Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Productos Relacionados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Comandos show en ROUTER1 cuando Serial0 está activo.

Comandos show en ROUTER1 cuando Serial0 está inactivo.

Troubleshoot

Recursos de resolución de problemas

Comandos para resolución de problemas

depurar salida en ENRUTADOR1 cuando serial0 desciende e ISDN se levanta

depurar salida en ENRUTADOR 1 cuando Serial0 regrese e ISDN interrumpe la llamada

Información Relacionada

Introducción

Este documento explica y proporciona un ejemplo de cómo configurar el puenteo de respaldo con ISDN. Esta configuración usa el método de interfaz de respaldo para identificar que el link principal está desactivado. Para obtener más información sobre la copia de seguridad, vea Configuración y resolución de problemas de respaldo DDR.

En los entornos WAN puenteados, la única solución de respaldo de routing de marcado a petición (DDR) disponible es el uso de ISDN, ya que no se admite la conexión en puente asíncrona.

Tenga en cuenta que la conexión en puente en una conexión ISDN tiende a mantener activa la conexión durante periodos muy largos, si no permanentemente. Si la compañía telefónica (Telco) cobra por ISDN en función del tiempo de conexión y el link serial que se rastrea durante mucho tiempo, esto puede resultar en una factura muy grande.

Nota: Esta configuración es para un sitio y un canal B. Para más de un canal B, debe utilizar perfiles de marcador. (Consulte Configuración de Perfiles del Marcador para el Puente mediante la configuración ISDN).

Para obtener información sobre la configuración de bridging en un entorno que no es de respaldo, vea Bridging Across ISDN.

Prerequisites

Requirements

Antes de utilizar esta configuración, asegúrese de que cumple con los siguientes requisitos:

- Poseer un conocimiento básico de ISDN.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Cisco 2500 Series Routers con una interfaz serial WAN y una interfaz BRI cada uno.

- Versión 12.2(7b) del software del IOS® de Cisco.

Nota: Esta configuración se puede utilizar con cualquier router que tenga un link WAN (serial) y un puerto BRI.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Productos Relacionados

Esta configuración puede utilizarse con cualquier par de routers que ejecuten el software del IOS de Cisco y cada uno debe tener al menos una interfaz serial WAN y una interfaz BRI.

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Configuraciones

En este documento, se utilizan estas configuraciones:

- Router1

- Router2

Router1

!

hostname ROUTER1

!

!

username ROUTER2 password 0 same

!--- This is required for PPP Challenge Handshake Authentication Protocol !--- (CHAP) authentication during dial backup.

!

!

isdn switch-type basic-5ess

!--- The ISDN switch type for this circuit. !--- Obtain this information from the Telco. !--- This ISDN switch type is specific to the United States, !--- and could change based on the requirements of the country and Telco.

!

interface Ethernet0

ip address 172.16.55.33 255.255.255.240

no ip directed-broadcast

no ip mroute-cache

bridge-group 1

!--- Assign this interface to bridge-group 1. !--- Frames are bridged only among interfaces in the same group. !--- Note that the BRI interface and serial interface are also !--- in this bridge-group 1.

!

interface Serial0

description Serial link to ROUTER2

backup interface BRI0

!--- This defines the backup interface. !--- Cisco IOS Software tracks the Serial0 interface, and !--- uses BRI0 if Serial0 fails.

ip address 172.16.54.1 255.255.255.0

no ip directed-broadcast

no ip mroute-cache

no fair-queue

bridge-group 1

!--- Enable bridging on Serial0 for normal operation.

!

interface BRI0

description ISDN to ROUTER2

ip address 172.16.53.19 255.255.255.240

no ip directed-broadcast

encapsulation ppp

no ip mroute-cache

dialer map bridge name ROUTER2 broadcast 5552000

!--- The broadcast keyword is required to initiate the ISDN call. !--- Dialer map bridge to the remote router. The statement includes !--- the name of the remote router and the phone number to be dialed. !--- Note that this dialer map statement includes the keyword bridge, !--- and does not include the IP address of the peer, as required for !--- IP routing-based dialer maps.

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list.

isdn switch-type basic-5ess

!--- Check with your Telco for the correct values.

ppp authentication chap

bridge-group 1

!--- Enable bridging on BRI0.

