Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Diagrama de topología

Configurar

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

En esta configuración, dos recursos X.25 diferentes (hemos utilizado dspu-host para simular los dispositivos finales en esta configuración). Para obtener más información sobre la unidad física descendente (DSPU), consulte estos documentos:

- Configuración del Soporte del Punto de Servicio de SNA y DSPU

- Preguntas frecuentes sobre la unidad física descendente

Estos dos dispositivos finales se comunican con diferentes adaptadores en el sistema central a través de X.25. Los recursos X.25 remotos se configuraron para diferentes direcciones de destino (en diferentes longitudes y direcciones). Cualquier llamada entrante cuya dirección de destino X.121 coincida con la "subdirección qllc dlsw" del router se envía a Data Link Switching Plus (DLSw+) (con ID.STN IND). Cuando DLSw+ recibe una consulta de tipo "Can You Reach" sobre una dirección MAC virtual en el conjunto, el código QLLC (Control de enlace lógico cualificado) intenta configurar un circuito virtual (VC) en la dirección X.121 que se asigna a la dirección MAC virtual especificada. Si se recibe una llamada entrante, QLLC envía un ID.STN.IND con una dirección MAC virtual del conjunto a DLSw+.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las versiones de software y hardware.

- Cisco IOS® Software Release 12.2(6a) se utilizó en Pathos (Cisco 2612)

- La versión 12.0(20) del software Cisco IOS se utilizó en Namur y Goode (Cisco 2500, Cisco 4000)

- Cisco IOS Software Release 12.1(7 ) se utilizó en Nesle (Cisco 4500)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Diagrama de topología

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Configuraciones

Las direcciones MAC del mainframe son las siguientes:

- 4000.7507.0000

- 4000.7507.ffff

Este documento usa las configuraciones detalladas aquí:

- Cisco 7507 (Fiesta de carne)

- Cisco 2612 (rutas)

- Cisco 4500 (Nesle)

- Cisco 2500 (Namur)

- Cisco 4000 (Goode)

Cisco 7507 (Fiesta de carne)

source-bridge ring-group 100

dlsw local-peer peer-id 10.48.64.75 promiscuous

!

interface Channel4/2

ip address 10.48.64.225 255.255.255.240

no keepalive

lan TokenRing 0

source-bridge 88 1 100

adapter 0 4000.7507.0000

adapter 1 4000.7507.ffff

Cisco 2612 (rutas)

!

source-bridge ring-group 200

dlsw local-peer peer-id 10.48.64.40

dlsw remote-peer 0 tcp 10.48.64.75

!

interface Ethernet0/0

ip address 10.48.64.40 255.255.255.0

half-duplex

!

interface Serial0/0

no ip address

!

interface TokenRing0/0

no ip address

ring-speed 16

!

interface Serial0/1

no ip address

encapsulation x25

x25 alias .*

!--- It is used against the destination !--- address of a received call.

x25 htc 10

x25 win 7

x25 wout 7

qllc accept-all-calls

qllc dlsw subaddress 123456789012345 vmacaddr 4000.3333.0000 2 partner 4000.7507.0000

qllc dlsw subaddress 2224 vmacaddr 4000.2222.0000 2 partner 4000.7507.ffff

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

Cisco 4500 (Nesle)

!

x25 routing

!

!

!

interface Ethernet0

ip address 10.48.64.34 255.255.255.0

media-type 10BaseT

!

interface Ethernet1

no ip address

shutdown

media-type 10BaseT

!

interface Ethernet2

no ip address

media-type 10BaseT

!

interface Serial0

no ip address

encapsulation x25 dce

clockrate 250000

!

interface Serial1

no ip address

!

interface Serial2

no ip address

encapsulation x25 dce

no ip mroute-cache

clockrate 250000

!

interface Serial3

no ip address

encapsulation x25 dce

clockrate 250000

!

interface TokenRing0

no ip address

ring-speed 16

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

x25 route input-interface Serial2 interface Serial0

x25 route input-interface Serial3 interface Serial0

x25 route 555 interface Serial2

x25 route 666 interface Serial3

!

line con 0

exec-timeout 0 0

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password 7 071836

login

!

ntp clock-period 17179258

ntp server 10.48.64.100

end

Cisco 2500 (Namur)

hostname namur

!

logging buffered 150000 debugging

enable password 7 120E12

!

dspu host OZDEN xid-snd 00000000 x25 2224 qllc 12 interface Serial1

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 555

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 12

dspu start OZDEN

!

interface TokenRing0

no ip address

no ip directed-broadcast

shutdown

!

Cisco 4000 (Goode)

dspu host GOODE xid-snd 11132323 x25 123456789012345 qllc 20 interface Serial1

!

interface Ethernet0

ip address 10.48.64.17 255.255.255.0

no ip directed-broadcast

media-type 10BaseT

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 666

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 20

dspu start GOODE

!

