Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Ejemplo de resultado del comando debug

Devolución de llamada GSM mediante el uso de V.110

Devolución de llamada del módem mediante el uso de V.110

Devolución de llamada de ISDN mediante V.110

Información Relacionada

Introducción

Este documento ofrece un ejemplo de configuración de las llamadas entrantes de usuarios remotos que se realizan por uno de los siguientes métodos. Para cada caso, la devolución de llamada se realiza utilizando una llamada V.110.

- Conexión de usuarios 3640 a través de GSM y solicitud de devolución de llamada.

- Usuarios que conectan 3640 a través de un módem y solicitan la devolución de llamada.

- Usuarios que conecten 3640 vía ISDN (datos) y soliciten devolución de llamada.

Nota: La autenticación, autorización y contabilidad (AAA) se configura de forma predeterminada en el router. También debe crear un usuario para iniciar sesión.

En este ejemplo, también hemos establecido la autenticación PPP (Point-to-Point Protocol) para la llamada y la llamada. Hemos cambiado el script para configurar el módem para V.110 todo el tiempo y para permitir a los usuarios elegir su método (módem o GSM). Según el método elegido, los usuarios deben:

- utilice ZDTxxx en el número de devolución de llamada (para módem).

- use DIxxxx en el número de retorno de llamada (para GSM).

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- La función de devolución de llamada V.110 está disponible en Rosa IOS?? Versión de software 12.2(5.2)T y posterior.

- Software del módem versión 2.7.3.0.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

Este documento utiliza la configuración de red que se muestra en el siguiente diagrama.

Configuraciones

Este documento usa esta configuración:

- suzanne

suzanne

suzanne#show running-config

!

version 12.2

service internal

!

hostname suzanne

!

aaa new-model

!

aaa authentication login default local

aaa authentication ppp default local

aaa authorization network default local

aaa session-id common

!

username ww password 0

username alainisdn password 0

username alaingsm callback-dialstring "" password 0

username alainmod callback-dialstring "" password 0

!

modem country mica belgium

!

isdn switch-type primary-net5

isdn voice-call-failure 0

chat-script offhook "" "ATH1" OK

chat-script callback ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATX3DT \T" TIMEOUT 90 \c

chat-script callback1analog ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATDT \T" TIMEOUT 90 CONNECT \c

chat-script callback2gsm ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATS29=8" OK "AT \T" TIMEOUT 90 CONNECT \c

!

controller E1 1/0

pri-group timeslots 1-31

!

interface Ethernet0/0

ip address 172.17.243.105 255.255.255.0

!

interface Serial1/0:15

description E1 0451/39920

no ip address

encapsulation ppp

dialer rotary-group 1

isdn switch-type primary-net5

isdn incoming-voice modem

isdn outgoing-voice info-transfer-capability 3.1kHz-audio

no cdp enable

ppp authentication chap callin

!

interface BRI3/1

description belgacom 027202094

no ip address

encapsulation ppp

isdn switch-type basic-net3

isdn incoming-voice modem

no cdp enable

!

interface Group-Async1

ip unnumbered Dialer1

encapsulation ppp

dialer in-band

dialer callback-secure

dialer-group 1

async dynamic routing

async mode interactive

peer default ip address pool pool

ppp callback accept

ppp authentication pap

group-range 65 94

!

interface Dialer1

description Dial-In User

ip address 172.31.1.1 255.255.0.0

ip helper-address 90.100.48.38

ip helper-address 90.100.60.202

encapsulation ppp

dialer in-band

dialer callback-secure

dialer map ip 172.31.1.2 name alainisdn class callback 6136

peer default ip address pool pool

no cdp enable

ppp callback accept

ppp authentication chap callin

!

map-class dialer callback

dialer callback-server username

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

password

line 65 94

script dialer callback2gsm

script callback callback2gsm

modem InOut

transport input telnet

transport output pad v120 lapb-ta telnet rlogin udptn

autoselect during-login

autoselect ppp

stopbits 1

flowcontrol hardware

line aux 0

password

line vty 0 4

exec-timeout 0 0

password

!

end

Verificación

En esta sección encontrará información que puede utilizar para confirmar que su configuración esté funcionando correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

- show ip route???muestra el contenido de la tabla de IP Routing

Troubleshoot

En esta sección encontrará información que puede utilizar para solucionar problemas de configuración.

Nota: Antes de ejecutar los comandos debug, consulte Información Importante sobre Comandos Debug.

- debug modem —para observar la actividad de la línea del módem en un servidor de acceso.

- debug dialer events —muestra información de depuración sobre los paquetes recibidos en una interfaz de marcador.

- debug ppp authentication : muestra los mensajes del protocolo de autenticación, incluidos los intercambios de paquetes del protocolo de autenticación por desafío mutuo (CHAP) y los intercambios del protocolo de autenticación por contraseña (PAP).

- debug ppp cbcp : muestra los errores de protocolo y las estadísticas asociadas a las negociaciones de conexión PPP mediante el protocolo de control de devolución de llamada de Microsoft (MSCB).

