Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Antecedentes

Traer

Configurar

Verificación

Información Relacionada

Introducción

Este documento describe el procedimiento de configuración y verificación inicial para configurar el switch Catalyst 9600.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

Asegúrese de que el chasis y el supervisor están instalados de acuerdo con las guías de instalación.

- Guía de instalación del chasis

- Guía de instalación del supervisor

Componentes Utilizados

La información de este documento se basa y configura en estas versiones de software y hardware:

- Hardware Switch Catalyst 9600

- Software: Cisco IOS® XE 16.12.3a

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Antecedentes

Puede iniciar, configurar y verificar Catalyst 9600 en tres pasos.

Traer

- Conecte la consola

- Encienda el sistema

- Observar mensajes de consola

- Seleccionar opción de diálogo de configuración

Configurar

- Gestión de dispositivos

- Hostname

- Reloj

- Guarde la configuración

Verificación

- Versión y paquete de software

- Hardware del sistema, alimentación, etc.

- Conectividad IP de administración

- Estado del sistema

- Hora

Traer

- Conecte el PC a la consola de Catalyst 9600 con RJ45 o USB

- Encienda el sistema

- Observe que la consola imprime la inicialización del hardware del sistema y otra información en la pantalla

Inicio inicial:

Initializing Hardware...

Initializing Hardware......

System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Compiled 30-04-2020 12:00:00.00 by rel

Current ROMMON image : Primary Rommon Image

Last reset cause:LocalSoft

C9600-SUP-1 platform with 16777216 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt]  0

boot: attempting to boot from [bootflash:packages.conf]

boot: reading file packages.conf

<truncated

###########################################################################

<truncated>

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Espere hasta que vea el cuadro de diálogo Configuración del sistema. Seleccione la opción No para ingresar al modo de configuración manual y seleccione Sí para terminar la autoinstalación, para entrar en la configuración manual simple.

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]: yes

Press RETURN to get started

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, changed state to down

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet0/0, changed state to down

Configurar

Nota: Utilice el comando show running-config en cualquier momento en el modo "habilitar" para verificar los valores configurados.

Configure el puerto de administración con una dirección IP de la red y habilite el puerto.

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#interface gigabitEthernet 0/0

Switch(config-if)#ip address 10.122.186.8 255.255.255.240

Switch(config-if)#no shutdown

Configure una ruta estática para alcanzar la puerta de enlace predeterminada para la red de administración, utilice la red IP y la puerta de enlace.

Switch(config)#ip route vrf Mgmt-vrf 10.122.157.250 255.255.255.255 10.122.186.1

Configure Line VTY (Línea VTY), Virtual Terminal (Terminal virtual) para acceder a través de telnet y establecer una contraseña de su elección.

Switch(config)#line vty 0 4

Switch(config-line)#password cisco

Switch(config-line)#login

Transport input all permite todos los protocolos (p. ej. ssh, telnet) para acceder al dispositivo a través de sesiones VTY.

Switch(config-line)#transport input all

Switch(config-line)#exit

Configure la contraseña de modo de usuario para el acceso a la consola.

Switch(config)#line console 0

Switch(config-line)#password cisco

Switch(config-line)#login

Switch(config-line)#exit

Configure una contraseña de modo de habilitación fuerte.

Switch(config)#enable secret cisco

Configure el reloj del sistema.

Switch(config)#clock timezone utc +5 30

*Nov 6 04:34:58.910: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:05:58 utc Fri Nov 6 2020 to 10:04:58 utc Fri Nov 6 2020, configured from console by console.

*Nov 6 04:35:59.634: %SYS-5-CONFIG_I: Configured from console by console

Switch#clock set 04:30:00 6 Nov 2020

*Nov 5 23:00:00.000: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:06:19 utc Fri Nov 6 2020 to 04:30:00 utc Fri Nov 6 2020, configured from console by console.

Nov 5 23:00:00.000: %PKI-6-AUTHORITATIVE_CLOCK: The system clock has been set.

Configure el nombre de host para el sistema.

Switch(config)#hostname Catalyst-9600

Guarde la configuración configurada hasta ahora en startup-config.

Catalyst-9600#write memory

Building configuration...

[OK]

*Nov  5 16:11:46.061: %SYS-2-PRIVCFG_ENCRYPT: Successfully encrypted private config file

Verificación

Compruebe la versión del software en el sistema, observe el tiempo de actividad, los detalles del sistema, etc.

Catalyst-9600#show version

Cisco IOS XE Software, Version 16.12.03a

Cisco IOS Software [Gibraltar], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 16.12.3a, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2020 by Cisco Systems, Inc.

Compiled Tue 28-Apr-20 09:37 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2020 by cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

BOOTLDR: System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Catalyst-9600 uptime is 36 minutes

Uptime for this control processor is 37 minutes

System returned to ROM by Reload Command

System image file is "bootflash:packages.conf"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Technology Package License Information:

------------------------------------------------------------------------------

Technology-package                                     Technology-package

Current                        Type                       Next reboot

------------------------------------------------------------------------------

network-advantage   Smart License                            network-advantage

dna-advantage            Subscription Smart License     dna-advantage

AIR License Level: AIR DNA Advantage

Next reload AIR license Level: AIR DNA Advantage

Smart Licensing Status: UNREGISTERED/EVAL MODE

cisco C9606R (X86) processor (revision V00) with 1867991K/6147K bytes of memory.

