Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Produits connexes

Conventions

Configuration

Diagramme du réseau

Configurations

Vérification

Commandes show sur ROUTER1 lorsque Serial0 est actif

Commandes show sur ROUTER1 lorsque Serial0 est désactivé

Dépannage

Ressources de dépannage

Dépannage des commandes

sortie de débogage sur ROUTER1 lorsque Serial0 est désactivé et que RNIS est activé

sortie de débogage sur ROUTER1 lorsque Serial0 revient à nouveau et que RNIS abandonne l’appel

Informations connexes

Introduction

Ce document explique et fournit un exemple de configuration du pontage de sauvegarde avec RNIS. Cette configuration utilise la méthode d’interface de sauvegarde pour reconnaître que la liaison principale est en panne. Pour plus d'informations sur la sauvegarde, consultez Configuration et dépannage de la sauvegarde DDR.

Dans les environnements WAN pontés, la seule solution de sauvegarde de routage à établissement de connexion à la demande (DDR) disponible est l'utilisation de RNIS, car le pontage sur asynchrone n'est pas pris en charge.

Sachez que le pontage sur une connexion RNIS tend à maintenir la connexion active pendant de très longues périodes, voire de manière permanente. Si la compagnie de téléphone (Telco) facture un RNIS en fonction du temps de connexion et de la liaison série qui est suivie, cela peut entraîner une facture très importante.

Remarque : cette configuration concerne un site et un canal B. Pour plusieurs canaux B, vous devez utiliser des profils de numérotation. (Reportez-vous à la section Configuration des profils de numérotation sur le pont à l'aide de la configuration RNIS.)

Pour plus d'informations sur la configuration du pontage dans un environnement non de sauvegarde, consultez Pontage sur RNIS.

Conditions préalables

Conditions requises

Assurez-vous de répondre à ces exigences avant d'essayer cette configuration :

- Posséder une connaissance de base de la technologie RNIS.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Routeurs de la gamme Cisco 2500 avec une interface série WAN et une interface BRI chacune.

- Logiciel Cisco IOS® Version 12.2(7b).

Remarque : Cette configuration peut être utilisée avec n'importe quel routeur disposant d'une liaison WAN (série) et d'un port BRI.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Produits connexes

Cette configuration peut être utilisée avec deux routeurs qui exécutent le logiciel Cisco IOS et chacun possède au moins une interface série WAN et une interface BRI.

Conventions

Pour plus d'informations sur les conventions des documents, référez-vous aux Conventions utilisées pour les conseils techniques de Cisco.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Configurations

Ce document utilise les configurations suivantes :

- Routeur 1

- Routeur 2

Routeur 1

!

hostname ROUTER1

!

!

username ROUTER2 password 0 same

!--- This is required for PPP Challenge Handshake Authentication Protocol !--- (CHAP) authentication during dial backup.

!

!

isdn switch-type basic-5ess

!--- The ISDN switch type for this circuit. !--- Obtain this information from the Telco. !--- This ISDN switch type is specific to the United States, !--- and could change based on the requirements of the country and Telco.

!

interface Ethernet0

ip address 172.16.55.33 255.255.255.240

no ip directed-broadcast

no ip mroute-cache

bridge-group 1

!--- Assign this interface to bridge-group 1. !--- Frames are bridged only among interfaces in the same group. !--- Note that the BRI interface and serial interface are also !--- in this bridge-group 1.

!

interface Serial0

description Serial link to ROUTER2

backup interface BRI0

!--- This defines the backup interface. !--- Cisco IOS Software tracks the Serial0 interface, and !--- uses BRI0 if Serial0 fails.

ip address 172.16.54.1 255.255.255.0

no ip directed-broadcast

no ip mroute-cache

no fair-queue

bridge-group 1

!--- Enable bridging on Serial0 for normal operation.

!

interface BRI0

description ISDN to ROUTER2

ip address 172.16.53.19 255.255.255.240

no ip directed-broadcast

encapsulation ppp

no ip mroute-cache

dialer map bridge name ROUTER2 broadcast 5552000

!--- The broadcast keyword is required to initiate the ISDN call. !--- Dialer map bridge to the remote router. The statement includes !--- the name of the remote router and the phone number to be dialed. !--- Note that this dialer map statement includes the keyword bridge, !--- and does not include the IP address of the peer, as required for !--- IP routing-based dialer maps.