- debug ISDN Q931 : muestra información sobre la configuración de llamadas y la desconexión de conexiones de red ISDN (capa 3) entre el router local (lado del usuario) y la red.

- debug chat —verifica que el script de chat funcione correctamente.

- debug callback : muestra los eventos de devolución de llamada cuando el router utiliza un módem y un script de chat para devolver la llamada en una línea de terminal.

Ejemplo de resultado del comando debug

Devolución de llamada GSM mediante el uso de V.110

suzanne#

01:03:00: ISDN BR3/1: RX <- SETUP pd = 8 callref = 0x2F

01:03:00: Sending Complete

01:03:00: Bearer Capability i = 0x9090A3

01:03:00: Channel ID i = 0x89

01:03:00: Calling Party Number i = 0x21, 0x83, '478681006', Plan:ISDN,

Type:National

01:03:00: Called Party Number i = 0xA1, '27202094', Plan:ISDN, Type:National

01:03:00: ISDN BR3/1: Event: Received a VOICE call from 478681006 on B1 at 64 Kb/s

01:03:00: ISDN BR3/1: Event: Accepting the call id 0x19

01:03:00: %ISDN-6-LAYER2UP: Layer 2 for Interface BR3/1, TEI 70 changed to up

01:03:00: ISDN BR3/1: TX -> CALL_PROC pd = 8 callref = 0xAF

01:03:00: Channel ID i = 0x89

01:03:00: ISDN BR3/1: TX -> ALERTING pd = 8 callref = 0xAF

01:03:00: ISDN BR3/1: TX -> CONNECT pd = 8 callref = 0xAF

01:03:01: ISDN BR3/1: RX <- CONNECT_ACK pd = 8 callref = 0x2F

01:03:01: Modem 2/12 Mica: configured for Answer mode,

with Null signaling,0x0 tone detection.

01:03:01: Modem 2/12 Mica: in modem state CALL_SETUP

01:03:02: Modem 2/12 Mica: in modem state CONNECT

01:03:06: Modem 2/12 Mica: in modem state LINK

01:03:07: %ISDN-6-CONNECT: Interface BRI3/1:1 is now connected to 478681006

01:03:15: Modem 2/12 Mica: in modem state TRAINUP

01:03:17: Modem 2/12 Mica: in modem state EC_NEGOTIATING

01:03:18: Modem 2/12 Mica: in modem state STEADY

01:03:18: Modem 2/12 Mica: CONNECT at 31200/31200 (Tx/Rx), V34+, LAPM, None

01:03:19: TTY77: DSR came up

01:03:19: tty77: Modem: IDLE->(unknown)

01:03:19: TTY77: EXEC creation

01:03:19: TTY77: set timer type 10, 30 seconds

01:03:19: TTY77: Autoselect(2) sample 7E

01:03:19: TTY77: Autoselect(2) sample 7EFF

01:03:19: TTY77: Autoselect(2) sample 7EFF7D

01:03:19: TTY77: Autoselect(2) sample 7EFF7D23

01:03:19: TTY77 Autoselect cmd: ppp negotiate

01:03:19: TTY77: EXEC creation

01:03:19: TTY77: create timer type 1, 600 seconds

01:03:19: TTY77: destroy timer type 1

01:03:19: TTY77: no timer type 0 to destroy

01:03:19: As77 DDR: Dialer received incoming call from <unknown>

01:03:21: %LINK-3-UPDOWN: Interface Async77, changed state to up

01:03:21: As77 DDR: Dialer statechange to up

01:03:21: As77 DDR: Dialer received incoming call from <unknown>

01:03:21: As77 PPP: Treating connection as a callin

01:03:21: As77 PPP: Authorization required

01:03:22: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:03:22: As77 PPP: Authorization required

01:03:27: Modem 2/12 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:03:27: As77 MCB: Initialize

01:03:27: MCB: Flush

01:03:27: Modem 2/12 Mica: Bad RX Frame: control = 0xE007, length = 0xD,

buffer = 0x3BC6E54

01:03:30: As77 PAP: I AUTH-REQ id 2 len 16 from "alaingsm"

01:03:30: As77 PAP: Authenticating peer alaingsm

01:03:30: As77 PPP: Sent PAP LOGIN Request to AAA

01:03:30: As77 PPP: Received LOGIN Response from AAA = PASS

01:03:30: As77 DDR: Remote name for alaingsm

01:03:30: As77 DDR: Authenticated host alaingsm with no matching dialer map

01:03:30: As77 PAP: O AUTH-ACK id 2 len 5

01:03:30: As77 MCB: Start

01:03:30: As77 MCB: User alaingsm Callback Number - Client ANY

01:03:30: As77 MCB: Newstate 0-INIT -> 2-WAIT_RESPONSE

01:03:30: As77 MCB: O Request Id 1 Callback Type Client-Num delay 0

01:03:32: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 2

01:03:32: As77 MCB: O Request Id 2 Callback Type Client-Num delay 0

01:03:34: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 3

01:03:34: As77 MCB: O Request Id 3 Callback Type Client-Num delay 0

01:03:35: Async77 PPP: I MCB Response(2) id 1 len 22

01:03:35: Async77 MCB:

