Contenido

Introducción

prerrequisitos

Requisitos

Componentes Utilizados

Convenciones

Teoría Precedente

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshooting

Información Relacionada

Introducción

La seguridad de protocolos en Internet (IPSec) es un marco de los estándares abiertos que asegura las comunicaciones privadas seguras sobre las redes del IP. De acuerdo con los estándares desarrollados por la Fuerza de tareas de ingeniería en Internet (IETF) (IETF), el IPSec asegura la confidencialidad, la integridad, y la autenticidad de las comunicaciones de datos a través de una red IP pública. El IPSec proporciona a un componente necesario para un basado en estándares, solución flexible para desplegar una política de seguridad de toda la red.

Este documento proporciona un ejemplo de configuración del IPSec entre dos cables módem de Cisco. Esta configuración crea un túnel de encripción a través de una red de cable entre dos routeres de cable módem de las uBR9xx Series de Cisco. Todo el tráfico entre las dos redes se cifra. Pero el tráfico destinado para otras redes se permite pasar unencrypted. Para los usuarios del oficina pequeña, oficina en el hogar (SOHO), esto permite la creación del Redes privadas virtuales (VPN) a través de una red de cable.

prerrequisitos

Requisitos

No hay requisitos específicos para este documento.

Componentes Utilizados

Los módems deben ajustarse a estos requisitos de configurar el IPSec en dos Cable módems:

- Cisco uBR904, uBR905, o uBR924 en el modo de ruteo

- Conjunto de características del IPSec 56

- Software Release 12.0(5)T o Posterior de Cisco IOS®

Además, usted debe tener un Sistema de terminación del cablemódem (CMTS), que es cualquier Data-over-Cable Service Interface Specifications (DOCSIS) - de cabecera compatible con router del cable, tal como uBR7246VXR del Cisco uBR7246, del Cisco uBR7223, o de Cisco.

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si la red está funcionando, asegúrese de haber comprendido el impacto que puede tener cualquier comando.

Convenciones

Consulte Convenciones de Consejos TécnicosCisco para obtener más información sobre las convenciones del documento.

Teoría Precedente

El ejemplo en este documento utiliza un módem de cable del uBR904, un módem de cable del uBR924, y un uBR7246VXR CMTS. El Cable módems funciona con el Cisco IOS Software Release 12.1(6), y el CMTS funciona con el Cisco IOS Software Release 12.1(4)EC.

Nota: Este ejemplo se hace con la configuración manual en el Cable módems a través del puerto de la consola. Si un proceso automatizado se realiza a través del archivo de configuración de DOCSIS (el script ios.cfg se crea con las Listas de acceso de la configuración IPSec) entonces 100 y 101 no puede ser utilizado. Esto es porque la implementación de Cisco de la tabla de los docsDevNmAccess del Simple Network Management Protocol (SNMP) utiliza las Listas de acceso del Cisco IOS. Crea una lista de acceso por la interfaz. En el uBR904, 924, y 905, las primeras dos Listas de acceso se utilizan generalmente (100 y 101). En un módem de cable que soporte el Bus serie universal (USB), como el CVA120, tres Listas de acceso se utilizan (100, 101, y 102).

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Utilice la herramienta de búsqueda de comandos (clientes registrados solamente) para encontrar la información adicional sobre los comandos en este documento.

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Nota: Todos los IP Addresses en este diagrama tienen una máscara 24-bit.

Configuraciones

En este documento, se utilizan estas configuraciones:

- uBR924-1

- uBR904-2

- uBR7246VXR

uBR924-1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-1

!

enable password ww

!

!

!

!

clock timezone - -8

ip subnet-zero

no ip finger

!

ip audit notify log

ip audit po max-events 100

!