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list.

isdn switch-type basic-5ess

!--- Check with your Telco for the correct values.

ppp authentication chap

bridge-group 1

!--- Enable bridging on BRI0.

!

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic.

bridge 1 protocol ieee

!--- Defines the type of Spanning Tree Protocol (STP) used for the !--- interface in bridge-group 1. Here, the IEEE STP is used. !--- The IEEE 802.1D STP is the preferred way to run the bridge.

!

Routeur 2

hostname router2

!

!

username ROUTER1 password 0 same

!--- Required for PPP CHAP Authentication during dial backup.

!

isdn switch-type basic-5ess

!--- Check with your Telco at the Router2 side for the correct values.

!

interface Ethernet0

ip address 172.16.55.2 255.255.255.240

bridge-group 1

!--- Enable bridging on Ethernet0.

!

interface Serial0

description Serial link to ROUTER1

!--- The backup interface bri0 command is not required on this side, !--- because it is sufficient if one side tracks the serial interface.

ip address 172.16.54.2 255.255.255.0

no fair-queue

bridge-group 1

!--- Enable bridging on Serial0 for normal operation.

interface BRI0

description ISDN to ROUTER1

ip address 172.16.53.17 255.255.255.240

encapsulation ppp

no ip mroute-cache

dialer map bridge name ROUTER1 broadcast 5551000

!--- The broadcast keyword is required to initiate the ISDN call.

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list.

isdn switch-type basic-5ess

!--- Check with your Telco at the Router2 side for the correct values.

ppp authentication chap

bridge-group 1

!--- Enable bridging on BRI0.

!

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic.

bridge 1 protocol ieee

!--- Defines the type of STP used for the interface in !--- bridge-group 1. Here the IEEE STP is used. !--- The IEEE 802.1D STP is the preferred way to run the bridge.

!

Vérification

Cette section fournit des informations qui vous permettront de vérifier que votre configuration fonctionne correctement.

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

- show isdn status : affiche l'état des couches 1 (L1), 2 (L2) et 3 (L3) des interfaces RNIS.

- show dialer : affiche l'état du numéroteur et l'état individuel des canaux RNIS.

- show bridge : affiche les classes d'entrées dans la base de données de transfert de pont.

- show interface : affiche l'état des différentes interfaces, telles que les interfaces série et BRI.

- show spanning-tree : affiche la topologie spanning tree connue du routeur.

Commandes show sur ROUTER1 lorsque Serial0 est actif

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

Layer 2 NOT Activated

Layer 3 Status:

0 Active Layer 3 Call(s)

Activated dsl 0 CCBs = 0

The Free Channel Mask: 0x80000003

Number of L2 Discards = 36, L2D_Task Discards = 35

Total Allocated ISDN CCBs = 0

ROUTER1# show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

5552000 29 977 00:45:08 successful

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is shutdown

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is shutdown

ROUTER1# show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

0000.0c76.2882 forward Serial0 0 5 4

!--- Bridging traffic goes through Serial0.

00d0.58ad.ae13 forward Ethernet0 0 42 5

Commandes show sur ROUTER1 lorsque Serial0 est désactivé

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 114, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

!--- ISDN L1 and L2 will be up (when Serial0 fails) !--- even if interesting traffic is not present.

Layer 3 Status:

1 Active Layer 3 Call(s)

Activated dsl 0 CCBs = 1

CCB:callid=8484, sapi=0, ces=1, B-chan=1, calltype=DATA

The Free Channel Mask: 0x80000002

Total Allocated ISDN CCBs = 1

ROUTER1# show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

5552000 30 977 00:00:16 successful

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: bridge (0xFFFF)

Time until disconnect 106 secs

Connected to 5552000 (ROUTER2)

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

ROUTER1# show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

0000.0c76.2882 forward BRI0 0 5 4

!--- Bridging traffic now goes through BRI0.