I 2 1 0 16 2 12 F 1 44 49 30 30 34 37 38 36 38 31 30 30 36 0

01:03:35: As77 MCB: Received response

01:03:35: As77 MCB: Resp ignored. ID Expected 3, got id 1

01:03:36: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 4

01:03:36: As77 MCB: O Request Id 4 Callback Type Client-Num delay 0

01:03:36: Async77 PPP: I MCB Response(2) id 4 len 22

01:03:36: Async77 MCB:

I 2 4 0 16 2 12 F 1 44 49 30 30 34 37 38 36 38 31 30 30 36 0

01:03:36: As77 MCB: Received response

!--- You can see here that "DI00478681006" was entered at the user PC.

01:03:36: As77 MCB: Response CBK-Client-Num 2 18 15, addr 1-DI00478681006

01:03:36: As77 MCB: O Ack Id 5 Callback Type Client-Num delay 15

01:03:36: As77 MCB: Negotiated MCB with peer

01:03:36: As77 MCB: Newstate 2-WAIT_RESPONSE -> 3-WAIT_TERMINATE

01:03:37: As77 MCB: Peer terminating the link

01:03:37: As77 MCB: Newstate 3-WAIT_TERMINATE -> 5-WAIT_LINKDOWN

01:03:37: As77 MCB: Link terminated by peer, Callback Needed

01:03:37: As77 MCB: Newstate 5-WAIT_LINKDOWN -> 6-CALLING

01:03:37: As77 MCB: Initiate Callback for ^->o`iB@ at DI00478681006

using Async DDR

01:03:37: As77 DDR: PPP callback Callback server starting to alaingsm

DI00478681006

01:03:37: As77 MCB: Dialer callback started

!--- Call is disconnected.

01:03:38: Modem 2/12 Mica: in modem state SS_RETRAINING

01:03:38: ISDN BR3/1: RX <- DISCONNECT pd = 8 callref = 0x2F

01:03:38: Cause i = 0x8090 - Normal call clearing

01:03:38: Progress Ind i = 0x8088 - In-band info or appropriate now available

01:03:38: %ISDN-6-DISCONNECT: Interface BRI3/1:1 disconnected from 478681006,

call lasted 37 seconds

01:03:38: ISDN BR3/1: TX -> RELEASE pd = 8 callref = 0xAF

01:03:38: Cause i = 0x8090 - Normal call clearing

01:03:38: Modem 2/12 Mica: in modem state TERMINATING

01:03:38: ISDN BR3/1: RX <- RELEASE_COMP pd = 8 callref = 0x2F

01:03:39: TTY77: Async Int reset: Dropping DTR

01:03:39: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:03:39: As77 PPP: Authorization required

01:03:40: Modem 2/12 Mica: in modem state IDLE

01:03:40: Modem 2/12 Mica: DISCONNECT after 00:00:38, due to reason (0xDF00)

Host Disconnect.

01:03:40: TTY77: DSR was dropped

01:03:40: tty77: Modem: READY->(unknown)

01:03:41: TTY77: dropping DTR, hanging up

01:03:41: tty77: Modem: HANGUP->(unknown)

01:03:41: %LINK-5-CHANGED: Interface Async77, changed state to reset

01:03:42: TTY77: cleanup pending. Delaying DTR

01:03:43: TTY77: cleanup pending. Delaying DTR

01:03:44: TTY77: cleanup pending. Delaying DTR

01:03:44: TTY77: no timer type 0 to destroy

01:03:44: TTY77: no timer type 1 to destroy

01:03:44: TTY77: no timer type 3 to destroy

01:03:44: TTY77: no timer type 4 to destroy

01:03:44: TTY77: no timer type 2 to destroy

01:03:44: Async77: allowing modem_process to continue hangup

01:03:45: TTY77: restoring DTR

01:03:46: %LINK-3-UPDOWN: Interface Async77, changed state to down

01:03:53: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR3/1, TEI 70

changed to down

!--- Callback is started.

01:03:56: As77 DDR: re-enable timeout

01:03:56: DDR: callback triggered by dialer_timers

01:03:56: As77 DDR: beginning callback to alaingsm DI00478681006

01:03:56: As77 DDR: Attempting to dial DI00478681006

01:03:56: CHAT77: Attempting async line dialer script

01:03:56: CHAT77: Dialing using Modem script: callback2gsm & System script:

none

01:03:56: CHAT77: process started

01:03:56: CHAT77: Asserting DTR

01:03:56: CHAT77: Chat script callback2gsm started

01:03:56: CHAT77: Sending string: AT&F

01:03:56: CHAT77: Expecting string: OK

01:03:56: CHAT77: Completed match for expect: OK

01:03:56: CHAT77: Sending string: ATS29=8

01:03:56: CHAT77: Expecting string: OK

01:03:56: CHAT77: Completed match for expect: OK

!--- We send DI00478681006

01:03:56: CHAT77: Sending string: AT \T<DI00478681006>

01:03:56: CHAT77: Expecting string: CONNECT

01:03:56: Modem 2/12 Mica: configured for Originate mode, with Null signaling,

0x1 tone detection.

