Table of Contents

IOHrcsi.fm

Cisco Network Modules, Server Modules, Interface Cards Regulatory Compliance and Safety Information

This document provides domestic and international regulatory compliance and safety information for the Cisco network modules, server modules, and interface cards supported in the following products:

- Cisco 1700 series

- Cisco 1800 (modular)

- Cisco 1900 series

- Cisco 2600 series

- Cisco 2800 series

- Cisco 2900 series

- Cisco 3600 series

- Cisco 3700 series

- Cisco 3800 series

- Cisco 3900 series

- Cisco MWR 1941-DC routers

- Cisco IAD243x series

This document contains the following sections:

- Installation Precautions

- Agency Compliance

- Approval Information

- Translated Safety Warnings

- Obtaining Documentation, Obtaining Support, and Security Guidelines

Installation Precautions

This equipment is not designed for making emergency telephone calls when the power fails. Alternative arrangements should be made for access to emergency services. Access to emergency services can be affected by any call-barring function of this equipment.

California Perchlorate Contamination Prevention Act (Title 22, California Code of Regulations, Chapter 33)

.

Agency Compliance

The following agency compliance applies to Cisco network modules and interface cards, when used in Cisco 1700 series, Cisco 1800 (modular), Cisco 1900 series, Cisco 2600 series, Cisco 2800 series, Cisco 2900 series, Cisco 3600 series, Cisco 3700 series, Cisco 3800 series, Cisco 3900 series, Cisco MWR 1941-DC, and Cisco IAD243x series routers.

Table 1 Agency Compliance

Type

Compliance

Safety

UL 60950-1, CSA C22.2 No. 60950-1, IEC 60950-1, EN 60950-1, AS/NZS 60950.1, EN 50385

EMI/EMC

Emissions:

47CFR part 15 Class A (FCC); CISPR22 Class A; EN55022 Class A;AS/NZS CISPR 22 Class A; ICES003 Class A (Industry Canada); V-3 Class A (VCCI); EN61000-3-2; EN61000-3-3; EN300386 Class A; EN 301 489-1, EN 301 489-7 and EN 301 489-24

Immunity:

EN50024, EN50082-1, & EN61000-6-1 (including EN 61000 4-2 Electrostatic Discharge; EN 61000 4-3 Radiated Susceptibility; EN 61000 4-4 Electrical Fast Transients; EN 61000 4-5 Power & Signal Line Surges; EN 61000 4-6 Injected RF Swept Immunity; EN61000-4-11 Voltage Dips + Sags); EN300386; EN 301 489-1, EN 301 489-7 and EN 301 489-24

Radio

EN 301 511, EN 301 908-1, EN 301 908-2

Post Telephone & Telegraph (PTT)

This equipment complies with all the regulatory requirements for connection to the communications networks of each country in which it is sold.

USA

FCC Part 15 Notice

When used in Cisco 1700 series, Cisco 1800 series (modular), Cisco 1900 series, Cisco 2600 series, Cisco 2800 series, Cisco 2900 series, Cisco 3600 series, Cisco 3700 series, Cisco 3800 series, Cisco 3900 series, Cisco MWR 1941-DC, Cisco IAD243x series routers, Cisco network modules and interface cards comply with Part 15 of the FCC Rules. Operation is subject to the following two conditions:

1. This device may not cause harmful interference.

2. This device must accept any interference received, including interference that may cause undesired operation.

Modifying this equipment without Cisco’s authorization may result in the equipment no longer complying with FCC requirements for Class A or Class B digital devices. In that event, your right to use the equipment may be limited by FCC regulations, and you may be required to correct any interference to radio or television communications at your own expense.

Note This equipment has been tested and found to comply with the limits for a Class A digital device, pursuant to Part 15 of the FCC Rules. These limits are designed to provide reasonable protection against harmful interference when the equipment is operated in a commercial environment. This equipment generates, uses, and can radiate radio frequency energy and, if not installed and used in accordance with the instruction manual, may cause harmful interference to radio communications. Operation of this equipment in a residential area is likely to cause harmful interference in which case the user will be required to correct the interference at his own expense.

Radio Notice

lists the FCC radio certification identification numbers for the 3G wireless HWIC antennas.

Table 2 FCC Radio Certification Identification Numbers

Cisco Product Name

FCC IDD

HWIC-3G-GSM

N7NMC8775

HWIC-3G-CDMA

N7NMC5725

HWIC-3G-HSPA

N7NMC8790

This radio module has been certified in accordance with FCC regulations as referenced in 47 Code of Federal Regulations Parts 22 and 24. These systems require a FCC operators license before operation under these technical rules is allowed.

It is the responsibility of the user to select an antenna which adheres to the following gain restrictions as specified below:

- HWIC-3G-GSM

To comply with FCC regulations limiting both maximum RF output power and human exposure to RF radiation, the maximum antenna gain, including cable loss, must not exceed 8 dBi in the cellular band and 4 dBi in the PCS band.

- HWIC-3G-CDMA

To comply with FCC regulations limiting both maximum RF output power and human exposure to RF radiation, the maximum antenna gain, including cable loss, must not exceed 5 dBi in the cellular band and 4.1 dBi in the PCS band.

- HWIC-3G-HSPA

To comply with FCC regulations limiting both maximum RF output power and human exposure to RF radiation, the maximum antenna gain, including cable loss, must not exceed 5 dBi in the cellular band and 4 dBi in the PCS band.

Table 3 FCC Regulatory Standards Compliance - Specification Description

Type

Compliance

Safety

47 CFR Part 1.1310

47 CFR Part 2.109

EMC

47CFR Part 15 (FCC) Class A

Radio

47CFR Part 22H

47CFR Part 24E

RF Radiation Exposure

The 3G HWICs have been evaluated for Radio Frequency Exposure Levels for Humans in accordance with the various regulatory requirements world wide. The systems have been evaluated and found compliant with the limits as referenced in the International Electrical Engineering and Electronics (IEEE) C95. 1 standard (99) and the International Commission on Non Ionizing Radiation Protection (ICNIRP) limits.

The HWIC’s have been evaluated as a mobile device and such based on the evaluation per that criteria and in compliance with the various international guidelines, Cisco recommends that the antennas be mounted a minimum of 25cm (9.9 inches) away from the general public.

According to the World Health Organization, all research reviews conducted so far have indicated that exposures below the limits recommended in the ICNIRP (1998) EMF guidelines, covering all currently used radio frequencies, do not produce any known adverse health effect.

In the US, the Federal Communications Commission (FCC) has adopted a safety standard for human exposure to radio frequency (RF) electromagnetic energy emitted by FCC certified equipment.

This radio has been evaluated and meets the requirements for operation in the uncontrolled environment as referenced in 47 CFR Part 1.1310. This limit is based on the limits recommended by American National Standards Institute C95.1 (1999).

Additional information can be found at: http://www.fcc.gov/oet/rfsafety

In some cases with the use of high gain antennas, an Environmental Assessment in accordance with 47 CFR Part 1.1307 may be required before the system can be operated. Note other restrictions on the use of high gain antennas may also exist, please consult section on antenna’s

Co-Location: This transmitter has been evaluated for co-location including for RF exposure with Cisco 2.4GHz, 4.9GHz and 5GHz WLAN radios and Cisco specified antennas.

Compliance with FCC Part 68 Requirements

When used in Cisco 1700 series, Cisco 1800 series (modular), Cisco 1900 series, Cisco 2600 series, Cisco 2800 series, Cisco 2900 series, Cisco 3600 series, Cisco 3700 series, Cisco 3800 series, Cisco 3900 series, Cisco MWR 1941-DC routers, and Cisco IAD243x series, this equipment complies with Part 68 of the FCC rules and is listed as part of the host chassis. On the bottom of the chassis is a label that contains, among other information, the FCC registration number and ringer equivalence number (REN) for this equipment.

document that shipped with the host chassis.

Canada

Class A Warning

Cet appareil numèrique de la classe A est conforme á la norme NMB-003 du Canada.

Industry Canada Certification Identification Numbers

Table 4

Cisco Product Name

Industry Canada ID

HWIC-3G-GSM

2417C-MC8775

HWIC-3G-CDMA

2417C-MC5725

HWIC-3G-HSPA

2417C-MC8790

This radio module has been certified in accordance with Industry Canada regulations as referenced in RSP-100 and the applicable radio standard specifications. These systems require an operators license before operation under these technical guidelines is allowed.

This transmitter has been evaluated in accordance with Industry Canada RSS-102 Evaluation Procedure for Mobile and Portable Transmitters with Respect to Health Canada Safety Code 6 for Human Exposure to Radio Frequency Fields. These limits are based on the limits as referenced in the IEEE (ANSI C95.1) standard.

Co-Location: This transmitter has been evaluated for co-location including for RF exposure with Cisco 2.4GHz, 4.9GHz and 5GHz WLAN radios and Cisco specified antennas.

Equipment Attachment Limitations

This equipment meets the applicable Industry Canada Terminal Equipment Technical Specifications. This is confirmed by the registration number. The abbreviation, IC, before the registration number signifies that registration was performed based on a Declaration of Conformity indicating that Industry Canada technical specifications were met. It does not imply that Industry Canada approved the equipment. This equipment is registered as a part of the host chassis.

Note The Ringer Equivalence Number (REN) for this terminal equipment is 1. The REN assigned to each terminal equipment provides an indication of the maximum number of terminals allowed to be connected to a telephone interface. The termination on an interface may consist of any combination of devices subject only to the requirement that the sum of the Ringer Equivalence Numbers of all the devices does not exceed five.

European Directives Compliance

Non-Wireless and Non-Telecom equipment—Network modules, or routers that contain neither a radio module nor a telecom interface card, will carry the CE mark to indicate compliance with the EU Directive 2004/108/EC (amended by the Directives 91/263/EEC, 92/31/EEC and 93/68/EEC) and with the EU Directive 2006/95/EC. The standards applied include one or more of the following: EN 300 386, EN 55 022, EN 55 024, EN 60 950-1.

Wireless and Telecom equipment—Telecom interface cards, radio modules or routers that contain a telecom interface card or a radio module will carry the CE mark and, if applicable, the Alert sign to indicate compliance with the EU Directive 1999/5/EC.

.

[Bulgarian]

Česky [Czech]:

Toto zaøízení je v souladu se základními po_adavky a ostatními odpovídajícími ustanoveními Smìrnice 1999/5/EC.

Dansk [Danish]:

Dette udstyr er i overensstemmelse med de væsentlige krav og andre relevante bestemmelser i Direktiv 1999/5/EF.