!

crypto isakmp policy 10

!--- Creates an Internet Key Exchange (IKE) policy with the specified priority !--- number of 10. The range for the priority is 1 to 10000, where 1 is the !--- highest priority. This command also enters Internet Security Association !--- and Key Management Protocol (ISAKMP) policy configuration command mode.

hash md5

!--- Specifies the MD5 (HMAC variant) hash algorithm for packet authentication.

authentication pre-share

!--- Specifies that the authentication keys are pre-shared, as opposed to !--- dynamically negotiated using Rivest, Shamir, and Adelman (RSA) public !--- key signatures.

group 2

!--- Diffie-Hellman group for key negotiation.

lifetime 3600

!--- Defines how long, in seconds, each security association should exist before !--- it expires. Its range is 60 to 86400, and in this case, it is 1 hour.

crypto isakmp key mykey address 18.18.18.18

!--- Specifies the pre-shared key that should be used with the peer at the !--- specific IP address. The key can be any arbitrary alphanumeric key up to !--- 128 characters. The key is case-sensitive and must be entered identically !--- on both routers. In this case, the key is mykey and the peer is the !--- Ethernet address of uBR904-2

.

!

crypto IPSec transform-set TUNNELSET ah-md5-hmac esp-des

!--- Establishes the transform set to use for IPsec encryption. As many as !--- three transformations can be specified for a set. Authentication Header !--- and ESP are in use. Another common transform set used in industry is !--- esp-des esp-md5-hmac.

!

crypto map MYMAP local-address Ethernet0

!--- Creates the MYMAP crypto map and applies it to the Ethernet0 interface.

crypto map MYMAP 10 ipsec-isakmp

!--- Creates a crypto map numbered 10 and enters crypto map configuration mode.

set peer 18.18.18.18

!--- Identifies the IP address for the destination peer router. In this case, !--- the Ethernet interface of the remote cable modem (ubr904-2) is used.

set transform-set TUNNELSET

!--- Sets the crypto map to use the transform set previously created.

match address 101

!--- Sets the crypto map to use the access list that specifies the type of !--- traffic to be encrypted. !--- Do not use access lists 100, 101, and 102 if the IPsec config is !--- downloaded through the ios.cfg in the DOCSIS configuration file.

!

!

!

!

voice-port 0

input gain -2

output attenuation 0

!

voice-port 1

input gain -2

output attenuation 0

!

!

!

interface Ethernet0

ip address 19.19.19.19 255.255.255.0

ip rip send version 2

ip rip receive version 2

no ip route-cache

no ip mroute-cache

!

interface cable-modem0

ip rip send version 2

ip rip receive version 2

no ip route-cache

no ip mroute-cache

cable-modem downstream saved channel 525000000 39 1

cable-modem mac-timer t2 40000

no cable-modem compliant bridge

crypto map MYMAP

!--- Applies the previously created crypto map to the cable interface.

!

router rip

version 2

network 19.0.0.0

network 172.16.0.0

!

ip default-gateway 172.16.31.1

ip classless

ip http server

!

access-list 101 permit ip 19.19.19.0 0.0.0.255 18.18.18.0 0.0.0.255

!--- Access list that identifies the traffic to be encrypted. In this case, !--- it is setting traffic from the local Ethernet network to the remote !--- Ethernet network.

snmp-server manager

!

line con 0

transport input none

line vty 0 4

password ww

login

!

end

La configuración del otro módem de cable es muy similar, tan la mayor parte de los comentarios en la configuración previa se omite.

uBR904-2

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr904-2

!

enable password ww

!

!

!

!

!

clock timezone - -8

ip subnet-zero

no ip finger

!

!

!

crypto isakmp policy 10

hash md5

authentication pre-share

group 2

lifetime 3600

crypto isakmp key mykey address 19.19.19.19

!

!

crypto IPSec transform-set TUNNELSET ah-md5-hmac ESP-Des

!

crypto map MYMAP local-address Ethernet0

crypto map MYMAP 10 ipsec-isakmp

set peer 19.19.19.19

!--- Identifies the IP address for the destination peer router. In this case, !--- the Ethernet interface of the remote cable modem (uBR924-1) is used.

set transform-set TUNNELSET

match address 101

!

!

!