!

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic.

bridge 1 protocol ieee

!--- Defines the type of Spanning Tree Protocol (STP) used for the !--- interface in bridge-group 1. Here, the IEEE STP is used. !--- The IEEE 802.1D STP is the preferred way to run the bridge.

!

Router2

hostname router2

!

!

username ROUTER1 password 0 same

!--- Required for PPP CHAP Authentication during dial backup.

!

isdn switch-type basic-5ess

!--- Check with your Telco at the Router2 side for the correct values.

!

interface Ethernet0

ip address 172.16.55.2 255.255.255.240

bridge-group 1

!--- Enable bridging on Ethernet0.

!

interface Serial0

description Serial link to ROUTER1

!--- The backup interface bri0 command is not required on this side, !--- because it is sufficient if one side tracks the serial interface.

ip address 172.16.54.2 255.255.255.0

no fair-queue

bridge-group 1

!--- Enable bridging on Serial0 for normal operation.

interface BRI0

description ISDN to ROUTER1

ip address 172.16.53.17 255.255.255.240

encapsulation ppp

no ip mroute-cache

dialer map bridge name ROUTER1 broadcast 5551000

!--- The broadcast keyword is required to initiate the ISDN call.

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list.

isdn switch-type basic-5ess

!--- Check with your Telco at the Router2 side for the correct values.

ppp authentication chap

bridge-group 1

!--- Enable bridging on BRI0.

!

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic.

bridge 1 protocol ieee

!--- Defines the type of STP used for the interface in !--- bridge-group 1. Here the IEEE STP is used. !--- The IEEE 802.1D STP is the preferred way to run the bridge.

!

Verificación

En esta sección encontrará información que puede utilizar para comprobar que su configuración funcione correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- show isdn status: muestra el estado de Capa 1 (L1), Capa 2 (L2) y Capa 3 (L3) de las interfaces ISDN.

- show dialer: muestra el estado del marcador y el estado individual de los canales ISDN.

- show bridge: muestra clases de entradas en la base de datos de reenvío de puente.

- show interface: muestra el estado de las diversas interfaces, como las interfaces serial y BRI.

- show spanning-tree: muestra la topología de spanning tree conocida por el router.

Comandos show en ROUTER1 cuando Serial0 está activo.

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

Layer 2 NOT Activated

Layer 3 Status:

0 Active Layer 3 Call(s)

Activated dsl 0 CCBs = 0

The Free Channel Mask: 0x80000003

Number of L2 Discards = 36, L2D_Task Discards = 35

Total Allocated ISDN CCBs = 0

ROUTER1# show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

5552000 29 977 00:45:08 successful

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is shutdown

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is shutdown

ROUTER1# show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

0000.0c76.2882 forward Serial0 0 5 4

!--- Bridging traffic goes through Serial0.

00d0.58ad.ae13 forward Ethernet0 0 42 5

Comandos show en ROUTER1 cuando Serial0 está inactivo.

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 114, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

!--- ISDN L1 and L2 will be up (when Serial0 fails) !--- even if interesting traffic is not present.

Layer 3 Status:

1 Active Layer 3 Call(s)

Activated dsl 0 CCBs = 1

CCB:callid=8484, sapi=0, ces=1, B-chan=1, calltype=DATA

The Free Channel Mask: 0x80000002

Total Allocated ISDN CCBs = 1

ROUTER1# show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

5552000 30 977 00:00:16 successful

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: bridge (0xFFFF)

Time until disconnect 106 secs

Connected to 5552000 (ROUTER2)

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

ROUTER1# show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

0000.0c76.2882 forward BRI0 0 5 4

!--- Bridging traffic now goes through BRI0.

00d0.58ad.ae13 forward Ethernet0 0 5 5

Troubleshoot

En esta sección encontrará información que puede utilizar para solucionar problemas de configuración.

Recursos de resolución de problemas

Utilice estos recursos según sea necesario:

- Soporte de Tecnología ISDN

- Resolución de problemas de líneas en serie

- Conexión adosada HDLC

Comandos para resolución de problemas

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

Nota: Antes de ejecutar comandos debug, consulte Información Importante sobre Comandos Debug.

