Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento explica cómo configurar un enlace entre switches (ISL) entre un Cisco Catalyst 2948G-L3 y switches Catalyst 2900/3500XL o 2970 Series. Cuando conecta un Catalyst 2948G-L3 a un switch, las tareas de configuración son las mismas que las que se realizan para conectar un router a un switch. El ejemplo de configuración en este documento utiliza el Catalyst 2948G-L3 como router y utiliza el Catalyst 3500XL como el switch de Capa 2 (L2). Puede sustituir el Catalyst 2900XL o 2970 por el 3500XL, a los efectos de este documento.

Para utilizar el concepto de VLAN en el Catalyst 2948G-L3, debe utilizar grupos de bridges. Cada grupo de puente se considera una VLAN separada. Estos grupos de puentes corresponden al número VLAN del switch conectado.

Prerequisites

Requirements

Antes de intentar esta configuración, asegúrese de conectar un cable cruzado entre el 2900/3500XL o 2970 y el 2948G-L3. Normalmente, se utiliza un cable directo entre un router y un switch; pero con el Catalyst 2948G-L3, se utiliza un cable de cruce para conectarse a otro switch. Este es el mismo cable cruzado que utilizaría para una conexión de switch a switch.

Quienes lean este documento deben tener conocimiento de los siguientes temas:

- Los switches de las series Catalyst 2940 y 2950/2955 no soportan la encapsulación ISL. Para obtener información sobre el soporte de encapsulación ISL y otros requisitos de trunking para los switches Catalyst, refiérase a Requisitos del Sistema para Implementar Trunking.

- El Catalyst 2948G-L3 ha llegado al final de su vida útil (EoL). Para obtener detalles y productos de reemplazo recomendados, consulte EoL / EoS para switches Cisco Catalyst 2948G-L3 y 4908G-L3.

Componentes Utilizados

La información que contiene este documento se basa en estas versiones de software:

- Software Cisco IOS® versión 12.0(25)W5(27) para switch/router de capa 3 (L3) (CAT2948G-IN-M)

- Software Cisco IOS versión 12.0(5)WC9 (C3500XL-C3H2S-M) (fc1)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar

Esta sección proporciona información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Si desea que los tres PC puedan hacer ping entre sí y tengan un gateway predeterminado, debe utilizar el puente con routing y puente integrados (IRB).

El Catalyst 2948G-L3 es el dispositivo L3 en este escenario. Debido a que es un dispositivo L3, no puede tener dos interfaces L3 en la misma subred. Es por eso que necesita utilizar grupos de puente en las interfaces y vincularlos con una interfaz virtual de puente (BVI), BVI 2.

La dirección IP BVI 2 es el gateway predeterminado para todos los PC y dispositivos en VLAN 2 o grupo de bridges 2.

Configuraciones

En este documento, se utilizan estas configuraciones:

- 2948G-L3

- 2900/3500XL o 2970

2948G-L3

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

bridge irb

!

!

!

interface FastEthernet1

!--- This interface is the ISL trunk to the switch.

no ip address

no ip directed-broadcast

!

interface FastEthernet1.1

encapsulation isl 1

no ip redirects

no ip directed-broadcast

bridge-group 1

!--- Use bridge-group 1 for the trunk subinterface. !--- You can not use an IP address here because of the subnet !--- overlap that would occur due to BVI 1, which is in the !--- same subnet.

!

interface FastEthernet1.2

encapsulation isl 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

interface FastEthernet2

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet3

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet4

no ip address

no ip directed-broadcast

bridge-group 1

!--- This port belongs to VLAN 1.

!

interface BVI1

ip address 10.1.1.1 255.255.0.0

!--- This is the IP address of BVI 1.

no ip directed-broadcast

no ip route-cache cef

!

interface BVI2

!--- This is the IP address of BVI 2.

ip address 10.2.2.2 255.255.0.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

bridge 1 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol.

bridge 1 route ip

!--- Allow routing to occur for IP.

bridge 2 protocol ieee

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

2900/3500XL o 2970

!--- First, add VLAN 2 to the VLAN database for a 2900/3500XL !--- switch:

3500XL# vlan database

3500XL(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

3500XL(vlan)# exit

APPLY completed.