!

interface Ethernet0

ip address 18.18.18.18 255.255.255.0

ip rip send version 2

ip rip receive version 2

!

interface cable-modem0

ip rip send version 2

ip rip receive version 2

no keepalive

cable-modem downstream saved channel 555000000 42 1

cable-modem Mac-timer t2 40000

no cable-modem compliant bridge

crypto map MYMAP

!

router rip

version 2

network 18.0.0.0

network 172.16.0.0

!

ip default-gateway 172.16.30.1

ip classless

no ip http server

!

access-list 101 permit ip 18.18.18.0 0.0.0.255 19.19.19.0 0.0.0.255

snmp-server manager

!

line con 0

transport input none

line vty 0 4

password ww

login

!

end

El uBR7246VXR CMTS también funciona con la versión 2 del Routing Information Protocol (RIP), de modo que la encaminamiento trabaje. Ésta es la configuración de RIP usada en el CMTS:

uBR7246VXR

router rip

version 2

network 172.16.0.0

no auto-summary

Verificación

Use esta sección para confirmar que su configuración funciona correctamente.

Para verificar que el IPSec trabaje:

- Verifique estas cosas:

1. El Cisco IOS Software soporta el IPSec.

2. La configuración corriente está correcta.

3. Las interfaces están para arriba.

4. Rutear los trabajos.

5. La lista de acceso definida para cifrar el tráfico está correcta.

- Cree el tráfico y mire el cifrar y el Decrypt, para ver la cantidad que está aumentando.

- Gire los debugs para crypto.

La herramienta Output Interpreter Tool (clientes registrados solamente) (OIT) soporta ciertos comandos show. Utilice la OIT para ver un análisis del resultado del comando show.

Publique el comando show version en ambo Cable módems.

ubr924-1#show version

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1O3SV4Y556I-M), Version 12.1(6),

RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2000 by Cisco Systems, Inc.

Compiled Wed 27-Dec-00 16:36 by kellythw

Image text-base: 0x800100A0, data-base: 0x806C1C20

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ubr924-1 uptime is 1 hour, 47 minutes

System returned to ROM by reload at 10:39:05 - Fri Feb 9 2001

System restarted at 10:40:05 - Fri Feb 9 2001

System image file is "flash:ubr920-k1o3sv4y556i-mz.121-6"

cisco uBR920 CM (MPC850) processor (revision 3.e)

with 15872K/1024K bytes of memory.

Processor board ID FAA0422Q04F

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

UBR924-1 funciona con el Cisco IOS Software Release 12.1(6) con el conjunto de características del VALUE SMALL OFFICE/VOICE/FW IPSEC 56.

ubr904-2#show version

Cisco Internetwork Operating System Software

IOS (TM) 900 Software (UBR900-K1OY556I-M), Version 12.1(6),

RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2000 by cisco Systems, Inc.

Compiled Wed 27-DEC-00 11:06 by kellythw

Image text-base: 0x08004000, database: 0x085714DC

ROM: System Bootstrap, Version 11.2(19980518:195057), RELEASED SOFTWARE

ROM: 900 Software (UBR900-RBOOT-M), Version 11.3(11)NA,

EARLY DEPLOYMENT RELEASE SOFTWARE (fc1)

ubr904-2 uptime is 1 hour, 48 minutes

System returned to ROM by reload at 10:38:44 - Fri Feb 9 2001

System restarted at 10:40:37 - Fri Feb 9 2001

System image file is "flash:ubr900-k1oy556i-mz.121-6"

cisco uBR900 CM (68360) processor (revision D)

with 8192K bytes of memory.

Processor board ID FAA0235Q0ZS

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

4096K bytes of processor board System flash (Read/Write)

2048K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

UBR904-2 funciona con el Cisco IOS Software Release 12.1(6) con el PEQUEÑO conjunto de características del IPSec 56 OFFICE/FW.

ubr924-1#show ip interface brief

Interface            IP-Address      OK? Method Status          Protocol

Ethernet0            19.19.19.19     YES NVRAM  up              up

cable-modem0         172.16.31.20    YES unset  up              up

ubr904-2#show ip interface brief

Interface            IP-Address      OK? Method Status          Protocol

Ethernet0            18.18.18.18     YES NVRAM  up              up

cable-modem0         172.16.30.18    YES unset  up              up

Del comando más reciente, usted puede ver que las interfaces de Ethernet están para arriba. Los IP Addresses de las interfaces de Ethernet fueron ingresados manualmente. Las interfaces del cable son también ascendentes y aprendieron sus IP Addresses con el DHCP. Porque asignan estas direcciones del cable dinámicamente, no pueden ser utilizadas como pares en la configuración IPSec.

