Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Determine la versión actual del firmware en el router

Actualización del firmware VDSL

Verificación

Troubleshoot

Introducción

Este documento describe cómo actualizar el firmware de la línea de suscriptor digital de velocidad de bits muy alta (VDSL) en el router Cisco serie 800.

Prerequisites

Requirements

Cisco recomienda que compruebe las Release Notes de su versión de firmware antes de completar este procedimiento de actualización.

Componentes Utilizados

La información de este documento se basa en un router Cisco 897VAB. Sin embargo, este documento no se limita a versiones específicas de software y hardware.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Nota: Use la Command Lookup Tool (clientes registrados solamente) para obtener más información sobre los comandos usados en esta sección.

Determine la versión actual del firmware en el router

Ingrese el comando show controller vdsl para determinar la versión del firmware actualmente en su Cisco 800 Series Router. Busque las entradas de salida que se muestran en negrita en este ejemplo de resultado:

Router# show controller vdsl 0

Controller VDSL 0 is UP

Daemon Status: Up

XTU-R (DS) XTU-C (US)

Chip Vendor ID: 'BDCM' 'BDCM'

Chip Vendor Specific: 0x0000 0xA31E

Chip Vendor Country: 0xB500 0xB500

Modem Vendor ID: 'CSCO' ' '

Modem Vendor Specific: 0x4602 0x0000

Modem Vendor Country: 0xB500 0x0000

Serial Number Near: FHK144672GQ 886VA-K 15.2(4)M

Serial Number Far:

Modem Version Near: 15.2(4)M

Modem Version Far: 0xa31e

Modem Status: TC Sync (Showtime!)

DSL Config Mode: AUTO

Trained Mode: G.992.5 (ADSL2+) Annex J

TC Mode: ATM

Selftest Result: 0x00

DELT configuration: disabled

DELT state: not running

Trellis: ON ON

SRA: disabled disabled

SRA count: 0 0

Bit swap: enabled enabled

Bit swap count: 0 1

Line Attenuation: 0.0 dB 4.9 dB

Signal Attenuation: 3.3 dB 4.4 dB

Noise Margin: 9.8 dB 6.3 dB

Attainable Rate: 26332 kbits/s 2952 kbits/s

Actual Power: 7.1 dBm 11.9 dBm

Total FECC: 0 0

Total ES: 9721 42

Total SES: 9714 4

Total LOSS: 1086 0

Total UAS: 2670101 2670101

Total LPRS: 0 0

Total LOFS: 8342 0

Total LOLS: 0 0

Full inits: 2511

Failed full inits: 815

Short inits: 174

Failed short inits: 1353

Firmware Source File Name (version)

-------- --------- ------------------

VDSL user config flash:VA_A_39h_B_38h3_24h_j.bin (10)

Modem FW Version: 140305_1531-4.02L.03.B2pvC038h3_J.d24h

Modem PHY Version: B2pvC038h3_J.d24h

Vendor Version: Bpv38h3.24h 68

DS Channel1 DS Channel0 US Channel1 US Channel0

Speed (kbps): 0 25346 0 2832

SRA Previous Speed: 0 0 0 0

Previous Speed: 0 25866 0 1264

Total Cells: 0 35481077 0 3942410

User Cells: 0 0 0 0

Reed-Solomon EC: 0 0 0 0

CRC Errors: 0 220155 0 0

Header Errors: 0 0 0 0

Interleave (ms): 0.00 0.08 0.00 11.11

Actual INP: 0.00 0.00 0.00 0.69

Training Log: Stopped

Training Log Filename: flash:vdsllog.bin

Nota: El firmware predeterminado se coloca en flash:/firmware/<nombre de archivo>. Si no se da ninguna trayectoria de firmware bajo el controlador VDSL y se reinicia el controlador VDSL (shut/ no shut) o se recarga el router; el controlador VDSL toma este firmware predeterminado. No elimine el firmware base de flash:/firmware/<filename>.

Actualización del firmware VDSL

1. Descargue el nuevo firmware VDSL2 del Centro de Software de Cisco.com.

2. Elija Routers > Routers de Sucursales > Routers Cisco Serie 800 > Router de Servicios Integrados Cisco 887V > Firmware DSL (VDSL) Muy Alto.