Exiting....

3500XL#

!--- The Catalyst 2970 gives you the option to configure VLANs !--- from the VLAN database or from global configuration mode:

2970# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

2970(config)# vlan 2

2970(config-vlan)# end

2970#

!--- The switchport configurations on the Catalyst 2900/3500XL !--- and on the 2970 are identical, for the purposes of this !--- document. Remember that the Catalyst 2970 has 10/100/1000 !--- ports (1000Base-T), so the interfaces in this output !--- would instead be labeled Gigabit Ethernet 0/1, 0/2, !--- and so forth.

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3500XL

!

interface FastEthernet0/1

switchport mode trunk

!--- This port is an ISL trunk.

!

interface FastEthernet0/2

switchport access vlan 2

!--- This port is in VLAN 2.

!

interface FastEthernet0/3

!--- This port is in the default VLAN 1.

!

interface FastEthernet0/4

!

!

interface VLAN1

ip address 10.1.1.100 255.255.0.0

!--- This is the IP address of the management interface.

no ip directed-broadcast

no ip route-cache

!

snmp-server engineID local 000000090200000AF484CC80

snmp-server community public RO

!

line con 0

exec-timeout 0 0

transport input none

stopbits 1

line vty 0 4

login

line vty 5 15

login

!

end

Verificación

Esta sección proporciona información para confirmar que su configuración funciona correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- show interface fa0/1 switchport: verifique el estado del trunk en 2900/3500XL o 2970 y vea qué VLAN están activas.

3500XL# show interface fa0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: isl

Operational Trunking Encapsulation: isl

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1,2

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

Self Loopback: No

3500XL#

- show vlan: verifique que los puertos en 2900/3500XL o 2970 estén asignados a las VLAN correctas.

3500XL# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/3, Fa0/4, Fa0/5, Fa0/6,

Fa0/7, Fa0/8, Fa0/9, Fa0/10,

Fa0/11, Fa0/12, Fa0/13, Fa0/14,

Fa0/15, Fa0/16, Fa0/17, Fa0/18,

Fa0/19, Fa0/20, Fa0/21, Fa0/22,

Fa0/23, Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/2

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

3500XL#

- show interface bvi 1: verifique que las interfaces BVI 2948G-L3 y el protocolo de línea estén activos en el 2948G-L3.

2948G-L3# show interface bvi 1

BVI1 is up, line protocol is up

Hardware is BVI, address is 0001.c75c.680a (bia 0000.0000.0000)

Internet address is 10.1.1.1/16

MTU 1500 bytes, BW 10000 Kbit, DLY 5000 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue 0/0 (size/max)

2948G-L3#

- show bridge 1: verifique que el bridge 1 esté reenviando. También puede verificar que el Protocolo de árbol de expansión esté habilitado y el reenvío con un comando show spanning-tree.

2948G-L3# show bridge 1

Total of 300 station blocks, 299 free

Codes: P - permanent, S - self

Bridge Group 1:

Address       Action   Interface

00ee.1e9f.50c0   forward   Fa1.1

2948G-L3#

Troubleshoot

Esta sección proporciona consejos y muestra de salida para ayudar a resolver problemas de su configuración.

- Verifique que pueda realizar ping con el otro dispositivo.

- Verifique que las PC puedan realizar ping a las demás PC en otras VLAN.

- Asegúrese de que el gateway predeterminado es correcto. En este escenario, la gateway predeterminada es la respectiva BVI en la 2948G-L3.

2948G-L3# ping 10.1.1.100

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.100, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

2948G-L3# show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  10.2.2.2                -   0030.40d6.4008  ARPA   BVI2

Internet  10.1.1.1                -   0030.40d6.400a  ARPA   BVI1

Internet  10.1.1.100              1   00ee.1e9f.50c0  ARPA   BVI1

2948G-L3#

Información Relacionada

- Páginas de Soporte de Productos de LAN

- Página de Soporte de LAN Switching

- Soporte Técnico y Documentación - Cisco Systems