Deutsch [German]:

Dieses Gerät entspricht den grundlegenden Anforderungen und den weiteren entsprechenden Vorgaben der Richtlinie 1999/5/EU.

Eesti [Estonian]:

See seade vastab direktiivi 1999/5/EÜ olulistele nõuetele ja teistele asjakohastele sätetele.

English:

This equipment is in compliance with the essential requirements and other relevant provisions of Directive 1999/5/EC.

Español [Spanish]:

Este equipo cumple con los requisitos esenciales asi como con otras disposiciones de la Directiva 1999/5/CE.

Ελληνική [Greek]:

Αυτός ο εξοπλισµός είναι σε συµµόρφωση µε τις ουσιώδεις απαιτήσεις και άλλες σχετικές διατάξεις της Οδηγίας 1999/5/EC.

Français [French]:

Cet appareil est conforme aux exigences essentielles et aux autres dispositions pertinentes de la Directive 1999/5/EC.

Íslenska [Icelandic]:

Þetta tæki er samkvæmt grunnkröfum og öðrum viðeigandi ákvæðum Tilskipunar 1999/5/EC.

Italiano [Italian]:

Questo apparato é conforme ai requisiti essenziali ed agli altri principi sanciti dalla Direttiva 1999/5/CE.

Latviski [Latvian]:

Ðî iekârta atbilst Direktîvas 1999/5/EK bûtiskajâm prasîbâm un citiem ar to saistîtajiem noteikumiem.

Lietuvių [Lithuanian]:

Ðis árenginys tenkina 1999/5/EB Direktyvos esminius reikalavimus ir kitas ðios direktyvos nuostatas.

Nederlands [Dutch]:

Dit apparaat voldoet aan de essentiele eisen en andere van toepassing zijnde bepalingen van de Richtlijn 1999/5/EC.

Malti [Maltese]:

Dan l-apparat huwa konformi mal-htigiet essenzjali u l-provedimenti l-ohra rilevanti tad-Direttiva 1999/5/EC.

Magyar [Hungarian]:

Ez a készülék teljesíti az alapvetõ követelményeket és más 1999/5/EK irányelvben meghatározott vonatkozó rendelkezéseket.

Norsk [Norwegian]:

Dette utstyret er i samsvar med de grunnleggende krav og andre relevante bestemmelser i EU-direktiv 1999/5/EF.

Polski [Polish]:

Urz¹dzenie jest zgodne z ogólnymi wymaganiami oraz szczególnymi warunkami okreœlonymi Dyrektyw UE: 1999/5/EC.

Português [Portuguese]:

Este equipamento está em conformidade com os requisitos essenciais e outras provisões relevantes da Directiva 1999/5/EC.

Română [Romanian]

Acest echipament este in conformitate cu cerintele esentiale si cu alte prevederi relevante ale Directivei 1999/5/EC.

Slovensko [Slovenian]:

Ta naprava je skladna z bistvenimi zahtevami in ostalimi relevantnimi pogoji Direktive 1999/5/EC.

Slovensky [Slovak]:

Toto zariadenie je v zhode so základnými po_iadavkami a inými príslušnými nariadeniami direktív: 1999/5/EC.

Suomi [Finnish]:

Tämä laite täyttää direktiivin 1999/5/EY olennaiset vaatimukset ja on siinä asetettujen muiden laitetta koskevien määräysten mukainen.

Svenska [Swedish]:

Denna utrustning är i överensstämmelse med de väsentliga kraven och andra relevanta bestämmelser i Direktiv 1999/5/EC.

Cellular Equipment (GSM-Based: EDGE, HSDPA, UMTS, GPRS)

The standards applied during the assessment include the following:

- Radio: EN 301 511, EN 301 908-1 and EN 301 908-2

- EMC: EN 301 489-1, EN 301 489-7 and EN 301 489-24

- Safety: EN 60950-1, EN 50385

The system has been evaluated for compliance with European Union EMF Directive 1999/519/EC. This evaluation is based on the ICNIRP (International Commission of Non Ionizing Radiations Protection) limits. Based on this evaluation, a minimum distance of 25 cm from the antenna of the 3G HWICs is required to maintain compliance.

CE Marking - This product contains a 3G radio modem for which a Notified Body was involved during the conformity assessment procedure. The product carries the following mark:

Note The full declaration of conformity for this product can be found on www.ciscofax.com. It can also be found in the Declarations of Conformity and regulatory information section of the appropriate product hardware installation guide, which is available on www.cisco.com.

CISPR 22 Requirements

Specifications covered:

- EN55022:1998 - EU requirements

- AS/NZS CISPR22 - Australia & New Zealand

Warning:

- This is a class A product. In a domestic environment this product may cause radio interference, in which case the user may be required to take adequate measures.

Taiwan Class A Warning

South Korea Class A Warning

Approval Information

The following approvals are independent of host.

Australia

Australian Communications and Media Authority (ACMA)

This system has been evaluated and found compliant in accordance with the Australian and New Zealand RF exposure requirements.

Caution To ensure compliance with exposure limits to radiofrequency fields, the antenna of the 3G HWICs should be no closer than 25 cm from the body during use.

Warning This equipment will be inoperable when mains power fails. Statement 198

Brazil

The Cisco HWIC-3G-GSM product complies with the following radio approvals for Brazil:

Belorussia

Canada

Table 5 Canada Agency Approvals for Cisco Network Modules and Interface Cards

Network Module or

Interface Card

Independent-of-Host Certificate Number

NM-4(8)T1-IMA

2461-9462-A

NM-1FE2CT1

2461-7731-A

NM-1FE1CT1

2461-7731-A

NM-1FE2CT1-CSU

2461-7731-A

NM-1FE1CT1-CSU

2461-7731-A

VIC-2DID

2461-9462-A

VIC-2BRI-NT/TE

2461-9462-A

VIC-2FXS

2461-9462-A

VIC-2E/M

2461-9462-A

VIC-2DID

2461-10942-A

VIC-2FXO-M1

2461-10678-A

WIC-1ADSL

2461-10908-A

WIC-1SHDSL

2461-11650-A

WIC-1AM

2461-11156-A

WIC-2AM

2461-11156-A

WIC-1DSU-T1

2461-8792-A

WIC-1DSU-56K4

2461-7964-A

WIC-1B-U

2461-7726-A

WIC-1B-S/T

2461-7664-A

VWIC-2MFT-T1-D1

2461-10728-A

VWIC-2MFT-T1

2461-10728-A

VWIC-1MFT-T1

2461-10728-A

China

This certifies that the Cisco EHWIC-4G-LTE-GB and C881G-4G-GA-K9 are certified by the China State Radio Regulatory Committee (SRRC) with a valid CMIIT ID. The CMIIT ID for Cisco EHWIC-4G-LTE-GB and C881G-4G-GA-K9 is 2009DJ0960.

Hong Kong

This certifies the HWIC-3G-GSM radio card has been evaluated and found to comply with the HKTA1033 (Issue 5) and HKTA1048 (Issue 1) performance specification issued by the Office of the Telecommunications Authority (OFTA), Hong Kong.

Table 6

Certification Number

RE407274 TEC 7161

Certification Date

August 16, 2007

Cisco Product ID

HWIC-3G-GSM

Table 7 Hong Kong Agency Approvals for Cisco Network Modules and Interface Cards

Network Module or

Interface Card

Independent-of-Host Certificate Number

VIC-2BRI-S/T-TE

IN300019

VIC-2BRI-NT/TE

IN400211

VIC-2DID

ML400212

VIC-2FXO

IN399105

VIC-2FXO-M1

ML300020

VWIC-1MFT-T1

IN601020

VWIC-2MFT-T1

IN401018

VWIC-2MFT-T1-D1

IN601019

WIC-1AM

SL601118

WIC-2AM

ML401117

NM-16AM

ML300020

NM-2CT1

IN399104

NM-1CT1

IN399103

NM-8AM/16AM

ML399101

NM-4B-S/T

IN399102

NM-8B-S/T

IN399116

NM-1FE2CT1

IN399134

India

Table 8 India Agency Approvals for Cisco Network Modules and Interface Cards

Network Module or

Interface Card

Cisco 2600 Certificate Number

Cisco 3600 Certificate Number

NM-8AM

—

TEC/WR/I/MOD-03/01/167.NOV98

NM-16AM

—

TEC/WR/I/MOD-03/01/164.NOV98

NM-8AM

TEC/WR/I/MOD-03/01/168.NOV 98

—

NM-16AM

TEC/WR/I/MOD-03/01/163.OCT 98

—

NM-4B-S/T

TEC/WR/I/CPE-02/02/056.JUN 99

TEC/WR/I/CPE-02/02/055.JUN 99

NM-8B-S/T

TEC/WR/I/CPE-02/02/058.JUN 99

TEC/WR/I/CPE-02/02/053.JUN 99

WIC-1B-S/T

TEC/WR/I/CPE-02/02/057.JUN 99

TEC/WR/I/CPE-02/02/054.JUN 99

NM-2CE1B

—

TEC/SR/I/TCP-01/01/030

NM-4A/S

TEC/SR/I/TCP-01/01/010.MAY 00

TEC/SR/I/TCP-01/01/009.MAY 00

NM-4TI-IMA

—

TEC/SR/I/TCP-01/01/015.JUN 00

NM-2V

—

TEC/SR/I/PPX-01/01/003.OCT 01

VIC-2FXO

—

TEC/SR/I/RAS-01/01/019.MAY 00

VIC-2FXO-M1

—

TEC/SR/I/PPX-01/01/003.OCT 01

VIC-2FXO

—

TEC/SR/I.RAS-00/01/038.FEB 01

WIC-IT

TEC/SR/I/TCP-01/01/005.JAN 00

TEC/SR/I/TCP-01/01/023.JUL 00

WIC-2T

TEC/SR/I/TCP-01/01/005.JAN 00

—

WIC-2AM

TEC/SR/I/RAS-01/01/032.DEC 00

TEC/SR/I/RAS-01/01/031.DEC 00

Japan

The Cisco HWIC-3G-GSM radio card has been approved under the following provisions:

- Technical conditions granted in accordance with the provisions of Article 56, Paragraph I of the Telecommunication Business Law

Table 9

Certification Number

AD070057003

Certification Date

May 25, 2009

Cisco Product ID

HWIC-3G-GSM

- Type certification granted in accordance with the provisions of Article 38-24 Paragraph I of the Radio Law

.