01:03:56: Modem 2/12 Mica: received dialstring 00478681006

01:03:56: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x000E

01:03:56: Bearer Capability i = 0x8890214846BB

01:03:56: Channel ID i = 0xA9839F

01:03:56: Called Party Number i = 0x81, '00478681006', Plan:ISDN, Type:Unknown

01:03:56: Low Layer Compat i = 0x8890214846BB

01:03:56: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x800E

01:03:56: Channel ID i = 0xA9839F

01:03:56: Modem 2/12 Mica: in modem state CALL_SETUP

01:04:02: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x800E

01:04:03: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x800E

01:04:03: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x000E

01:04:03: Modem 2/12 Mica: in modem state CONNECT

01:04:03: Modem 2/12 Mica: in modem state LINK

01:04:03: Modem 2/12 Mica: in modem state TRAINUP

01:04:03: Modem 2/12 Mica: in modem state EC_NEGOTIATING

01:04:03: Modem 2/12 Mica: in modem state STEADY

01:04:03: CHAT77: Completed match for expect: CONNECT

01:04:03: CHAT77: Sending string: \c

01:04:03: CHAT77: Chat script callback2gsm finished, status = Success

01:04:03: TTY77: no timer type 1 to destroy

01:04:03: TTY77: no timer type 0 to destroy

01:04:03: Modem 2/12 Mica: CONNECT at 9600/9600 (Tx/Rx), V110, V.110, None

01:04:04: As77 PPP: Treating connection as a callout

01:04:04: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:04:04: As77 PPP: Authorization required

01:04:04: %LINK-3-UPDOWN: Interface Async77, changed state to up

01:04:04: As77 DDR: Dialer statechange to up

01:04:04: As77 DDR: Copying MS callback dialstring DI00478681006 to ddb

01:04:04: DDR: Freeing callback to alaingsm DI00478681006

01:04:04: As77 DDR: Dialer call has been placed

01:04:08: Modem 2/12 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:04:08: As77 MCB: Initialize

01:04:08: Modem 2/12 Mica: Bad RX Frame: control = 0xE007, length = 0xD,

buffer = 0x3BC6E54

01:04:09: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to 00478681006

01:04:11: As77 PAP: I AUTH-REQ id 2 len 16 from "alaingsm"

01:04:11: As77 PAP: Authenticating peer alaingsm

01:04:11: As77 PPP: Sent PAP LOGIN Request to AAA

01:04:11: As77 PPP: Received LOGIN Response from AAA = PASS

01:04:11: As77 DDR: Remote name for alaingsm

01:04:11: As77 DDR: Authenticated host alaingsm with no matching dialer map

01:04:11: As77 PAP: O AUTH-ACK id 2 len 5

01:04:13: As77 DDR: dialer protocol up

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2 E1 - OSPF external type 1,

E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.28/32 is directly connected, Async77

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.28

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.28, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 784/858/880 ms

suzanne#

01:04:49: ISDN Se1/0:15: RX <- DISCONNECT pd = 8 callref = 0x800E

01:04:49: Cause i = 0x8090 - Normal call clearing

01:04:49: %ISDN-6-DISCONNECT: Interface Serial1/0:30 disconnected from

00478681006, call lasted 46 seconds

01:04:49: ISDN Se1/0:15: TX -> RELEASE pd = 8 callref = 0x000E

01:04:49: Modem 2/12 Mica: in modem state TERMINATING

01:04:49: ISDN Se1/0:15: RX <- RELEASE_COMP pd = 8 callref = 0x800E

01:04:49: Modem 2/12 Mica: in modem state IDLE

01:04:49: Modem 2/12 Mica: DISCONNECT after 00:00:46,

due to reason (0xDF00) Host Disconnect.

01:04:50: TTY77: DSR was dropped

01:04:50: tty77: Modem: READY->(unknown)

01:04:51: TTY77: Async Int reset: Dropping DTR

01:04:51: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:04:51: As77 PPP: Authorization required

01:04:51: TTY77: dropping DTR, hanging up

01:04:51: tty77: Modem: HANGUP->(unknown)

01:04:52: TTY77: cleanup pending. Delaying DTR

01:04:53: %LINK-5-CHANGED: Interface Async77, changed state to reset

01:04:53: TTY77: cleanup pending. Delaying DTR

01:04:54: TTY77: cleanup pending. Delaying DTR

01:04:55: TTY77: cleanup pending. Delaying DTR

01:04:56: TTY77: no timer type 0 to destroy

01:04:56: TTY77: no timer type 1 to destroy

01:04:56: TTY77: no timer type 3 to destroy

01:04:56: TTY77: no timer type 4 to destroy

01:04:56: TTY77: no timer type 2 to destroy

01:04:56: Async77: allowing modem_process to continue hangup

01:04:56: TTY77: restoring DTR

01:04:58: %LINK-3-UPDOWN: Interface Async77, changed state to down

01:05:08: As77 DDR: re-enable timeout

Devolución de llamada del módem mediante el uso de V.110

!--- Modem callback using default of MICA (modem dialing US robotics).

