Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Antecedentes

Configurar

Diagrama de la red

Configuraciones

Comandos útiles

Salida de comando de muestra

Catalyst Switch

Router Cisco

Información Relacionada

Introducción

Este documento describe cómo estructurar las configuraciones para configurar el ruteo entre VLAN con el uso de un router externo de Cisco.

Prerequisites

Requirements

Cisco le recomienda que tenga conocimiento acerca de este tema:

- Conocimientos básicos sobre routing

Componentes Utilizados

La información que contiene este documento se basa en estas versiones de software:

- Switch Catalyst Cisco IOS® 15.2E

- Router Cisco Cisco IOS XE 17.3

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Convenciones

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Antecedentes

Este documento describe las configuraciones para configurar el ruteo entre VLAN con el uso de un router externo de Cisco y lo explica con configuraciones de ejemplo en el trunking 802.1Q; los resultados de cada comando se muestran a medida que se ejecutan. En los escenarios presentados en este documento se pueden utilizar diferentes routers de la serie Cisco y cualquier switch Catalyst para obtener los mismos resultados.

Trunking es una forma de llevar el tráfico de varias VLAN a través de un link punto a punto entre dos dispositivos. Al principio, se implementaba el enlace troncal de Ethernet de dos maneras:

- Protocolo propiedad de Cisco InterSwitch Link (ISL)

- Norma del Instituto de Ingenieros Eléctricos y Electrónicos (IEEE) 802.1Q

Un enlace troncal se crea y se utiliza para transportar tráfico desde dos o más VLAN, por ejemplo, VLAN1 y VLAN2 a través de un único enlace entre switches Catalyst o router Cisco.

El router de Cisco se utiliza para realizar el ruteo entre VLAN-X y VLAN-Y. Esta configuración puede ser útil cuando los switches de la serie Catalyst son de Capa 2 (L2) solamente y no pueden rutear o comunicarse entre las VLAN.

Para 802.1Q trunking, no se etiqueta una VLAN. Esta VLAN se denomina VLAN nativa. La VLAN nativa se usa para tráfico sin etiquetas cuando el puerto está en modo 802.1Q trunking. Al configurar el enlace troncal 802.1Q, recuerde que la VLAN nativa debe configurarse de la misma manera en cada lado del enlace troncal. Un error muy común es que no se haga coincidir las VLAN de origen al configurar el enlace troncal 802.1Q entre el router y el conmutador.

En esta configuración de ejemplo, VLAN 1 es la VLAN nativa, de forma predeterminada, en el router Cisco y en el switch Catalyst. Según las necesidades de la red, puede utilizar una VLAN nativa distinta de la VLAN predeterminada, VLAN1. Los comandos para cambiar la VLAN nativa en estos dispositivos se han mencionado en la sección   Configuraciones de este documento.

Las configuraciones de ejemplo presentadas en este documento se pueden utilizar en diferentes series de routers de Cisco que admiten enlaces troncales de VLAN 802.1Q.

Nota: La versión mínima admitida no necesariamente puede ser la versión recomendada. Para determinar la mejor versión de mantenimiento para su producto Cisco, busque los errores enumerados por componente del producto en el Kit de herramientas para errores.

Nota: Solo los usuarios registrados de Cisco tienen acceso a la información, herramientas y documentos internos.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Diagrama de la red

Este documento utiliza la configuración de red que se muestra en el siguiente diagrama.

Diagrama de la red

Configuraciones

Switch Catalyst L2

!-- (Optional) Set the IP address and default gateway for VLAN1 for management purposes.

L2_Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

L2_Switch(config)#interface vlan 1

L2_Switch(config-if)#ip address 10.10.0.2 255.255.255.0

L2_Switch(config-if)#no ip directed-broadcast

L2_Switch(config-if)#no ip route-cache

L2_Switch(config-if)#exit

L2_Switch(config-if)#ip default-gateway 10.10.0.1

!-- (Optional) Set the VTP Mode. In our example, we have set the mode to be transparent.

!-- Depending on your network, set the VTP Mode accordingly.

L2_Switch(config)#vtp mode transparent

Setting device to VTP Transparent mode for VLANS.

L2_Switch(config)#

!-- Adding VLAN10 and VLAN11.

