Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Antecedentes

Configurar

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento describe los problemas causados al configurar un paquete de unidad de transmisión máxima Jumbo (MTU) en un switch Nexus serie 5000.

Prerequisites

Verificación

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información de este documento se basa en las siguientes series de switches Nexus:

- Nexus 5020

- NX-OS versión 4.1(3)N2(1a)

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Convenciones

Consulte Convenciones de Consejos Técnicos de Cisco para obtener más información sobre las convenciones sobre documentos.

Antecedentes

Este documento describe los problemas que surgen cuando necesita utilizar Jumbo Packet en un switch Nexus 5000 Series. El escenario descrito puede ocurrir cuando intenta transferir paquetes gigantes entre switches Nexus 5000 y/o Nexus 7000.

Configurar

La pérdida de paquetes puede producirse entre dos switches Nexus 5000 o entre un switch Nexus 5000 y un switch Nexus 7000.

Cuando hace ping a un host con el tamaño de paquete de 9216 bytes, puede ver una pérdida de paquete del 50 por ciento.

Nexus-5000#ping 172.16.0.1 packet-size 9216 count 20

PING 172.16.0.1 (172.16.0.1): 9216 data bytes

9224 bytes from 172.16.0.1: icmp_seq=0 ttl=254 time=6.094 ms

Request 1 timed out

9224 bytes from 172.16.0.1: icmp_seq=2 ttl=254 time=5.507 ms

Request 3 timed out

9224 bytes from 172.16.0.1: icmp_seq=4 ttl=254 time=5.529 ms

Request 5 timed out

9224 bytes from 172.16.0.1: icmp_seq=6 ttl=254 time=10.09 ms

Request 7 timed out

9224 bytes from 172.16.0.1: icmp_seq=8 ttl=254 time=5.597 ms

Request 9 timed out

9224 bytes from 172.16.0.1: icmp_seq=10 ttl=254 time=5.497 ms

Request 11 timed out

9224 bytes from 172.16.0.1: icmp_seq=12 ttl=254 time=5.491 ms

Request 13 timed out

9224 bytes from 172.16.0.1: icmp_seq=14 ttl=254 time=5.555 ms

Request 15 timed out

9224 bytes from 172.16.0.1: icmp_seq=16 ttl=254 time=6.021 ms

Request 17 timed out

9224 bytes from 172.16.0.1: icmp_seq=18 ttl=254 time=5.51 ms

--- 172.16.0.1 ping statistics ---

20 packets transmitted, 10 packets received, 50.00% packet loss

round-trip min/avg/max = 5.491/6.089/10.09 ms

Configuraciones

Si un paquete Jumbo tiene que atravesar un Nexus 5020 y un Nexus 7010, debe configurar el Policy-map en Nexus 5020 y establecer el  system jumbomtu size en el switch Nexus serie 7010.

Complete estos pasos para configurar el Policy-map en Nexus 5020:

Nexus-5020

!--- You can enable the Jumbo MTU for the whole switch by setting the MTU to its maximum size (9216 bytes)

!--- in the policy map for the default Ethernet system class (class-default).

switch(config)#policy-map type network-qos jumbo

switch(config-pmap-nq)#class type network-qos class-default

switch(config-pmap-c-nq)#mtu 9216

switch(config-pmap-c-nq)#exit

switch(config-pmap-nq)#exit

switch(config)#system qos

switch(config-sys-qos)#service-policy type network-qos jumbo

Consulte la Guía de Configuración de Switching de Capa 2 de Cisco Nexus 5000 Series NX-OS, Release 4.2(1)N1(1) para obtener más información.

Complete estos pasos para establecer la trama jumbo en un switch Nexus 7010:

Nexus-7010

!--- Set the MTU to its maximum size (9216 bytes) in order to enable the Jumbo MTU for the whole switch.

switch(config)#system jumbomtu 9216

!--- Set the MTU specification for an interface.

switch(config)#interface ethernet x/x

!--- By default, Cisco NX-OS configures Layer 3 parameters. In order to configure Layer 2 parameters, use this command.

switch(config-if)#switchport

switch(config-if)#mtu 9216

switch(config-if)#exit

Verificación

Para verificar, puede hacer ping con un tamaño de paquete de más de 1500 bytes: Ping -l 9000 x.x.x.x .

También puede ejecutar el comando  show interface ethernet port/slot  para verificar si la trama Jumbo está configurada.

En el Nexus 5000, introduzca la  show queuing interface ethernet 1/1  comando:

Nexus5000#show queuing interface ethernet 1/1

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 243200, HW MTU: 9280 (9216 configured)

En Nexus 7000, introduzca el  show interface ethernet 1/9  comando:

Nexus-7010#show interface ethernet 1/9

Ethernet1/9 is up

Hardware: 10000 Ethernet, address: 0000.0000.0000 (bia 0000.0000.0000)

MTU 9216 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is access

full-duplex, 10 Gb/s, media type is 10g

Beacon is turned off

Auto-Negotiation is turned off

Input flow-control is off, output flow-control is off

Rate mode is dedicated

Switchport monitor is off

Last link flapped 00:57:24

Last clearing of "show interface" counters 00:56:14

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 360 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 448 bps, 0 pps

RX

5894254 unicast packets  0 multicast packets  0 broadcast packets

5894254 input packets  29108950332 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  0 input discard

0 Rx pause

TX

5894228 unicast packets  2225 multicast packets  0 broadcast packets

5896453 output packets  29109001641 bytes

0 jumbo packets

0 output error  0 collision  0 deferred  0 late collision

0 lost carrier  0 no carrier  0 babble

0 Tx pause

0 interface resets

Nota: El contador Jumbo de Nexus serie 7000 no es compatible y las tramas Tx y Rx muestran un valor nulo, pero si observa el tamaño de MTU, muestra la trama Jumbo configurada.

Troubleshoot

Actualmente no hay información disponible para resolver problemas de esta configuración.

Información Relacionada

- Switches de la serie Cisco Nexus 5000

- Página de soporte de los switches Nexus de Cisco serie 7000

- Asistencia técnica y descargas de Cisco