Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Configuration

Vérification

Introduction

Ce document décrit la configuration chiffrée sécurisée SCCP (Signaling Connection Control Part) sur la passerelle analogique VG224.

Conditions préalables

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- SCCP

- VG224

- Gestionnaire de communications unifiées de Cisco (version CUCM)

Components Used

Les informations contenues dans ce document sont basées sur les versions de logiciel suivantes :

- VG224

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si votre réseau est en ligne, assurez-vous de bien comprendre l’incidence possible des commandes.

Configuration

Étape 1. Copiez le certificat callmanager.pem sur le VG224 (référencé comme point de confiance SÉCURISÉ dans la configuration ci-dessous)

Étape 2. Créez un certificat auto-signé sur le VG224 avec l'adresse MAC de FastEthernet0/0 (interface de liaison) avec seulement les 10 derniers chiffres comme nom d'objet.

Étape 3. Copiez le vg-cert dans CUCM en tant qu'approbation du gestionnaire d'appels et redémarrez CUCM.

Les informations sont fournies pour la configuration des certificats requis pour VG224.

Router(config)#crypto key generate rsa general-keys label vg modulus 1024

Router(config)#crypto pki trustpoint vg

Router(ca-trustpoint)#enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E2  <----- Last 10 DIGITS ONLY of the SCCP bind interface. Formatting EXACTLY as shown with colons.

rsakeypair vg

crypto pki enroll vg

Router(config)#crypto pki export vg_cert pem terminal

Astuce : Guide de référence des commandes

Note: Vous ne verrez pas d'icône de verrouillage lors de l'appel depuis un téléphone analogique VG224 sécurisé vers un téléphone IP sécurisé en raison de la mise en garde CSCti08882

Vérification

Ces informations sont destinées à la vérification de l'enregistrement réussi de VG224

Router#show sccp

SCCP Admin State: UP

Gateway Local Interface: FastEthernet0/0

IPv4 Address: 14.1.97.95

Port Number: 2000

IP Precedence: 5

User Masked Codec list: None

Call Manager: 172.18.172.204, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 1

Trustpoint: N/A

Call Manager: 172.18.172.205, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 2

Trustpoint: N/A

Call Manager: 172.18.172.206, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 3

Trustpoint: N/A

AutoCfg_Virtual_Endpoint Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2000

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2FFF

Reported Max Streams: 0, Reported Max OOS Streams: 0

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Alg_Phone Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2443

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2400

Security

Signaling Security: ENCRYPTED TLS

Media Security: SRTP

Supported crypto suites :AES_CM_128_HMAC_SHA1_32

Reported Max Streams: 1, Reported Max OOS Streams: 0

Supported Codec: rfc2833 dtmf, Maximum Packetization Period: 30

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Supported Codec: g711alaw, Maximum Packetization Period: 20

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: g729ar8, Maximum Packetization Period: 220

Supported Codec: g729br8, Maximum Packetization Period: 220

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: ilbc, Maximum Packetization Period: 120

TLS : ENABLED

Cela montre que le VG224 sécurisé utilise la configuration IOS SCCP.

Building configuration...

Current configuration : 5258 bytes

!

version 15.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Router

!

boot-start-marker

boot system slot0:vg224-i6k9s-mz.151-4.M3

boot-end-marker

!

!

enable secret 5 $1$f99B$PWPClPrUNzgsUZEO8aBYG.

!

no aaa new-model

crypto pki token default removal timeout 0

!

crypto pki trustpoint SECURE

enrollment terminal

revocation-check crl

!

crypto pki trustpoint vg

enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E24       ( instead of this command,  we can use hiddle command "mac-address Fast Ethernet0/0 as well )

revocation-check crl

rsakeypair AN1AE2857BE2400

!

!

crypto pki certificate chain SECURE

certificate ca 588C9B7C2D4B37F03930E8C926D02A18

<truncated>

crypto pki certificate chain vg

certificate self-signed 03

<truncated>

ip source-route

!

ip cef

ip name-server 172.18.108.43

ip name-server 172.18.108.34

!

!

no ipv6 cef

!

stcapp ccm-group 1

stcapp security trustpoint vg

stcapp security mode encrypted

stcapp

!

stcapp feature access-code

!

stcapp feature speed-dial

!

!

!

stcapp supplementary-services

port 2/0

fallback-dn 862224

!

!

!

!

!

!

!

!

!

voice-card 0

!

!

!

!

!

!

!

!

!

!

interface FastEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface FastEthernet0/1

no ip address

duplex auto

speed auto

!

ip forward-protocol nd

!

ip http server

no ip http secure-server

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

!

!

!

control-plane

!

!

voice-port 2/0

timeouts initial 60

timeouts interdigit 60

timeouts ringing infinity

!

voice-port 2/1

!

<truncated>

!

voice-port 2/23

!

ccm-manager config server 172.18.172.204

ccm-manager config

ccm-manager sccp local FastEthernet0/0

ccm-manager sccp

!

!

mgcp profile default

!

sccp local FastEthernet0/0

sccp ccm 172.18.172.204 identifier 1 version 7.0

sccp ccm 172.18.172.205 identifier 2 version 7.0

sccp ccm 172.18.172.206 identifier 3 version 7.0

sccp

!

sccp ccm group 1

associate ccm 1 priority 1

associate ccm 2 priority 2

associate ccm 3 priority 3

!

dial-peer voice 999200 pots

service stcapp

securiy mode encrypted   =====> Required command

port 2/0

!

dial-peer voice 99920 pots

! service stcapp

securiy mode encrypted   =====> Required command

port 2/1

!

!(configure all ports in same secure mode)

!

line con 0

line aux 0

line vty 0 4

password ww

login

transport input all

!

ntp server 172.18.108.15

end