suzanne#

01:06:21: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x6D73

01:06:21: Sending Complete

01:06:21: Bearer Capability i = 0x9090A3

01:06:21: Channel ID i = 0xA18387

01:06:21: Progress Ind i = 0x8183 - Origination address is non-ISDN

01:06:21: Calling Party Number i = 0xA1, '6020', Plan:ISDN, Type:National

01:06:21: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:06:21: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xED73

01:06:21: Channel ID i = 0xA98387

01:06:21: ISDN Se1/0:15: TX -> ALERTING pd = 8 callref = 0xED73

01:06:21: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xED73

01:06:21: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x6D73

01:06:21: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1A, bchan 6, dsl 0

01:06:21: Modem 2/13 Mica: configured for Answer mode, with Null signaling,

0x0 tone detection.

01:06:21: Modem 2/13 Mica: in modem state CALL_SETUP

01:06:22: Modem 2/13 Mica: in modem state CONNECT

01:06:26: Modem 2/13 Mica: in modem state LINK

01:06:27: %ISDN-6-CONNECT: Interface Serial1/0:6 is now connected to 6020

01:06:34: Modem 2/13 Mica: in modem state TRAINUP

01:06:36: Modem 2/13 Mica: in modem state EC_NEGOTIATING

01:06:36: Modem 2/13 Mica: in modem state STEADY

01:06:36: Modem 2/13 Mica: CONNECT at 9600/9600 (Tx/Rx), V34+, LAPM, None

01:06:37: TTY78: DSR came up

01:06:37: tty78: Modem: IDLE->(unknown)

01:06:37: TTY78: EXEC creation

01:06:37: TTY78: set timer type 10, 30 seconds

01:06:40: TTY78: Autoselect(2) sample 7E

01:06:40: TTY78: Autoselect(2) sample 7EFF

01:06:40: TTY78: Autoselect(2) sample 7EFF7D

01:06:40: TTY78: Autoselect(2) sample 7EFF7D23

01:06:40: TTY78 Autoselect cmd: ppp negotiate

01:06:40: TTY78: EXEC creation

01:06:40: TTY78: create timer type 1, 600 seconds

01:06:40: TTY78: destroy timer type 1

01:06:40: TTY78: no timer type 0 to destroy

01:06:40: As78 DDR: Dialer received incoming call from <unknown>

01:06:42: %LINK-3-UPDOWN: Interface Async78, changed state to up

01:06:42: As78 DDR: Dialer statechange to up

01:06:42: As78 DDR: Dialer received incoming call from <unknown>

01:06:42: As78 PPP: Treating connection as a callin

01:06:42: As78 PPP: Authorization required

01:06:43: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:06:43: As78 PPP: Authorization required

01:06:47: Modem 2/13 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:06:47: As78 MCB: Initialize   01:06:47: MCB: Flush

01:06:47: Modem 2/13 Mica: Bad RX Frame: control = 0xE007, length = 0xE, buffer = 0x3BC9014

01:06:50: As78 PAP: I AUTH-REQ id 2 len 16 from "alainmod"

