Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar (Prime Infrastructure 2.2 y versiones anteriores)

Configuración de SNMP v2 en un switch

GUI

CLI

Configuración de SNMP v3 en un switch

CLI

Prime Infrastructure

SNMP v2

SNMP v3

Configurar (Prime Infrastructure 3.x y posterior)

Configuración de SNMP en un switch (Denali 16.x)

GUI

Configuración de GUI SNMP v2 en un switch (Denali 16.x)

Configuración SNMP v2 de CLI en un switch (Denali 16.x)

Configuración de GUI SNMP v3 en un switch (Denali 16.x)

Configuración SNMP v3 de CLI en un switch (Denali 16.x)

Prime Infrastructure

SNMP v2

SNMP v3

Verificación

Configuración de SNMP v2 en un switch (Cisco IOS-XE)

Configuración de SNMP v3 en un switch (Cisco IOS-XE)

Prime Infrastructure (2.2 y anteriores)

Configuración de SNMP v2 en un switch (Denali 16.x)

Configuración de SNMP v3 en un switch (Denali 16.x)

Prime Infrastructure

Troubleshoot

Desde el acceso convergente

Desde Prime Infrastructure

Introducción

Este documento describe cómo agregar acceso convergente (5760/3850/3650) a Prime Infrastructure con protocolo simple de administración de red (SNMP) v2 y v3.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Acceso convergente (5760/3850/3650) Cisco IOS® versión 3.3.x y posteriores o Denali 16.x

- Prime Infrastructure versión 2.0 o posterior

Componentes Utilizados

Este documento no tiene restricciones específicas en cuanto a versiones de software y de hardware.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar (Prime Infrastructure 2.2 y versiones anteriores)

Configuración de SNMP v2 en un switch

GUI

Elija Configuration > Controller > Management > SNMP > Communities > New.

CLI

Ingrese estos comandos:

conf t

snmp-server community V2Community RW

Configuración de SNMP v3 en un switch

CLI

Ingrese estos comandos:

conf t

snmp-server group V3Group v3 auth read V3Read write V3Write

snmp-server user V3User V3Group v3 auth sha Password1 priv aes 128 Password1

snmp-server view V3Read iso included

snmp-server view V3Write iso included

snmp-server host 10.201.234.170 version 3 auth V3User

snmp-server enable traps

Prime Infrastructure

Nota: Utilice la vista Ciclo de vida.

Elija Operate > Device Work Center > Add Device.

SNMP v2

SNMP v3

Nota: Si no se ingresan los parámetros de Telnet/Secure Shell, Prime Infrastructure no recopilará el inventario del switch.

Configurar (Prime Infrastructure 3.x y posterior)

Configuración de SNMP en un switch (Denali 16.x)

GUI

Elija General Settings > Management > SNMP.

Habilite SNMP.

Configuración de GUI SNMP v2 en un switch (Denali 16.x)

Configuración SNMP v2 de CLI en un switch (Denali 16.x)

Ingrese estos comandos:

conf t

snmp-server community V2Community RW

Configuración de GUI SNMP v3 en un switch (Denali 16.x)

Configuración SNMP v3 de CLI en un switch (Denali 16.x)

Ingrese estos comandos:

conf t

snmp-server user V3user V3Group v3 auth sha Password1 priv aes 128 Password1

snmp-server view V3Read iso included

snmp-server view V3Write iso included

snmp-server host 10.201.236.107 version 3 auth V3user

snmp-server enable traps

Prime Infrastructure

SNMP v2

SNMP v3

Verificación

Use esta sección para confirmar que su configuración funciona correctamente.

El Analizador de Cisco CLI (solo clientes registrados) admite determinados comandos show. Utilice el Analizador de Cisco CLI para ver un análisis de los resultados del comando show.