Table 10

Certification Number

003XYA090361

003MWA090362

Certification Date

May 13, 2009

Cisco Product ID

HWIC-3G-GSM

Statement 191—VCCI Class A Warning for Japan

Warning

This is a Class A product based on the standard of the Voluntary Control Council for Interference by Information Technology Equipment (VCCI). If this equipment is used in a domestic environment, radio disturbance may arise. When such trouble occurs, the user may be required to take corrective actions.

Table 11 Japan Agency Approvals for Cisco Network Modules and Interface Cards

NIHON CISCO SYSTEMS INC

Network Module or Interface Card

Approval Number

EM-HDA-4FXO

A02-0195JP

NM-4A/S

N97-K007-0

NM-8A/S

N97-K006-0

NM-4B-S/T

T97-5319-0

NM-8B-S/T

T97-5320-0

NM-1CT1

N97-K034-0

NM-2CT1

N97-K035-0

NM-1A-0C3SMI

N99-N311-0

NM-1A-0C3SMI-1V

D99-1084JP

NM-1A-OC3SML

N99-N312-0

NM-1A-OC3SML-1V

D99-1083JP

NM-1A-OC3MM

L00-0316

NM-1ATM25

N99-N320-0

WIC-1T

N96-K075-0

WIC-1ADSL

L02-0018

WIC-2A/S

M98-N028-0

WIC-2T

N98-N024-0

WIC-1B-S/T

T96-5295-0

WIC-1DSU-T1

N98-N018-0

WIC-1DSU-T1 V2

D03-0006JPB

VIC-2BRI-NT/TE

C00-1009JP

L00-0273

VIC-2BRI-S/T-TE

T99-0302-0

VIC2-2BRI-NT/TE

C03-003JPB

VIC2-2E/M

D03-0022JPB

VIC2-2FXO

D03-0018JPB

VIC2-4FXO

D03-0018JPB

Table 12 Japan Agency Approvals for Cisco Network Modules and WAN Interface Cards

NIHON CISCO SYSTEMS INC

Network Module/WAN Interface Card

Approval Number

NM-CEM-4TE1

D04-0014003

NM-1CE1T1-PRI

D03-0021JPB

NM-2CE1T1-PRI

D03-0021JPB

NM-1FE2CT1

L99-1054

NM-1FE1CT1

L99-1056

NM-1T3/E3

D03-0033JPB

NM-1A-T3/E3

D070043003

NM-HDV2-2T1/E1

D04-0017003

NM-16A/S

D05-0022003

HWIC-16A

D060116003

HWIC-4A/S

D060117003

HWIC-4B-S/T

C070070003

HWIC-4T

D060117003

HWIC-8A

D060116003

HWIC-8A/S-232

D060118003

NM-1A-OC3-POM

D05-0084003

EM-4BRI-NT/TE

C04-0033003

WIC-1B-S/T-V3

C05-0012003

VWIC2-1MFT-T1/E1

CD05-0003003-1

VWIC2-2MFT-T1/E1

CD05-0003003

VWIC-2MFT-T1-DIR

D02-0552JP

VWIC-2T1/E1-RAN

D05-0268001

VWIC3-4MFT-T1/E1

CD110499003

VWIC3-1MFT-G703

CD110499003

VWIC3-2MFT-G703

CD110499003

VWIC3-1MFT-G703

CD110499003

VWIC3-2MFT-G703

CD110499003

Table 13 Japan Agency Approvals for Cisco Network Modules and WAN Interface Cards

NIHON CISCO SYSTEMS INC

Network Module/WAN Interface Card

Approval Number

EM-HDA-3FXS/4FXO

A04-037003

EM-HDA-6FXO

A04-0036003

NM-1T3/E3

D03-0033JPB

NM-8AM-J

S98-2434-1

NM-8AM-V2

A03-0034JPB

NM-16AM-J

S98-2433-1

NM-16AM-V2

A03-0034JPB

NM-16ESW

D110112003

NM-16ESW-1GIG

D110110003

NM-1FE-FX-V2

D110174003

NM-1FE1R2W

D110157003

NM-1FE2W-V2

D110156003

NM-2FE2W-V2

D110156003

NME-16ES-1G

D110070003

NME-16ES-1G-P

D110070003

NME-X-23ES-1G

D110068003

NME-X-23ES-1G-P

D110068003

NME-XD-24ES-1S-P

D110105003

NME-XD-48ES-2S-P

D110105003

VIC-2FXO

S98-2481-1

VIC-2FXO-M1

A99-1085JP

VIC-4FXO-M1

A02-0226JP

VIC2-2E/M

D03-0022JPB

VIC2-2FXO

A03-0018JPB

VIC2-4FXO

A03-0018JPB

WIC-1AM

A01-0674JP

WIC-1AM-V2

A06-0069003

WIC-2AM

A01-0130JP

WIC-2AM-V2

A06- 0069003

Table 14 Japan Agency Approvals for Cisco Network Modules and WAN Interface Cards

NIHON CISCO SYSTEMS INC

Network Module/WAN Interface Card

Approval Number

NM-4T1-IMA

L99-1113

NM-8T1-IMA

L99-1114

WIC-1B-S/T-LL

L99-1179

VWIC-1MFT-T1

L99-1089

C00-1240JP

L00-0341

VWIC-2MFT-T1

L99-1090

C00-1241JP

L00-0342

VWIC-2MFT-T1-D1

L99-1090

Malaysia

Table 15 Malaysia Agency Approvals for Cisco Network Modules

Network Module

WAN Interface Card

Certificate Number

NM-1A-T3

MAJE/03A/0102/S

NM-1A-OC3MM

MAJD/35A/0101/S

NM-1A-OC3SMI

MAJD/13A/0499/S

NM-1A-OC3SML

MAJD/14A/0499/S

NM-1FE1CE1U

ISTF/57A/0699/S

NM-1FE2CE1U

ISTF/59A/0599/S

NM-1HSSI

DAIH/16A/0902/S

NM-1T3/E3

MAJH/04A 0104/S

NM-16A

DAID/494/0999/S

NM-16AM

DAID/49A/1099/S

NM-16AM-J

DAFG/26C/1198/C

NM-2CE1T1-PRI

CETS/006A/0504/T

NM-4A/S

DAAC/01A/1297/S

NM-4B-S/T

ISTF/28A/0398/S

NM-4E1-IMA

DAIH07A/1099/S

NM-4T

DAID/15A/0299/S

NM-8A/S

DAAC/02A/0398/S

NM-8AM

DAFG/27C/1198/C

NM-8AM-J

DAFG/27C/1198/C

NM-8B-S/T

ISTF/23A/0198/S

NM-8E1-IMA

DAIH/06A/0999/S

VIC-2BRI-S/T-TE

ISTF/73A/1299/S

VIC-2FXO

TADI/01A/0798/S

VIC-2FXO-M1

TADI/03A/0300/S

VIC2-2BRI-NT/TE

CETS/004A/0504/T

VIC2-2FXO

TADI/18A/0104/S

VIC2-4FXO

TADI/17A/0104/

VWIC-2MFT-E1

DAIH/08A/1099/S

VWIC-2MFT-E1-DI

DAIH/09A/1099/S

VWIC-1MFT-E1

DAIH/10A/1099/S

WIC-1ADSL

C00075/55/2001

WIC-1AM

DACU/01A/1002/S

WIC-1B-S/T

ISTQ/02A/0298/S

WIC-1DSU-T1

LAHB/01A/0703/S

WIC-1DSU-T1-V2

LAHB/02A/0104/S

WIC-1T

DAAC/03A/0398/S

WIC-2A/S

DAAC/05A/0599/S

WIC-2T

DAAC/04A/0499/S

New Zealand

Note This Telepermit is issued to Cisco Systems NZ Ltd., subject to the conditions of Specification PTC 100 and any further conditions stated in the appropriate dated CPAS letters.

Note The network modules/WAN interface cards may be connected to Telecom Network.

Table 16 New Zealand Agency Approvals

Network Module/WAN Interface Card

Cisco 2600 License Number

Cisco 3600 License Number

NM-8AM

PTC 211/98/256

PTC 232/98/256

NM-16AM

PTC 211/98/257

PTC 211/98/257

NM-4B-S/T

PTC 231/97/023

–

NM-8B-S/T

–

PTC 231/97/024

WIC-1AM

PTC 211/01/084

PTC 211/01/084

WIC-2AM

PTC 211/01/085

PTC 211/01/085

WIC-1B-S/T

PTC 231/97/011

PTC 231/97/011

EM-HDA-4FXO

PTC 217/02/007

PTC 217/02/007

EM-HDA-8FXS

PTC 217/02/007

PTC 217/02/007

NM-1A-E3

PTC 217/00/014

PTC 217/00/014

NM-1CE1B

PTC 232/97/007

PTC 232/97/007

NM-2CE1B

PTC 232/97/009

PTC 232/97/009

NM-1FE1CE1B

–

PTC 232/99/005

NM-1FE1CE1U

–

PTC 232/99/006

NM-1FE2CE1B

–

PTC 232/99/007

NM-1FE2CE1U

–

PTC 232/99/008

NM-HDA-4FXS

PTC 217/02/007

PTC 217/02/007

VIC-2BRI-NT/TE

PTC 231/01/002

PTC 231/01/002

VIC-2BRI-S/T-TE

PTC 231/99/007 (APP#38763)

PTC 231/99/007 (APP#38763)

VIC-2FXO

–

PTC 231/99/097

VIC-2FXO-M1

PTC 217/00/002

PTC 217/00/002

VWIC-2MFT-E1-DI

PTC 217/99/031

PTC 217/99/031

VWIC-2MFT-E1

PTC 217/99/030

PTC 217/99/030

VWIC-1MFT-E1

PTC 217/99/029

PTC 217/99/029

Singapore

The radio equipment listed below is registered with the Info-communications Development Authority (IDA) of Singapore under regulation 20(6) of the Telecommunications (Dealers) Regulations (Cap 323, Rg 6) (the "Dealers Regulations") and approved for sale in Singapore. The equipment listed complies with IDA Standards DA00518.