00d0.58ad.ae13 forward Ethernet0 0 5 5

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Ressources de dépannage

Utilisez ces ressources selon les besoins :

- Support technologique RNIS

- Dépannage des lignes série

- Connexions dos à dos HDLC

Dépannage des commandes

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

Remarque : Avant d'émettre des commandes debug, reportez-vous à Informations importantes sur les commandes de débogage.

- debug dialer : fournit des informations sur les événements d'interface de numérotation.

- debug isdn event - affiche les messages de débogage liés à l'activité RNIS qui se produisent du côté utilisateur de l'interface RNIS.

- debug isdn q931 : fournit des informations sur la configuration et le retrait des connexions réseau RNIS (L3) entre le routeur local (côté utilisateur) et le réseau.

- debug isdn q921 - affiche les messages de débogage relatifs aux procédures d'accès de couche liaison de données (L2) qui se déroulent au niveau du routeur sur le canal D (LAPD) de son interface RNIS.

- debug ppp negotiation - affiche les messages de débogage liés à la négociation des options PPP et des paramètres NCP (Network Control Protocol).

- debug ppp authentication - Affiche les messages de débogage liés à l'échange de paquets CHAP et PAP (Password Authentication Protocol).

sortie de débogage sur ROUTER1 lorsque Serial0 est désactivé et que RNIS est activé

ROUTER1# show debug

Dial on demand:

Dial on demand events debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

ISDN:

ISDN events debugging is on

ISDN Q921 packets debugging is on

ISDN Q931 packets debugging is on

ROUTER1#

!--- Interface serial0 goes down.

ROUTER1#

00:56:53: %LINK-3-UPDOWN: Interface Serial0, changed state to down

*Mar  1 00:56:53.103: ISDN BR0 EVENT: isdn_sw_cstate: State = 0,

Old State = 6

00:56:53: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar  1 00:56:53.107: BR0:1 LCP: State is Closed

*Mar  1 00:56:53.111: BR0:1 DDR: disconnecting call

00:56:53: %LINK-3-UPDOWN: Interface BRI0:2, changed state to down

*Mar  1 00:56:53.119: BR0:2 LCP: State is Closed

*Mar  1 00:56:53.119: BR0:2 DDR: disconnecting call

*Mar  1 00:56:53.127: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.135: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.567: ISDN BR0: RX <- IDCKRQ ri=0 ai=127

*Mar  1 00:56:53.567: ISDN Recvd L1 prim 3 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.571: ISDN BR0: L1 persistent Deactivated

*Mar  1 00:56:53.571: ISDN Recvd L1 prim 7 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.575: ISDN BR0: Recvd MPH_IIC_IND from L1

*Mar  1 00:56:53.575: ISDN Recvd L1 prim 7 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.579: ISDN BR0: Recvd MPH_IIC_IND from L1

*Mar  1 00:56:53.579: ISDN Recvd L1 prim 1 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.583: ISDN BR0: L1 is IF_ACTIVE

*Mar  1 00:56:53.583: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.587: ISDN BR0: L2-TERM: ces/tei=1/0

AWAIT_ESTABLISH->TERM_DOWN

*Mar  1 00:56:53.591: ISDN BR0: Incoming call id = 0x0010, dsl 0

*Mar  1 00:56:53.595: ISDN BR0: L2-TERM: ces/tei=1/0

TERM_DOWN->AWAIT_ESTABLISH

00:56:53: %LINK-3-UPDOWN: Interface BRI0, changed state to up

*Mar  1 00:56:53.631: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.655: ISDN BR0: TX -> IDREQ ri=48769 ai=127

00:56:54: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Serial0, changed state to down

*Mar  1 00:56:54.387: ISDN BR0: RX <- IDCKRQ ri=0 ai=127

*Mar  1 00:56:55.655: ISDN BR0: TX -> IDREQ ri=42642 ai=127

*Mar  1 00:56:55.699: ISDN BR0: RX <- IDASSN ri=42642 ai=68

*Mar  1 00:56:55.791: ISDN BR0: TX -> SABMEp c/r=0 sapi=0 tei=68

*Mar  1 00:56:55.823: ISDN BR0: RX <- UAf c/r=0 sapi=0 tei=68

00:56:55: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0,

TEI 68 changed to up

*Mar  1 00:56:55.831: ISDN BR0: L2-TERM: ces/tei=1/68

AWAIT_ESTABLISH->ESTABLISHED

!--- Interesting traffic has not arrived yet from Host1, !--- but ISDN L1 and L2 are up now.

