Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Topologie

Ajouter un noeud supplémentaire

Configuration finale

ML 1

ML 2

ML 3

Informations connexes

Introduction

Ce document décrit la procédure à suivre pour ajouter un ou plusieurs noeuds à la sonnerie de paquets résilients (RPR) sur des cartes ML pour Cisco ONS 15454.

Conditions préalables

Conditions requises

Cisco vous recommande de prendre connaissance des rubriques suivantes :

- Cisco ONS 15454

- Cartes Ethernet Cisco ONS 15454 ML-Series

- Logiciel Cisco IOSMD

- Pontage et routage IP

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Cisco ONS 15454 qui exécute ONS version 4.1.3.

- ML (inclus dans la version ONS 4.1.3) qui exécute le logiciel Cisco IOS Version 12.1(19) EO1.

Remarque : les configurations de ce document sont basées sur une solution Bridging over RPR.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Topologie

La technologie Resilient Packet Ring (RPR) est une architecture de couche 2 standard, optimisée pour le trafic de données par salves. Le RPR permet une architecture en anneau sans avoir besoin d'Ethernet Spanning Tree ni du schéma de protection SONET/SDH, tout en fournissant un temps de convergence inférieur à 50 ms pour les services Ethernet et IP. RPR fournit une protection de type SONET sans avoir à réserver la bande passante. RPR peut fonctionner avec ou sans protection SONET. RPR sur les cartes ML introduit un autre point entre les interfaces Packet Over SONET (POS) et les interfaces Ethernet. Une interface SPR (Shared Packet Ring) est une interface virtuelle qui fournit cette liaison. Pour RPR, les deux ports POS agissent en tant que membres de l'interface SPR. L'interface SPR exécute automatiquement le recouvrement de protection.

La Figure 1 indique deux circuits entre les ports POS sur les noeuds ONS 15454 sur SONET. Une interface SPR1 unique sur chaque carte ML gère la fonction RPR.

Figure 1 : anneau de paquets résilient à deux noeuds

Avec l'ajout d'un troisième noeud, il y a trois circuits entre les ports POS sur 15454 noeuds sur SONET (voir Figure 2).

Figure 2 : anneau de paquets résilient à trois noeuds

Ajouter un noeud supplémentaire

Complétez ces étapes afin d'ajouter un noeud supplémentaire au RPR :

1. Arrêtez le port POS sur ML1 qui fait face à l'étendue où vous voulez ajouter le nouveau noeud. Le port est POS 1 ici :

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. Arrêtez le port POS sur ML2 qui fait face à l'étendue où vous voulez ajouter le nouveau noeud. Le port est POS 0 dans ce cas :

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. Supprimez le chemin STS (Synchronous Transport Signal) entre les noeuds adjacents pour RPR (voir Figure 3).

Figure 3 : suppression du chemin STS

4. Vérifiez si la connectivité Ethernet existe toujours sur RPR (avec jeu de tests et tables de routage du client).

5. Ajoutez le nouveau noeud (supposez que le noeud est déjà configuré pour l'identificateur de cible (TID), l'adresse IP, les ports SONET IS, SONET Data Communications Channel (SDCC) activé, etc.).

6. Téléchargez la configuration ML sur le nouveau noeud (ML 3). Reportez-vous à la configuration ML 3 dans la section Configuration finale.

7. Créez deux nouveaux circuits (et assurez-vous de sélectionner IS comme état de circuit) de POS 0 de ML2 à POS 1 de ML3, et de POS 0 de ML3 à POS 1 de ML1 (voir Figure 4). Vérifiez le journal d'audit pour voir si le circuit se trouve dans ADMIN_IS ou ADMIN_OOS.

Figure 4 : ajout de deux nouveaux circuits

8. Exécutez no shutdown sur le port POS 1 dans ML 1 qui fait face au nouveau noeud :

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. Exécutez no shutdown sur le port POS 0 dans ML 2 qui fait face au nouveau noeud :

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. Vérifier si la connectivité Ethernet existe toujours sur RPR (avec le jeu de tests et les tables de routage du client)

11. Surveillez le trafic Ethernet pendant au moins une heure après l'insertion du noeud.

Configuration finale

Cette section fournit la configuration finale pour ML 1, ML 2 et ML3.

ML 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

ML 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

ML 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

Informations connexes

- Configuration de la sonnerie de paquets résiliente

- Support et documentation techniques - Cisco Systems