Table 17

IDA Registration Number

G0693-07

Technical Specification

IDA TS 3G-MT

Cisco Product ID

HWIC-3G-GSM

Cisco 2600 Series Routers

Network Module/WAN Interface Card

Cisco 2610

Cisco 2611

Cisco 2612

Cisco 2613

Cisco 2620

Cisco 2621

VWIC-1MFT-E1

GAP

GAP

GAP

GAP

GAP

GAP

VWIC-2MFT-E1

GAP

GAP

GAP

GAP

GAP

GAP

VWIC-2MFT-E1-DI

GAP

GAP

GAP

GAP

GAP

GAP

NM-4E1-IMA

GAP

GAP

GAP

GAP

GAP

GAP

NM-8E1-IMA

GAP

GAP

GAP

GAP

GAP

GAP

Cisco 3600 Series Routers

Network Module/WAN Interface Card

Cisco 3620

Cisco 3640

Cisco 3660-1FE

Cisco 3660-2FE

VWIC-1MFT-E1

SG99-054GAP

SG99-057GAP

SG99-060GAP

SG99-063GAP

VWIC-2MFT-E1

SG99-055GAP

SG99-058GAP

SG99-061GAP

SG99-064GAP

VWIC-2MFT-E1-DI

SG99-056GAP

SG99-059GAP

SG99-062GAP

SG99-065GAP

NM-4E1-IMA

SG99-085GAP

SG99-079GAP

SG99-081GAP

SG99-083GAP

NM-8E1-IMA

SG99-086GAP

SG99-080GAP

SG99-082GAP

SG99-084GAP

South Africa

The following is the approval marking and ID number for the Cisco HWIC-3G-GSM radio card for use in South Africa.

South Korea

Taiwan

This is to certify the the HWIC-3G-GSM radio card has been found to comply with the PLMN01 (for GSM & DCS) & PLMN08 (for WCDMA), Taiwan.

Table 20

Certification Number

CCAC073G0250T5

Certification Date

August 18, 2007

Cisco Product ID

HWIC-3G-GSM

Translated Safety Warnings

This section includes translations in multiple languages of the warnings that appear in the hardware installation guide or quick start guide for the Cisco network modules and interface cards. Before working on equipment, be aware of the hazards involved with electrical circuitry, and follow standard safety practices to prevent accidents. If you have questions or need assistance, see the “Obtaining Documentation, Obtaining Support, and Security Guidelines” section.

- Statement 1071 — Warning Definition

- Statement 4—Power Supply Warning

- Statement 7—DC Power Disconnection Warning

- Statement 8—DC Power Connection Warning

- Statement 7—DC Power Disconnection Warning

- Statement 43—Jewelry Removal Warning

- Statement 68—WAN Interface Card Insertion Warning

- Statement 125—Radiation from Open Port Aperture

- Statement 194—Chassis Lifting Warning

- Statement 198—Power Failure Warning

- Statement 240—Laser Radiation Warning

- Statement 240—Laser Radiation Warning

- Statement 240—Laser Radiation Warning

- Statement 373—Must Connect To An Indoor Antenna

- Statement 374—Equipment Connected to Outdoor Cameras

- Statement 1001—Work During Lightning Activity

- Statement 1004 — Installation Instructions

- Statement 1008—Class 1 Laser Product

- Statement 1016—Invisible Laser Radiation

- Statement 1021 — SELV Circuit

- Statement 1024 — Ground Conductor

- Statement 1026 — WAN Port Static Shock

- Statement 1027—Class 1 LED Product

- Statement 1029 — Blank Faceplates and Cover Panels

- Statment 1030 — Equipment Installation

- Statement 1031—EU Public Network Port

- Statement 1036 — Telephone Jacks in Wet Locations

- Statement 1037 — Uninsulated Wires and Terminals

- Statement 1038—Telephone Use During an Electrical Storm

- Statement 1039 — Telephone Use by Gas Leak

- Statement 1040 — Product Disposal

- Statement 1041 — Disconnecting Telephone-Network Cables

- Statement 1042—Ring Signal Generator

- Statement 1043—Installation Hazard

- Statement 1044—Port Connections

- Statement 1051—Laser Radiation

- Statement 1055—Class I and Class 1M Laser

Statement 1071 — Warning Definition

Warning

that accompanied this device.

Note: SAVE THESE INSTRUCTIONS

Note: This documentation is to be used in conjunction with the specific product installation guide that shipped with the product. Please refer to the Installation Guide, Configuration Guide, or other enclosed additional documentation for further details.

Dit waarschuwingssymbool betekent gevaar. U verkeert in een situatie die lichamelijk letsel kan veroorzaken. Voordat u aan enige apparatuur gaat werken, dient u zich bewust te zijn van de bij elektrische schakelingen betrokken risico's en dient u op de hoogte te zijn van de standaard praktijken om ongelukken te voorkomen. Voor een vertaling van de waarschuwingen die in deze publicatie verschijnen, dient u de vertaalde veiligheidswaarschuwingen te raadplegen die bij dit apparaat worden geleverd.

BEWAAR DEZE INSTRUCTIES.

Deze documentatie dient gebruikt te worden in combinatie met de installatiehandleiding voor het specifieke product die bij het product wordt geleverd. Raadpleeg de installatiehandleiding, configuratiehandleiding of andere verdere ingesloten documentatie voor meer informatie.

Tämä varoitusmerkki merkitsee vaaraa. Olet tilanteessa, joka voi johtaa ruumiinvammaan. Ennen kuin työskentelet minkään laitteiston parissa, ota selvää sähkökytkentöihin liittyvistä vaaroista ja tavanomaisista onnettomuuksien ehkäisykeinoista. Tässä asiakirjassa esitettyjen varoitusten käännökset löydät laitteen mukana toimitetuista ohjeista.

SÄILYTÄ NÄMÄ OHJEET

Tämä asiakirja on tarkoitettu käytettäväksi yhdessä tuotteen mukana tulleen asennusoppaan kanssa. Katso lisätietoja asennusoppaasta, kokoonpano-oppaasta ja muista mukana toimitetuista asiakirjoista.

IMPORTANTES INFORMATIONS DE SÉCURITÉ

Ce symbole d'avertissement indique un danger. Vous vous trouvez dans une situation pouvant causer des blessures ou des dommages corporels. Avant de travailler sur un équipement, soyez conscient des dangers posés par les circuits électriques et familiarisez-vous avec les procédures couramment utilisées pour éviter les accidents. Pour prendre connaissance des traductions d'avertissements figurant dans cette publication, consultez les consignes de sécurité traduites qui accompagnent cet appareil.

CONSERVEZ CES INFORMATIONS

Cette documentation doit être utilisée avec le guide spécifique d'installation du produit qui accompagne ce dernier. Veuillez vous reporter au Guide d'installation, au Guide de configuration, ou à toute autre documentation jointe pour de plus amples renseignements.

WICHTIGE SICHERHEITSANWEISUNGEN

Dieses Warnsymbol bedeutet Gefahr. Sie befinden sich in einer Situation, die zu einer Körperverletzung führen könnte. Bevor Sie mit der Arbeit an irgendeinem Gerät beginnen, seien Sie sich der mit elektrischen Stromkreisen verbundenen Gefahren und der Standardpraktiken zur Vermeidung von Unfällen bewusst. Übersetzungen der in dieser Veröffentlichung enthaltenen Warnhinweise sind im Lieferumfang des Geräts enthalten.

BEWAHREN SIE DIESE SICHERHEITSANWEISUNGEN AUF

Dieses Handbuch ist zum Gebrauch in Verbindung mit dem Installationshandbuch für Ihr Gerät bestimmt, das dem Gerät beiliegt. Entnehmen Sie bitte alle weiteren Informationen dem Handbuch (Installations- oder Konfigurationshandbuch o. Ä.) für Ihr spezifisches Gerät.

Figyelem!

FONTOS BIZTONSÁGI ELÕÍRÁSOK

Ez a figyelmezetõ jel veszélyre utal. Sérülésveszélyt rejtõ helyzetben van. Mielõtt bármely berendezésen munkát végezte, legyen figyelemmel az elektromos áramkörök okozta kockázatokra, és ismerkedjen meg a szokásos balesetvédelmi eljárásokkal. A kiadványban szereplõ figyelmeztetések fordítása a készülékhez mellékelt biztonsági figyelmeztetések között található.

Megjegyzés ÕRIZZE MEG EZEKET AZ UTASÍTÁSOKAT!

Megjegyzés Ezt a dokumentációt a készülékhez mellékelt üzembe helyezési útmutatóval együtt kell használni. További tudnivalók a mellékelt Üzembe helyezési útmutatóban (Installation Guide), Konfigurációs útmutatóban (Configuration Guide) vagy más dokumentumban találhatók.

IMPORTANTI ISTRUZIONI SULLA SICUREZZA

Questo simbolo di avvertenza indica un pericolo. La situazione potrebbe causare infortuni alle persone. Prima di intervenire su qualsiasi apparecchiatura, occorre essere al corrente dei pericoli relativi ai circuiti elettrici e conoscere le procedure standard per la prevenzione di incidenti. Per le traduzioni delle avvertenze riportate in questo documento, vedere le avvertenze di sicurezza che accompagnano questo dispositivo.

CONSERVARE QUESTE ISTRUZIONI

La presente documentazione va usata congiuntamente alla guida di installazione specifica spedita con il prodotto. Per maggiori informazioni, consultare la Guida all'installazione, la Guida alla configurazione o altra documentazione acclusa.

VIKTIGE SIKKERHETSINSTRUKSJONER

Dette varselssymbolet betyr fare. Du befinner deg i en situasjon som kan forårsake personskade. Før du utfører arbeid med utstyret, bør du være oppmerksom på farene som er forbundet med elektriske kretssystemer, og du bør være kjent med vanlig praksis for å unngå ulykker. For å se oversettelser av advarslene i denne publikasjonen, se de oversatte sikkerhetsvarslene som følger med denne enheten.

TA VARE PÅ DISSE INSTRUKSJONENE

Denne dokumentasjonen skal brukes i forbindelse med den spesifikke installasjonsveiledningen som fulgte med produktet. Vennligst se installasjonsveiledningen, konfigureringsveiledningen eller annen vedlagt tilleggsdokumentasjon for detaljer.

INSTRUÇÕES IMPORTANTES DE SEGURANÇA

Este símbolo de aviso significa perigo. O utilizador encontra-se numa situação que poderá ser causadora de lesões corporais. Antes de iniciar a utilização de qualquer equipamento, tenha em atenção os perigos envolvidos no manuseamento de circuitos eléctricos e familiarize-se com as práticas habituais de prevenção de acidentes. Para ver traduções dos avisos incluídos nesta publicação, consulte os avisos de segurança traduzidos que acompanham este dispositivo.

Nota GUARDE ESTAS INSTRUÇÕES

Nota Esta documentação destina-se a ser utilizada em conjunto com o manual de instalação incluído com o produto específico. Consulte o manual de instalação, o manual de configuração ou outra documentação adicional inclusa, para obter mais informações.

INSTRUCCIONES IMPORTANTES DE SEGURIDAD

Este símbolo de aviso indica peligro. Existe riesgo para su integridad física. Antes de manipular cualquier equipo, considere los riesgos de la corriente eléctrica y familiarícese con los procedimientos estándar de prevención de accidentes. Vea las traducciones de las advertencias que acompañan a este dispositivo.