- debug dialer: proporciona información sobre los eventos de la interfaz del marcador.

- debug isdn event: muestra los mensajes de depuración relacionados con la actividad ISDN que se producen en el lado del usuario de la interfaz ISDN.

- debug isdn q931: proporciona información sobre la configuración de llamadas y la desconexión de conexiones de red ISDN (L3) entre el router local (lado del usuario) y la red.

- debug isdn q921: muestra los mensajes de depuración relacionados con los procedimientos de acceso de capa de enlace de datos (L2) que se producen en el router en el canal D (LAPD) de su interfaz ISDN.

- debug ppp negotiation: muestra los mensajes de depuración relacionados con la negociación de las opciones PPP y los parámetros del protocolo de control de red (NCP).

- debug ppp authentication: muestra los mensajes de depuración relacionados con el intercambio de paquetes CHAP y Password Authentication Protocol (PAP).

depurar salida en ENRUTADOR1 cuando serial0 desciende e ISDN se levanta

ROUTER1# show debug

Dial on demand:

Dial on demand events debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

ISDN:

ISDN events debugging is on

ISDN Q921 packets debugging is on

ISDN Q931 packets debugging is on

ROUTER1#

!--- Interface serial0 goes down.

ROUTER1#

00:56:53: %LINK-3-UPDOWN: Interface Serial0, changed state to down

*Mar  1 00:56:53.103: ISDN BR0 EVENT: isdn_sw_cstate: State = 0,

Old State = 6

00:56:53: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar  1 00:56:53.107: BR0:1 LCP: State is Closed

*Mar  1 00:56:53.111: BR0:1 DDR: disconnecting call

00:56:53: %LINK-3-UPDOWN: Interface BRI0:2, changed state to down

*Mar  1 00:56:53.119: BR0:2 LCP: State is Closed

*Mar  1 00:56:53.119: BR0:2 DDR: disconnecting call

*Mar  1 00:56:53.127: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.135: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.567: ISDN BR0: RX <- IDCKRQ ri=0 ai=127

*Mar  1 00:56:53.567: ISDN Recvd L1 prim 3 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.571: ISDN BR0: L1 persistent Deactivated

*Mar  1 00:56:53.571: ISDN Recvd L1 prim 7 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.575: ISDN BR0: Recvd MPH_IIC_IND from L1

*Mar  1 00:56:53.575: ISDN Recvd L1 prim 7 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.579: ISDN BR0: Recvd MPH_IIC_IND from L1

*Mar  1 00:56:53.579: ISDN Recvd L1 prim 1 dsl 0 state 3 ctrl_state 0

*Mar  1 00:56:53.583: ISDN BR0: L1 is IF_ACTIVE

*Mar  1 00:56:53.583: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.587: ISDN BR0: L2-TERM: ces/tei=1/0

AWAIT_ESTABLISH->TERM_DOWN

*Mar  1 00:56:53.591: ISDN BR0: Incoming call id = 0x0010, dsl 0

*Mar  1 00:56:53.595: ISDN BR0: L2-TERM: ces/tei=1/0

TERM_DOWN->AWAIT_ESTABLISH

00:56:53: %LINK-3-UPDOWN: Interface BRI0, changed state to up

*Mar  1 00:56:53.631: ISDN BR0 EVENT: isdn_sw_cstate: State = 4,

Old State = 6

*Mar  1 00:56:53.655: ISDN BR0: TX -> IDREQ ri=48769 ai=127

00:56:54: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Serial0, changed state to down

*Mar  1 00:56:54.387: ISDN BR0: RX <- IDCKRQ ri=0 ai=127

*Mar  1 00:56:55.655: ISDN BR0: TX -> IDREQ ri=42642 ai=127

*Mar  1 00:56:55.699: ISDN BR0: RX <- IDASSN ri=42642 ai=68

*Mar  1 00:56:55.791: ISDN BR0: TX -> SABMEp c/r=0 sapi=0 tei=68

*Mar  1 00:56:55.823: ISDN BR0: RX <- UAf c/r=0 sapi=0 tei=68

00:56:55: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0,

TEI 68 changed to up

*Mar  1 00:56:55.831: ISDN BR0: L2-TERM: ces/tei=1/68

AWAIT_ESTABLISH->ESTABLISHED

!--- Interesting traffic has not arrived yet from Host1, !--- but ISDN L1 and L2 are up now.

