Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Procédure de mise à niveau

Configuration initiale

Étapes de mise à niveau

Vérification

Introduction

Ce document décrit une procédure de mise à niveau logicielle en service (ISSU) étape par étape sur les commutateurs de la gamme Cisco Catalyst 6500 en mode VSS (Virtual Switching System) avec l'utilisation du Supervisor 2T avec les commutateurs d'accès instantané Cisco Catalyst 6800 à double résidence (FEX) joints.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations de ce document sont basées sur les commutateurs de la gamme Cisco Catalyst 6500 en mode VSS qui exécutent Supervisor Engine 2T avec un 6800IA à double résidence attaché aux cartes de ligne WS-X6904-40G.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Procédure de mise à niveau

Configuration initiale

La procédure de mise à niveau est exécutée pour le logiciel Cisco IOS® Version 15.1(2)SY à Version 15.1(2)SY1.

Voici les statistiques avant le processus ISSU :

- Le châssis Catalyst 6500 avec l'ID de commutateur 1 est actif et le commutateur avec l'ID 2 est en veille (à chaud).

- Les deux châssis sont activés sur le logiciel Cisco IOS Version 15.1(2)SY.

- Un seul commutateur 6800IA qui exécute la version 15.0(2)EX2 de la plate-forme logicielle Cisco IOS est connecté à VSS sur les cartes de ligne WS-X6904-40G avec une connexion à double domicile. Le numéro de port-channel FEX est 99 et l'ID FEX est 110.

6K1#show mod sw all

Switch Number:     1   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY    Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY    Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX2   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Active

Peer switch number           : 2

Peer switch operational role : Virtual Switch Standby

Étapes de mise à niveau

1. Assurez-vous que la nouvelle image Cisco IOS (version 15.1(2)SY1 du logiciel Cisco IOS) est présente dans le disque de démarrage et le disque d'amorçage.

6K1#dir bootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:35:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:42:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

6K1#dir slavebootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:26:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:46:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

2. (Facultatif) Utilisez ces commandes afin de vérifier que le VSS est prêt à exécuter la procédure de mise à niveau :

- show issu state detail

- show redundancy

- Show module switch all (Afficher tous les modules de commutateurs)

- 6K1#show issu state detail

Le système est configuré pour être mis à niveau en mode échelonné.

Deux noeuds de superviseur sont en ligne.

Résumé: le système sera mis à niveau en mode in-tandem.

Slot = 1/2

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_INIT

6K1#

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 36 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 1/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 2/2

Current Software state = STANDBY HOT

Uptime in current state = 34 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

3. Utilisez la commande issu loadversion afin de démarrer le processus de mise à niveau.

Au cours de cette étape, le châssis de secours VSS redémarre, se recharge avec la nouvelle image et s'initialise en tant que châssis de secours VSS en mode de redondance SSO, exécutant la nouvelle image. Cette étape est terminée lorsque la configuration du châssis est synchronisée, comme l'indique le message Bulk sync Success. Le chargement de la nouvelle image peut prendre de quelques secondes à quelques minutes et la transition du châssis de secours VSS en mode SSO.

6K1#issu loadversion 1/2 bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

2/2 slavebootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

System configuration has been modified. Save? [yes/no]: yes

Building configuration...

[OK]

%issu loadversion initiated successfully, upgrade sequence will begin shortly

6K1#

*Feb 11 05:24:40.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence

will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Feb 11 05:25:10.091: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

<..output truncated..>

*Feb 11 05:29:46.075: %VS_GENERIC-SW1-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 05:29:46.079: %HA_CONFIG_SYNC-SW1-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:29:46.079: %RF-SW1-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:30:25.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed.

Please issue the 'issu runversion' command after all modules come online.

!