01:06:50: As78 PAP: Authenticating peer alainmod

01:06:50: As78 PPP: Sent PAP LOGIN Request to AAA

01:06:50: As78 PPP: Received LOGIN Response from AAA = PASS

01:06:50: As78 DDR: Remote name for alainmod

01:06:50: As78 DDR: Authenticated host alainmod with no matching dialer map

01:06:50: As78 PAP: O AUTH-ACK id 2 len 5

01:06:50: As78 MCB: Start

01:06:50: As78 MCB: User alainmod Callback Number - Client ANY

01:06:50: As78 MCB: Newstate 0-INIT -> 2-WAIT_RESPONSE

01:06:50: As78 MCB: O Request Id 1 Callback Type Client-Num delay 0

01:06:52: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 2

01:06:52: As78 MCB: O Request Id 2 Callback Type Client-Num delay 0

01:06:54: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 3

01:06:54: As78 MCB: O Request Id 3 Callback Type Client-Num delay 0

01:06:54: Async78 PPP: I MCB Response(2) id 1 len 17

01:06:54: Async78 MCB: I 2 1 0 11 2 D F 1 5A 44 54 20 36 30 32 30 0

01:06:54: As78 MCB: Received response

01:06:54: As78 MCB: Resp ignored. ID Expected 3, got id 1

01:06:56: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 4

01:06:56: As78 MCB: O Request Id 4 Callback Type Client-Num delay 0

01:06:56: Async78 PPP: I MCB Response(2) id 4 len 17

01:06:56: Async78 MCB: I 2 4 0 11 2 D F 1 5A 44 54 20 36 30 32 30 0

01:06:56: As78 MCB: Received response

01:06:56: As78 MCB: Response CBK-Client-Num 2 13 15, addr 1-ZDT 6020

01:06:56: As78 MCB: O Ack Id 5 Callback Type Client-Num delay 15

01:06:56: As78 MCB: Negotiated MCB with peer

01:06:56: As78 MCB: Newstate 2-WAIT_RESPONSE -> 3-WAIT_TERMINATE

01:06:56: As78 MCB: Peer terminating the link

01:06:56: As78 MCB: Newstate 3-WAIT_TERMINATE -> 5-WAIT_LINKDOWN

01:06:56: As78 MCB: Link terminated by peer, Callback Needed

01:06:56: As78 MCB: Newstate 5-WAIT_LINKDOWN -> 6-CALLING

01:06:56: As78 MCB: Initiate Callback for ^->o`iB@ at ZDT 6020 using Async DDR

01:06:56: As78 DDR: PPP callback Callback server starting to alainmod ZDT 6020

01:06:56: As78 MCB: Dialer callback started

01:06:57: Modem 2/13 Mica: in modem state TERMINATING

01:06:57: Modem 2/13 Mica: in modem state IDLE

01:06:57: %ISDN-6-DISCONNECT: Interface Serial1/0:6 disconnected from 6020,

call lasted 36 seconds

01:06:57: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xED73

01:06:57: Cause i = 0x8090 - Normal call clearing

01:06:57: Modem 2/13 Mica: DISCONNECT after 00:00:35, due to reason (0x8220)

EC rcvd DISC frame.

01:06:57: TTY78: DSR was dropped

01:06:57: tty78: Modem: READY->(unknown)

01:06:57: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x6D73

01:06:57: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xED73

01:06:58: TTY78: dropping DTR, hanging up

01:06:58: TTY78: Async Int reset: Dropping DTR

01:06:58: tty78: Modem: HANGUP->(unknown)

01:06:59: TTY78: cleanup pending. Delaying DTR

01:06:59: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:06:59: As78 PPP: Authorization required

01:07:00: %LINK-5-CHANGED: Interface Async78, changed state to reset

01:07:00: TTY78: cleanup pending. Delaying DTR

01:07:01: TTY78: cleanup pending. Delaying DTR

01:07:02: TTY78: cleanup pending. Delaying DTR

01:07:03: TTY78: no timer type 0 to destroy

01:07:03: TTY78: no timer type 1 to destroy

01:07:03: TTY78: no timer type 3 to destroy

01:07:03: TTY78: no timer type 4 to destroy

01:07:03: TTY78: no timer type 2 to destroy

01:07:03: Async78: allowing modem_process to continue hangup

01:07:03: TTY78: restoring DTR

01:07:05: %LINK-3-UPDOWN: Interface Async78, changed state to down

01:07:15: As78 DDR: re-enable timeout

!--- Callback start.

01:07:15: DDR: callback triggered by dialer_timers

01:07:15: As78 DDR: beginning callback to alainmod ZDT 6020

01:07:15: As78 DDR: Attempting to dial ZDT 6020

01:07:15: CHAT78: Attempting async line dialer script

01:07:15: CHAT78: Dialing using Modem script: callback2gsm

& System script: none

01:07:15: CHAT78: process started

01:07:15: CHAT78: Asserting DTR

01:07:15: CHAT78: Chat script callback2gsm started

01:07:15: CHAT78: Sending string: AT&F

01:07:15: CHAT78: Expecting string: OK

01:07:15: CHAT78: Completed match for expect: OK

01:07:15: CHAT78: Sending string: ATS29=8

01:07:15: CHAT78: Expecting string: OK

01:07:15: CHAT78: Completed match for expect: OK

!--- The user entered "ZDT 6020". This is what we send:

01:07:15: CHAT78: Sending string: AT \T<ZDT 6020>

01:07:15: CHAT78: Expecting string: CONNECT

01:07:15: Modem 2/13 Mica: configured for Originate mode, with Null signaling,

0x1 tone detection.

01:07:15: Modem 2/13 Mica: received dialstring 6020

01:07:15: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x000F

01:07:15: Bearer Capability i = 0x9090A3

01:07:15: Channel ID i = 0xA9839F

01:07:15: Called Party Number i = 0x81, '6020', Plan:ISDN, Type:Unknown

01:07:15: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x800F

01:07:15: Channel ID i = 0xA9839F

01:07:15: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x800F

01:07:15: Modem 2/13 Mica: in modem state CALL_SETUP

01:07:16: Modem 2/13 Mica: Detected Dial tone

01:07:17: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x800F

01:07:17: Progress Ind i = 0x8182 - Destination address is non-ISDN

01:07:17: Connected Number i = 0xA136303230

01:07:17: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x000F

01:07:17: Modem 2/13 Mica: in modem state CONNECT

01:07:19: Modem 2/13 Mica: in modem state LINK

01:07:23: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to 6020

01:07:26: Modem 2/13 Mica: in modem state TRAINUP

01:07:28: Modem 2/13 Mica: in modem state EC_NEGOTIATING

01:07:28: Modem 2/13 Mica: in modem state STEADY

01:07:28: CHAT78: Completed match for expect: CONNECT

01:07:28: CHAT78: Sending string: \c

01:07:28: CHAT78: Chat script callback2gsm finished, status = Success

01:07:28: TTY78: no timer type 1 to destroy

01:07:28: TTY78: no timer type 0 to destroy

01:07:28: Modem 2/13 Mica: CONNECT at 33600/31200 (Tx/Rx), V34+, LAPM, None

01:07:28: As78 PPP: Treating connection as a callout

01:07:28: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:07:28: As78 PPP: Authorization required