GUARDE ESTAS INSTRUCCIONES

Esta documentación está pensada para ser utilizada con la guía de instalación del producto que lo acompaña. Si necesita más detalles, consulte la Guía de instalación, la Guía de configuración o cualquier documentación adicional adjunta.

VIKTIGA SÄKERHETSANVISNINGAR

Denna varningssignal signalerar fara. Du befinner dig i en situation som kan leda till personskada. Innan du utför arbete på någon utrustning måste du vara medveten om farorna med elkretsar och känna till vanliga förfaranden för att förebygga olyckor. Se översättningarna av de varningsmeddelanden som finns i denna publikation, och se de översatta säkerhetsvarningarna som medföljer denna anordning.

SPARA DESSA ANVISNINGAR

Denna dokumentation ska användas i samband med den specifika produktinstallationshandbok som medföljde produkten. Se installationshandboken, konfigurationshandboken eller annan bifogad ytterligare dokumentation för närmare detaljer.

Statement 4—Power Supply Warning

Warning

Do not touch the power supply when the power cord is connected. For systems with a power switch, line voltages are present within the power supply even when the power switch is off and the power cord is connected. For systems without a power switch, line voltages are present within the power supply when the power cord is connected. Statement 4

Waarschuwing

U dient de voeding niet aan te raken zolang het netsnoer aangesloten is. Bij systemen met een stroomschakelaar zijn er lijnspanningen aanwezig in de voeding, zelfs wanneer de stroomschakelaar uitgeschakeld is en het netsnoer aangesloten is. Bij systemen zonder een stroomschakelaar zijn er lijnspanningen aanwezig in de voeding wanneer het netsnoer aangesloten is.

Varoitus

Älä kosketa virtalähdettä virtajohdon ollessa kytkettynä. Virrankatkaisimella varustetuissa järjestelmissä on virtalähteen sisällä jäljellä verkkojännite, vaikka virrankatkaisin on katkaistu-asennossa virtajohdon ollessa kytkettynä. Järjestelmissä, joissa ei ole virrankatkaisinta, on virtalähteen sisällä verkkojännite, kun virtajohto on kytkettynä.

Attention

Ne pas toucher le bloc d'alimentation quand le cordon d'alimentation est branché. Avec les systèmes munis d'un commutateur marche-arrêt, des tensions de ligne sont présentes dans l'alimentation quand le cordon est branché, même si le commutateur est à l'arrêt. Avec les systèmes sans commutateur marche-arrêt, l'alimentation est sous tension quand le cordon d'alimentation est branché.

Warnung

Berühren Sie das Netzgerät nicht, wenn das Netzkabel angeschlossen ist. Bei Systemen mit Netzschalter liegen Leitungsspannungen im Netzgerät vor, wenn das Netzkabel angeschlossen ist, auch wenn das System ausgeschaltet ist. Bei Systemen ohne Netzschalter liegen Leitungsspannungen im Netzgerät vor, wenn das Netzkabel angeschlossen ist.

Avvertenza

Non toccare l’alimentatore se il cavo dell’alimentazione è collegato. Per i sistemi con un interruttore di alimentazione, tensioni di linea sono presenti all’interno dell’alimentatore anche quando l’interruttore di alimentazione è en posizione di disattivazione (off), se il cavo dell’alimentazione è collegato. Per i sistemi senza un interruttore, tensioni di linea sono presenti all’interno dell’alimentatore quando il cavo di alimentazione è collegato.

Advarsel

Berør ikke strømforsyningsenheten når strømledningen er tilkoblet. I systemer som har en strømbryter, er det spenning i strømforsyningsenheten selv om strømbryteren er slått av og strømledningen er tilkoblet. Når det gjelder systemer uten en strømbryter, er det spenning i strømforsyningsenheten når strømledingen er tilkoblet.

Aviso

Não toque na unidade abastecedora de energia quando o cabo de alimentação estiver ligado. Em sistemas com interruptor, a corrente eléctrica estará presente na unidade abastecedora, sempre que o cabo de alimentação de energia estiver ligado, mesmo quando o interruptor se encontrar desligado. Para sistemas sem interruptor, a tensão eléctrica dentro da unidade abastecedora só estará presente quando o cabo de alimentação estiver ligado.

¡Advertencia!

No tocar la fuente de alimentación mientras el cable esté enchufado. En sistemas con interruptor de alimentación, hay voltajes de línea dentro de la fuente, incluso cuando el interruptor esté en Apagado (OFF) y el cable de alimentación enchufado. En sistemas sin interruptor de alimentación, hay voltajes de línea en la fuente cuando el cable está enchufado.

Varning!

Vidrör inte strömförsörjningsenheten när nätsladden är ansluten. För system med strömbrytare finns det nätspänning i strömförsörjningsenheten även när strömmen har slagits av men nätsladden är ansluten. För system utan strömbrytare finns det nätspänning i strömförsörjningsenheten när nätsladden är ansluten.

Statement 7—DC Power Disconnection Warning

Warning

Before performing any of the following procedures, ensure that power is removed from the DC circuit. To ensure that all power is OFF, locate the circuit breaker on the panel board that services the DC circuit, switch the circuit breaker to the OFF position, and tape the switch handle of the circuit breaker in the OFF position. Statement 7

Waarschuwing

Voordat u een van de onderstaande procedures uitvoert, dient u te controleren of de stroom naar het gelijkstroom circuit uitgeschakeld is. Om u ervan te verzekeren dat alle stroom UIT is geschakeld, kiest u op het schakelbord de stroomverbreker die het gelijkstroom circuit bedient, draait de stroomverbreker naar de UIT positie en plakt de schakelaarhendel van de stroomverbreker met plakband in de UIT positie vast.

Varoitus

Varmista, että tasavirtapiirissä ei ole virtaa ennen seuraavien toimenpiteiden suorittamista. Varmistaaksesi, että virta on KATKAISTU täysin, paikanna tasavirrasta huolehtivassa kojetaulussa sijaitseva suojakytkin, käännä suojakytkin KATKAISTU-asentoon ja teippaa suojakytkimen varsi niin, että se pysyy KATKAISTU-asennossa.

Attention

Avant de pratiquer l'une quelconque des procédures ci-dessous, vérifier que le circuit en courant continu n'est plus sous tension. Pour en être sûr, localiser le disjoncteur situé sur le panneau de service du circuit en courant continu, placer le disjoncteur en position fermée (OFF) et, à l'aide d'un ruban adhésif, bloquer la poignée du disjoncteur en position OFF.

Warnung

Vor Ausführung der folgenden Vorgänge ist sicherzustellen, daß die Gleichstromschaltung keinen Strom erhält. Um sicherzustellen, daß sämtlicher Strom abgestellt ist, machen Sie auf der Schalttafel den Unterbrecher für die Gleichstromschaltung ausfindig, stellen Sie den Unterbrecher auf AUS, und kleben Sie den Schaltergriff des Unterbrechers mit Klebeband in der AUS-Stellung fest.

Avvertenza

Prima di svolgere una qualsiasi delle procedure seguenti, verificare che il circuito CC non sia alimentato. Per verificare che tutta l’alimentazione sia scollegata (OFF), individuare l’interruttore automatico sul quadro strumenti che alimenta il circuito CC, mettere l’interruttore in posizione OFF e fissarlo con nastro adesivo in tale posizione.

Advarsel

Før noen av disse prosedyrene utføres, kontroller at strømmen er frakoblet likestrømkretsen. Sørg for at all strøm er slått AV. Dette gjøres ved å lokalisere strømbryteren på brytertavlen som betjener likestrømkretsen, slå strømbryteren AV og teipe bryterhåndtaket på strømbryteren i AV-stilling.

Aviso

Antes de executar um dos seguintes procedimentos, certifique-se que desligou a fonte de alimentação de energia do circuito de corrente contínua. Para se assegurar que toda a corrente foi DESLIGADA, localize o disjuntor no painel que serve o circuito de corrente contínua e coloque-o na posição OFF (Desligado), segurando nessa posição a manivela do interruptor do disjuntor com fita isoladora.

¡Advertencia!

Antes de proceder con los siguientes pasos, comprobar que la alimentación del circuito de corriente continua (CC) esté cortada (OFF). Para asegurarse de que toda la alimentación esté cortada (OFF), localizar el interruptor automático en el panel que alimenta al circuito de corriente continua, cambiar el interruptor automático a la posición de Apagado (OFF), y sujetar con cinta la palanca del interruptor automático en posición de Apagado (OFF).

Varning!

Statement 8—DC Power Connection Warning

Warning

After wiring the DC power supply, remove the tape from the circuit breaker switch handle and reinstate power by moving the handle of the circuit breaker to the ON position. Statement 8

Waarschuwing

Nadat de bedrading van de gelijkstroom voeding aangebracht is, verwijdert u het plakband van de schakelaarhendel van de stroomverbreker en schakelt de stroom weer in door de hendel van de stroomverbreker naar de AAN positie te draaien.

Varoitus

Yhdistettyäsi tasavirtalähteen johdon avulla poista teippi suojakytkimen varresta ja kytke virta uudestaan kääntämällä suojakytkimen varsi KYTKETTY-asentoon.

Attention

Une fois l'alimentation connectée, retirer le ruban adhésif servant à bloquer la poignée du disjoncteur et rétablir l'alimentation en plaçant cette poignée en position de marche (ON).

Warnung

Nach Verdrahtung des Gleichstrom-Netzgeräts entfernen Sie das Klebeband vom Schaltergriff des Unterbrechers und schalten den Strom erneut ein, indem Sie den Griff des Unterbrechers auf EIN stellen.

Avvertenza

Dopo aver eseguito il cablaggio dell’alimentatore CC, togliere il nastro adesivo dall’interruttore automatico e ristabilire l’alimentazione spostando all'interruttore automatico in posizione ON.

Advarsel

Etter at likestrømsenheten er tilkoblet, fjernes teipen fra håndtaket på strømbryteren, og deretter aktiveres strømmen ved å dreie håndtaket på strømbryteren til PÅ-stilling.

Aviso

Depois de ligar o sistema de fornecimento de corrente contínua, retire a fita isoladora da manivela do disjuntor, e volte a ligar a corrente ao deslocar a manivela para a posição ON (Ligado).

¡Advertencia!

Después de cablear la fuente de alimentación de corriente continua, retirar la cinta de la palanca del interruptor automático, y restablecer la alimentación cambiando la palanca a la posición de Encendido (ON).