! Boot variable for standby should point to new Image in "show issu state detail" output.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 1/2

RP State = Active

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show redundancy states

my state = 13 -ACTIVE

peer state = 8  -STANDBY HOT

Mode = Duplex

Unit = Secondary

Unit ID = 18

Redundancy Mode (Operational) = sso

Redundancy Mode (Configured)  = sso

Redundancy State              = sso

Maintenance Mode = Disabled

Manual Swact = enabled

Communications = Up

client count = 144

client_notification_TMR = 30000 milliseconds

keep_alive TMR = 9000 milliseconds

keep_alive count = 1

keep_alive threshold = 19

RF debug mask = 0x0

4. Lorsque le châssis de secours VSS exécute correctement la nouvelle image dans l'état de redondance SSO et que toutes les cartes de ligne du châssis de secours VSS sont activées et en ligne, entrez la commande issu runversion afin de forcer un basculement. Le châssis de secours VSS mis à niveau prend le relais en tant que nouveau châssis actif, exécutant la nouvelle image. L'ancien châssis actif se recharge et s'initialise en tant que nouveau châssis de secours VSS en mode SSO, exécutant l'ancienne image (au cas où la mise à niveau logicielle doit être abandonnée et l'ancienne image restaurée). Cette étape est terminée lorsque la configuration du châssis est synchronisée, comme l'indique le message Bulk sync Success.

6K1#issu runversion

Cette commande recharge l'unité active.

Proceed ? [confirm]

%issu runversion initiated successfully

*Feb 11 05:35:19.035: %RF-SW1-5-RF_RELOAD: Self reload. Reason: Admin ISSU

runversion CLI

<..output truncated..>

Feb 11 05:35:21.411: %SYS-SW1-5-SWITCHOVER: Switchover requested by Exec.

Reload Reason: Admin ISSU runversion CLI.

Resetting .......

!

!Standby chassis now becomes active. Below logs are from new active switch.

!

Initializing as Virtual Switch ACTIVE processor

.

.

*Feb 11 05:37:36.107: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 05:39:56.563: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:39:56.563: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:39:56.555: %PFREDUN-SW1_STBY-6-STANDBY: Ready for SSO mode in Default Domain

! Wait till all the modules and Fex Port-channel 99 links come up

!

*Feb 11 05:41:28.467: %ISSU_PROCESS-SW2-6-RUNVERSION_INFO: Runversion has completed.

Please issue the 'issu acceptversion' command

Feb 11 05:43:13.034: %LINK-3-UPDOWN: Interface TenGigabitEthernet1/0/2, changed

state to up (FEX-110)

Feb 11 05:43:14.033: %LINEPROTO-5-UPDOWN: Line protocol on Interface

TenGigabitEthernet1/0/2, changed state to up (FEX-110)

*Feb 11 05:43:14.491: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te1/3/5,

connected to FEX 110, uplink 52

*Feb 11 05:43:14.491: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group 99

is now dual-active detection capable

6K1#show issu state

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show fex 110 detail

FEX: 110        Description: FEX0110     state: online

FEX version: 15.0(2)EX2

Extender Model: C6800IA-48TD, Extender Serial: FOC1736W1A6

FCP ready: yes

Image Version Check: enforced

Fabric Portchannel Ports: 2

Fabric port for control traffic: Te2/3/5

Fabric interface state:

Po99       - Interface Up.

Te1/3/5    - Interface Up.      state: bound

Te2/3/5    - Interface Up.      state: bound

5. Utilisez la commande issu acceptversion afin d'arrêter le temporisateur de restauration. Cela est nécessaire car si le compteur expire, le châssis mis à niveau se recharge et revient à la version logicielle précédente.

6K1#issu acceptversion

% Rollback timer stopped. Please issue the 'issu commitversion' command.

6. Utilisez la commande issu runversion fex all afin de démarrer la procédure de téléchargement et de mise à niveau d'image sur FEX (6800IA). La FEX déclenche le téléchargement de l'image à partir du nouveau bundle logiciel de Supervisor2T (ici la version 15.2(2)SY1 du logiciel Cisco IOS). Si vous utilisez des piles FEX, le maître est responsable d'extraire l'image à ses membres. Un serveur TFTP s’exécute à l’adresse 192.1.1.1.

6K1#issu runversion fex all

% Successfully initiated 'runversion fex' for Fex IDs: 110.

Use 'show issu state' for more information.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;bootdisk:

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_IN_PROGRESS

Following are the logs on from FEX 6800IA console:

!

!192.1.1.1 is the tftp running on FEX controller i.e. VSS active and vlan 1012 is the

control vlan associated with fex.

!