ubr924-1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - ISIS level-1, L2 - ISIS level-2, ia - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.31.1 to network 0.0.0.0

19.0.0.0/24 is subnetted, 1 subnets

C       19.19.19.0 is directly connected, Ethernet0

R    18.0.0.0/8 [120/2] via 172.16.31.1, 00:00:23, cable-modem0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

R       172.16.135.0/25 [120/1] via 172.16.31.1, 00:00:23, cable-modem0

R       172.16.29.0/27 [120/1] via 172.16.31.1, 00:00:23, cable-modem0

R       172.16.30.0/24 [120/1] via 172.16.31.1, 00:00:23, cable-modem0

C       172.16.31.0/24 is directly connected, cable-modem0

R    192.168.99.0/24 [120/3] via 172.16.31.1, 00:00:24, cable-modem0

10.0.0.0/24 is subnetted, 2 subnets

R       10.10.10.0 [120/2] via 172.16.31.1, 00:00:24, cable-modem0

S*   0.0.0.0/0 [1/0] via 172.16.31.1

Usted puede ver de esta salida que uBR924-1 esté aprendiendo sobre la ruta 18.18.18.0, que es la interfaz de Ethernet de uBR904-2.

ubr904-2#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - ISIS level-1, L2 - ISIS level-2, IA - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.30.1 to network 0.0.0.0

R    19.0.0.0/8 [120/2] via 172.16.30.1, 00:00:17, cable-modem0

18.0.0.0/24 is subnetted, 1 subnets

C       18.18.18.0 is directly connected, Ethernet0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

R       172.16.135.0/25 [120/1] via 172.16.30.1, 00:00:17, cable-modem0

R       172.16.29.224/27 [120/1] via 172.16.30.1, 00:00:17, cable-modem0

C       172.16.30.0/24 is directly connected, cable-modem0

R       172.16.31.0/24 [120/1] via 172.16.30.1, 00:00:17, cable-modem0

R    192.168.99.0/24 [120/3] via 172.16.30.1, 00:00:18, cable-modem0

10.0.0.0/24 is subnetted, 1 subnets

R       10.10.10.0 [120/2] via 172.16.30.1, 00:00:18, cable-modem0

S*   0.0.0.0/0 [1/0] via 172.16.30.1

De la tabla de ruteo de uBR904-2, usted puede ver que la red para los Ethernetes de uBR924-1 está en la tabla de ruteo.

Nota: Pudo haber los casos donde usted no puede funcionar con un Routing Protocol entre el dos Cable módems. En estos casos, usted debe agregar las Static rutas en el CMTS al tráfico directo para las interfaces de Ethernet del Cable módems.

La cosa siguiente a marcar es la certificación de la lista de acceso; publique el comando show access-lists en ambo Routers.

ubr924-1#show access-lists

Extended IP access list 101

permit ip 19.19.19.0 0.0.0.255 18.18.18.0 0.0.0.255 (2045 matches)

ubr904-2#show access-lists

Extended IP access list 101

permit ip 18.18.18.0 0.0.0.255 19.19.19.0 0.0.0.255 (2059 matches)

La lista de acceso fijó sesión IPSec cuando el LAN detrás de uBR924-1 (19.19.19.0) envía el tráfico IP al LAN detrás de uBR904-2 (18.18.18.0), y vice versa. No utilice “ningunos” en las Listas de acceso, porque crea los problemas. Refiera a configurar el IPSec Network Security para más detalles.

No hay tráfico IPSec. Publique el comando show crypto engine connection active.

ubr924-1#show crypto engine connection active

ID Interface    IP-Address    State    Algorithm           Encrypt  Decrypt

1                              set     HMAC_MD5+DES_56_CB        0        0

ubr904-2#show crypto engine connection active

ID Interface    IP-Address    State    Algorithm           Encrypt  Decrypt

1                              set     HMAC_MD5+DES_56_CB        0        0

No hay conexiones del IPSec porque ningún tráfico ha correspondido con las Listas de acceso.