Varning!

Statement 12—Power Supply Disconnection Warning

Warning

Before working on a chassis or working near power supplies, unplug the power cord on AC units; disconnect the power at the circuit breaker on DC units. Statement 12

Waarschuwing

Voordat u aan een frame of in de nabijheid van voedingen werkt, dient u bij wisselstroom toestellen de stekker van het netsnoer uit het stopcontact te halen; voor gelijkstroom toestellen dient u de stroom uit te schakelen bij de stroomverbreker.

Varoitus

Kytke irti vaihtovirtalaitteiden virtajohto ja katkaise tasavirtalaitteiden virta suojakytkimellä, ennen kuin teet mitään asennuspohjalle tai työskentelet virtalähteiden läheisyydessä.

Attention

Avant de travailler sur un châssis ou à proximité d'une alimentation électrique, débrancher le cordon d'alimentation des unités en courant alternatif ; couper l'alimentation des unités en courant continu au niveau du disjoncteur.

Warnung

Bevor Sie an einem Chassis oder in der Nähe von Netzgeräten arbeiten, ziehen Sie bei Wechselstromeinheiten das Netzkabel ab bzw. schalten Sie bei Gleichstromeinheiten den Strom am Unterbrecher ab.

Avvertenza

Prima di lavorare su un telaio o intorno ad alimentatori, scollegare il cavo di alimentazione sulle unità CA; scollegare l'alimentazione all’interruttore automatico sulle unità CC.

Advarsel

Før det utføres arbeid på kabinettet eller det arbeides i nærheten av strømforsyningsenheter, skal strømledningen trekkes ut på vekselstrømsenheter og strømmen kobles fra ved strømbryteren på likestrømsenheter.

Aviso

Antes de trabalhar num chassis, ou antes de trabalhar perto de unidades de fornecimento de energia, desligue o cabo de alimentação nas unidades de corrente alternada; desligue a corrente no disjuntor nas unidades de corrente contínua.

¡Advertencia!

Antes de manipular el chasis de un equipo o trabajar cerca de una fuente de alimentación, desenchufar el cable de alimentación en los equipos de corriente alterna (CA); cortar la alimentación desde el interruptor automático en los equipos de corriente continua (CC).

Varning!

nnan du arbetar med ett chassi eller nära strömförsörjningsenheter skall du för växelströmsenheter dra ur nätsladden och för likströmsenheter bryta strömmen vid överspänningsskyddet.

Statement 43—Jewelry Removal Warning

Warning

Before working on equipment that is connected to power lines, remove jewelry (including rings, necklaces, and watches). Metal objects will heat up when connected to power and ground and can cause serious burns or weld the metal object to the terminals. Statement 43

Waarschuwing

Alvorens aan apparatuur te werken die met elektrische leidingen is verbonden, sieraden (inclusief ringen, kettingen en horloges) verwijderen. Metalen voorwerpen worden warm wanneer ze met stroom en aarde zijn verbonden, en kunnen ernstige brandwonden veroorzaken of het metalen voorwerp aan de aansluitklemmen lassen.

Varoitus

Ennen kuin työskentelet voimavirtajohtoihin kytkettyjen laitteiden parissa, ota pois kaikki korut (sormukset, kaulakorut ja kellot mukaan lukien). Metalliesineet kuumenevat, kun ne ovat yhteydessä sähkövirran ja maan kanssa, ja ne voivat aiheuttaa vakavia palovammoja tai hitsata metalliesineet kiinni liitäntänapoihin.

Attention

Avant d’accéder à cet équipement connecté aux lignes électriques, ôter tout bijou (anneaux, colliers et montres compris). Lorsqu’ils sont branchés à l’alimentation et reliés à la terre, les objets métalliques chauffent, ce qui peut provoquer des blessures graves ou souder l’objet métallique aux bornes.

Warnung

Vor der Arbeit an Geräten, die an das Netz angeschlossen sind, jeglichen Schmuck (einschließlich Ringe, Ketten und Uhren) abnehmen. Metallgegenstände erhitzen sich, wenn sie an das Netz und die Erde angeschlossen werden, und können schwere Verbrennungen verursachen oder an die Anschlußklemmen angeschweißt werden.

Avvertenza

Prima di intervenire su apparecchiature collegate alle linee di alimentazione, togliersi qualsiasi monile (inclusi anelli, collane, braccialetti ed orologi). Gli oggetti metallici si riscaldano quando sono collegati tra punti di alimentazione e massa: possono causare ustioni gravi oppure il metallo può saldarsi ai terminali.

Advarsel

Fjern alle smykker (inkludert ringer, halskjeder og klokker) før du skal arbeide på utstyr som er koblet til kraftledninger. Metallgjenstander som er koblet til kraftledninger og jord blir svært varme og kan forårsake alvorlige brannskader eller smelte fast til polene.

Aviso

Antes de trabalhar em equipamento que esteja ligado a linhas de corrente, retire todas as jóias que estiver a usar (incluindo anéis, fios e relógios). Os objectos metálicos aquecerão em contacto com a corrente e em contacto com a ligação à terra, podendo causar queimaduras graves ou ficarem soldados aos terminais.

¡Advertencia!

Antes de operar sobre equipos conectados a líneas de alimentación, quitarse las joyas (incluidos anillos, collares y relojes). Los objetos de metal se calientan cuando se conectan a la alimentación y a tierra, lo que puede ocasionar quemaduras graves o que los objetos metálicos queden soldados a los bornes.

Varning!

Tag av alla smycken (inklusive ringar, halsband och armbandsur) innan du arbetar på utrustning som är kopplad till kraftledningar. Metallobjekt hettas upp när de kopplas ihop med ström och jord och kan förorsaka allvarliga brännskador; metallobjekt kan också sammansvetsas med kontakterna.

Statement 68—WAN Interface Card Insertion Warning

Warning

To avoid electric shock, do not insert a WAN interface card into a 2-slot module while power to the router is ON or network cables are connected. Statement 68

Waarschuwing

Om elektrische schokken te vermijden, dient u geen interface-kaart van het type WAN in een module met 2 gleuven te steken terwijl de stroom naar de router-eenheid AAN is of de netwerkkabels verbonden zijn.

Varoitus

Vältä sähköisku - älä aseta WAN-liitäntäkorttia kaksiaukkoiseen moduuliin reitittimen ollessa päälle kytkettynä (ON) tai verkkojohtimien ollessa yhdistettyinä.

Attention

Afin d’éviter tout risque d’électrocution, ne pas insérer la carte d’interface de réseau étendu (WAN) dans le module à 2 emplacements lorsque le routeur EST alimenté ou que les câbles sont branchés.

Warnung

Zur Vermeidung von Elektroschock keine WAN-Schnittstellenkarte in ein Modul mit zwei Steckplätzen einsetzen, wenn der Strom zum Router eingeschaltet ist oder Netzwerkkabel angeschlossen sind.

Avvertenza

Per evitare folgorazione da scosse elettriche, non inserire una scheda d’interfaccia WAN in un modulo a 2 slot mentre il router è alimentato o mentre i cavi di rete sono collegati.

Advarsel

For å unngå elektrisk sjokk skal du ikke sette i et grensesnittkort for WAN i en 2-sporsmodul mens strømmen til fordelingsenheten er på (ON) eller nettverkskabler er tilkoblet.

Aviso

Para evitar o risco de choque eléctrico, não insira uma placa de interface WAN num módulo de 2 aberturas enquanto a corrente do distribuidor estiver ligada ou enquanto os cabos da rede estiverem conectados.

¡Advertencia!

Para evitar la sacudida eléctrica, no inserte una tarjeta de interfase WAN en un módulo de 2 ranuras cuando estén conectados la alimentación al router o el cableado dirigido a la red.

Varning!

För att undvika elektriska stötar, sätt inte i ett WAN-gränssnittskort i en modul med 2 kortplatser när strömmen till routern är PÅ eller om nätverkskablarna är anslutna.

Statement 125—Radiation from Open Port Aperture

Warning

Because invisible radiation may be emitted from the aperture of the port when no fiber cable is connected, avoid exposure to radiation and do not stare into open apertures. Statement 125

Waarschuwing

Aangezien onzichtbare straling vanuit de opening van de poort kan komen als er geen fiberkabel aangesloten is, dient blootstelling aan straling en het kijken in open openingen vermeden te worden.

Varoitus

Koska portin aukosta voi emittoitua näkymätöntä säteilyä, kun kuitukaapelia ei ole kytkettynä, vältä säteilylle altistumista äläkä katso avoimiin aukkoihin.

Attention

Des radiations invisibles à l'åil nu pouvant traverser l'ouverture du port lorsqu'aucun câble en fibre optique n'y est connecté, il est recommandé de ne pas regarder fixement l'intérieur de ces ouvertures.

Warnung

Warnung: Aus der Port-Öffnung können unsichtbare Strahlen emittieren, wenn kein Glasfaserkabel angeschlossen ist. Vermeiden Sie es, sich den Strahlungen auszusetzen, und starren Sie nicht in die Öffnungen!

Avvertenza

Quando i cavi in fibra non sono inseriti, radiazioni invisibili possono essere emesse attraverso l'apertura della porta. Evitate di esporvi alle radiazioni e non guardate direttamente nelle aperture.

Advarsel

Unngå utsettelse for stråling, og stirr ikke inn i åpninger som er åpne, fordi usynlig stråling kan emiteres fra portens åpning når det ikke er tilkoblet en fiberkabel.

Aviso

Dada a possibilidade de emissão de radiação invisível através do orifício da via de acesso, quando esta não tiver nenhum cabo de fibra conectado, deverá evitar a exposição à radiação e não deverá olhar fixamente para orifícios que se encontrarem a descoberto.

¡Advertencia!

Debido a que la apertura del puerto puede emitir radiación invisible cuando no existe un cable de fibra conectado, evite mirar directamente a las aperturas para no exponerse a la radiación.

Varning!

Statement 194—Chassis Lifting Warning

.

Warning

Two people are required to lift a fully configured chassis. Grasp the chassis underneath the lower edge and lift with both hands. To prevent injury, keep your back straight and lift with your legs, not your back. To prevent damage to the chassis and components, never attempt to lift the chassis by the handles on the front of the chassis. These handles were not designed to support the weight of the chassis. Statement 194

Waarschuwing

Er zijn twee mensen nodig om het frame op te tillen. Het frame dient onder de onderste rand vastgegrepen en met beide handen omhooggetild te worden. Om letsel te voorkomen, dient u uw rug recht te houden en met behulp van uw benen, niet uw rug, te tillen. Om schade aan het frame en de onderdelen te voorkomen, mag u nooit proberen om het frame op te tillen aan de plastic panelen voor op het frame. Deze handvatten zijn niet ontworpen om het gewicht van het frame te dragen.

