Contenido

Introducción

Uso

Lista de cables ópticos de 10 Gbps y 1 Gbps compatibles con el adaptador CVR-QSFP-SFP10G

Diseño y asignación de puertos del panel frontal de la tarjeta de línea C9600-LC-24C

Limitaciones con el adaptador CVR-QSFP-SFP10G

Introducción

Este documento describe el uso y las limitaciones del adaptador CVR-QSFP-SFP10G en la tarjeta de línea C9600-LC-24C en la plataforma Catalyst 9600.

Uso

La tarjeta de línea C9600-LC-24C de la plataforma C9600 cuenta con 24 puertos QSFP que admiten óptica de 40 G y 100 G. No puede insertar directamente una óptica de 10 Gbps o 1 Gbps basada en SFP en estos puertos.

El adaptador CVR-QSFP-SFP10G proporciona la flexibilidad necesaria para utilizar cables ópticos de 10 Gbps o 1 Gbps basados en SFP en puertos basados en QSFP de la tarjeta de línea C9600-LC-24C en la plataforma C9600.

Lista de cables ópticos de 10 Gbps y 1 Gbps compatibles con el adaptador CVR-QSFP-SFP10G

No Sl.

Óptica

Velocidad

Versión mínima de Cisco® IOS-XE

1

SFP-10G-SR

10 Gbps

16.11.1

2

SFP-10G-SR-S

10 Gbps

16.11.1

3

SFP-10G-LR

10 Gbps

16.11.1

4

SFP-10G-LR-S

10 Gbps

16.11.1

5

SFP-10G-ER

10 Gbps

16.11.1

6

SFP-10G-ER-S

10 Gbps

16.11.1

7

SFP-10G-ZR

10 Gbps

16.11.1

8

SFP-10G-ZR-S

10 Gbps

16.11.1

9

DWDM-SFP10G-xxx

10 Gbps

16.11.1

10

SFP-H10GB-CU1M

10 Gbps

16.11.1

11

SFP-H10GB-CU3M

10 Gbps

16.11.1

12

SFP-H10GB-CU5M

10 Gbps

16.11.1

13

GLC-T*

1 Gbps

16.12.2/17.1.1

14

GLC-TE*

1 Gbps

16.12.2/17.1.1

15

GLC-LH-SMD

1 Gbps

16.12.2/17.1.1

16

GLC-SX-MMD

1 Gbps

16.12.2/17.1.1

* El adaptador CVR-QSFP-SFP10G no admite velocidades de 10 Mbps y 100 Mbps con GLC-T y GLC-TE. Con el adaptador CVR-QSFP-SFP10G, sólo se admite velocidad de 1 Gbps con GLC-T y GLC-TE.

Diseño y asignación de puertos del panel frontal de la tarjeta de línea C9600-LC-24C

1/25

3/27

5/29

7/31

9/33

11/35

13/37

15/39

17/41

19/43

21/45

23/47

2/26

4/28

6/30

8/32

10/34

12/36

14/38

16/40

18/42

20/44

22/46

24/48

Estas CLI se pueden utilizar para verificar la asignación de puertos. Su modo de velocidad de funcionamiento y la numeración de puertos físicos a virtuales (para interfaces de 100 Gbps):

show hw-module subslot x/0 port-group mapping

show hw-module subslot x/0 port-group operation-mode

show hw-module subslot x/0 port-group port-numbered

donde x es el número de ranura de la tarjeta de línea.

Ejemplo de Salida:

Switch#show hw-module subslot 1/0 port-group mapping

Port Group Mapping for slot 1

Port-Group Ports

1 Fo1/0/1, Fo1/0/2, Hu1/0/25

2 Fo1/0/3, Fo1/0/4, Hu1/0/27

3 Fo1/0/5, Fo1/0/6, Hu1/0/29

4 Fo1/0/7, Fo1/0/8, Hu1/0/31

5 Fo1/0/9, Fo1/0/10, Hu1/0/33

6 Fo1/0/11, Fo1/0/12, Hu1/0/35

7 Fo1/0/13, Fo1/0/14, Hu1/0/37

8 Fo1/0/15, Fo1/0/16, Hu1/0/39

9 Fo1/0/17, Fo1/0/18, Hu1/0/41

10 Fo1/0/19, Fo1/0/20, Hu1/0/43

11 Fo1/0/21, Fo1/0/22, Hu1/0/45

12 Fo1/0/23, Fo1/0/24, Hu1/0/47

Switch#show hw-module subslot 1/0 port-group operation-mode

Module 1 port group 1 is running in HundredGigabitEthernet mode

Module 1 port group 2 is running in FortyGigabitEthernet mode

Module 1 port group 3 is running in FortyGigabitEthernet mode

Module 1 port group 4 is running in FortyGigabitEthernet mode

Module 1 port group 5 is running in FortyGigabitEthernet mode

Module 1 port group 6 is running in FortyGigabitEthernet mode

Module 1 port group 7 is running in HundredGigabitEthernet mode

Module 1 port group 8 is running in HundredGigabitEthernet mode

Module 1 port group 9 is running in HundredGigabitEthernet mode

Module 1 port group 10 is running in HundredGigabitEthernet mode

Module 1 port group 11 is running in HundredGigabitEthernet mode

Module 1 port group 12 is running in HundredGigabitEthernet mode

Switch#show hw-module subslot 1/0 port-group port-numbering

Physical Port Mapping for slot 1

Physical-Port Mapped-Port

1 Hu1/0/25

2 Hu1/0/26

3 Hu1/0/27

4 Hu1/0/28

5 Hu1/0/29

6 Hu1/0/30

7 Hu1/0/31

8 Hu1/0/32

9 Hu1/0/33

10 Hu1/0/34

11 Hu1/0/35

12 Hu1/0/36

13 Hu1/0/37

14 Hu1/0/38

15 Hu1/0/39

16 Hu1/0/40

17 Hu1/0/41

18 Hu1/0/42

19 Hu1/0/43

20 Hu1/0/44

21 Hu1/0/45

22 Hu1/0/46

23 Hu1/0/47

24 Hu1/0/48

Limitaciones con el adaptador CVR-QSFP-SFP10G

- El adaptador CVR-QSFP-SFP10G no se debe instalar en un puerto con número par en el que el puerto con número impar correspondiente tenga óptica de 40 GE. Por ejemplo, si el puerto 1 tiene óptica de 40 GE, no se debe instalar CVR-QSFP-SFP10G en el puerto 2.

- El adaptador CVR-QSFP-SFP10G no se debe instalar en ningún puerto que tenga una configuración de habilitación. Por ejemplo, el adaptador CVR-QSFP-SFP10G no se debe instalar en un puerto configurado para funcionar en 100 GE.