Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Informations générales

Configuration

Diagramme du réseau

Configuration d'IPSec à l'aide d'un port d'accès ou de liaison de couche 2

Configuration d'IPSec à l'aide d'un port routé

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Ce document décrit comment créer un tunnel IPSec LAN à LAN entre un commutateur de la gamme Cisco Catalyst 6500 avec le module de service VPN IPSec (W) et un pare-feu Cisco PIX.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Logiciel Cisco IOS® Version 12.2(14)SY2 pour Supervisor Engine de la gamme Catalyst 6000, avec module de service VPN IPSec

- Logiciel Cisco PIX Firewall Version 6.3(3)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Informations générales

Le module de service VPN Catalyst 6500 est équipé de deux ports Gigabit Ethernet (GE) sans connecteurs externes visibles. Ces ports sont adressables uniquement à des fins de configuration. Le port 1 est toujours le port interne. Ce port gère tout le trafic en provenance et à destination du réseau interne. Le second port (port 2) gère tout le trafic en provenance et à destination du WAN ou des réseaux externes. Ces deux ports sont toujours configurés en mode d’agrégation 802.1Q. Le module de service VPN utilise une technique appelée Bump In The Wire (BITW) pour le flux de paquets.

Les paquets sont traités par une paire de VLAN, une couche 3 à l’intérieur du VLAN et une couche 2 à l’extérieur du VLAN. Les paquets, de l'intérieur vers l'extérieur, sont acheminés via une méthode appelée Encoded Address Recognition Logic (EARL) vers le VLAN interne. Après avoir chiffré les paquets, le module de service VPN utilise le VLAN externe correspondant. Dans le processus de déchiffrement, les paquets de l'extérieur vers l'intérieur sont pontés au module de service VPN à l'aide du VLAN externe. Une fois que le module de service VPN déchiffre le paquet et mappe le VLAN au VLAN interne correspondant, EARL achemine le paquet vers le port LAN approprié. Les VLAN internes de couche 3 et les VLAN externes de couche 2 sont associés à la commande crypto connect vlan. Il existe trois types de ports dans les commutateurs de la gamme Catalyst 6500 :

- Routed ports - Par défaut, tous les ports Ethernet sont des ports routés dans Cisco IOS. Ces ports sont associés à un VLAN masqué.

- Ports d'accès - Ces ports sont associés à un VLAN externe ou VTP (VLAN Trunk Protocol). Vous pouvez associer plusieurs ports à un VLAN défini.

- Ports agrégés - Ces ports transportent de nombreux VLAN externes ou VTP, sur lesquels tous les paquets sont encapsulés avec un en-tête 802.1Q.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Utilisez l’outil de recherche de commandes (clients inscrits seulement) pour en savoir plus sur les commandes figurant dans le présent document.

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Configuration d'IPSec à l'aide d'un port d'accès ou de liaison de couche 2

Procédez comme suit pour configurer IPSec à l'aide d'un port d'accès ou de liaison de couche 2 pour l'interface physique externe.

1. Ajoutez les VLAN internes au port interne du module de service VPN.

Supposez que le module de service VPN se trouve sur le logement 4. Utilisez VLAN 100 comme VLAN interne et VLAN 209 comme VLAN externe. Configurez les ports GE du module de service VPN comme suit :

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Ajoutez l'interface VLAN 100 et l'interface où le tunnel est terminé (qui, dans ce cas, est l'interface Vlan 209, comme indiqué ici).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface Vlan209

no ip address

crypto connect vlan 100

3. Configurez le port physique externe en tant que port d'accès ou de liaison (dans ce cas, FastEthernet 2/48, comme indiqué ici).

!--- This is the configuration that uses an access port.

interface FastEthernet2/48

no ip address

switchport

switchport access vlan 209

switchport mode access

!--- This is the configuration that uses a trunk port.

interface FastEthernet2/48

no ip address switchport

switchport trunk encapsulation dot1q

switchport mode trunk

4. Créez la NAT de contournement. Ajoutez ces entrées à l'instruction no nat afin d'exempter la liaison entre ces réseaux :

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

5. Créez votre configuration de chiffrement et la liste de contrôle d'accès (ACL) qui définit le trafic à chiffrer.

1. Créez une liste de contrôle d’accès Crypto (dans ce cas, la liste de contrôle d’accès 100 - Trafic intéressant) qui définit le trafic du réseau interne 192.168.5.0/24 vers le réseau distant 192.168.6.0/24, comme ceci :

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Définissez vos propositions de politique ISAKMP (Internet Security Association and Key Management Protocol), comme suit :

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Émettez cette commande (dans cet exemple) pour utiliser et définir des clés pré-partagées :

crypto isakmp key cisco address 10.66.79.73

4. Définissez vos propositions IPSec, comme suit :

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Créez votre instruction crypto map, comme ceci :

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

6. Appliquez la crypto-carte à l'interface VLAN 100, comme ceci :

interface vlan100

crypto map cisco

Ces configurations sont utilisées :

- Catalyst 6500

- Pare-feu PIX

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that Internet Key Exchange (IKE) !--- is used to establish the IPSec !--- security associations (SAs) to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the outside Layer 2 port that allows !--- VLAN 209 traffic to enter.

interface FastEthernet2/48

no ip address

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the Interface VLAN (IVLAN).