01:07:28: %LINK-3-UPDOWN: Interface Async78, changed state to up

01:07:28: As78 DDR: Dialer statechange to up

01:07:28: As78 DDR: Copying MS callback dialstring ZDT 6020 to ddb

01:07:28: DDR: Freeing callback to alainmod ZDT 6020

01:07:28: As78 DDR: Dialer call has been placed

01:07:29: Modem 2/13 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:07:29: As78 MCB: Initialize

01:07:29: As78 PAP: I AUTH-REQ id 1 len 16 from "alainmod"

01:07:29: As78 PAP: Authenticating peer alainmod

01:07:29: As78 PPP: Sent PAP LOGIN Request to AAA

01:07:29: As78 PPP: Received LOGIN Response from AAA = PASS

01:07:29: As78 DDR: Remote name for alainmod

01:07:29: As78 DDR: Authenticated host alainmod with no matching dialer map

01:07:29: As78 PAP: O AUTH-ACK id 1 len 5

01:07:29: As78 DDR: dialer protocol up

01:07:29: %LINEPROTO-5-UPDOWN: Line protocol on Interface Async78,

changed state to up

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.19/32 is directly connected, Async78

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.19

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.19, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 356/372/396 ms

suzanne#

01:08:08: Modem 2/13 Mica: in modem state TERMINATING

01:08:08: Modem 2/13 Mica: in modem state IDLE

01:08:08: Modem 2/13 Mica: DISCONNECT after 00:00:51, due to reason (0x8220)

EC rcvd DISC frame.

01:08:08: %ISDN-6-DISCONNECT: Interface Serial1/0:30 disconnected from 6020,

call lasted 51 seconds

01:08:08: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0x000F

01:08:08: Cause i = 0x8090 - Normal call clearing

01:08:08: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x800F

01:08:08: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0x000F

01:08:09: TTY78: DSR was dropped

01:08:09: tty78: Modem: READY->(unknown)

01:08:09: %LINEPROTO-5-UPDOWN: Line protocol on Interface Async78,

changed state to down

01:08:10: TTY78: dropping DTR, hanging up

01:08:10: TTY78: Async Int reset: Dropping DTR

01:08:10: tty78: Modem: HANGUP->(unknown)

01:08:10: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:08:10: As78 PPP: Authorization required

01:08:11: TTY78: cleanup pending. Delaying DTR

01:08:12: %LINK-5-CHANGED: Interface Async78, changed state to reset

01:08:12: TTY78: cleanup pending. Delaying DTR

01:08:13: TTY78: cleanup pending. Delaying DTR

01:08:14: TTY78: cleanup pending. Delaying DTR

01:08:15: TTY78: no timer type 0 to destroy

01:08:15: TTY78: no timer type 1 to destroy

01:08:15: TTY78: no timer type 3 to destroy

01:08:15: TTY78: no timer type 4 to destroy

01:08:15: TTY78: no timer type 2 to destroy

01:08:15: Async78: allowing modem_process to continue hangup

01:08:15: TTY78: restoring DTR

01:08:17: %LINK-3-UPDOWN: Interface Async78, changed state to down

01:08:27: As78 DDR: re-enable timeout

Devolución de llamada de ISDN mediante V.110

!--- Receive call.

suzanne#

01:09:00: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x6F28

01:09:00: Sending Complete

01:09:00: Bearer Capability i = 0x8890

01:09:00: Channel ID i = 0xA18388

01:09:00: Calling Party Number i = 0xA1, '6136', Plan:ISDN, Type:National

01:09:00: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:09:00: %LINK-3-UPDOWN: Interface Serial1/0:7, changed state to up

01:09:00: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xEF28

01:09:00: Channel ID i = 0xA98388

01:09:00: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xEF28

01:09:00: Channel ID i = 0xA98388

01:09:00: Se1/0:7 PPP: Treating connection as a callin

01:09:00: Se1/0:7 PPP: Authorization required

01:09:00: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x6F28

01:09:00: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1B,

bchan 7, dsl 0

01:09:01: Se1/0:7 PPP: Authorization required

01:09:01: Se1/0:7 MCB: Initialize

01:09:01: Se1/0:7 CHAP: O CHALLENGE id 1 len 28 from "suzanne"

01:09:01: Se1/0:7 CHAP: I RESPONSE id 1 len 30 from "alainisdn"