ROUTER1# show isdn stat

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 68, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x80000003

Number of L2 Discards = 0, L2 Session ID = 34

Total Allocated ISDN CCBs = 0

ROUTER1#

*Mar  1 00:57:25.839: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=0

*Mar  1 00:57:25.871: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=0

ROUTER1#

!--- Interesting traffic arrives now, !--- which triggers ISDN Dialup (see below).

*Mar  1 00:57:32.519: BR0 DDR: Dialing cause bridge (0xFFFF)

*Mar  1 00:57:32.519: BR0 DDR: Attempting to dial 5552000

*Mar  1 00:57:32.523: ISDN BR0: Outgoing call id = 0x800E, dsl 0

*Mar  1 00:57:32.527: ISDN BR0: Event: Call to 5552000 at 64 Kb/s

*Mar  1 00:57:32.527: ISDN BR0: process_bri_call(): call id 0x800E,

called_number 5552000, speed 64, call type DATA

*Mar  1 00:57:32.531: CCBRI_Go Fr Host InPkgInfo (Len=22) :

*Mar  1 00:57:32.535: 1 0 1 80 E 0 4 2 88 90 18

1 83 2C 7 35 35 35 32 30 30 30

*Mar  1 00:57:32.543:

*Mar  1 00:57:32.547: CC_CHAN_GetIdleChanbri: dsl 0

*Mar  1 00:57:32.547:     Found idle channel B1

*Mar  1 00:57:32.563: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=0 nr=0

i=0x08010E05040288901801832C0735353532303030

*Mar  1 00:57:32.583:     SETUP pd = 8  callref = 0x0E

*Mar  1 00:57:32.591:         Bearer Capability i = 0x8890

*Mar  1 00:57:32.599:         Channel ID i = 0x83

*Mar  1 00:57:32.603:         Keypad Facility i = '5552000'

*Mar  1 00:57:32.867: ISDN BR0: RX <- INFOc sapi=0 tei=68 ns=0 nr=1

i=0x08018E02180189

*Mar  1 00:57:32.875:     CALL_PROC pd = 8  callref = 0x8E

*Mar  1 00:57:32.883:         Channel ID i = 0x89

*Mar  1 00:57:32.899: ISDN BR0: TX -> RRr sapi=0 tei=68 nr=1

*Mar  1 00:57:32.907: CCBRI_Go Fr L3 pkt (Len=7) :

*Mar  1 00:57:32.907: 2 1 E 98 18 1 89

*Mar  1 00:57:32.911:

*Mar  1 00:57:32.915: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_PROCEEDING

*Mar  1 00:57:32.919: ISDN BR0: HOST_PROCEEDING

*Mar  1 00:57:32.919: ISDN BR0: HOST_MORE_INFO

*Mar  1 00:57:33.159: ISDN BR0: RX <- INFOc sapi=0 tei=68 ns=1

nr=1 i=0x08018E07

*Mar  1 00:57:33.167:     CONNECT pd = 8  callref = 0x8E

*Mar  1 00:57:33.183: ISDN BR0: TX -> RRr sapi=0 tei=68 nr=2

*Mar  1 00:57:33.191: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 00:57:33.191: 7 1 E 91

*Mar  1 00:57:33.195:

*Mar  1 00:57:33.199: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_CONNECT

00:57:33: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 00:57:33.215: ISDN: get_isdn_service_state():

idb 0x19F4D8 bchan 2 is_isdn 1 Not a Pri

*Mar  1 00:57:33.215: BR0:1 PPP: Treating connection as a callout

*Mar  1 00:57:33.219: BR0:1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 1 load]