Nota: Consulte Información Importante sobre Comandos de Debug antes de usar un comando debug.

El siguiente paso es girar algunos debugs crypto para generar el tráfico interesante.

En este ejemplo, se giran estos debugs:

- debug crypto engine

- debug crypto ipsec

- debug crypto key-exchange

- debug crypto isakmp

Usted debe primero generar un cierto tráfico interesante para ver la salida de los debugs. Publique un ping extendido del acceso de Ethernet de uBR904-2 al PC en uBR924-1 (dirección IP 19.19.19.1).

ubr904-2#ping ip

Target IP address: 19.19.19.1

!--- IP address of PC1 behind the Ethernet of uBR924-1.

Repeat count [5]: 100

!--- Sends 100 pings.

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 18.18.18.18

!--- IP address of the Ethernet behind uBR904-2.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 19.19.19.1, timeout is 2 seconds:

El uBR924-2 muestra esta salida de los debugs:

ubr904-2#

01:50:37: IPSec(sa_request): ,

(key eng. msg.) src= 18.18.18.18, dest= 19.19.19.19,

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

protocol= AH, transform= ah-md5-hmac ,

lifedur= 3600s and 4608000kb,

spi= 0x19911A16(428939798), conn_id= 0, keysize= 0, flags= 0x4004

01:50:37: IPSec(sa_request): ,

(key Eng. msg.) src= 18.18.18.18, dest= 19.19.19.19,

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= ESP-Des ,

lifedur= 3600s and 4608000kb,

spi= 0x7091981(118036865), conn_id= 0, keysize= 0, flags= 0x4004

01:50:37: ISAKMP: received ke message (1/2)

01:50:37: ISAKMP (0:1): sitting IDLE. Starting QM immediately (QM_IDLE)

01:50:37: ISAKMP (0:1): beginning Quick Mode exchange, M-ID of 1108017901

01:50:37: CryptoEngine0: generate hmac context for conn id 1

01:50:37: ISAKMP (1): sending packet to 19.19.19.19 (I) QM_IDLE

01:50:37: ISAKMP (1): received packet from 19.19.19.19 (I) QM_IDLE

01:50:37: CryptoEngine0: generate hmac context for conn id 1

01:50:37: ISAKMP (0:1): processing SA payload. message ID = 1108017901

01:50:37: ISAKMP (0:1): Checking IPSec proposal 1

01:50:37: ISAKMP: transform 1, AH_MD5

01:50:37: ISAKMP:   attributes in transform:

01:50:3.!!!!!!!!!!!!!!!!!!!!!!!7: ISAKMP:      encaps is 1

01:50:37: ISAKMP:      SA life type in seconds

01:50:37: ISAKMP:      SA life duration (basic) of 3600

01:50:37: ISAKMP:      SA life type in kilobytes

01:50:37: ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

01:50:37: ISAKMP:      authenticator is HMAC-MD5

01:50:37: validate proposal 0

01:50:37: ISAKMP (0:1): atts are acceptable.

01:50:37: ISAKMP (0:1): Checking IPSec proposal 1

01:50:37: ISAKMP: transform 1, ESP_DES

01:50:37: ISAKMP:   attributes in transform:

01:50:37: ISAKMP:      encaps is 1

01:50:37: ISAKMP:      SA life type in seconds

01:50:37: ISAKMP:      SA life duration (basic) of 3600

01:50:37: ISAKMP:      SA life type in kilobytes

01:50:37: ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

01:50:37: validate proposal 0

01:50:37: ISAKMP (0:1): atts are acceptable.

01:50:37: IPSec(validate_proposal_request): proposal part #1,

(key Eng. msg.) dest= 19.19.19.19, src= 18.18.18.18,

dest_proxy= 19.19.1!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 99 percent (99/100), round-trip min/avg/max = 30/40/70 ms

ubr904-2#

Note que el primer ping falló. Esto es porque necesita establecer la conexión.

