Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Descripción general de la topología

Estados de BFD

Escenarios

Escenario 1. flap-reason:bfd-delete

Situación hipotética 2. flap-reason:timeout

Situación hipotética 3. motivo de inestabilidad:na

Situación hipotética 4. flap-reason:remote-down

Información Relacionada

Introducción

Este documento describe los diversos motivos de inestabilidad de la detección de reenvío bidireccional (BFD) en un router Cisco vEdge.

Prerequisites

Requirements

Cisco recomienda que conozca la solución Cisco SDWAN.

Componentes Utilizados

Este documento se basa en el router Cisco Cloud vEdge que ejecuta 19.2.1.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Descripción general de la topología

Este documento no se limita a ninguna topología específica.

Direcciones IP y colores de algunos componentes importantes en este documento:

Componente

System-IP

IP VPN 0 / Color

IP VPN 0 / Color

VEDGE-1

10.13.13.13

192.168.1.4/mpls

192.168.2.4/mpls

VEDGE-2

10.15.15.15

192.168.1.8 / internet biz

192.168.2.8 / internet biz

vSmart

10.8.8.8

192.168.1.3 / valor predeterminado

NA

vManage

10.7.7.7

192.168.1.1 / valor predeterminado

NA

Estados de BFD

Los valores posibles de 'flap-reason' en un router Cisco vEdge son:

1. bfd-delete - BFD se desactiva porque el plano de control lo ha eliminado.

Se generan dos notificaciones cuando se elimina BFD. Uno para BFD down y otro cuando BFD se elimina.

2. timeout - No hay respuesta BFD desde el extremo remoto.

3. remote-down - El extremo remoto envió un paquete BFD que indica que ha pasado al estado inactivo.4.

4. na - no aplicable. Esto se establece cuando se crea la sesión BFD por primera vez y cuando se activa la sesión BFD.

Escenarios

Escenario 1. flap-reason:bfd-delete

Realice un salto de puerto en el router VEDGE-1 y reproduzca este escenario:

HUB-1# request port-hop color biz-internet

VEDGE-1# show log tail -f /var/log/tmplog/vdebug

local7.debug: Mar 20 09:29:21 VEDGE-1 VDAEMON[1136]: vdaemon_disable_my_tloc[1308]: %VDAEMON_DBG_EVENTS-1: Disabling tloc ge0_1.

local7.debug: Mar 20 09:29:21 VEDGE-1 VDAEMON[1136]: vdaemon_send_tloc_info[8282]: %VDAEMON_DBG_MISC-1: Sending TLOC: ifname:ge0_1 color:biz-internet spi:1499 smarts:1 manages:1 state:DOWN LR encap: 0 LR hold time : 7000 Pairwise-Keys Disabled  key-id 0

local7.info: Mar 20 09:29:21 VEDGE-1 VDAEMON[1136]: %Viptela-VEDGE-1-vdaemon-6-INFO-1400002: Notification: 3/20/2020 9:29:21 control-connection-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 personality:vEdge peer-type:vsmart peer-system-ip:10.8.8.8 peer-vmanage-system-ip:0.0.0.0 public-ip:192.168.1.3 public-port:12946 src-color:biz-internet remote-color:default uptime:"0:00:35:57" new-state:down

local7.info: Mar 20 09:29:21 VEDGE-1 VDAEMON[1136]: %Viptela-VEDGE-1-vdaemon-6-INFO-1400002: Notification: 3/20/2020 9:29:21 control-connection-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 personality:vEdge peer-type:vmanage peer-system-ip:10.7.7.7 peer-vmanage-system-ip:0.0.0.0 public-ip:192.168.1.1 public-port:12946 src-color:biz-internet remote-color:mpls uptime:"0:01:56:34" new-state:down

local7.info: Mar 20 09:29:21 VEDGE-1 FTMD[1126]: %Viptela-VEDGE-1-ftmd-6-INFO-1400002: Notification: 3/20/2020 9:29:21 bfd-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 src-ip:192.168.2.4 dst-ip:192.168.1.6 proto:ipsec src-port:12406 dst-port:12347 local-system-ip:10.13.13.13 local-color:"biz-internet" remote-system-ip:10.14.14.14 remote-color:"mpls" new-state:down deleted:false flap-reason:bfd-deleted

Verifique BFD y controle el tiempo de actividad de la conexión en Internet biz:

VEDGE-1# show control connections | t

LOCAL    LOCAL                                                                                                                       CFG     V