*Mar  1 00:57:33.223: BR0:1 LCP: O CONFREQ [Closed] id 27 len 15

*Mar  1 00:57:33.227: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.231: BR0:1 LCP:    MagicNumber 0x6091A5F6

(0x05066091A5F6)

*Mar  1 00:57:33.235: ISDN BR0: Event: Connected to 5552000

on B1 at 64 Kb/s

*Mar  1 00:57:33.247: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=1 nr=2

i=0x08010E0F

*Mar  1 00:57:33.251:     CONNECT_ACK pd = 8  callref = 0x0E

*Mar  1 00:57:33.267: BR0:1 LCP: I CONFREQ [REQsent] id 4 len 15

*Mar  1 00:57:33.271: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.275: BR0:1 LCP:    MagicNumber 0x6062D6EA

(0x05066062D6EA)

*Mar  1 00:57:33.279: BR0:1 LCP: O CONFACK [REQsent] id 4 len 15

*Mar  1 00:57:33.283: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.287: BR0:1 LCP:    MagicNumber 0x6062D6EA

(0x05066062D6EA)

*Mar  1 00:57:33.291: BR0:1 LCP: I CONFACK [ACKsent] id 27 len 15

*Mar  1 00:57:33.291: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.295: BR0:1 LCP:    MagicNumber 0x6091A5F6

(0x05066091A5F6)

*Mar  1 00:57:33.299: BR0:1 LCP: State is Open

*Mar  1 00:57:33.303: BR0:1 PPP: Phase is AUTHENTICATING,

by both [0 sess, 1 load]

*Mar  1 00:57:33.307: BR0:1 CHAP: O CHALLENGE id 14

len 28 from "ROUTER1"

*Mar  1 00:57:33.319: BR0:1 CHAP: I CHALLENGE id 4

len 28 from "ROUTER2"

*Mar  1 00:57:33.327: BR0:1 CHAP: O RESPONSE id 4

len 28 from "ROUTER1"

*Mar  1 00:57:33.335: ISDN BR0: RX <- RRr sapi=0

tei=68 nr=2

*Mar  1 00:57:33.351: BR0:1 CHAP: I SUCCESS id 4

len 4

*Mar  1 00:57:33.367: BR0:1 CHAP: I RESPONSE id 14

len 28 from "ROUTER2"

*Mar  1 00:57:33.371: BR0:1 CHAP: O SUCCESS id 14

len 4

*Mar  1 00:57:33.375: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar  1 00:57:33.379: BR0:1 BNCP: O CONFREQ [Closed] id 14

len 4

*Mar  1 00:57:33.387: BR0:1 CDPCP: O CONFREQ [Closed] id 14

len 4

*Mar  1 00:57:33.395: BR0:1 BNCP: I CONFREQ [REQsent] id 4

len 4

*Mar  1 00:57:33.399: BR0:1 BNCP: O CONFACK [REQsent] id 4

len 4

*Mar  1 00:57:33.403: BR0:1 IPCP: I CONFREQ [Not negotiated] id 4

len 10

*Mar  1 00:57:33.407: BR0:1 IPCP:    Address 172.16.53.17

(0x0306AC103511)

*Mar  1 00:57:33.415: BR0:1 LCP: O PROTREJ [Open] id 28

len 16 protocol IPCP

(0x80210104000A0306AC103511)

*Mar  1 00:57:33.419: BR0:1 CDPCP: I CONFREQ [REQsent] id 4

len 4

*Mar  1 00:57:33.423: BR0:1 CDPCP: O CONFACK [REQsent] id 4

len 4

*Mar  1 00:57:33.427: BR0:1 BNCP: I CONFACK [ACKsent] id 14

len 4

*Mar  1 00:57:33.431: BR0:1 BNCP: State is Open

*Mar  1 00:57:33.435: BR0:1 CDPCP: I CONFACK [ACKsent] id 14

len 4

*Mar  1 00:57:33.439: BR0:1 CDPCP: State is Open

*Mar  1 00:57:33.443: BR0:1 DDR: dialer protocol up

00:57:34: %LINEPROTO-5-UPDOWN:

