1.9

4 8.4(4) 1.9

5 8.4(4) 1.3

6 8.4(4) 1.3

7 8.4(4) 1.2

8 8.4(4) 1.2

2022 Feb 23 02:15:44 lab-sw01-admin-vdc-1 %MODULE-5-MOD_OK: Module 8 is online (Serial number: JAA00000000)

2022 Feb 23 02:15:43 lab-sw01-admin-vdc-1 %SYSMGR-SLOT8-5-MODULE_ONLINE: System Manager has received notification of local module becoming online.

2022 Feb 23 02:15:44 lab-sw01-admin-vdc-1 %PLATFORM-5-MOD_STATUS: Module 8 current-status is MOD_STATUS_ONLINE/OK

2022 Feb 23 02:16:38 lab-sw01-admin-vdc-1 %MODULE-5-STANDBY_SUP_OK: Supervisor 5 is standby

Nota: tutti i moduli sono in linea (OK) e il modulo 6 è il SUP attivo (attivo *) con il modulo 5 come SUP in standby ad alta disponibilità (in standby).

Passaggio 5. Una volta che tutti i moduli sono online, ripetere il passaggio 1 e verificare che tutta la connettività sia normalizzata.