Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Configurazione

Esempio di rete

Configurazioni

Verifica

Router 1

Switch ATM

Risoluzione dei problemi

Informazioni correlate

Introduzione

La funzione Frame Relay (FR) to ATM Service Interworking permette la comunicazione tra un utente finale FR e un utente finale ATM. Si basa sul contratto di implementazione del Frame Relay Forum (FRF.8) , che specifica che una stazione terminale FR può comunicare con una stazione terminale ATM, a condizione che tra le due stazioni terminali vi sia un router che esegue le specifiche fornite in FRF.8.

Questo documento presenta una configurazione di esempio di interoperabilità tra i servizi FR e ATM utilizzando FRF.8 (modalità di conversione) su LightStream 1010. Questa configurazione funziona anche sugli switch Catalyst 8510 MSR o 8540 MSR.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Il riferimento delle informazioni contenute in questo documento è Cisco IOS® versione 12.0(3c)W5(9).

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazione

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questo documento, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete:

I parametri di traffic shaping FR utilizzati in questa configurazione di esempio nel router 1 sono:

- CIR (Committed Information Rate) = 64 kbps

- Burst Impegnato (Bc) = 8000

- Burst in eccesso (Be) = 8000

Nota: per una spiegazione dettagliata su come risolvere i problemi relativi alle connessioni Frame Relay Traffic Shaping, vedere Comandi show per Frame Relay Traffic Shaping.

Configurazioni

Nel documento vengono usate queste configurazioni:

- Router 1

- Switch ATM

- Router 2

Nota: queste configurazioni contengono informazioni rilevanti solo per Frame Relay to ATM Service Interworking.

Router 1

controller E1 5/0

channel-group 30 timeslots 1-31

!

interface Serial5/0:30

ip address 12.12.12.2 255.255.255.0

no ip directed-broadcast

encapsulation frame-relay IETF

!--- The FR encapsulation used is IETF. It should match the switch.

no fair-queue

frame-relay traffic-shaping

!--- Enabling FR traffic shaping on this interface.

frame-relay class test-iwf

frame-relay map ip 12.12.12.1 123 broadcast

!

map-class frame-relay test-iwf

no frame-relay adaptive-shaping

!--- Traffic shaping parameters configured.

frame-relay cir 64000

frame-relay bc 8000

frame-relay be 8000

Switch ATM

frame-relay connection-traffic-table-row index 123 64000

8000 128000 8000 vbr-nrt 123

!

controller E1 4/0/0

clock source free-running

channel-group 30  timeslots 1-31

!

interface Serial4/0/0:30

no ip address

no ip directed-broadcast

encapsulation frame-relay IETF

!--- The FR encapsulation used is IETF.

no arp frame-relay

frame-relay intf-type dce

!--- Interface type is dce, because it is providing clocking.

frame-relay pvc 123 rx-cttr 123 tx-cttr 123 service translation

interface  ATM0/0/0 0 123

!--- This command makes the translation from !--- Frame Relay to ATM PVC 123.

Router 2

interface ATM2/0.123 point-to-point

ip address 12.12.12.1 255.255.255.0

no ip directed-broadcast

pvc 0/123

!--- Configured ATM PVC 0/123 with traffic shaping and !--- oam-pvc management enabled.

vbr-nrt 163 81 49

broadcast

oam-pvc manage

encapsulation aal5snap

I parametri di traffic shaping sul router 2 possono essere ottenuti dalla tabella del traffico di connessione Frame Relay sullo switch ATM (vedere la sezione).

Verifica

Le informazioni contenute in questa sezione permettono di verificare che la configurazione funzioni correttamente.

Alcuni comandi show sono supportati dallo strumento Output Interpreter (solo utenti registrati); lo strumento permette di visualizzare un'analisi dell'output del comando show.

- show frame-relay lmi

- mostra mappa frame relay

- show frame-relay pvc

- show atm vc interface atm 0/0/0

- show frame-relay connection-traffic-table-row

- show atm connection-traffic-table

- show frame-relay interface resource serial 4/0/0:30 tutte le informazioni

L'output mostrato di seguito è il risultato dell'immissione dei comandi sopra riportati sui dispositivi mostrati nel diagramma di rete. Questo output mostra che la rete funziona correttamente.

Router 1

Nota: quando si collega un router Cisco a una connessione di terze parti, è preferibile utilizzare l'interfaccia LMI (Local Management Interface) IETF (Internet Engineering Task Force). Notare che l'LMI è Cisco e il Frame Relay è DTE poiché riceve l'orologio dallo switch.