UBR924-1 muestra esta salida de los debugs:

ubr924-1#

01:50:24: ISAKMP (1): received packet from 18.18.18.18 (R) QM_IDLE

01:50:24: CryptoEngine0: generate hmac context for conn id 1

01:50:24: ISAKMP (0:1): processing SA payload. Message ID = 1108017901

01:50:24: ISAKMP (0:1): Checking IPSec proposal 1

01:50:24: ISAKMP: transform 1, AH_MD5

01:50:24: ISAKMP:   attributes in transform:

01:50:24: ISAKMP:      encaps is 1

01:50:24: ISAKMP:      SA life type in seconds

01:50:24: ISAKMP:      SA life duration (basic) of 3600

01:50:24: ISAKMP:      SA life type in kilobytes

01:50:24: ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

01:50:24: ISAKMP:      authenticator is HMAC-MD5

01:50:24: validate proposal 0

01:50:24: ISAKMP (0:1): atts are acceptable.

01:50:24: ISAKMP (0:1): Checking IPSec proposal 1

01:50:24: ISAKMP: transform 1, ESP_DES

01:50:24: ISAKMP:   attributes in transform:

01:50:24: ISAKMP:      encaps is 1

01:50:24: ISAKMP:      SA life type in seconds

01:50:24: ISAKMP:      SA life duration (basic) of 3600

01:50:24: ISAKMP:      SA life type in kilobytes

01:50:24: ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

01:50:24: validate proposal 0

01:50:24: ISAKMP (0:1): atts are acceptable.

01:50:24: IPSec(validate_proposal_request): proposal part #1,

(key Eng. msg.) dest= 19.19.19.19, src= 18.18.18.18,

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= AH, transform= ah-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x4

01:50:24: IPSec(validate_proposal_request): proposal part #2,

(key Eng. msg.) dest= 19.19.19.19, src= 18.18.18.18,

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= ESP-Des ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x4

01:50:24: validate proposal request 0

01:50:24: ISAKMP (0:1): processing NONCE payload. Message ID = 1108017901

01:50:24: ISAKMP (0:1): processing ID payload. Message ID = 1108017901

01:50:24: ISAKMP (1): ID_IPV4_ADDR_SUBNET src 18.18.18.0/255.255.255.0

prot 0 Port 0

01:50:24: ISAKMP (0:1): processing ID payload. Message ID = 1108017901

01:50:24: ISAKMP (1): ID_IPV4_ADDR_SUBNET dst 19.19.19.0/255.255.255.0

prot 0 Port 0

01:50:24: ISAKMP (0:1): asking for 2 spis from IPSec

01:50:24: IPSec(key_engine): got a queue event...

01:50:24: IPSec(spi_response): getting spi 393021796 for SA

from 18.18.18.18     to 19.19.19.19     for prot 2

01:50:24: IPSec(spi_response): getting spi 45686884 for SA

from 18.18.18.18     to 19.19.19.19     for prot 3

01:50:24: ISAKMP: received ke message (2/2)

01:50:24: CryptoEngine0: generate hmac context for conn id 1

01:50:24: ISAKMP (1): sending packet to 18.18.18.18 (R) QM_IDLE

01:50:24: ISAKMP (1): received packet from 18.18.18.18 (R) QM_IDLE

01:50:24: CryptoEngine0: generate hmac context for conn id 1

01:50:24: IPSec allocate flow 0

01:50:24: IPSec allocate flow 0

01:50:24: ISAKMP (0:1): Creating IPSec SAs

01:50:24:         inbound SA from 18.18.18.18 to 19.19.19.19

(proxy 18.18.18.0 to 19.19.19.0)

01:50:24:         has spi 393021796 and conn_id 2000 and flags 4

01:50:24:         lifetime of 3600 seconds

01:50:24:         lifetime of 4608000 kilobytes

01:50:24:         outbound SA from 19.19.19.19 to 18.18.18.18

(proxy 19.19.19.0 to 18.18.18.0)