Varoitus

Käyttövalmiin asennuspohjan nostamiseen tarvitaan kaksi henkilöä. Tartu asennuspohjan alareunasta ja nosta molemmin käsin. Pidä selkäsi suorana ja nosta jalkojen (ei selän) avulla loukkaantumisen välttämiseksi. Älä nosta asennuspohjaa sen etuosassa olevista kahvoista, etteivät asennuspohja ja sen osat vaurioituisi. Nämä kahvat eivät kestä koko asennuspohjan painoa.

Attention

Il faut deux personnes pour soulever un châssis entièrement configuré. Saisissez celui-ci sous son bord inférieur et soulevez-le des deux mains. Pour éviter tout risque de traumatisme de la région lombaire, soulevez la charge en gardant le dos droit et en poussant avec les jambes. Pour éviter tout risque de dommage matériel, ne soulevez jamais le châssis par les poignées de la partie frontale. Celles-ci ne sont pas conçues pour supporter le poids du châssis.

Warnung

Zum Anheben eines vollständig konfigurierten Chassis werden zwei Personen benötigt. Fassen Sie das Chassis unterhalb der unteren Kante an und heben es mit beiden Händen an. Um Verletzungen zu vermeiden, ist der Rücken gerade zu halten und das Gewicht mit den Beinen, nicht mit dem Rücken, anzuheben. Um Schäden an Chassis und anderen Komponenten zu vermeiden, heben Sie das Chassis nicht an den Griffen vorne am Chassis an. Diese Griffe sind nicht so konstruiert, daß sie das Gewicht des Chassis tragen könnten.

Avvertenza

Sono necessarie due persone per sollevare un telaio in configurazione completa. Afferrare il telaio al di sotto del bordo inferiore e sollevare con entrambe le mani. Per evitare infortuni, mantenere la schiena diritta e sollevare il peso con le gambe, non con la schiena. Per evitare danni al telaio ed ai componenti, non provare mai a sollevare il telaio dalle maniglie poste sul fronte del telaio. Queste maniglie non sono state progettate per sostenere il peso del telaio.

Advarsel

Det er nødvendig med to personer for å løfte kabinettet. Ta tak i kabinettet under den nedre kanten, og løft med begge hender. Unngå personskade ved å holde ryggen rett og løfte med bena, ikke ryggen. Unngå skade på kabinettet og komponentene ved å aldri prøve å løfte kabinettet etter plastpanelene foran på kabinettet. Disse håndtakene er ikke beregnet på å tåle vekten av kabinettet.

Aviso

São necessárias duas pessoas para levantar um chassis configurado integralmente. Agarre o chassis imediatamente abaixo da margem inferior, e levante-o com ambas as mãos. Para evitar lesões, mantenha as costas direitas e levante o peso com ambas as pernas, sem forçar as costas. Para prevenir danos no chassis e nos seus componentes, nunca tente levantá-lo pelas pegas localizadas na frente do chassis. Estas pegas não foram concebidas para suportar o peso do chassis.

¡Advertencia!

Se necesitan dos personas para levantar un chasis completamente configurado. Sujete el chasis con las dos manos por debajo del borde inferior y levántelo. Para evitar lesiones, mantenga la espalda recta y levántelo con la fuerza de las piernas y no de la espalda. Para evitar daños al chasis y a sus componentes, no intente nunca levantar el chasis por las asas situadas en el frontal del chasis. Las asas no han sido diseñadas para soportar el peso del chasis.

Varning!

Statement 198—Power Failure Warning

Warning

This equipment will be inoperable when mains power fails. Statement 198

Waarschuwing

De apparatuur kan niet worden gebruikt bij onderbreking van de hoofdstroomtoevoer.

Varoitus

Tämä laite ei toimi, jos sähkövirta katkeaa.

Attention

Cet équipement est inutilisable en cas de panne d’électricité.

Warnung

Dieses Gerät ist nicht betriebsbereit, wenn die Hauptstromzufuhr ausfällt.

Avvertenza

Questo apparecchio non è utilizzabile in caso di mancanza di corrente elettrica.

Advarsel

Dette utstyret vil ikke fungere hvis hovedstrømmen feiler.

Aviso

Este equipamento fica inoperável quando faltar energia.

¡Advertencia!

Este equipo no funcionará si falla la alimentación principal.

Varning!

Statement 240—Laser Radiation Warning

Warning

Because invisible laser radiation may be emitted from the aperture of the OC-3 type NI-2 optical interface port when no cable is connected, avoid exposure to laser radiation and do not stare into an open aperture. Statement 240

Waarschuwing

Omdat er onzichtbare laserstraling uit de opening van de OC-3 type NI-2 optische interface-poort geëmitteerd kan worden wanneer er geen kabel aangesloten is, dient men om blootstelling aan laserstraling te vermijden niet in de open openingen te kijken.

Varoitus

Kun OC-3-tyyppiseen optiseen NI-2-porttiin ei ole kytketty kaapelia, portin aukosta voi vuotaa näkymätöntä lasersäteilyä. Älä katso avoimeen aukkoon, jotta et altistu lasersäteilylle.

Attention

Etant donné qu'un rayonnement laser invisible peut être émis par l'ouverture du port d'interface optique OC-3 type NI-2 quand aucun câble n'est connecté, ne pas regarder dans les ouvertures béantes afin d'éviter tout risque d'exposition au rayonnement laser.

Warnung

Aus der Öffnung des optischen OC-3 Typ NI-2 Schnittstellenanschlusses kann unsichtbare Laserstrahlung austreten, wenn kein Kabel angeschlossen ist. Kontakt mit Laserstrahlung vermeiden und nicht in offene Öffnungen blicken.

Avvertenza

Poiché quando nessun cavo è collegato alla porta dell'interfaccia ottica NI-2, del tipo OC-3, da quest'ultima potrebbe essere emessa radiazione laser invisibile, evitare l'esposizione a tale radiazione e non fissare con gli occhi porte a cui non siano collegati cavi.

Advarsel

Usynlige laserstråler kan sendes ut fra åpningen til den optiske OC-3 type NI-2 grensesnittporten når ingen kabel er tilkoblet. Unngå utsettelse for laserstråling og se ikke inn i åpninger som ikke er tildekket.

Aviso

Evite uma exposição à radiação laser e não olhe através de aberturas expostas, porque poderá ocorrer emissão de radiação laser invisível a partir da abertura da porta de interface óptica OC-3 tipo NI-2, quando não estiver qualquer cabo conectado.

¡Advertencia!

Cuando no esté conectado ningún cable, pueden emitirse radiaciones láser invisibles por el orificio del puerto de interfaz óptica NI-2 de tipo OC-3. Evitar la exposición a radiaciones láser y no mirar fijamente los orificios abiertos.

Varning!

Statement 347—Failure to Secure the Expansion Module

Warning

Failure to secure the expansion module to the base module with two screws defeats the earth ground, causing a potential safety hazard. Statement 347

Waarschuwing

Als u verzuimt de uitbreidingsmodule met twee schroeven aan de basismodule te bevestigen, wordt de aarding verbroken waardoor een veiligheidsrisico ontstaat.

Varoitus

Epäonnistunut yritys kiinnittää laajennusmoduuli perusmoduuliin kahdella ruuvilla mitätöi maadoituksen, mikä aiheuttaa mahdollisen turvallisuusriskin.

Attention

Si le module d'extension n'est pas fixé au module de base à l'aide de deux vis, le raccordement à la terre est entravé, ce qui présente un danger potentiel pour la sécurité.

Warnung

Wird das Expansionsmodul nicht mit zwei Schrauben am Basismodul befestigt, wird die Erdung außer Kraft gesetzt. Dies stellt u.U. ein Sicherheitsrisiko dar.

Avvertenza

Il mancato fissaggio del modulo di espansione al modulo di base mediante due viti annulla la connessione a terra e costituisce un potenziale pericolo.

Advarsel

Hvis utvidelsesmodulen ikke festes ordentlig til hovedmodulen med to skruer, ødelegges jordingen. Dette kan innebære en sikkerhetsrisiko.

Aviso

A incapacidade de fixar o módulo de expansão ao módulo base com dois parafusos destrói o fio de terra, originando um risco de segurança potencial.

Si no se asegura el módulo de expansión al módulo base con dos tornillos se anula la conexión de tierra, lo que provocaría un posible riesgo.

Underlåtande att sätta fast expansionsmodulen vid basmodulen med två skruvar omintetgör jordningen och föranleder en potentiell säkerhetsrisk.

Statement 373—Must Connect To An Indoor Antenna

Warning

This equipment must be connected to an indoor antenna only. Statement 373

Waarschuwing

Deze apparatuur kan alleen worden aangesloten op een antenne voor binnengebruik.

Varoitus

Tämän laitteiston voi liittää vain sisäantenniin.

Attention

Cet équipement doit être connecté à une antenne intérieure uniquement.

Warnung

Diese Gerät darf nur an eine Innenantenne angeschlossen werden.

Avvertenza

Questo apparecchio può essere collegato solo a un'antenna da interno.

Advarsel

Dette utstyret må kun kobles til en innendørsantenne.

Aviso

Este equipamento só pode ser ligado a uma antena interior.

Este equipo sólo debe estar conectado a una antena de interior.

Den här utrustningen får endast anslutas till en inomhusantenn.

Statement 374—Equipment Connected to Outdoor Cameras

Warning

Equipment connected to outdoor cameras must be permanently grounded in accordance with national and local codes. Statement 374

Waarschuwing

Apparatuur die is aangesloten op camera's die zich buiten bevinden, moeten permanent worden geaard volgens nationale en regionale normen.

Varoitus

Ulkokameroihin liitettävät laitteistot täytyy maadoittaa pysyvästi kansallisten ja paikallisten säädösten mukaisesti.

Attention

L'équipement connecté à des caméras extérieures doit être mis à la terre conformément aux codes locaux et nationaux en vigueur.

Warnung

Geräte, die an Außenkameras angeschlossen werden, müssen in Übereinstimmung mit den nationalen und lokalen Bestimmungen dauerhaft geerdet sein.

Avvertenza

Ogni apparecchiatura collegata a telecamere da esterni deve essere provvista di messa a terra permanente in conformità alle normative nazionali e locali vigenti.

Advarsel

Utstyr som er koblet til utendørskameraer må være permanent jordet i henhold til nasjonale og lokale regler.

