Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento describe cómo configurar un grupo Hot Standby Router Protocol (HSRP) para IPv6 (HSRPv2) en espera para realizar un seguimiento de un objeto y cambiar la prioridad HSRP en función del estado del objeto.

Cada objeto de seguimiento tiene un número único especificado en la interfaz de línea de comandos (CLI) de seguimiento. HSRPv2 utiliza este número para realizar un seguimiento de un objeto específico. El proceso de seguimiento sondea periódicamente el objeto sometido a seguimiento para determinar los cambios de valor y envía cualquier cambio (como valores ascendentes o descendentes) a HSRPv2, inmediatamente o después de una demora especificada. Este documento utiliza el comando track interface para configurar una interfaz para ser rastreada.

Prerequisites

Requirements

Asegúrese de cumplir estos requisitos antes de intentar esta configuración:

- Conocimiento de la configuración de HSRP; consulte Configuración de HSRP para obtener más información.

- Conocimiento básico de la implementación de direccionamiento IPv6 y conectividad básica; consulte Implementación de Direccionamiento IPv6 y Conectividad Básica para obtener más información.

- Conocimiento básico de Enhanced Object Tracking

- HSRPv2 se debe habilitar en una interfaz antes de que se pueda configurar HSRP IPv6.

- El routing unidifusión IPv6 debe estar habilitado en el dispositivo para que se configure HSRP IPv6.

Componentes Utilizados

Las configuraciones en este documento se basan en el Cisco7200 Series Router que ejecuta Cisco IOS® Software Release 15.0(1).

Convenciones

Consulte Convenciones de Consejos Técnicos de Cisco para obtener información sobre las convenciones sobre documentos.

Configurar

Los routers R2 y R3 están conectados a R1 a través de una interfaz serial. Las interfaces Fast Ethernet de R2 y R3 se configuran con HSRP IPv6 de tal manera que R2 actúa como el router activo y R3 actúa como el router en espera. En el router R2, el proceso de seguimiento se configura para realizar un seguimiento del estado del protocolo de línea de interfaz de la interfaz serial 1/0: En caso de que la interfaz serial S1/0 de R2 deje de funcionar, el router R3 cambia su estado de En espera a Activo.

Nota: Use la Command Lookup Tool (sólo clientes registrados) para obtener más información sobre los comandos utilizados en este documento.

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Configuraciones

En este documento, se utilizan estas configuraciones:

- Configuración del router R1

- Configuración del router R2

- Configuración del router R3

Configuración del router R1

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::1/64

serial restart-delay 0

!

!

interface Serial1/1

no ip address

ipv6 address 2011:11:11:11::1/64

serial restart-delay 0

!

end

Configuración del router R2

!

version 15.0

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

track 1 interface Serial1/0 line-protocol

!--- Tracking process 1 is configured in the router !--- to track state of the interface line protocol !--- of serial interface 1/0

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::2/64

serial restart-delay 0

!

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::10/64

standby version 2

standby 10 ipv6 autoconfig

!--- Assigns a standby group and standby IP address.

standby 10 preempt delay minimum 45

!--- The preempt command allows the router to become the !--- active router when it has the priority higher than all the other !--- HSRP-configured routers. Without this command, even if a router has higher !--- priority value, it will not become an active router. !--- The delay minimum value causes the local router to postpone !--- taking over the active role for a minimum of 45 seconds.

standby 10 track 1 decrement 10

!--- Configures HSRP to track an object and change the Hot Standby !--- priority on the basis of the state of the object.

!--- In this example,the HSRP tracks the interface s1/0 mentioned !--- in the track process 1.

!--- Decrement value specified the amount by which the Hot Standby !--- priority for the router is decremented (or incremented) when the tracked object !--- goes down (or comes back up). The range is from 1 to 255. The default is 10.

!

end

Configuración del router R3

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Serial1/0

no ip address

ipv6 address 2011:11:11:11::2/64

serial restart-delay 0

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::11/64

standby version 2

standby 10 ipv6 autoconfig

standby 10 priority 95

standby 10 preempt delay minimum 45

!

end

Verificación

Utilice el comando show standby en los routers R2 y R3 para verificar la configuración.

Router R2

R2#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:26:03

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 1.872 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C802:AFF:FE10:38, priority 95 (expires in 8.048 sec)

Priority 100 (default 100)

Track object 1 state Up decrement 10

Group name is "hsrp-Fa2/0-10" (default)

Router R3

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Standby

4 state changes, last state change 00:26:25

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.176 secs

Preemption enabled, delay min 45 secs

Active router is FE80::C801:14FF:FEF4:38, priority 100 (expires in 9.888 sec)

MAC address is ca01.14f4.0038

Standby router is local

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Para mostrar información de seguimiento, utilice el comando show track en el router R2.

Router R2

R2#show track 1

Track 1

Interface Serial1/0 line-protocol

Line protocol is Up

3 changes, last change 00:28:39

Tracked by:

HSRP FastEthernet2/0 10

!--- Displays the information about the objects that !--- are tracked by tracking process 1.

R2#show track int brief

Track   Object                           Parameter        Value Last Change

1       interface   Serial1/0            line-protocol    Up    00:31:19

!--- Displays the information about the tracked interface.

En caso de que el router activo (R2 en este ejemplo) se desactive, el router en espera cambia su estado inmediatamente a Activo como se muestra en esta tabla:

Cuando el router activo (R2) deja de funcionar...

Router R2
R2(config)#interface s1/0

R2(config-if)#shut

R2(config-if)#

*May 21 20:56:54.223: %TRACKING-5-STATE: 1 interface Se1/0 line-protocol Up->Down

R2(config-if)#

*May 21 20:56:56.203: %LINK-5-CHANGED: Interface Serial1/0, changed state to administratively down

*May 21 20:56:57.203: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0, changed state to down

R2(config-if)#

*May 21 20:57:43.087: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Active -> Speak

R2(config-if)#

*May 21 20:57:54.479: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Speak -> Standby

!--- When the interface goes down, the active router changes !--- its state to Standby.

Router R3

R3#

*May 21 20:56:53.419: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Standby-> Active

!--- The standby router is now the active router.

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:02:32

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.080 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C801:14FF:FEF4:38, priority 90 (expires in 9.664 sec)

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Compatibilidad con tecnología IPv6

- Configuración de Protocolos de Redundancia de Primer Salto en IPv6

- Protocolo de rHot Standby Router Protocol (HSRP): Preguntas Frecuentes

- RFC 2281: protocolo de router de espera en caliente (HSRP) de Cisco

- Soporte Técnico y Documentación - Cisco Systems