Contenido

Introducción

Antes de que usted comience

Convenciones

prerrequisitos

Componentes Utilizados

Teoría previa

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshooting

Información Relacionada

Introducción

Este documento contiene las descripciones, las configuraciones y las verificaciones para el Generic Routing Encapsulation (GRE) en un entorno de cable. GRE es un protocolo de tunelización desarrollado por Cisco que encapsula una amplia variedad de tipos de paquetes de protocolo dentro de los túneles IP.

Antes de que usted comience

Convenciones

Para más información sobre los convenios del documento, vea los convenios de los consejos técnicos de Cisco.

prerrequisitos

No hay requisitos previos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las versiones de software y hardware indicadas a continuación.

- Módem cable uBR924 que funciona con el Software Release 12.1(5)T4 de Cisco IOS®

Nota: Aunque sea posible configurar los túneles GRE en otras Plataformas del módem cable de Cisco, por ejemplo en el uBR904 usando diversas versiones del Cisco IOS, el soporte oficial para esta característica está en el Cisco IOS 12.1(5)T4 para uBR920 y del Cisco IOS 12.1(3) para uBR910.

Plataforma del módem cable

Versión de software del IOS de Cisco

uBR920

12.1(5)T4

uBR910

A partir de la 12.1(3) y más adelante

Para funcionar con esta configuración, usted necesita tener Conectividad IP entre el dos Cable módems.

La Información presentada en este documento fue creada de los dispositivos en un entorno específico del laboratorio. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si la red está funcionando, asegúrese de haber comprendido el impacto que puede tener un comando antes de ejecutarlo.

Teoría previa

El Tunelización proporciona a una manera de encapsular los paquetes de un protocolo externo dentro de un Transport Protocol. El Tunelización se ejecuta como interfaz virtual para proporcionar a una interfaz simple para la configuración. La interfaz del túnel no se ata al pasajero específico o los protocolos de transporte, sin embargo, es una arquitectura que se diseña para proporcionar los servicios necesarios ejecutar cualquier esquema estándar de la encapsulación Point-to-Point. Los túneles son links de punto a punto, y usted debe configurar un túnel diferente para cada link.

GRE establece un link Point-to-Point virtual al Routers de Cisco en las puntas remotas sobre una red interna IP. Conectando los redes secundarios multiprotocol en un entorno de estructura básica de un solo protocolo, el Tunelización IP usando GRE permite la expansión de la red a través de un entorno de estructura básica de un solo protocolo. Un Sistema de terminación del cablemódem (CMTS) es cualquier Data-over-Cable Service Interface Specifications (DOCSIS) - de cabecera compatible con telegrafíe al router, tal como el uBR7246 de Cisco, uBR7223, o uBR7246VXR.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Diagrama de la red

Este documento utiliza la instalación de red que se muestra en el siguiente diagrama.

Esta disposición crea un túnel entre el dos Cable módems uBR924-ddd5 y uBR924-b5db. El ejemplo debajo de las aplicaciones dos uBR924s y un uBR7246VXR. Para esta disposición, los nombres del Cable módems son ubr924-ddd5 y ubr924-b5db, y utilizan la versión 12.1(5)T4 del Cisco IOS. Las interfaces del túnel son creadas dinámicamente en el modo de configuración global publicando el comando interface tunnel 0.

Nota: Siempre y cuando haya conectividad de la IP entre los dos cablemódems, no es necesario que los cablemódems uBR900 estén conectados al mismo uBR7200 CMTS o a la misma red del proveedor de servicio.

Configuraciones

Este documento usa las configuraciones detalladas a continuación.

Nota: El texto intrépido refiere a los Comandos relacionados GRE. Los comentarios están en el azul y refieren a la línea arriba.

ubr924-ddd5

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-ddd5

!

logging rate-limit console 10 except errors

!

clock timezone - -80

ip subnet-zero

no ip finger

!

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0.

ip address 192.168.20.1 255.255.255.0

!--- IP address of the GRE tunnel interface 0.

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 11.11.11.11

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 9.9.9.9 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

cable-modem downstream saved channel 525000000 40 1

cable-modem mac-timer t2 40000

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 9.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

transport input none

line vty 0 4

login

!

end

ubr924-ddd5#

ubr924-b5db

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-b5db

!

logging rate-limit console 10 except errors

enable password ww

!

clock timezone - -80

ip subnet-zero

no ip finger

!

mgcp

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0

ip address 192.168.20.2 255.255.255.0

!--- IP address of the gre tunnel interface 0

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 9.9.9.9

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 11.11.11.11 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

no ip route-cache

no ip mroute-cache

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

no ip route-cache

no ip mroute-cache

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 11.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

password ww

login

!

end

ubr924-b5db#

Verificación

En esta sección encontrará información que puede utilizar para confirmar que su configuración esté funcionando correctamente.