Processor board ID FXS2302Q2EP

1 Virtual Ethernet interface

24 Forty/Hundred Gigabit Ethernet interfaces

48 TwentyFive Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

16009160K bytes of physical memory.

11161600K bytes of Bootflash at bootflash:.

1638400K bytes of Crash Files at crashinfo:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Configuration register is 0x102

Verifique los paquetes instalados.

Catalyst-9600#show install summary

[ R0 R1 ] Installed Package(s) Information:

State (St): I - Inactive, U - Activated & Uncommitted,

C - Activated & Committed, D - Deactivated & Uncommitted

--------------------------------------------------------------------------------

Type  St   Filename/Version

--------------------------------------------------------------------------------

IMG   C    16.12.3a.0.4

--------------------------------------------------------------------------------

Auto abort timer: inactive

--------------------------------------------------------------------------------

Verifique la ruta para el VRF de administración.

Switch#show ip route vrf Mgmt-vrf

Routing Table: Mgmt-vrf

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

S*    0.0.0.0/0 [1/0] via 10.122.186.1                       <--- the default gateway

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

S        10.122.157.250/32 [1/0] via 10.122.186.1

C        10.122.186.0/28 is directly connected, GigabitEthernet0/0

L        10.122.186.8/32 is directly connected, GigabitEthernet0/0

Verifique el alcance de la red a través del gateway predeterminado.

Switch#ping vrf Mgmg-vrf 10.122.186.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.122.186.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Switch#

Compruebe los módulos instalados en el sistema.

Catalyst-9600#show module

Chassis Type: C9606R

Mod Ports Card Type                                   Model          Serial No.

---+-----+--------------------------------------+--------------+--------------

1   24   24-Port 40GE/12-Port 100GE                  C9600-LC-24C     CAT2252L0PY

3   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SH

4   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SU

6   48   48-Port 10GE / 25GE                         C9600-LC-48YL    CAT2302L16G

Mod MAC addresses                    Hw   Fw           Sw                 Status

---+--------------------------------+----+------------+------------------+--------

1   70B3.175A.7580 to 70B3.175A.75FF 0.10 17.3.1r[FC2]  16.12.03a          ok

3   70B3.175A.5680 to 70B3.175A.56FF 0.10 17.3.1r[FC2]  16.12.03a          ok

4   70B3.175A.5600 to 70B3.175A.567F 0.10 17.3.1r[FC2]  16.12.03a          ok

6   6C8B.D307.6680 to 6C8B.D307.66FF 0.10 17.3.1r[FC2]  16.12.03a          ok

Mod Redundancy Role     Operating Redundancy Mode Configured Redundancy Mode

---+-------------------+-------------------------+---------------------------

3   Active              sso                       sso

4   Standby             sso                       sso

Chassis MAC address range: 64 addresses from 6cb2.ae4a.70c0 to 6cb2.ae4a.70ff

Compruebe el estado del sistema mediante los resultados de prueba automática de encendido (POST) y diagnóstico.

Catalyst-9600#show post

Stored system POST messages:

Switch C9606R

--------------

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback: loopback Test: End, Status Passed

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback: loopback Test: End, Status Passed

Catalyst-9600#show diagnostic result module all

Current bootup diagnostic level: minimal

module 1:   SerialNo : CAT2252L0PY

Overall Diagnostic Result for module 1 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  U  U  U  U  U  U  .  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

module 3:   SerialNo : CAT2252L0SH

Overall Diagnostic Result for module 3 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> .

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> .

module 4:   SerialNo : CAT2252L0SU

Overall Diagnostic Result for module 4 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> U

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> U

module 6:   SerialNo : CAT2302L16G

Overall Diagnostic Result for module 6 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

.  .  U  U  U  .  U  .  U  .  .  .  U  U  .  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  .  U  U  U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  .  .  U

Compruebe si el reloj está configurado correctamente.

Catalyst-9600#show clock

*16:32:55.196 UTC Thu Nov 5 2020

Compruebe las fuentes de alimentación instaladas y su estado.

Catalyst-9600#show power detail

Power                                                       Fan States

Supply  Model No              Type  Capacity  Status        1     2

------  --------------------  ----  --------  ------------  -----------

PS1     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS4     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS Current Configuration Mode : none

PS Current Operating State    : none

Power supplies currently active    : 2

Power supplies currently available : 2

Power Summary          Maximum

(in Watts)    Used    Available

-------------  ------  ---------

System Power   2800    3940

-------------  ------  ---------

Total          2800    3940

Power Budget Mode           : Dual Sup

Power                                  Out of  In

Mod  Model No              State     Budget  Instantaneous  Peak  Reset   Reset

---  --------------------  --------  ------  -------------  ----  ------  -----

1    C9600-LC-24C          accepted  300     0              0     300     10

3    C9600-SUP-1           accepted  950     0              0     950     202

4    C9600-SUP-1           accepted  950     0              0     950     202

6    C9600-LC-48YL         accepted  300     0              0     300     10

FM1  C9606-FAN             accepted  300     --             --    300     --

---  --------------------  --------  ------  -------------  ----  ------  -----

Total allocated power:            2800

Total required power: 2800

Información Relacionada

- Siga la guía de configuración de administración del sistema para ver opciones de configuración detalladas.

- Soporte Técnico y Documentación - Cisco Systems