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The Port VLAN (PVLAN) configuration is handled transparently by !--- the VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port !--- of the VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

interface Vlan209

no ip address

crypto connect vlan 100

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration. access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

Pare-feu PIX

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Configuration d'IPSec à l'aide d'un port routé

Procédez comme suit pour configurer IPSec à l'aide d'un port routé de couche 3 pour l'interface physique externe.

1. Ajoutez les VLAN internes au port interne du module de service VPN.

Supposez que le module de service VPN se trouve sur le logement 4. Utilisez VLAN 100 comme VLAN interne et VLAN 209 comme VLAN externe. Configurez les ports GE du module de service VPN comme suit :

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Ajoutez l'interface VLAN 100 et l'interface où le tunnel est terminé (qui, dans ce cas, est FastEthernet2/48, comme indiqué ici).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface FastEthernet2/48

no ip address

crypto connect vlan 100

3. Créez la NAT de contournement. Ajoutez ces entrées à l'instruction no nat afin d'exempter la liaison entre ces réseaux :

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

4. Créez votre configuration de chiffrement et la liste de contrôle d’accès qui définit le trafic à chiffrer.

1. Créez une liste de contrôle d’accès (dans ce cas, la liste de contrôle d’accès 100) qui définit le trafic du réseau interne 192.168.5.0/24 vers le réseau distant 192.168.6.0/24, comme suit :

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Définissez vos propositions de politique ISAKMP, comme ceci :

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Émettez cette commande (dans cet exemple) pour utiliser et définir des clés pré-partagées :

crypto isakmp key cisco address 10.66.79.73

4. Définissez vos propositions IPSec, comme suit :

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Créez votre instruction crypto map, comme ceci :

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

5. Appliquez la crypto-carte à l'interface VLAN 100, comme ceci :

interface vlan100

crypto map cisco

Ces configurations sont utilisées :

- Catalyst 6500

- Pare-feu PIX

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that IKE is used to establish the !--- IPSec SAs to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the secure port that is configured in routed port mode. !--- This routed port mode does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path. This is the Layer 2 port VLAN on which the !--- outside port of the VPN service module also belongs.

!

interface FastEthernet2/48

no ip address

crypto connect vlan 100

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the IVLAN.

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The PVLAN configuration is handled transparently by the !--- VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port of the !--- VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.6.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration.

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

Pare-feu PIX

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Vérification

Cette section fournit les informations pour confirmer que votre configuration fonctionne correctement.

L'Outil Interpréteur de sortie (clients enregistrés uniquement) (OIT) prend en charge certaines commandes show. Utilisez l'OIT pour afficher une analyse de la sortie de la commande show .

- show crypto ipsec sa - Affiche les paramètres utilisés par les SA IPSec actuelles.

- show crypto isakmp sa — Affiche toutes les SA IKE en cours au niveau d'un homologue.

- show crypto vlan - Affiche le VLAN associé à la configuration de chiffrement.

- show crypto eli - Affiche les statistiques du module de service VPN.

Pour plus d'informations sur la vérification et le dépannage d'IPSec, référez-vous à Dépannage de la sécurité IP - Compréhension et utilisation des commandes de débogage.

Dépannage

Cette section fournit les informations nécessaires au dépannage de votre configuration.

Dépannage des commandes

Remarque : Avant d'émettre des commandes debug, reportez-vous à Informations importantes sur les commandes de débogage.

- debug crypto ipsec : Cette commande affiche les négociations IPSec de la phase 2.

- debug crypto isakmp - Affiche les négociations ISAKMP de la phase 1.

- debug crypto engine - Montre le trafic crypté.

- clear crypto isakmp : efface les SA liées à la phase 1.

- clear crypto sa : efface les SA liées à la phase 2.

Pour plus d'informations sur la vérification et le dépannage d'IPSec, référez-vous à Dépannage de la sécurité IP - Compréhension et utilisation des commandes de débogage.

Informations connexes

- Page d'assistance IPsec

- Configuration de la sécurité des réseaux IPSec

- Configuration du protocole IKE (Internet Key Exchange)

- Support technique - Cisco Systems