La herramienta intérprete de la salida apoyan a los ciertos comandos show, que permite que usted vea un análisis de la salida del comando show.

Verifique que la configuración CMTS (7246VXR) esté correcta, y que el Cable módems está en línea. La configuración del CMTS se muestra abajo.

7246VXR#show run

Building configuration...

Current configuration : 4579 bytes

!

! Last configuration change at 13:22:17 PDT Mon Feb 26 2001

! NVRAM config last updated at 13:22:46 PDT Mon Feb 26 2001

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime localtime

no service password-encryption

service linenumber

service udp-small-servers max-servers no-limit

!

hostname 7246VXR

!

logging buffered 1000000 debugging

logging rate-limit console 10 except errors

enable password cable

!

cable qos profile 8

cable qos profile 10

cable qos profile 10 grant-size 1500

cable qos profile 12 guaranteed-upstream 100000

no cable qos permission create

no cable qos permission update

cable qos permission modems

cable time-server

clock timezone PDT -8

clock summer-time PDT recurring

clock calendar-valid

ip subnet-zero

no ip finger

!

interface Ethernet2/0

ip address 172.16.30.4 255.255.255.192

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.29.1 255.255.255.224 secondary

ip address 10.1.4.1 255.255.255.0

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.16.30.2

!

interface Cable5/0

ip address 172.16.29.225 255.255.255.224 secondary

ip address 10.1.5.1 255.255.255.0

load-interval 30

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

no cable upstream 1 shutdown

cable dhcp-giaddr policy

!

router eigrp 202

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

no eigrp log-neighbor-changes

!

router rip

version 2

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

!

ip default-gateway 172.16.30.1

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.30.1

ip route 172.16.30.0 255.255.255.0 Ethernet2/0

ip http server

ip http authentication local

!

access-list 188 permit tcp any any eq www log

access-list 188 permit ip any any

route-map docsis permit 10

!

snmp-server engineID local 00000009020000E01ED77E40

snmp-server community public RO

snmp-server community private RW

line con 0

exec-timeout 0 0

transport input none

line aux 0

speed 19200

line vty 0 4

session-timeout 60

exec-timeout 0 0

!

ntp clock-period 17179973

end

7246VXR#show cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable4/0/U0 69   online     2812    0.25  5   0   10.1.4.3        0002.1685.b5db

Cable4/0/U0 70   online     2288    0.00  5   0   10.1.4.6        0010.7bed.9b23

Cable4/0/U0 71   online     2289    0.50  5   0   10.1.4.2        0010.7bed.9b45

Cable4/0/U0 72   online     2812    0.00  5   0   10.1.4.4        0002.fdfa.0a63

Cable4/0/U0 73   online     2812   -0.75  5   0   10.1.4.5        0004.2752.ddd5

Cable4/0/U0 74   online     2813    0.25  5   0   10.1.4.7        0001.64ff.e47d

Si el estado en línea del Cable módems no muestra en línea, refiera al documento en línea que no viene del Cable módems del uBR del troubleshooting.

7246VXR#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

FastEthernet0/0            192.168.7.253   YES NVRAM  up                    down

Ethernet2/0                172.16.30.4     YES manual up                    up

Ethernet2/1                unassigned      YES NVRAM  administratively down down

Ethernet2/2                unassigned      YES NVRAM  administratively down down

Ethernet2/3                unassigned      YES NVRAM  administratively down down

Cable3/0                   10.1.3.1        YES manual up                    up

Cable4/0                   10.1.4.1        YES manual up                    up

Cable5/0                   10.1.5.1        YES manual up                    up

7246VXR#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.30.1 to network 0.0.0.0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

C       172.16.29.224/27 is directly connected, Cable5/0

C       172.16.29.0/27 is directly connected, Cable4/0

S       172.16.30.0/24 is directly connected, Ethernet2/0

C       172.16.30.0/26 is directly connected, Ethernet2/0

9.0.0.0/24 is subnetted, 1 subnets

R       9.9.9.0 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

R    192.168.20.0/24 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C       10.1.3.0/24 is directly connected, Cable3/0

R       10.5.5.0/24 [120/1] via 10.1.4.4, 00:00:01, Cable4/0

R       10.0.0.0/8 [120/1] via 172.16.30.10, 00:00:24, Ethernet2/0

C       10.1.5.0/24 is directly connected, Cable5/0

C       10.1.4.0/24 is directly connected, Cable4/0

11.0.0.0/24 is subnetted, 1 subnets

R       11.11.11.0 [120/1] via 10.1.4.3, 00:00:15, Cable4/0

S*   0.0.0.0/0 is directly connected

Del Cable módems eche a un lado, verifique la versión sh de ambos dispositivos, como se muestra abajo.

ubr924-ddd5#sh ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-ddd5 uptime is 2 hours, 1 minute

System returned to ROM by reload at 12:45:25 - Fri Feb 23 2001

System restarted at 12:46:07 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 4.d) with 15872K/1024K bytes of memory.