ROUTER1# show isdn stat

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 68, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x80000003

Number of L2 Discards = 0, L2 Session ID = 34

Total Allocated ISDN CCBs = 0

ROUTER1#

*Mar  1 00:57:25.839: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=0

*Mar  1 00:57:25.871: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=0

ROUTER1#

!--- Interesting traffic arrives now, !--- which triggers ISDN Dialup (see below).

*Mar  1 00:57:32.519: BR0 DDR: Dialing cause bridge (0xFFFF)

*Mar  1 00:57:32.519: BR0 DDR: Attempting to dial 5552000

*Mar  1 00:57:32.523: ISDN BR0: Outgoing call id = 0x800E, dsl 0

*Mar  1 00:57:32.527: ISDN BR0: Event: Call to 5552000 at 64 Kb/s

*Mar  1 00:57:32.527: ISDN BR0: process_bri_call(): call id 0x800E,

called_number 5552000, speed 64, call type DATA

*Mar  1 00:57:32.531: CCBRI_Go Fr Host InPkgInfo (Len=22) :

*Mar  1 00:57:32.535: 1 0 1 80 E 0 4 2 88 90 18

1 83 2C 7 35 35 35 32 30 30 30

*Mar  1 00:57:32.543:

*Mar  1 00:57:32.547: CC_CHAN_GetIdleChanbri: dsl 0

*Mar  1 00:57:32.547:     Found idle channel B1

*Mar  1 00:57:32.563: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=0 nr=0

i=0x08010E05040288901801832C0735353532303030

*Mar  1 00:57:32.583:     SETUP pd = 8  callref = 0x0E

*Mar  1 00:57:32.591:         Bearer Capability i = 0x8890

*Mar  1 00:57:32.599:         Channel ID i = 0x83

*Mar  1 00:57:32.603:         Keypad Facility i = '5552000'

*Mar  1 00:57:32.867: ISDN BR0: RX <- INFOc sapi=0 tei=68 ns=0 nr=1

i=0x08018E02180189

*Mar  1 00:57:32.875:     CALL_PROC pd = 8  callref = 0x8E

*Mar  1 00:57:32.883:         Channel ID i = 0x89

*Mar  1 00:57:32.899: ISDN BR0: TX -> RRr sapi=0 tei=68 nr=1

*Mar  1 00:57:32.907: CCBRI_Go Fr L3 pkt (Len=7) :

*Mar  1 00:57:32.907: 2 1 E 98 18 1 89

*Mar  1 00:57:32.911:

*Mar  1 00:57:32.915: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_PROCEEDING

*Mar  1 00:57:32.919: ISDN BR0: HOST_PROCEEDING

*Mar  1 00:57:32.919: ISDN BR0: HOST_MORE_INFO

*Mar  1 00:57:33.159: ISDN BR0: RX <- INFOc sapi=0 tei=68 ns=1

nr=1 i=0x08018E07

*Mar  1 00:57:33.167:     CONNECT pd = 8  callref = 0x8E

*Mar  1 00:57:33.183: ISDN BR0: TX -> RRr sapi=0 tei=68 nr=2

*Mar  1 00:57:33.191: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 00:57:33.191: 7 1 E 91

*Mar  1 00:57:33.195:

*Mar  1 00:57:33.199: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_CONNECT

00:57:33: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 00:57:33.215: ISDN: get_isdn_service_state():

idb 0x19F4D8 bchan 2 is_isdn 1 Not a Pri

*Mar  1 00:57:33.215: BR0:1 PPP: Treating connection as a callout

*Mar  1 00:57:33.219: BR0:1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 1 load]

*Mar  1 00:57:33.223: BR0:1 LCP: O CONFREQ [Closed] id 27 len 15

*Mar  1 00:57:33.227: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.231: BR0:1 LCP:    MagicNumber 0x6091A5F6

(0x05066091A5F6)