Configuración de SNMP v2 en un switch (Cisco IOS-XE)

Ingrese este comando:

5760-79b#show snmp community

Community name: V2Community

Community Index: V2Community

Community SecurityName: V2Community

storage-type: nonvolatile        active

Configuración de SNMP v3 en un switch (Cisco IOS-XE)

Ingrese estos comandos:

5760-79b#show snmp user

User name: V3User

Engine ID: 80000009030068BC0C5A8F80

storage-type: nonvolatile        active

Authentication Protocol: SHA

Privacy Protocol: AES128

Group-name: V3Group

5760-79b#show snmp group

groupname: V3Group                          security model:v3 auth

contextname: <no context specified>         storage-type: nonvolatile

readview : V3Read                           writeview: V3Write

notifyview: <no notifyview specified>

row status: active

Nota: La CLI es preferible a la GUI para la configuración SNMP v3 en el acceso convergente para algunos problemas conocidos que se abordan en el Id. de error de Cisco CSCuo52406.

Prime Infrastructure (2.2 y anteriores)

Configuración de SNMP v2 en un switch (Denali 16.x)

Ingrese este comando:

polaris-3850#show snmp community

Community name: v2community

Community Index: v2community

Community SecurityName: v2community

storage-type: nonvolatile     active

Configuración de SNMP v3 en un switch (Denali 16.x)

Ingrese estos comandos:

polaris-3850#show snmp user

User name: v3user

Engine ID: 80000009030068BC0C5A8F80

storage-type: nonvolatile        active

Authentication Protocol: SHA

Privacy Protocol: AES128

Group-name: V3Group

polaris-3850#show snmp group

groupname: V3Group                          security model:v3 auth

contextname: <no context specified>         storage-type: nonvolatile

readview : V3Read                           writeview: V3Write

notifyview: <no notifyview specified>

row status: active

Prime Infrastructure

Troubleshoot

En esta sección encontrará información que puede utilizar para solucionar problemas de configuración.

Desde el acceso convergente

El comando show logging muestra los paquetes activos enviados a la dirección IP de la infraestructura Prime desde el WLC.

Ingrese estos comandos:

polaris-3850#debug snmp packets

Polaris-3850#show logging

entPhysicalEntry.7.2042 = Gi2/0/1

*Jun 10 15:58:51.817: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.819: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.825: SNMP: Get-bulk request, reqid 945449769, nonrptr 0, maxreps 10

Jun 10 15:58:51.904: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.927: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.928: SNMP: Get-bulk request, reqid 945449775, nonrptr 0, maxreps 10

entPhysicalEntry.7.2062 = NULL TYPE/VALUE

*Jun 10 15:58:51.931: SNMP: Response, reqid 945449775, errstat 0, erridx 0

entPhysicalEntry.7.2063 = Gi2/0/22

entPhysicalEntry.7.2064 = Gi2/0/23

entPhysicalEntry.7.2065 = Gi2/0/24

entPhysicalEntry.7.2066 = Switch 2 FRU Uplink Module 1

--More--          entPhysicalEntry.7.2067 = Gi2/1/1 Container

entPhysicalEntry.7.2068 = Gi2/1/2 Container

entPhysicalEntry.7.2069 = Te2/1/3 Container

entPhysicalEntry.7.2070 = Te2/1/4 Container

entPhysicalEntry.8.1 = V01

*Jun 10 15:58:51.951: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.974: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.975: SNMP: Get-bulk request, reqid 945449777, nonrptr 0, maxreps 10

ciscoEnvMonTemperatureStatusEntry.3 = NULL TYPE/VALUE

*Jun 10 15:58:51.978: SNMP: Response, reqid 945449777, errstat 0, erridx 0

ciscoEnvMonTemperatureStatusEntry.3.2008 = 28

ciscoEnvMonTemperatureStatusEntry.3.2009 = 40

ciscoEnvMonTemperatureStatusEntry.3.2010 = 44

ciscoEnvMonTemperatureStatusEntry.6.2008 = 1

--More--         *Jun 10 15:58:52.001: SNMP: Packet sent via UDP to 10.201.236.107

Desde Prime Infrastructure

SNMPWALK entre dispositivos.

Ingrese estos comandos:

PrimeInfrastructurejoker/admin# shell

Enter shell access password :

Starting bash shell ...

ade # snmpwalk -v2c -c v2community 10.201.234.36 sysUpTime

DISMAN-EVENT-MIB::sysUpTimeInstance = Timeticks: (238833753) 27 days, 15:25:37.53

v2community = comunidad snmp

10.201.234.36 = IP del WLC

Este es el resultado si hay disponibilidad:

DISMAN-EVENT-MIB::sysUpTimeInstance = Tiempos de tiempo: xx.xxx