Line protocol on Interface BRI0:1, changed state to up

00:57:39: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to 5552000 ROUTER2

ROUTER1#

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 68, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=800E, sapi=0, ces=1, B-chan=1, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask:  0x80000002

Number of L2 Discards = 0, L2 Session ID = 34

Total Allocated ISDN CCBs = 1

*Mar  1 00:58:03.343: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=2

*Mar  1 00:58:03.379: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=2pann

ROUTER1# show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0060.5cf4.a955

Root port is 3 (BRI0), cost of root path is 15625

Topology change flag set, detected flag not set

Number of topology changes 10 last change occurred 00:01:15 ago

from Serial0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 15

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.2, designated path cost 15625

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 751, received 0

Port 3 (BRI0) of Bridge group 1 is forwarding

!--- BRI Interface forwards the bridged traffic now.

Port path cost 15625, Port priority 128, Port Identifier 128.3.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a955

Designated port id is 128.3, designated path cost 0

Timers: message age 2, forward delay 0, hold 0

Number of transitions to forwarding state: 3

BPDU: sent 1014, received 608

Port 6 (Serial0) of Bridge group 1 is down

Port path cost 647, Port priority 128, Port Identifier 128.6.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.6, designated path cost 15625

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 15, received 27

ROUTER1#

*Mar 1 00:58:33.387: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=2

*Mar 1 00:58:33.423: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=2

sortie de débogage sur ROUTER1 lorsque Serial0 revient à nouveau et que RNIS abandonne l’appel

00:58:37: %LINK-3-UPDOWN: Interface Serial0, changed state to up

*Mar 1 00:58:37.671: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.675: BR0:2 DDR: disconnecting call

*Mar 1 00:58:37.675: ISDN BR0: Event: Hangup call to call id 0x800E

*Mar 1 00:58:37.679: ISDN BR0: process_disconnect(): call id 0x800E,

call type is DATA, b_idb 0x19F4D8, ces 1, cause Normal call

clearing(0x10)

00:58:37: %ISDN-6-DISCONNECT: Interface BRI0:1 disconnected from

5552000 ROUTER2, call lasted 64 seconds

*Mar 1 00:58:37.691: ISDN: get_isdn_service_state(): idb 0x19F4D8

bchan 2 is_isdn 1 Not a Pri

*Mar 1 00:58:37.695: CCBRI_Go Fr Host InPkgInfo (Len=13) :

*Mar 1 00:58:37.699: 5 0 1 80 E 3 8 1 90 8 2 80 90

*Mar 1 00:58:37.703:

*Mar 1 00:58:37.719: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=2 nr=2

i=0x08010E4508028090

*Mar 1 00:58:37.727: DISCONNECT pd = 8 callref = 0x0E

*Mar 1 00:58:37.735: Cause i = 0x8090 - Normal call clearing

*Mar 1 00:58:37.743: ISDN BR0 EVENT: isdn_sw_cs!!!!!!!!!!!!!!!!!!!tate:

State = 6, Old State = 4

00:58:37: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 1 00:58:37.751: BR0:1 BNCP: State is Closed

*Mar 1 00:58:37.755: BR0:1 CDPCP: State is Closed

*Mar 1 00:58:37.755: BR0:1 PPP: Phase is TERMINATING [0 sess, 1 load]

*Mar 1 00:58:37.759: BR0:1 LCP: State is Closed

*Mar 1 00:58:37.763: BR0:1 PPP: Phase is DOWN [0 sess, 1 load]

*Mar 1 00:58:37.763: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.775: ISDN Recvd L1 prim 3 dsl 0 state 1 ctrl_state 0

*Mar 1 00:58:37.779: ISDN BR0: Physical layer is IF_DOWN

*Mar 1 00:58:37.783: ISDN BR0: Shutting down ME

00:58:37: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BRI0,

TEI 68 changed to down

*Mar 1 00:58:37.791: ISDN BR0: L2-TERM: ces/tei=1/68

ESTABLISHED->TERM_DOWN

*Mar 1 00:58:37.795: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_DISCONNECT_ACK