01:50:24:         has spi 428939798 and conn_id 2001 and flags 4

01:50:24:         lifetime of 3600 seconds

01:50:24:         lifetime of 4608000 kilobytes

01:50:24: ISAKMP (0:1): Creating IPSec SAs

01:50:24:         inbound SA from 18.18.18.18 to 19.19.19.19

(proxy 18.18.18.0 to 19.19.19.0)

01:50:24:         has spi 45686884 and conn_id 2002 and flags 4

01:50:24:         lifetime of 3600 seconds

01:50:24:         lifetime of 4608000 kilobytes

01:50:24:         outbound SA from 19.19.19.19 to 18.18.18.18

(proxy 19.19.19.0 to 18.18.18.0)

01:50:24:         has spi 118036865 and conn_id 2003 and flags 4

01:50:25:         lifetime of 3600 seconds

01:50:25:         lifetime of 4608000 kilobytes

01:50:25: ISAKMP (0:1): deleting node 1108017901 error FALSE reason

"quick mode done (await()"

01:50:25: IPSec(key_engine): got a queue event...

01:50:25: IPSec(initialize_sas): ,

(key Eng. msg.) dest= 19.19.19.19, src= 18.18.18.18,

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= AH, transform= ah-md5-hmac ,

lifedur= 3600s and 4608000kb,

spi= 0x176D0964(393021796), conn_id= 2000, keysize= 0, flags= 0x4

01:50:25: IPSec(initialize_sas): ,

(key Eng. msg.) src= 19.19.19.19, dest= 18.18.18.18,

src_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

dest_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= AH, transform= ah-md5-hmac ,

lifedur= 3600s and 4608000kb,

spi= 0x19911A16(428939798), conn_id= 2001, keysize= 0, flags= 0x4

01:50:25: IPSec(initialize_sas): ,

(key Eng. msg.) dest= 19.19.19.19, src= 18.18.18.18,

dest_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

src_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= ESP-Des ,

lifedur= 3600s and 4608000kb,

spi= 0x2B92064(45686884), conn_id= 2002, keysize= 0, flags= 0x4

01:50:25: IPSec(initialize_sas): ,

(key Eng. msg.) src= 19.19.19.19, dest= 18.18.18.18,

src_proxy= 19.19.19.0/255.255.255.0/0/0 (type=4),

dest_proxy= 18.18.18.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= ESP-Des ,

lifedur= 3600s and 4608000kb,

spi= 0x7091981(118036865), conn_id= 2003, keysize= 0, flags= 0x4

01:50:25: IPSec(create_sa): sa created,

(sa) sa_dest= 19.19.19.19, sa_prot= 51,

sa_spi= 0x176D0964(393021796),

sa_trans= ah-md5-hmac , sa_conn_id= 2000

01:50:25: IPSec(create_sa): sa created,

(sa) sa_dest= 18.18.18.18, sa_prot= 51,

sa_spi= 0x19911A16(428939798),

sa_trans= ah-md5-hmac , sa_conn_id= 2001

01:50:25: IPSec(create_sa): sa created,

(sa) sa_dest= 19.19.19.19, sa_prot= 50,

sa_spi= 0x2B92064(45686884),

sa_trans= ESP-Des , sa_conn_id= 2002

01:50:25: IPSec(create_sa): sa created,

(sa) sa_dest= 18.18.18.18, sa_prot= 50,

sa_spi= 0x7091981(118036865),

sa_trans= ESP-Des , sa_conn_id= 2003

ubr924-1#

Una vez que se crea el túnel IPsec, usted puede ver la conexión y los paquetes encriptados y desencriptados.

ubr924-1#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.31.20   set    HMAC_MD5                 0       99

2001 cable-modem0   172.16.31.20   set    HMAC_MD5                99        0

2002 cable-modem0   172.16.31.20   set    DES_56_CBC               0       99

2003 cable-modem0   172.16.31.20   set    DES_56_CBC              99        0

La primera línea 200x muestra los 99 paquetes recibidos. Tiene que desencriptar los paquetes para enviarlos al PC1. La segunda línea muestra 99 paquetes enviados. Tiene que cifrar los paquetes antes de que los envíe a uBR904-2. Las terceras y cuartas líneas hacen el mismo proceso, pero con el ESP-DES lo transforman en vez del AH-MD5-HMAC.