PEER     SITE  DOMAIN  PRIVATE  PRIVATE  PUBLIC    PUBLIC  SYSTEM                                         PRIVATE   PRIVATE                     CONTROLLER  SYSTEM  ORG   BEHIND

INSTANCE  TYPE     ID    ID      IP       PORT     IP        PORT    IP       PROTOCOL  LOCAL COLOR   REMOTE COLOR  IP        PORT     STATE  UPTIME      GROUP ID    IP      NAME  PROXY

--------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

0         vsmart   8     1       192.168.1.4  12366    192.168.1.3   12946   10.8.8.8  dtls      mpls          default       192.168.1.3   12946    up     0:00:03:47  0           -       -     No

0         vsmart   8     1       192.168.2.4  12426    192.168.1.3   12946   10.8.8.8  dtls      biz-internet  default       192.168.1.3   12946    up     0:00:01:52  0           -       -     No

0         vbond    0     0       192.168.1.4  12366    192.168.1.10  12346   0.0.0.0  dtls       mpls          mpls          192.168.1.10  12346    up     0:00:03:47  0           -       -     -

0         vbond    0     0       192.168.2.4  12426    192.168.1.10  12346   0.0.0.0  dtls       biz-internet  biz-internet  192.168.1.10  12346    up     0:00:00:31  0           -       -     -

0         vmanage  8     0       192.168.2.4  12426    192.168.1.1   12946   10.7.7.7  dtls      biz-internet  mpls          192.168.1.1   12946    up     0:00:01:52  0           -       -     No

VEDGE-1# sh bfd sess | t

SRC    DST                 SITE                                     DETECT      TX

SRC IP   DST IP    PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR         STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

---------------------------------------------------------------------------------------------------------------------------------------------

192.168.1.4  192.168.1.6   ipsec  12366  12347  10.14.14.14  14    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.2.6   ipsec  12366  12387  10.14.14.14  14    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.1.6   ipsec  12426  12347  10.14.14.14  14    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.2.6   ipsec  12426  12387  10.14.14.14  14    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

192.168.1.4  192.168.1.8   ipsec  12366  12406  10.15.15.15  15    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.2.8   ipsec  12366  12366  10.15.15.15  15    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.1.8   ipsec  12426  12406  10.15.15.15  15    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.2.8   ipsec  12426  12366  10.15.15.15  15    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

192.168.1.4  192.168.1.11  ipsec  12366  12346  10.16.16.16  16    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.2.11  ipsec  12366  12426  10.16.16.16  16    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.1.11  ipsec  12426  12346  10.16.16.16  16    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.2.11  ipsec  12426  12426  10.16.16.16  16    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

192.168.1.4  192.168.1.12  ipsec  12366  12426  10.17.17.17  17    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.2.12  ipsec  12366  12406  10.17.17.17  17    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.1.12  ipsec  12426  12426  10.17.17.17  17    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.2.12  ipsec  12426  12406  10.17.17.17  17    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

192.168.1.4  192.168.1.14  ipsec  12366  12426  10.18.18.18  18    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.2.14  ipsec  12366  12426  10.18.18.18  18    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.1.14  ipsec  12426  12426  10.18.18.18  18    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.2.14  ipsec  12426  12426  10.18.18.18  18    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

192.168.1.4  192.168.3.40  ipsec  12366  12366  10.19.19.19  19    mpls          mpls          up     7           1000      0:00:03:48  0

192.168.1.4  192.168.4.40  ipsec  12366  12366  10.19.19.19  19    mpls          biz-internet  up     7           1000      0:00:03:48  0

192.168.2.4  192.168.3.40  ipsec  12426  12366  10.19.19.19  19    biz-internet  mpls          up     7           1000      0:00:01:55  0

192.168.2.4  192.168.4.40  ipsec  12426  12366  10.19.19.19  19    biz-internet  biz-internet  up     7           1000      0:00:01:55  0