*Mar 1 00:58:37.803: ISDN: get_isdn_service_state(): idb 0x19F4D8

bchan 2 is_isdn 1 Not a Pri

*Mar 1 00:58:37.807: ISDN BR0: HOST_DISCONNECT_ACK: call type is DATA

00:58:37: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 1 00:58:37.815: BR0:1 LCP: State is Closed

*Mar 1 00:58:37.815: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.819: ISDN BR0: Shutting down ISDN Layer 3

00:58:37: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR0,

TEI 68 changed to down

00:58:37: %LINK-5-CHANGED: Interface BRI0, changed state to standby mode

*Mar 1 00:58:37.847: ISDN BR0 EVENT: isdn_sw_cstate: State = 6,

Old State = 4

00:58:37: %LINK-3-UPDOWN: Interface BRI0:2, changed state to down

*Mar 1 00:58:37.855: BR0:2 LCP: State is Closed

*Mar 1 00:58:37.855: BR0:2 DDR: disconnecting call

*Mar 1 00:58:37.895: ISDN BR0: Incoming call id = 0x0011, dsl 0

*Mar 1 00:58:37.895: ISDN BR0: L2-TERM: ces/tei=1/0

TERM_DOWN->AWAIT_ESTABLISH

*Mar 1 00:58:37.935: ISDN BR0: Activating

00:58:38: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

00:58:38: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to down

*Mar 1 00:58:39.939: ISDN BR0: Could not bring up interface

*Mar 1 00:58:39.943: ISDN BR0: Shutting down ISDN Layer 3

*Mar 1 00:58:39.963: ISDN BR0: Activating

*Mar 1 00:58:41.943: ISDN BR0: Could not bring up interface

*Mar 1 00:58:41.947: ISDN BR0: Shutting down ISDN Layer 3

*Mar 1 00:58:41.947: ISDN BR0: Activating

ROUTER1#

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

Layer 2 NOT Activated

!--- ISDN L1 and L2 are back to the deactivated state.

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask: 0x80000003

Number of L2 Discards = 0, L2 Session ID = 39

Total Allocated ISDN CCBs = 0

ROUTER1#

*Mar 1 00:58:49.951: ISDN BR0: Could not bring up interface

*Mar 1 00:58:49.951: ISDN BR0: Shutting down ISDN Layer 3

ROUTER1#

ROUTER1# show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0060.5cf4.a955

Root port is 6 (Serial0), cost of root path is 647

Topology change flag not set, detected flag not set

Number of topology changes 13 last change occurred 00:28:23 ago

from Serial0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.2, designated path cost 647

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 1633, received 0

Port 3 (BRI0) of Bridge group 1 is down

!--- BRI0 is in the down state when Serial 0 is up.

Port path cost 15625, Port priority 128, Port Identifier 128.3.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.3, designated path cost 647

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 3

BPDU: sent 1014, received 622

Port 6 (Serial0) of Bridge group 1 is forwarding

!--- Serial0 forwards the bridged traffic now.

Port path cost 647, Port priority 128, Port Identifier 128.6.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a955

Designated port id is 128.6, designated path cost 0

Timers: message age 1, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 18, received 896

ROUTER1#

Informations connexes

- Pontage via RNIS

- Sauvegarde BRI RNIS avec l'interface de sauvegarde

- Configuration d'une sauvegarde BRI Multilink RNIS avec Dialer Watch

- Configuration d'une sauvegarde BRI RNIS avec Dialer Watch

- Configuration d'une sauvegarde RNIS avec des routes statiques flottantes

- Sauvegarde DDR à l'aide d'accès de base (BRI) et de la commande backup interface

- Configuration de l'interface de sauvegarde d'un accès de base (BRI) à l'aide de profils de numéroteur

- Configuration d'une sauvegarde DDR à l'aide d'accès de base (BRI) et de Dialer Watch

- Configuration d'une sauvegarde RNIS pour des liaisons WAN en utilisant des routes statiques flottantes

- Configuration de la sauvegarde du relayage de trames

- Configuration de la sauvegarde de numérotation pour les lignes série

- Commandes de services de numérotation Cisco IOS

- Numérotation et accès de l'assistance technique

- Support et documentation techniques - Cisco Systems