3. Copie el firmware en una ubicación designada. Por ejemplo, router flash o un servidor TFTP.
Este ejemplo muestra cómo copiar el firmware VDSL2 de un servidor TFTP en 10.76.76.160 a la memoria flash del router:

Router#copy tftp flash:

Address or name of remote host []? 10.76.76.160 [Addres of the TFTP Server]

Source filename []? vdsl_bond.bin_39p1 [Name of the downloaded VDSL Firmware]

Destination filename [vdsl_bond.bin_39p1]? [Name of the VDSL firmware on the router flash]

Alternativamente, puede ingresar el comando copy ftp://usernamepassword@TFTP-Server-IPAddress flash:VDSL-Firmware-Name. Este resultado proporciona un ejemplo:

Router#copy ftp://test:test@10.76.76.160 flash:vdsl_bond.bin_39p1

Source filename []? vdsl_bond.bin_39p1

Destination filename [vdsl_bond.bin_39p1]?

Accessing ftp://test:test@10.76.76.160/vdsl_bond.bin_39p1...

Loading vdsl_bond.bin_39p1 !!!!!!!!!!!

[OK - 2660422/4096 bytes]

4. Configure el router para cargar el nuevo firmware VDSL2 desde una ubicación designada.
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#firmware filename ?

archive: Download fw file name

cns: Download fw file name

flash: Download fw file name

ftp: Download fw file name

http: Download fw file name

https: Download fw file name

null: Download fw file name

nvram: Download fw file name

rcp: Download fw file name

scp: Download fw file name

system: Download fw file name

tar: Download fw file name

tftp: Download fw file name

tmpsys: Download fw file name

xmodem: Download fw file name

ymodem: Download fw file name

Router(config-controller)#firmware filename flash:vdsl_bond.bin_39p1

5. Reinicie la interfaz del controlador para que el nuevo firmware afecte:
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#shut

Router(config-controller)#no shut

Router(config-controller)#end

Verificación

Use esta sección para confirmar que su configuración funciona correctamente.

La herramienta de interpretación de información de salida (disponible para clientes registrados únicamente) admite ciertos comandos show. Utilice la herramienta para ver una análisis de información de salida del comando show.

Router#show controller vdsl 0

Controller VDSL 0 is DOWN

Daemon Status:           Establishing Link

XTU-R (DS)              XTU-C (US)

Chip Vendor ID:         'BDCM'                   'BDCM'

Chip Vendor Specific:   0x0000                   0xA39A

Chip Vendor Country:    0xB500                   0xB500

Modem Vendor ID:        'CSCO'                   'BDCM'

Modem Vendor Specific:  0x4602                   0xA39A

Modem Vendor Country:   0xB500                   0xB500

Serial Number Near:    FGL18212393 C897VAB- 15.4(201503

Serial Number Far:

Modem Version Near:    15.4(20150325:160033) [ragvasud

Modem Version Far:     0xa39a

Modem Status:          Unknown

DSL Config Mode:         ADSL2+

Trained Mode:

TC Mode:                 UNKNOWN

Selftest Result:         0x00

DELT configuration:      disabled

DELT state:              not running

Bonded Status:           PTM Bonded<

Number of Ports:         2

Port ID:                 0               1

Link Status:             DOWN            DOWN

Aggr US Rate(kbps):      0

Aggr DS Rate(kbps):      0

Full inits:             3

Failed full inits:      14

Short inits:            2

Failed short inits:     2

Firmware        Source          File Name

--------        ------          ----------

VDSL            user config     flash:vdsl_bond.bin_39p1

Modem FW  Version:      4.14L.04

Modem PHY Version:      A2pv6F039p1.d24m

Line:

XTU-R (DS)              XTU-C (US)

Trellis:                 OFF                      OFF

SRA:                     disabled                disabled

SRA count:              0                       0

Bit swap:                enabled                 enabled

Training Log :  Stopped

Training Log Filename : flash:vdsllog.bin

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.