También puede borrar una conexión de control en VEDGE-1 para probar este escenario (que también inhabilita un TLOC):

local1.info: Mar 20 09:34:20 VEDGE-1 confd[897]: audit user: admin/60155 CLI 'clear control connections'

local7.info: Mar 20 09:34:20 VEDGE-1 VDAEMON[1136]: %Viptela-VEDGE-1-vdaemon-6-INFO-1400002: Notification: 3/20/2020 9:34:20 control-connection-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 personality:vEdge peer-type:vsmart peer-system-ip:10.8.8.8 peer-vmanage-system-ip:0.0.0.0 public-ip:192.168.1.3 public-port:12946 src-color:biz-internet remote-color:default uptime:"0:00:00:51" new-state:down

local7.info: Mar 20 09:34:20 VEDGE-1 VDAEMON[1136]: %Viptela-VEDGE-1-vdaemon-6-INFO-1400002: Notification: 3/20/2020 9:34:20 control-connection-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 personality:vEdge peer-type:vmanage peer-system-ip:10.7.7.7 peer-vmanage-system-ip:0.0.0.0 public-ip:192.168.1.1 public-port:12946 src-color:biz-internet remote-color:mpls uptime:"0:00:01:09" new-state:down

local7.info: Mar 20 09:34:20 VEDGE-1 FTMD[1126]: %Viptela-VEDGE-1-ftmd-6-INFO-1400002: Notification: 3/20/2020 9:34:20 bfd-state-change severity-level:major host-name:"VEDGE-1" system-ip:10.13.13.13 src-ip:192.168.2.4 dst-ip:192.168.1.6 proto:ipsec src-port:12426 dst-port:12347 local-system-ip:10.13.13.13 local-color:"biz-internet" remote-system-ip:10.14.14.14 remote-color:"mpls" new-state:down deleted:false flap-reason:bfd-deleted

Verifique el tiempo de actividad en mpls y colores biz-internet esta vez:

VEDGE-1# sh bfd sess | t

SRC    DST                 SITE                                     DETECT      TX

SRC IP   DST IP    PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR         STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

---------------------------------------------------------------------------------------------------------------------------------------------

192.168.1.4  192.168.1.6   ipsec  12366  12347  10.14.14.14  14    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.2.6   ipsec  12366  12387  10.14.14.14  14    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.1.6   ipsec  12426  12347  10.14.14.14  14    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.2.6   ipsec  12426  12387  10.14.14.14  14    biz-internet  biz-internet  up     7           1000      0:00:01:55  2

192.168.1.4  192.168.1.8   ipsec  12366  12406  10.15.15.15  15    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.2.8   ipsec  12366  12366  10.15.15.15  15    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.1.8   ipsec  12426  12406  10.15.15.15  15    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.2.8   ipsec  12426  12366  10.15.15.15  15    biz-internet  biz-internet  up     7           1000      0:00:01:55  2

192.168.1.4  192.168.1.11  ipsec  12366  12346  10.16.16.16  16    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.2.11  ipsec  12366  12426  10.16.16.16  16    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.1.11  ipsec  12426  12346  10.16.16.16  16    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.2.11  ipsec  12426  12426  10.16.16.16  16    biz-internet  biz-internet  up     7           1000      0:00:01:55  2

192.168.1.4  192.168.1.12  ipsec  12366  12426  10.17.17.17  17    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.2.12  ipsec  12366  12406  10.17.17.17  17    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.1.12  ipsec  12426  12426  10.17.17.17  17    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.2.12  ipsec  12426  12406  10.17.17.17  17    biz-internet  biz-internet  up     7           1000      0:00:01:55  2

192.168.1.4  192.168.1.14  ipsec  12366  12426  10.18.18.18  18    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.2.14  ipsec  12366  12426  10.18.18.18  18    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.1.14  ipsec  12426  12426  10.18.18.18  18    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.2.14  ipsec  12426  12426  10.18.18.18  18    biz-internet  biz-internet  up     7           1000      0:00:01:55  2

192.168.1.4  192.168.3.40  ipsec  12366  12366  10.19.19.19  19    mpls          mpls          up     7           1000      0:00:01:37  2

192.168.1.4  192.168.4.40  ipsec  12366  12366  10.19.19.19  19    mpls          biz-internet  up     7           1000      0:00:01:37  2

192.168.2.4  192.168.3.40  ipsec  12426  12366  10.19.19.19  19    biz-internet  mpls          up     7           1000      0:00:01:55  2

192.168.2.4  192.168.4.40  ipsec  12426  12366  10.19.19.19  19    biz-internet  biz-internet  up     7           1000      0:00:01:54  3

VEDGE-1# show control connections | t

LOCAL    LOCAL                                                                                                                       CFG     V

PEER     SITE  DOMAIN  PRIVATE  PRIVATE  PUBLIC    PUBLIC  SYSTEM                                         PRIVATE   PRIVATE                     CONTROLLER  SYSTEM  ORG   BEHIND