Processor board ID FAA0444Q14Z

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

ubr924-b5db#show ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-b5db uptime is 1 hour, 53 minutes

System returned to ROM by reload at 12:55:34 - Fri Feb 23 2001

System restarted at 12:56:15 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 3.e) with 15872K/1024K bytes of memory.

Processor board ID FAA0422Q04F

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

El túnel mostrará up/up, mientras existan las condiciones siguientes:

- Se configura con los IP Addresses válidos.

- Hay una ruta en la tabla de encaminamiento a la dirección IP del destino del túnel, y no la dirección IP asignada al extremo lejano del túnel.

Esto debe ser verdad sin importar si usted puede hacer ping el direccionamiento de destino. Una Static ruta incorrecta o un default route que señala en la dirección incorrecta traerá para arriba el túnel, sin embargo, el túnel no funcionará.

El primer paso para verificar que los trabajos del túnel sean verificar que el túnel está para arriba. Publique los comandos show ip interface brief y show interface tunnel 0 en ambo Cable módems. A continuación, se incluye un resultado de ejemplo del comando

ubr924-ddd5#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  9.9.9.9         YES manual up                    up

Tunnel0                    192.168.20.1    YES manual up                    up

cable-modem0               10.1.4.5        YES unset  up                    up

ubr924-ddd5#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 9.9.9.9 (Ethernet0), destination 11.11.11.11

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:15:25, output 00:14:27, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 2 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

146 packets input, 21024 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

172 packets output, 57392 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

ubr924-b5db#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  11.11.11.11     YES manual up                    up

Tunnel0                    192.168.20.2    YES manual up                    up

cable-modem0               10.1.4.3        YES NVRAM  up                    up

ubr924-b5db#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.2/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 11.11.11.11 (Ethernet0), destination 9.9.9.9

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:16:42, output 00:17:40, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 5 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

118 packets input, 19144 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

164 packets output, 49624 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

Verifique que los trabajos del túnel sean hacer ping la dirección IP del destino del túnel. Esto verificará la Conectividad IP solamente, no el funcionamiento real del túnel.

From ubr924-ddd5 we ping 11.11.11.11

ubr924-ddd5#ping 11.11.11.11

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/17 ms

ubr924-ddd5#

Ping de ubr924-b5db el direccionamiento de destino 9.9.9.9.

ubr924-b5db#ping 9.9.9.9

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-b5db#

Para verificar que el túnel funcione, publique el comando show ip route x x x x, donde está la dirección IP x.x.x.x asignada al extremo lejano del túnel. En este caso, sería el direccionamiento del loop-detrás del router lejano. Si la única ruta mostrada está a la interfaz del túnel, un ping a ese direccionamiento probará que el túnel funciona.

Si hay un esquema de dirección IP que hace publicidad de las rutas a la parte posterior del segmento del túnel a través de la red, habría más de una ruta al extremo lejano de la interfaz del túnel. Si ése es el caso, es muy difícil verificar que el túnel está funcionando. Típicamente en esta situación, usted no quiere las rutas duplicados a la red de túneles. Las medidas se deben tomar para prevenir el anuncio de las rutas por un protocolo de la encaminamiento a través de la red. Si el túnel se está utilizando para transportar el tráfico de un diverso protocolo del IP, el mismo método de la verificación básica se aplica.

From ubr924-ddd5 we get

ubr924-ddd5#show ip route 192.168.20.2

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

From ubr924-b5db we get

ubr924-b5db#show ip route 192.168.20.1

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

Para verificar que el PC1 pueda tener acceso al PC2 y vice versa, realice los pings extendidos en el Cable módems, y también hace ping de las PC.

Realice un ping extendido en ubr924-b5db de su interfaz de los Ethernetes (11.11.11.11) al interfaz de los Ethernetes ubr924-ddd5 (9.9.9.9).

ubr924-b5db#ping ip

Target IP address: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/16/28 ms

ubr924-b5db#

Realice el contrario para probar la otra Conectividad del lado.

ubr924-ddd5#ping ip

Target IP address: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-ddd5#

La Prueba final es hacer ping del PC1 al PC2, y del PC2 al PC1.

PC1 tiene una dirección IP 9.9.9.1.

La dirección IP de PC2 es 11.11.11.1.

Ping de PC1 a PC2.

Comando ping desde PC2 a PC1.

Troubleshooting

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Troubleshooting de uBR Cable Modems que no funcionan

- Soporte Técnico - Cisco Systems