Verificación

Esta sección proporciona información que puede utilizar para confirmar que la configuración está activa.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- show llc2—Muestra las conexiones LLC2 activas en el router.

- show version—Muestra información de la versión del software.

- show dlsw peer—Muestra información de conexión del par dlsw.

- show dlsw circuit detail—Muestra los detalles del circuito DLSW.

- show qllc serial 0/1—Muestra información sobre QLLC serial 0/1.

- show x25 interface serial 0/1—Muestra el estado de la línea y el protocolo en la interfaz serial X.25 0/1.

- show x25 route—Muestra la tabla de ruteo X.25.

- show x25 interface serial 0—Muestra el estado de la línea y el protocolo en la interfaz serial 0 X.25.

- show dspu—Muestra el estado de la función DSPU.

- show x25 interface serial 1—Muestra el estado de la línea y el protocolo en la interfaz serial X.25 1.

Festín de carne

#show llc2

....

Channel4/2 DTE: 4000.7507.ffff 4000.2222.0000 04 04 state NORMAL

V(S)=1, V??)=1, Last N??)=1, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5430/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Channel4/2 DTE: 4000.7507.0000 4000.3333.0000 04 04 state NORMAL

V(S)=6, V??)=6, Last N??)=6, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5630/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Pathos

pathos#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.2(6a), RELEASE SOFTWARE (fc1)

Copyright ??) 1986-2001 by cisco Systems, Inc.

Compiled Sat 01-Dec-01 22:30 by pwade

Image text-base: 0x80008088, data-base: 0x810616B4

pathos#show dlsw peer

Peers:                state     pkts_rx   pkts_tx  type  drops ckts TCP   uptime

TCP 10.48.64.75     CONNECT        118        91  conf      0    2   0 00:32:12

Total number of connected peers: 1

Total number of connections:     1

pathos#show dlsw circuit detail

Index           local addr(lsap)    remote addr(dsap)  state          uptime

234881048       4000.2222.0000(04)  4000.7507.ffff(04) CONNECTED      00:29:50

PCEP: 81C25730   UCEP: 81D88528

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:19; Rx CW:20, Granted:39; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             429/453        Info-frames:           1/1

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

1426063385      4000.3333.0000(04)  4000.7507.0000(04) CONNECTED      00:29:49

PCEP: 81D081B4   UCEP: 81D108B0

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:34; Rx CW:20, Granted:34; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             554/513        Info-frames:           6/6

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

Total number of circuits connected: 2

pathos#show qllc serial 0/1

Interface Serial0/1

vc 2 66620

Circuit State P4/D1, Logical Link State QLOpened 4000.3333.0000(04)->4000.7507.0000(04)

0 packets held

vc 1 55512

Circuit State P4/D1, Logical Link State QLOpened 4000.2222.0000(04)->4000.7507.ffff(04)

0 packets held

pathos#

pathos#show x25 interface  serial 0/1

SVC 1,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 55512 <-->

qllc 4000.2222.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 66620 <-->

qllc 4000.3333.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

pathos#

Nesle

nesle#show x25 route

#  Match                         Substitute          Route to

1  input-int Serial2                                 Serial0

2  input-int Serial3                                 Serial0

3  dest 555                                          Serial2

4  dest 666                                          Serial3

nesle#show x25 interface serial 0

SVC 1,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 55512 <--> 2224 from Serial2 SVC 10

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 66620 <--> 123456789012345 from Serial3 SVC 1024

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 2

SVC 10,  State: D1,  Interface: Serial2

Started 00:32:51, last input 00:32:50, output 00:32:50

Connects 55512 <--> 2224 to Serial0 SVC 1

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 3

SVC 1024,  State: D1,  Interface: Serial3

Started 00:32:53, last input 00:32:52, output 00:32:52

Connects 66620 <--> 123456789012345 to Serial0 SVC 2

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

Namur

namur#show dspu

dspu host OZDEN Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 8 FRAMES SENT 8

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 0

namur#show x25 interface serial 1

SVC 10,  State: D1,  Interface: Serial1

Started 00:34:55, last input 00:34:54, output 00:34:54

Connects 2224 <-->

qllc

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

namur#

Goode

goode#show dspu

dspu host GOODE Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 18 FRAMES SENT 18

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 5

goode#show x25 interface serial 1

SVC 1024,  State: D1,  Interface: Serial1

Started 00:41:25, last input 00:41:25, output 00:41:25

Connects 123456789012345 <-->

qllc

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

goode#

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Página de soporte de tecnología Data-Link Switching Plus (DLSw+)

- Soporte de Tecnología de IBM

- Soporte Técnico y Documentación - Cisco Systems