*Mar  1 00:57:33.235: ISDN BR0: Event: Connected to 5552000

on B1 at 64 Kb/s

*Mar  1 00:57:33.247: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=1 nr=2

i=0x08010E0F

*Mar  1 00:57:33.251:     CONNECT_ACK pd = 8  callref = 0x0E

*Mar  1 00:57:33.267: BR0:1 LCP: I CONFREQ [REQsent] id 4 len 15

*Mar  1 00:57:33.271: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.275: BR0:1 LCP:    MagicNumber 0x6062D6EA

(0x05066062D6EA)

*Mar  1 00:57:33.279: BR0:1 LCP: O CONFACK [REQsent] id 4 len 15

*Mar  1 00:57:33.283: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.287: BR0:1 LCP:    MagicNumber 0x6062D6EA

(0x05066062D6EA)

*Mar  1 00:57:33.291: BR0:1 LCP: I CONFACK [ACKsent] id 27 len 15

*Mar  1 00:57:33.291: BR0:1 LCP:    AuthProto CHAP

(0x0305C22305)

*Mar  1 00:57:33.295: BR0:1 LCP:    MagicNumber 0x6091A5F6

(0x05066091A5F6)

*Mar  1 00:57:33.299: BR0:1 LCP: State is Open

*Mar  1 00:57:33.303: BR0:1 PPP: Phase is AUTHENTICATING,

by both [0 sess, 1 load]

*Mar  1 00:57:33.307: BR0:1 CHAP: O CHALLENGE id 14

len 28 from "ROUTER1"

*Mar  1 00:57:33.319: BR0:1 CHAP: I CHALLENGE id 4

len 28 from "ROUTER2"

*Mar  1 00:57:33.327: BR0:1 CHAP: O RESPONSE id 4

len 28 from "ROUTER1"

*Mar  1 00:57:33.335: ISDN BR0: RX <- RRr sapi=0

tei=68 nr=2

*Mar  1 00:57:33.351: BR0:1 CHAP: I SUCCESS id 4

len 4

*Mar  1 00:57:33.367: BR0:1 CHAP: I RESPONSE id 14

len 28 from "ROUTER2"

*Mar  1 00:57:33.371: BR0:1 CHAP: O SUCCESS id 14

len 4

*Mar  1 00:57:33.375: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar  1 00:57:33.379: BR0:1 BNCP: O CONFREQ [Closed] id 14

len 4

*Mar  1 00:57:33.387: BR0:1 CDPCP: O CONFREQ [Closed] id 14

len 4

*Mar  1 00:57:33.395: BR0:1 BNCP: I CONFREQ [REQsent] id 4

len 4

*Mar  1 00:57:33.399: BR0:1 BNCP: O CONFACK [REQsent] id 4

len 4

*Mar  1 00:57:33.403: BR0:1 IPCP: I CONFREQ [Not negotiated] id 4

len 10

*Mar  1 00:57:33.407: BR0:1 IPCP:    Address 172.16.53.17

(0x0306AC103511)

*Mar  1 00:57:33.415: BR0:1 LCP: O PROTREJ [Open] id 28

len 16 protocol IPCP

(0x80210104000A0306AC103511)

*Mar  1 00:57:33.419: BR0:1 CDPCP: I CONFREQ [REQsent] id 4

len 4

*Mar  1 00:57:33.423: BR0:1 CDPCP: O CONFACK [REQsent] id 4

len 4

*Mar  1 00:57:33.427: BR0:1 BNCP: I CONFACK [ACKsent] id 14

len 4

*Mar  1 00:57:33.431: BR0:1 BNCP: State is Open

*Mar  1 00:57:33.435: BR0:1 CDPCP: I CONFACK [ACKsent] id 14

len 4

*Mar  1 00:57:33.439: BR0:1 CDPCP: State is Open

*Mar  1 00:57:33.443: BR0:1 DDR: dialer protocol up

00:57:34: %LINEPROTO-5-UPDOWN:

Line protocol on Interface BRI0:1, changed state to up

00:57:39: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to 5552000 ROUTER2

ROUTER1#

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 68, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=800E, sapi=0, ces=1, B-chan=1, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask:  0x80000002

Number of L2 Discards = 0, L2 Session ID = 34

Total Allocated ISDN CCBs = 1

*Mar  1 00:58:03.343: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=2

*Mar  1 00:58:03.379: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=2pann

ROUTER1# show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0060.5cf4.a955

Root port is 3 (BRI0), cost of root path is 15625

Topology change flag set, detected flag not set

Number of topology changes 10 last change occurred 00:01:15 ago

from Serial0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 15

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.2, designated path cost 15625

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 751, received 0

Port 3 (BRI0) of Bridge group 1 is forwarding

!--- BRI Interface forwards the bridged traffic now.