Router1# show frame-relay lmi

LMI Statistics for interface Serial5/0:30 (Frame Relay DTE) LMI TYPE = CISCO

Invalid Unnumbered info 0             Invalid Prot Disc 0

Invalid dummy Call Ref 0              Invalid Msg Type 0

Invalid Status Message 0              Invalid Lock Shift 0

Invalid Information ID 0              Invalid Report IE Len 0

Invalid Report Request 0              Invalid Keep IE Len 0

Num Status Enq. Sent 1222             Num Status msgs Rcvd 1222

Num Update Status Rcvd 0              Num Status Timeouts 2

Per verificare che il dlci sia attivo e mappato all'indirizzo IP corrispondente, usare il comando show frame-relay map.

Router1# show frame-relay map

Serial5/0:30 (up): ip 12.12.12.1 dlci 123(0x7B,0x1CB0), static,

broadcast,

IETF, status defined, active

Per controllare lo stato del PVC Frame Relay, usare il comando show frame-relay pvc. Nell'output sottostante possiamo vedere che è attivo.

Router1# show frame-relay pvc

PVC Statistics for interface Serial5/0:30 (Frame Relay DTE)

Active     Inactive      Deleted       Static

Local          1            0            0            0

Switched       0            0            0            0

Unused         0            0            0            0

DLCI = 123, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = Serial5/0:30

input pkts 786           output pkts 549          in bytes 742312

out bytes 684503         dropped pkts 6           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 1          out bcast bytes 608

pvc create time 03:25:16, last time pvc status changed 03:09:30

Switch ATM

Nota: il termine ATM-PX/Y/Z si riferisce alla pseudo interfaccia.

ATMswitch# show atm vc interface atm 0/0/0

Interface         VPI  VCI   Type   X-Interface      X-VPI X-VCI Encap  Status

ATM0/0/0          0    5     PVC    ATM2/0/0          0    43    QSAAL  UP

ATM0/0/0          0    16    PVC    ATM2/0/0          0    35    ILMI   UP

ATM0/0/0          0    101   PVC    ATM0/1/0          0    101          UP

ATM0/0/0          0    102   PVC    ATM0/1/0          0    102          UP

ATM0/0/0          0    123   PVC    ATM-P4/0/0        30   155          UP

Per visualizzare le connessioni Frame Relay ad ATM nello switch, usare il comando show frame-relay connection-traffic-table-row, come mostrato di seguito:

ATMswitch# show frame-relay connection-traffic-table-row

Row            cir      bc     be      pir      fr-atm Service-category    ATM Row

100           64000   32768   32768   64000            vbr-nrt              100

123           64000   8000    8000    128000           vbr-nrt              123

ATMswitch# show atm connection-traffic-table

Row      Service-category    pcr        scr/mcr       mbs         cdvt

1            ubr          7113539        none                     none

2            cbr              424                                 none

3            vbr-rt           424         424          50         none

4            vbr-nrt          424         424          50         none

5            abr              424           0                     none

6            ubr              424        none                     none

10           cbr            50000                                 none

11           cbr             1000                                 none

12           cbr            11700                                 none

100          vbr-nrt           81          81-0        50         none

123          vbr-nrt          163          81-0        49         none

<-- (*)

2147483645*  ubr                0        none                     none

2147483646*  ubr                1        none                     none

2147483647*  ubr          7113539        none                     none

(*) Quando si crea la riga frame-relay connection-traffic-table-row, si associa un indice di riga della tabella ATM in cui i parametri di traffic shaping ATM vengono calcolati automaticamente utilizzando la specifica B-ICI (Broadband Inter-Carrier Interface), V2.0 (vedere formule).

ATMswitch# show frame-relay interface resource serial 4/0/0:30 all-information

Encapsulation: FRAME-RELAY

Resource Management configuration:

Input queues (PAM to switch fabric):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Output queues (PAM to line):

Discard threshold: 87% vbr-nrt, 87% abr, 87% ubr

Marking threshold: 75% vbr-nrt, 75% abr, 75% ubr

Overflow servicing for VBR: enabled

Available bit rates (in bps):

1920000 vbr-nrt RX, 1920000 vbr-nrt TX

1920000 abr RX,     1920000 abr TX

1920000 ubr RX,     1920000 ubr TX

Overbooking: disabled

Resource Management state:  Allocated bit rates (in bps):

64000 vbr-nrt RX, 64000 vbr-nrt TX

0 abr RX,     0 abr TX

0 ubr RX,     0 ubr TX

Actual allocated bit rates (in bps):

64000 vbr-nrt RX, 64000 vbr-nrt TX

0 abr RX,     0 abr TX

0 ubr RX,     0 ubr TX

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.

Informazioni correlate

- Supporto della tecnologia di interoperabilità ATM - Frame Relay

- Supporto della tecnologia ATM