L2_Switch(config)#vlan 10-11

L2_Switch(config-vlan)#exit

L2_Switch(config)#

!-- Enable trunking on the interface GigabitEthernet 0/2.

!-- Enter the trunking encapsulation as dot1q.

L2_Switch(config)#interface gigabitEthernet 0/2

L2_Switch(config-if)#switchport trunk encapsulation dot1q

L2_Switch(config-if)#switchport mode trunk

!-- In case of dot1q, you need to make sure that the native VLAN matches across the link.

!-- On Catalyst Switches, by default, the native VLAN is 1.

!-- It is very important that you change the native VLAN on the router accordingly.

!-- The following set of commands can place on the interfaces connecting to the workstations.

L2_Switch(config)#interface gigabitEthernet 0/0

L2_Switch(config-if)#switchport mode access

L2_Switch(config-if)#switchport access vlan 11

L2_Switch(config-if)#exit

L2_Switch(config)#interface gigabitEthernet 0/1

L2_Switch(config-if)#switchport mode access

L2_Switch(config-if)#switchport access vlan 10

L2_Switch(config-if)#exit

!-- Remember to save the configuration.

L2_Switch#write memory

Building configuration...

Router

Nota: Las capturas de pantalla siguientes muestran los comandos introducidos en el router de Cisco. Los comentarios entre los comandos están agregados en cursiva para explicar determinados pasos y comandos.

Router#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

!-- Select GigabitEthernet 1 for the trunk configuration.

!-- No Layer 3 (L3) configuration is done here.

Router(config)#interface GigabitEthernet 1

Router(config-if)#no shut

Router(config-if)#exit

!-- Enable dot1q on the sub-interface one for each VLAN.

!-- Configure L3 information on the sub-interface for each gateway.

Router(config)#interface gigabitEthernet 1.10

Router(config-subif)#encapsulation dot1Q 10

Router(config-subif)#ip address 10.10.10.1 255.255.255.0

Router(config-subif)#exit

Router(config)#interface gigabitEthernet 1.11

Router(config-subif)#encapsulation dot1Q 11

Router(config-subif)#ip address 10.10.11.1 255.255.255.0

Router(config-subif)#exit

!-- (Optional) For the management VLAN 1 make sure that the native VLAN matches across the link.

!-- On the switch, by default, the native VLAN is 1.

!-- On the router, configure VLAN1 as the native VLAN.

Router(config)#interface gigabitEthernet 1.1

Router(config-subif)#encapsulation dot1Q 1 native

Router(config-subif)#ip address 10.10.0.1 255.255.255.0

Router(config-subif)#end

!-- Remember to save the configuration.

Router#write memory

Building configuration...

[OK]

Router#

Nota: Para que esta configuración funcione y sea posible hacer ping satisfactoriamente entre la estación de trabajo1 y la estación de trabajo2, necesita asegurarse que las gateways predeterminadas en las estaciones de trabajo estén configuradas correctamente. Para la estación de trabajo 1, la puerta de enlace predeterminada debe ser 10.10.11.1 y, para la estación de trabajo 2, 10.10.10.1.

Comandos útiles

Esta sección lo ayuda a confirmar que su configuración funciona como se espera.

En el switch Catalyst, puede utilizar los siguientes comandos para ayudar con la verificación:

- show interface {FastEthernet | GigabitEthernet} <module/port> switchport}

- show vlan

- show vtp status

En el router de Cisco, utilice los siguientes comandos:

- show ip route

- show interface

Salida de comando de muestra

Catalyst Switch

El siguiente comando se utiliza para verificar el estado administrativo y operativo del puerto. También se usa para garantizar que la VLAN nativa concuerde en ambos lados del trunk. La VLAN nativa se usa para tráfico sin etiquetas cuando el puerto está en modo 802.1Q trunking.

Para el enlace troncal 802.1Q, el comando de resultado muestra:

L2_Switch#show interfaces gigabitEthernet 0/2 switchport

Name: Gi0/2

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk associations: none

Administrative private-vlan trunk mappings: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Appliance trust: none

El siguiente comando se utiliza para verificar que las interfaces (puertos) pertenecen a la VLAN correcta. En este ejemplo, la interfaz Gi0/1 pertenece a VLAN10 y Gi0/0 pertenece a VLAN11. El resto son miembros de VLAN1.