Port path cost 15625, Port priority 128, Port Identifier 128.3.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a955

Designated port id is 128.3, designated path cost 0

Timers: message age 2, forward delay 0, hold 0

Number of transitions to forwarding state: 3

BPDU: sent 1014, received 608

Port 6 (Serial0) of Bridge group 1 is down

Port path cost 647, Port priority 128, Port Identifier 128.6.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.6, designated path cost 15625

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 15, received 27

ROUTER1#

*Mar 1 00:58:33.387: ISDN BR0: TX -> RRp sapi=0 tei=68 nr=2

*Mar 1 00:58:33.423: ISDN BR0: RX <- RRf sapi=0 tei=68 nr=2

depurar salida en ENRUTADOR 1 cuando Serial0 regrese e ISDN interrumpe la llamada

00:58:37: %LINK-3-UPDOWN: Interface Serial0, changed state to up

*Mar 1 00:58:37.671: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.675: BR0:2 DDR: disconnecting call

*Mar 1 00:58:37.675: ISDN BR0: Event: Hangup call to call id 0x800E

*Mar 1 00:58:37.679: ISDN BR0: process_disconnect(): call id 0x800E,

call type is DATA, b_idb 0x19F4D8, ces 1, cause Normal call

clearing(0x10)

00:58:37: %ISDN-6-DISCONNECT: Interface BRI0:1 disconnected from

5552000 ROUTER2, call lasted 64 seconds

*Mar 1 00:58:37.691: ISDN: get_isdn_service_state(): idb 0x19F4D8

bchan 2 is_isdn 1 Not a Pri

*Mar 1 00:58:37.695: CCBRI_Go Fr Host InPkgInfo (Len=13) :

*Mar 1 00:58:37.699: 5 0 1 80 E 3 8 1 90 8 2 80 90

*Mar 1 00:58:37.703:

*Mar 1 00:58:37.719: ISDN BR0: TX -> INFOc sapi=0 tei=68 ns=2 nr=2

i=0x08010E4508028090

*Mar 1 00:58:37.727: DISCONNECT pd = 8 callref = 0x0E

*Mar 1 00:58:37.735: Cause i = 0x8090 - Normal call clearing

*Mar 1 00:58:37.743: ISDN BR0 EVENT: isdn_sw_cs!!!!!!!!!!!!!!!!!!!tate:

State = 6, Old State = 4

00:58:37: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 1 00:58:37.751: BR0:1 BNCP: State is Closed

*Mar 1 00:58:37.755: BR0:1 CDPCP: State is Closed

*Mar 1 00:58:37.755: BR0:1 PPP: Phase is TERMINATING [0 sess, 1 load]

*Mar 1 00:58:37.759: BR0:1 LCP: State is Closed

*Mar 1 00:58:37.763: BR0:1 PPP: Phase is DOWN [0 sess, 1 load]

*Mar 1 00:58:37.763: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.775: ISDN Recvd L1 prim 3 dsl 0 state 1 ctrl_state 0

*Mar 1 00:58:37.779: ISDN BR0: Physical layer is IF_DOWN

*Mar 1 00:58:37.783: ISDN BR0: Shutting down ME

00:58:37: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BRI0,

TEI 68 changed to down

*Mar 1 00:58:37.791: ISDN BR0: L2-TERM: ces/tei=1/68

ESTABLISHED->TERM_DOWN

*Mar 1 00:58:37.795: ISDN BR0: LIF_EVENT: ces/callid 1/0x800E

HOST_DISCONNECT_ACK

*Mar 1 00:58:37.803: ISDN: get_isdn_service_state(): idb 0x19F4D8

bchan 2 is_isdn 1 Not a Pri

*Mar 1 00:58:37.807: ISDN BR0: HOST_DISCONNECT_ACK: call type is DATA

00:58:37: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 1 00:58:37.815: BR0:1 LCP: State is Closed