01:09:01: Se1/0:7 PPP: Sent CHAP LOGIN Request to AAA

01:09:01: Se1/0:7 PPP: Received LOGIN Response from AAA = PASS

01:09:01: Se1/0:7 DDR: Remote name for alainisdn

01:09:01: Se1/0:7 CHAP: O SUCCESS id 1 len 4

01:09:01: Se1/0:7 DDR: PPP callback Callback server starting to

alainisdn 6136

01:09:01: Se1/0:7 DDR: disconnecting call

01:09:01: %ISDN-6-CONNECT: Interface Serial1/0:7 is now connected to

6136 alainisdn

01:09:01: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xEF28

01:09:01: Cause i = 0x8090 - Normal call clearing

01:09:01: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x6F28

01:09:01: %LINK-3-UPDOWN: Interface Serial1/0:7, changed state to down

01:09:01: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xEF28

01:09:01: Se1/0:7 DDR: disconnecting call

01:09:02: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x70DF

01:09:02: Sending Complete

01:09:02: Bearer Capability i = 0x8890

01:09:02: Channel ID i = 0xA18389

01:09:02: Calling Party Number i = 0xA1, '6136', Plan:ISDN, Type:National

01:09:02: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:09:02: %LINK-3-UPDOWN: Interface Serial1/0:8, changed state to up

01:09:02: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xF0DF

01:09:02: Channel ID i = 0xA98389

01:09:02: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xF0DF

01:09:02: Channel ID i = 0xA98389

01:09:02: Se1/0:8 PPP: Treating connection as a callin

01:09:02: Se1/0:8 PPP: Authorization required

01:09:02: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x70DF

01:09:02: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1C,

bchan 8, dsl 0

01:09:02: Se1/0:8 PPP: Authorization required

01:09:03: Se1/0:8 MCB: Initialize

01:09:03: Se1/0:8 CHAP: O CHALLENGE id 1 len 28 from "suzanne"

01:09:03: Se1/0:8 CHAP: I RESPONSE id 1 len 30 from "alainisdn"

01:09:03: Se1/0:8 PPP: Sent CHAP LOGIN Request to AAA

01:09:03: Se1/0:8 PPP: Received LOGIN Response from AAA = PASS

01:09:03: Se1/0:8 DDR: Remote name for alainisdn

01:09:03: Se1/0:8 CHAP: O SUCCESS id 1 len 4

01:09:03: Se1/0:8 DDR: callback to alainisdn already started

01:09:03: Se1/0:8 DDR: disconnecting call

01:09:03: %ISDN-6-CONNECT: Interface Serial1/0:8 is now connected

to 6136 alainisdn

01:09:03: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xF0DF

01:09:03: Cause i = 0x8090 - Normal call clearing

01:09:03: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x70DF

01:09:03: %LINK-3-UPDOWN: Interface Serial1/0:8, changed state to down

01:09:03: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xF0DF

01:09:03: Se1/0:8 DDR: disconnecting call

!--- Callback Start

01:09:16: DDR: Callback timer expired

01:09:16: Di1 DDR: beginning callback to alainisdn 6136

01:09:16: Se1/0:15 DDR: rotor dialout [priority]

01:09:16: Se1/0:15 DDR: Attempting to dial 6136

01:09:16: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x0010

01:09:16: Bearer Capability i = 0x8890

01:09:16: Channel ID i = 0xA9839F

01:09:16: Called Party Number i = 0x81, '6136', Plan:ISDN, Type:Unknown

01:09:16: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x8010

01:09:16: Channel ID i = 0xA9839F

01:09:16: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x8010

01:09:16: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x8010

01:09:16: Connected Number i = 0xA136313336

01:09:16: %LINK-3-UPDOWN: Interface Serial1/0:30, changed state to up

01:09:16: DDR: Freeing callback to alainisdn 6136

01:09:16: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x0010

01:09:16: Se1/0:30 PPP: Treating connection as a callout

01:09:16: Se1/0:30 PPP: Authorization required

01:09:16: Se1/0:30 MCB: Initialize

01:09:16: Se1/0:30 CHAP: I CHALLENGE id 7 len 30 from "alainisdn"

01:09:16: Se1/0:30 PPP: Sent CHAP SENDAUTH Request to AAA

01:09:16: Se1/0:30 PPP: Received SENDAUTH Response from AAA = PASS

01:09:16: Se1/0:30 CHAP: O RESPONSE id 7 len 28 from "suzanne"

01:09:16: Se1/0:30 CHAP: I SUCCESS id 7 len 4

01:09:16: Se1/0:30 PPP: Sent LCP AUTHOR Request to AAA

01:09:16: Se1/0:30 PPP: Sent IPCP AUTHOR Request to AAA

01:09:16: Se1/0:30 LCP: Received AAA AUTHOR Response = PASS

01:09:16: Se1/0:30 IPCP: Received AAA AUTHOR Response = PASS

01:09:16: Se1/0:30 DDR: dialer protocol up

01:09:17: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0:30,

changed state to up

01:09:22: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to

6136 alainisdn

suzanne#

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.2/32 is directly connected, Dialer1

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/34/36 ms

suzanne#

Información Relacionada

- Página de Soporte de la Tecnología de Marcación y Acceso

- Soporte Técnico y Documentación - Cisco Systems