FEX-110#

Loading c6800ia-universalk9-mz.150-2.EX4.bin from 192.1.1.1

(via Vlan1012):  !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 15493122 bytes]

examining image...

extracting info (112 bytes)

extracting c6800ia-universalk9-mz.150-2.EX4/info (792 bytes)

extracting info (112 bytes)

Stacking Version Number: 1.55

System Type:             0x00000000

Ios Image File Size:   0x00EB5200

Total Image File Size: 0x00EC6A00

Minimum Dram required: 0x08000000

Image Suffix:          universalk9-150-2.EX4

Image Directory:       c6800ia-universalk9-mz.150-2.EX4

Image Name:            c6800ia-universalk9-mz.150-2.EX4.bin

Image Feature:         IP|LAYER_2|SSH|3DES|MIN_DRAM_MEG=128

FRU Module Version:    No FRU Version Specified

Old image for switch 1: flash:/c6800ia-universalk9-mz.150-2.EX2

Old image will be left alone

Extracting images from archive into flash...

! The console will be waiting for about 5-10 minutes after the above line.

<output truncated>

New software image installed in flash:/c6800ia-universalk9-mz.150-2.EX4

Following are the logs from the 6500 Active supervisor:

*Feb 11 06:00:30.387: %SATMGR-SW2-5-ONLINE: FEX 110 online

*Feb 11 06:00:30.391: %SATMGR-SW2-5-FEX_MODULE_ONLINE: FEX 110, module 1 online

*Feb 11 06:00:30.395: %OIR-SW2-6-INSREM: Switch 110 Physical Slot 1 - Module

Type LINE_CARD  inserted

*Feb 11 06:00:30.951: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te2/3/5,

connected to FEX 110, uplink 51

*Feb 11 06:00:30.951: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group

99 is now dual-active detection capable

*Feb 11 06:01:00.983: %OIR-SW2-6-SP_INSCARD: Card inserted in Switch_number =

110, physical slot 1, interfaces are now online

FEX-110#show ver | in image

System image file is "flash:/c6800ia-universalk9-mz.150-2.EX4/

c6800ia-universalk9-mz.150-2.EX4.bin"

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

7. Afin de continuer, entrez la commande issu comitversion pour mettre à niveau le châssis de secours VSS et terminer la séquence ISSU. Le châssis de secours VSS redémarre, se recharge avec la nouvelle image et s'initialise en tant que châssis de secours VSS en état de redondance SSO, exécutant la nouvelle image. Cette étape est terminée lorsque la configuration du châssis est synchronisée, comme indiqué par le message Bulk sync Success, et que toutes les cartes de ligne du nouveau VSS-Standby sont actives et en ligne.

6K1#issu commitversion

%issu commitversion initiated successfully, upgrade sequence will continue shortly

6K1#

*Feb 11 06:05:30.839: %ISSU_PROCESS-SW2-3-COMMITVERSION: issu commitversion;

Commitversion sequence will begin in 60 seconds. Enter 'issu abortversion'

to cancel.

*Feb 11 06:06:00.839: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO:

Resetting Standby shortly

*Feb 11 06:08:48.571: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 06:09:01.163: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has

come online, wait for terminal state

.

.

*Feb 11 06:10:41.267: %VS_GENERIC-SW2-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 06:10:41.271: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED:

Bulk Sync succeeded

*Feb 11 06:10:41.271: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 06:10:46.403: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Upgrade has completed,

updating boot configuration

!

!Boot variable now displays both new and old image in ?show issu state detail? output.

!

6K1#show issu state detail

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 hour, 28 minutes

Switchovers system experienced = 1

Standby failures = 1

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M), Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/2

Current Software state = STANDBY HOT

Uptime in current state = 1 minute

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Vérification

Afin de vérifier que la mise à niveau a réussi, utilisez les commandes suivantes :

- show issu state detail

- show redundancy

- Show module switch all (Afficher tous les modules de commutateurs)

Voici l'état actuel après le processus ISSU :

- Le châssis 6500 avec l'ID de commutateur 2 est actif et le commutateur avec l'ID 1 est en veille (à chaud). Ils sont maintenant sur le logiciel Cisco IOS Version 15.1(2)SY1.

- Le client Instant Access (6800IA) exécute désormais le logiciel Cisco IOS Version 15.0(2)EX4.

6K1#show mod swi all

Switch Number:     1   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY1   Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY1   Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX4   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Active

Peer switch number           : 1

Peer switch operational role : Virtual Switch Standby