L2_Switch#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi0/3

10 VLAN0010 active Gi0/1 11 VLAN0011 active Gi0/0

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

L2_Switch#

El siguiente comando se utiliza para verificar la configuración del VLAN trunking protocol (VTP) en el switch. En este ejemplo, se utiliza el modo transparente. El modo VTP correcto depende de la topología de su red.

L2_Switch#show vtp status

VTP Version capable             : 1 to 3

VTP version running             : 1

VTP Domain Name                 :

VTP Pruning Mode                : Disabled

VTP Traps Generation            : Disabled

Device ID                       : 5254.0000.8000

Configuration last modified by 0.0.0.0 at 3-1-24 15:21:18

Feature VLAN:

--------------

VTP Operating Mode : Transparent

Maximum VLANs supported locally   : 1005

Number of existing VLANs          : 7

Configuration Revision            : 0

MD5 digest                        : 0x9F 0x7D 0x8D 0x10 0xB1 0x22 0x2F 0xE7

0x29 0x77 0x42 0xA7 0x95 0xE7 0x68 0x1C

Router Cisco

El siguiente comando indica a la información de ruteo L3 acerca de las subinterfaces configuradas en el router.

Router#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

& - replicated local route overrides by connected

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 6 subnets, 2 masks

C        10.10.0.0/24 is directly connected, GigabitEthernet1.1

L        10.10.0.1/32 is directly connected, GigabitEthernet1.1

C 10.10.10.0/24 is directly connected, GigabitEthernet1.10 L 10.10.10.1/32 is directly connected, GigabitEthernet1.10 C 10.10.11.0/24 is directly connected, GigabitEthernet1.11 L 10.10.11.1/32 is directly connected, GigabitEthernet1.11

El siguiente comando se utiliza para verificar el estado administrativo y operativo de la interfaz. Para el estado de la interfaz del router, el comando de resultado muestra:

Router#show interfaces

GigabitEthernet1 is up, line protocol is up

Hardware is CSR vNIC, address is 5254.0000.004d (bia 5254.0000.004d)

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full Duplex, 1000Mbps, link type is auto, media type is Virtual

output flow-control is unsupported, input flow-control is unsupported

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:14:10, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

5338 packets input, 361563 bytes, 0 no buffer

Received 0 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 0 multicast, 0 pause input

13 packets output, 1248 bytes, 0 underruns

Output 0 broadcasts (0 IP multicasts)

0 output errors, 0 collisions, 2 interface resets

57 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

1 lost carrier, 0 no carrier, 0 pause output

0 output buffer failures, 0 output buffers swapped out

GigabitEthernet1.1 is up, line protocol is up

Hardware is CSR vNIC, address is 5254.0000.004d (bia 5254.0000.004d)

Internet address is 10.10.0.1/24

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1Q Virtual LAN, Vlan ID  1.

ARP type: ARPA, ARP Timeout 04:00:00

Keepalive set (10 sec)

Last clearing of "show interface" counters never

GigabitEthernet1.10 is up, line protocol is up Hardware is CSR vNIC, address is 5254.0000.004d (bia 5254.0000.004d) Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1Q Virtual LAN, Vlan ID  10.

ARP type: ARPA, ARP Timeout 04:00:00

Keepalive set (10 sec)

Last clearing of "show interface" counters never

GigabitEthernet1.11 is up, line protocol is up Hardware is CSR vNIC, address is 5254.0000.004d (bia 5254.0000.004d) Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1Q Virtual LAN, Vlan ID  11.

ARP type: ARPA, ARP Timeout 04:00:00

Keepalive set (10 sec)

Last clearing of "show interface" counters never

GigabitEthernet2 is administratively down, line protocol is down

Hardware is CSR vNIC, address is 5254.0000.004e (bia 5254.0000.004e)

MTU 1500 bytes, BW 1000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full Duplex, 1000Mbps, link type is auto, media type is Virtual

output flow-control is unsupported, input flow-control is unsupported

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/375/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Información Relacionada

- Configuración de enlaces troncales 802.1q entre un Catalyst 3550/3750 y switches Catalyst

- Configuración del routing ente VLAN con switches Catalyst

- Soporte técnico y descargas: Cisco Systems