INSTANCE  TYPE     ID    ID      IP       PORT     IP        PORT    IP       PROTOCOL  LOCAL COLOR   REMOTE COLOR  IP        PORT     STATE  UPTIME      GROUP ID    IP      NAME  PROXY

--------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

0         vsmart   8     1       192.168.1.4  12366    192.168.1.3   12946   10.8.8.8  dtls     mpls          default       192.168.1.3   12946    up     0:00:01:41  0           -       -     No

0         vsmart   8     1       192.168.2.4  12426    192.168.1.3   12946   10.8.8.8  dtls     biz-internet  default       192.168.1.3   12946    up     0:00:01:59  0           -       -     No

0         vbond    0     0       192.168.1.4  12366    192.168.1.10  12346   0.0.0.0   dtls     mpls          mpls          192.168.1.10  12346    up     0:00:01:42  0           -       -     -

0         vbond    0     0       192.168.2.4  12426    192.168.1.10  12346   0.0.0.0   dtls     biz-internet  biz-internet  192.168.1.10  12346    up     0:00:00:01  0           -       -     -

0         vmanage  8     0       192.168.2.4  12426    192.168.1.1   12946   10.7.7.7  dtls     biz-internet  mpls          192.168.1.1   12946    up     0:00:01:59  0           -       -     No

Situación hipotética 2. flap-reason:timeout

Puede reproducir este escenario desactivando un TLOC (biz-internet en este caso) en VEDGE-1 cerrando una interfaz en la parte inferior.

Estado BFD en VEDGE-2 antes de inhabilitar un TLOC en el lado VEDGE-1:

VEDGE-2# show bfd sessions remote-color mpls system-ip 10.13.13.13 | t

SRC    DST                 SITE                              DETECT      TX

SRC IP   DST IP   PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR  STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

-------------------------------------------------------------------------------------------------------------------------------------

192.168.1.8  192.168.1.4  ipsec  12406  12366  10.13.13.13  13    mpls          mpls   up     7           1000      0:00:03:15  2

192.168.2.8  192.168.1.4  ipsec  12366  12366  10.13.13.13  13    biz-internet  mpls   up     7           1000      0:00:03:15  2

Inicia sesión en VEDGE-2 después de reproducir el problema:

local7.info: Mar 20 10:00:04 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 10:0:4 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.1.8 dst-ip:192.168.2.14 proto:ipsec src-port:12406 dst-port:12426 local-system-ip:10.15.15.15 local-color:"mpls" remote-system-ip:10.18.18.18 remote-color:"biz-internet" new-state:down deleted:false flap-reason:timeout

local7.info: Mar 20 10:00:05 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 10:0:4 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.2.8 dst-ip:192.168.4.40 proto:ipsec src-port:12386 dst-port:12366 local-system-ip:10.15.15.15 local-color:"biz-internet" remote-system-ip:10.19.19.19 remote-color:"biz-internet" new-state:down deleted:false flap-reason:timeout

VEDGE-2# show bfd sessions remote-color mpls system-ip 10.13.13.13 | t

SRC    DST                 SITE                              DETECT      TX

SRC IP   DST IP   PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR  STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

-------------------------------------------------------------------------------------------------------------------------------------

192.168.1.8  192.168.1.4  ipsec  12406  12366  10.13.13.13  13    mpls          mpls   up     7           1000      0:00:21:56  3

192.168.2.8  192.168.1.4  ipsec  12386  12366  10.13.13.13  13    biz-internet  mpls   down   7           1000      NA          1

Situación hipotética 3. motivo de inestabilidad:na

Puede reproducir este escenario realizando un no shut en la interfaz subyacente desde el escenario anterior.

local7.info: Mar 20 10:01:20 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 10:1:18 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.2.8 dst-ip:192.168.1.11 proto:ipsec src-port:12386 dst-port:12346 local-system-ip:10.15.15.15 local-color:"biz-internet" remote-system-ip:10.16.16.16 remote-color:"mpls" new-state:up deleted:false flap-reason:na

local7.info: Mar 20 10:01:20 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 10:1:18 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.1.8 dst-ip:192.168.2.11 proto:ipsec src-port:12406 dst-port:12426 local-system-ip:10.15.15.15 local-color:"mpls" remote-system-ip:10.16.16.16 remote-color:"biz-internet" new-state:up deleted:false flap-reason:na

VEDGE-2# show bfd sessions remote-color mpls system-ip 10.13.13.13 | t

SRC    DST                 SITE                              DETECT      TX

SRC IP   DST IP   PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR  STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

-------------------------------------------------------------------------------------------------------------------------------------

192.168.1.8  192.168.1.4  ipsec  12406  12366  10.13.13.13  13    mpls          mpls   up     7           1000      0:00:22:32  3

192.168.2.8  192.168.1.4  ipsec  12386  12366  10.13.13.13  13    biz-internet  mpls   up     7           1000      0:00:00:04  1

Situación hipotética 4. flap-reason:remote-down

Puede reproducir este escenario con el comando no control-connections en VEDGE-1 en un color específico (mpls en este caso).