*Mar 1 00:58:37.815: BR0:1 DDR: disconnecting call

*Mar 1 00:58:37.819: ISDN BR0: Shutting down ISDN Layer 3

00:58:37: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR0,

TEI 68 changed to down

00:58:37: %LINK-5-CHANGED: Interface BRI0, changed state to standby mode

*Mar 1 00:58:37.847: ISDN BR0 EVENT: isdn_sw_cstate: State = 6,

Old State = 4

00:58:37: %LINK-3-UPDOWN: Interface BRI0:2, changed state to down

*Mar 1 00:58:37.855: BR0:2 LCP: State is Closed

*Mar 1 00:58:37.855: BR0:2 DDR: disconnecting call

*Mar 1 00:58:37.895: ISDN BR0: Incoming call id = 0x0011, dsl 0

*Mar 1 00:58:37.895: ISDN BR0: L2-TERM: ces/tei=1/0

TERM_DOWN->AWAIT_ESTABLISH

*Mar 1 00:58:37.935: ISDN BR0: Activating

00:58:38: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to up

00:58:38: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to down

*Mar 1 00:58:39.939: ISDN BR0: Could not bring up interface

*Mar 1 00:58:39.943: ISDN BR0: Shutting down ISDN Layer 3

*Mar 1 00:58:39.963: ISDN BR0: Activating

*Mar 1 00:58:41.943: ISDN BR0: Could not bring up interface

*Mar 1 00:58:41.947: ISDN BR0: Shutting down ISDN Layer 3

*Mar 1 00:58:41.947: ISDN BR0: Activating

ROUTER1#

ROUTER1# show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

Layer 2 NOT Activated

!--- ISDN L1 and L2 are back to the deactivated state.

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask: 0x80000003

Number of L2 Discards = 0, L2 Session ID = 39

Total Allocated ISDN CCBs = 0

ROUTER1#

*Mar 1 00:58:49.951: ISDN BR0: Could not bring up interface

*Mar 1 00:58:49.951: ISDN BR0: Shutting down ISDN Layer 3

ROUTER1#

ROUTER1# show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0060.5cf4.a955

Root port is 6 (Serial0), cost of root path is 647

Topology change flag not set, detected flag not set

Number of topology changes 13 last change occurred 00:28:23 ago

from Serial0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.2, designated path cost 647

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 1633, received 0

Port 3 (BRI0) of Bridge group 1 is down

!--- BRI0 is in the down state when Serial 0 is up.

Port path cost 15625, Port priority 128, Port Identifier 128.3.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.3, designated path cost 647

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 3

BPDU: sent 1014, received 622

Port 6 (Serial0) of Bridge group 1 is forwarding

!--- Serial0 forwards the bridged traffic now.

Port path cost 647, Port priority 128, Port Identifier 128.6.

Designated root has priority 32768, address 0060.5cf4.a955

Designated bridge has priority 32768, address 0060.5cf4.a955

Designated port id is 128.6, designated path cost 0

Timers: message age 1, forward delay 0, hold 0

Number of transitions to forwarding state: 2

BPDU: sent 18, received 896

ROUTER1#

Información Relacionada

- Conexión mediante puentes a través de ISDN

- Copia de seguridad de BRI ISDN con interfaz de copia de seguridad

- Configuración de respaldo ISDA multilink BRI con vigilancia de marcador

- Configuración de respaldo BRI ISDN con vigilancia de programas dialer

- Configuración de respaldo ISDN con rutas estáticas flotantes

- DDR de respaldo mediante BRI y el comando backup interface

- Configuración de la interfaz de respaldo BRI con perfiles de marcado

- Configuración de respaldo DDR mediante BRI y la función de control de discado

- Configuración de respaldo ISDN para links WAN mediante el uso de rutas flotantes

- Configuración de respaldo para Frame Relay

- Configuración de Dial Backup para Líneas Seriales

- Comandos de Servicios de Marcado de Cisco IOS

- Soporte de Tecnología de Discado y Acceso

- Soporte Técnico y Documentación - Cisco Systems