Nota: Si la transformación fijó que se configura en el módem de cable es ESP-DES ESP-MD5-HMAC, usted considera solamente dos sistemas autónomos (AS), en comparación con los cuatro mostrados en el comando show anterior.

ubr904-2#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.30.18   set    HMAC_MD5                 0       99

2001 cable-modem0   172.16.30.18   set    HMAC_MD5                99        0

2002 cable-modem0   172.16.30.18   set    DES_56_CBC               0       99

2003 cable-modem0   172.16.30.18   set    DES_56_CBC              99        0

Publique un ping extendido al PC2 de uBR924-1 para ver si los contadores incrementan para los paquetes encriptados y desencriptados.

ubr924-1#ping ip

Target IP address: 18.18.18.1

Repeat count [5]: 50

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 19.19.19.19

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 50, 100-byte ICMP Echos to 18.18.18.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (50/50), round-trip min/avg/max = 28/30/33 ms

ubr924-1#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.31.20   set    HMAC_MD5                 0      149

2001 cable-modem0   172.16.31.20   set    HMAC_MD5               149        0

2002 cable-modem0   172.16.31.20   set    DES_56_CBC               0      149

2003 cable-modem0   172.16.31.20   set    DES_56_CBC             149        0

ubr904-2#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.30.18   set    HMAC_MD5                 0      149

2001 cable-modem0   172.16.30.18   set    HMAC_MD5               149        0

2002 cable-modem0   172.16.30.18   set    DES_56_CBC               0      149

2003 cable-modem0   172.16.30.18   set    DES_56_CBC             149        0

Otro ping extendido se puede publicar, para considerar que los contadores incrementan otra vez. Esta vez, envía un ping 500-packet de uBR904-2 a la interfaz de Ethernet de uBR924-1 (19.19.19.19).

ubr904-2#ping ip

Target IP address: 19.19.19.19

Repeat count [5]: 500

Datagram size [100]: 1000

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 18.18.18.18

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 500, 1000-byte ICMP Echos to 19.19.19.19, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

01:59:06: IPSec(encapsulate): encaps area too small, moving to new buffer:

idbtype 0, encaps_size 26, header size 60, avail 84!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!

Success rate is 100 percent (500/500), round-trip min/avg/max = 98/135/352 ms

ubr904-2#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.30.18   set    HMAC_MD5                 0      649

2001 cable-modem0   172.16.30.18   set    HMAC_MD5               649        0

2002 cable-modem0   172.16.30.18   set    DES_56_CBC               0      649

2003 cable-modem0   172.16.30.18   set    DES_56_CBC             649        0

ubr924-1#show crypto engine connection active

ID   Interface      IP-Address     State  Algorithm          Encrypt  Decrypt

1                               set    HMAC_MD5+DES_56_CB       0        0

2000 cable-modem0   172.16.31.20   set    HMAC_MD5                 0      649

2001 cable-modem0   172.16.31.20   set    HMAC_MD5               649        0

2002 cable-modem0   172.16.31.20   set    DES_56_CBC               0      649

2003 cable-modem0   172.16.31.20   set    DES_56_CBC             649        0

Usted puede publicar los comandos clear crypto isakmp y clear crypto sa de borrar las conexiones. También, si no hay tráfico a través del túnel IPsec durante el vencimiento, el IPSec reajusta la conexión automáticamente.

Troubleshooting

No hay actualmente información disponible específica para resolver problemas esta configuración.

Información Relacionada

- Comandos del IPSec Network Security

- Una Introducción al encripción de seguridad IP (IPSec) - Información del debug

- Ejemplos de la configuración IPSec

- Configurar el IPSec Network Security

- Configurar el Cisco Universal Broadband Routers (uBR) de la serie 900

- Descargas del cable Cisco/de la Banda ancha (clientes registrados solamente)

- Soporte de tecnología de la Banda ancha por cable

- Soporte Técnico y Documentación - Cisco Systems