Registros en VEDGE-1:

vpn 0

interface ge0/0

ip address 192.168.1.4/24

tunnel-interface

encapsulation ipsec

color mpls

no control-connections

VEDGE-1# show control connections | t

LOCAL    LOCAL                                                                                                                       CFG     V

PEER     SITE  DOMAIN  PRIVATE  PRIVATE  PUBLIC    PUBLIC  SYSTEM                                         PRIVATE   PRIVATE                     CONTROLLER  SYSTEM  ORG   BEHIND

INSTANCE  TYPE     ID    ID      IP       PORT     IP        PORT    IP       PROTOCOL  LOCAL COLOR   REMOTE COLOR  IP        PORT     STATE  UPTIME      GROUP ID    IP      NAME  PROXY

--------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

0         vsmart   8     1       192.168.2.4  12426    192.168.1.3   12946   10.8.8.8  dtls      biz-internet  default       192.168.1.3   12946    up     0:00:17:54  0           -       -     No

0         vbond    0     0       192.168.2.4  12426    192.168.1.10  12346   0.0.0.0   dtls      biz-internet  biz-internet  192.168.1.10  12346    up     0:00:02:37  0           -       -     -

0         vmanage  8     0       192.168.2.4  12426    192.168.1.1   12946   10.7.7.7  dtls      biz-internet  mpls          192.168.1.1   12946    up     0:00:22:44  0           -       -     No

Registros en VEDGE-2:

local7.info: Mar 20 11:36:40 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 11:36:40 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.1.8 dst-ip:192.168.1.4 proto:ipsec src-port:12406 dst-port:12406 local-system-ip:10.15.15.15 local-color:"mpls" remote-system-ip:10.13.13.13 remote-color:"mpls" new-state:down deleted:false flap-reason:remote-down

local7.info: Mar 20 11:36:40 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 11:36:40 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.2.8 dst-ip:192.168.1.4 proto:ipsec src-port:12386 dst-port:12406 local-system-ip:10.15.15.15 local-color:"biz-internet" remote-system-ip:10.13.13.13 remote-color:"mpls" new-state:down deleted:false flap-reason:remote-down

local7.info: Mar 20 11:36:41 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 11:36:41 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.1.8 dst-ip:192.168.1.4 proto:ipsec src-port:12406 dst-port:12406 local-system-ip:10.15.15.15 local-color:"mpls" remote-system-ip:10.13.13.13 remote-color:"mpls" new-state:up deleted:false flap-reason:na

local7.info: Mar 20 11:36:41 VEDGE-2 FTMD[1119]: %Viptela-VEDGE-2-ftmd-6-INFO-1400002: Notification: 3/20/2020 11:36:41 bfd-state-change severity-level:major host-name:"VEDGE-2" system-ip:10.15.15.15 src-ip:192.168.2.8 dst-ip:192.168.1.4 proto:ipsec src-port:12386 dst-port:12406 local-system-ip:10.15.15.15 local-color:"biz-internet" remote-system-ip:10.13.13.13 remote-color:"mpls" new-state:up deleted:false flap-reason:na

VEDGE-2# show bfd sessions remote-color mpls system-ip 10.13.13.13 | t

SRC    DST                 SITE                              DETECT      TX

SRC IP   DST IP   PROTO  PORT   PORT   SYSTEM IP    ID    LOCAL COLOR   COLOR  STATE  MULTIPLIER  INTERVAL  UPTIME      TRANSITIONS

-------------------------------------------------------------------------------------------------------------------------------------

192.168.1.8  192.168.1.4  ipsec  12406  12406  10.13.13.13  13    mpls          mpls   up     7           1000      0:00:05:27  16

192.168.2.8  192.168.1.4  ipsec  12386  12406  10.13.13.13  13    biz-internet  mpls   up     7           1000      0:00:05:27  9

Información Relacionada

- Resolución de Problemas de Detección de Reenvío Bidireccional y Conexiones del Plano de Datos

- Soporte Técnico y Documentación - Cisco Systems