Aviso

O equipamento ligado a câmaras exteriores tem de estar permanentemente ligado à terra, de acordo com as normas locais e nacionais.

Los equipos conectados a cámaras de exterior deben estar conectados de manera permanente a conexiones de tierra de acuerdo con los códigos nacionales y locales.

Utrustning som ansluts till utomhuskameror måste vara permanent jordad enligt nationella och lokala regler.

Statement 376—Hazardous Voltages May be Present

Warning

Hazardous voltages may be present in the outdoor camera cables under fault conditions. Disconnect all cables from the outdoor cameras before servicing this equipment. Statement 376

Waarschuwing

Mogelijk zijn bij verkeerde omstandigheden gevaarlijke voltages aanwezig in de kabels van de buitencamera's. Koppel alle kabels los van de buitencamera's voordat onderhoud aan deze apparatuur wordt gepleegd.

Varoitus

Vikatilanteissa ulkokameran kaapeleissa saattaa olla esiintyä vaarallisia jännitteitä. Irrota kaikki ulkokameran kaapelit ennen laitteen huoltamista.

Attention

Dans des conditions de défaut, des tensions dangereuses peuvent être présentes dans les câbles des caméras extérieures. Débranchez tous les câbles des caméras extérieures avant de procéder à l'entretien de cet équipement.

Warnung

Bei Fehlfunktionen können die Kabel der Außenkameras gefährliche Spannungen führen. Trennen Sie vor der Wartung alle Kabel von den Außenkameras.

Avvertenza

In caso di guasto o cattivo funzionamento, la tensione dei cavi della telecamera da esterni può raggiungere livelli pericolosi. Scollegare tutti i cavi della telecamera da esterni prima di eseguire qualsiasi manutenzione.

Advarsel

Det kan finnes farlig spenning i kabler i utendørskameraet ved feilsituasjoner. Koble alle kabler fra utendørskameraet før du foretar service på dette utstyret.

Aviso

Em caso de avaria, podem existir tensões perigosas nos cabos das câmaras exteriores. Desligue todos os cabos das câmaras exteriores antes de reparar este equipamento.

En condiciones de posibles errores, se pueden detectar voltajes peligrosos en los cables de cámaras de exterior. Desconecte todos los cables de las cámaras de exterior antes de poner en funcionamiento el equipo.

Utomhuskamerornas sladdar kan vara spänningsförande och farliga under feltillstånd. Koppla ur alla sladdar från utomhuskamerorna innan översyn görs på utrustningen.

Statement 1001—Work During Lightning Activity

Warning

Do not work on the system or connect or disconnect cables during periods of lightning activity.

Waarschuwing

Tijdens onweer dat gepaard gaat met bliksem, dient u niet aan het systeem te werken of kabels aan te sluiten of te ontkoppelen.

Älä työskentele järjestelmän parissa äläkä yhdistä tai irrota kaapeleita ukkosilmalla.

Ne pas travailler sur le système ni brancher ou débrancher les câbles pendant un orage.

Arbeiten Sie nicht am System und schließen Sie keine Kabel an bzw. trennen Sie keine ab, wenn es gewittert.

Figyelem!

Villámlás közben ne dolgozzon a rendszeren, valamint ne csatlakoztasson és ne húzzon ki kábeleket!

Non lavorare sul sistema o collegare oppure scollegare i cavi durante un temporale con fulmini.

Utfør aldri arbeid på systemet, eller koble kabler til eller fra systemet når det tordner eller lyner.

Não trabalhe no sistema ou ligue e desligue cabos durante períodos de mau tempo (trovoada).

No operar el sistema ni conectar o desconectar cables durante el transcurso de descargas eléctricas en la atmósfera.

Vid åska skall du aldrig utföra arbete på systemet eller ansluta eller koppla loss kablar.

Statement 1004 — Installation Instructions

Warning

Read the installation instructions before connecting the system to the power source.

Raadpleeg de installatie-instructies voordat u het systeem op de voedingsbron aansluit.

Lue asennusohjeet ennen järjestelmän yhdistämistä virtalähteeseen.

Avant de brancher le système sur la source d'alimentation, consulter les directives d'installation.

Vor dem Anschließen des Systems an die Stromquelle die Installationsanweisungen lesen.

Figyelem!

Mielõtt áramforráshoz csatlakoztatná a rendszert, olvassa el az üzembe helyezési útmutatót!

Consultare le istruzioni di installazione prima di collegare il sistema all'alimentatore.

Les installasjonsinstruksjonene før systemet kobles til strømkilden.

Leia as instruções de instalação antes de ligar o sistema à fonte de energia.

Lea las instrucciones de instalación antes de conectar el sistema a la red de alimentación.

Läs installationsanvisningarna innan du kopplar systemet till strömförsörjningsenheten.

Statement 1008—Class 1 Laser Product

Warning

Class 1 laser product.

Klasse-1 laser produkt.

Luokan 1 lasertuote.

Produit laser de classe 1.

Laserprodukt der Klasse 1.

Figyelem!

Class 1 besorolású lézeres termék.

Prodotto laser di Classe 1.

Laserprodukt av klasse 1.

Produto laser de classe 1.

Producto láser Clase I.

Laserprodukt av klass 1.

Statement 1016—Invisible Laser Radiation

Warning

Invisible laser radiation present.

Onzichtbare laserstraling aanwezig.

Näkymättömiä lasersäteitä.

Rayonnement laser actif mais invisible.

Unsichtbare Laserstrahlung.

Figyelem!

Láthatatlan lézersugárzás van jelen.

Radiazione laser invisibile.

Usynlig laserstråling.

Radiação laser invisível presente.

Existe radiación láser invisible.

Nu pågående osynlig laserstrålning.

Statement 1021 — SELV Circuit

Warning

To avoid electric shock, do not connect safety extra-low voltage (SELV) circuits to telephone-network voltage (TNV) circuits. LAN ports contain SELV circuits, and WAN ports contain TNV circuits. Some LAN and WAN ports both use RJ-45 connectors. Use caution when connecting cables.

Om elektrische schokken te vermijden, mogen veiligheidscircuits met extra lage spanning (genaamd SELV = Safety Extra-Low Voltage) niet met telefoonnetwerkspanning (TNV) circuits verbonden worden. LAN (Lokaal netwerk) poorten bevatten SELV circuits en WAN (Regionaal netwerk) poorten bevatten TNV circuits. Sommige LAN en WAN poorten gebruiken allebei RJ-45 connectors. Ga voorzichtig te werk wanneer u kabels verbindt.

Jotta vältyt sähköiskulta, älä kytke pienjännitteisiä SELV-suojapiirejä puhelinverkkojännitettä (TNV) käyttäviin virtapiireihin. LAN-portit sisältävät SELV-piirejä ja WAN-portit puhelinverkkojännitettä käyttäviä piirejä. Osa sekä LAN- että WAN-porteista käyttää RJ-45-liittimiä. Ole varovainen kytkiessäsi kaapeleita.

Pour éviter une électrocution, ne raccordez pas les circuits de sécurité basse tension (Safety Extra-Low Voltage ou SELV) à des circuits de tension de réseau téléphonique (Telephone Network Voltage ou TNV). Les ports du réseau local (LAN) contiennent des circuits SELV et les ports du réseau longue distance (WAN) sont munis de circuits TNV. Certains ports LAN et WAN utilisent des connecteurs RJ-45. Raccordez les câbles en prenant toutes les précautions nécessaires.

Zur Vermeidung von Elektroschock die Sicherheits-Kleinspannungs-Stromkreise (SELV-Kreise) nicht an Fernsprechnetzspannungs-Stromkreise (TNV-Kreise) anschließen. LAN-Ports enthalten SELV-Kreise, und WAN-Ports enthalten TNV-Kreise. Einige LAN- und WAN-Ports verwenden auch RJ-45-Steckverbinder. Vorsicht beim Anschließen von Kabeln.

Figyelem!

Az áramütés elkerülése érdekében ne csatlakoztasson biztonságos törpefeszültségû (SELV) áramköröket telefonhálózati feszültségû (TNV) áramkörökhöz. A LAN portok SELV áramköröket, a WAN portok TNV áramköröket tartalmaznak. Bizonyos LAN és WAN portok egyaránt RJ-45 csatlakozókkal vannak felszerelve. Óvatosan járjon el a kábelek csatlakoztatásakor!

Per evitare scosse elettriche, non collegare circuiti di sicurezza a tensione molto bassa (SELV) ai circuiti a tensione di rete telefonica (TNV). Le porte LAN contengono circuiti SELV e le porte WAN contengono circuiti TNV. Alcune porte LAN e WAN fanno uso di connettori RJ-45. Fare attenzione quando si collegano cavi.

Unngå å koble lavspenningskretser (SELV) til kretser for telenettspenning (TNV), slik at du unngår elektrisk støt. LAN-utganger inneholder SELV-kretser og WAN-utganger inneholder TNV-kretser. Det finnes både LAN-utganger og WAN-utganger som bruker RJ-45-kontakter. Vær forsiktig når du kobler kabler.

Para evitar choques eléctricos, não conecte os circuitos de segurança de baixa tensão (SELV) aos circuitos de tensão de rede telefónica (TNV). As portas LAN contêm circuitos SELV e as portas WAN contêm circuitos TNV. Algumas portas LAN e WAN usam conectores RJ-45. Tenha o devido cuidado ao conectar os cabos.

Para evitar la sacudida eléctrica, no conectar circuitos de seguridad de voltaje muy bajo (safety extra-low voltage = SELV) con circuitos de voltaje de red telefónica (telephone network voltage = TNV). Los puertos de redes de área local (local area network = LAN) contienen circuitos SELV, y los puertos de redes de área extendida (wide area network = WAN) contienen circuitos TNV. En algunos casos, tanto los puertos LAN como los WAN usan conectores RJ-45. Proceda con precaución al conectar los cables.

Statement 1024 — Ground Conductor

Warning

This equipment must be grounded. Never defeat the ground conductor or operate the equipment in the absence of a suitably installed ground conductor. Contact the appropriate electrical inspection authority or an electrician if you are uncertain that suitable grounding is available.

Deze apparatuur dient geaard te zijn. De aardingsleiding mag nooit buiten werking worden gesteld en de apparatuur mag nooit bediend worden zonder dat er een op de juiste wijze geïnstalleerde aardingsleiding aanwezig is. Neem contact op met de bevoegde instantie voor elektrische inspecties of met een elektricien als u er niet zeker van bent dat er voor passende aarding gezorgd is.

Laitteiden on oltava maadoitettuja. Älä koskaan ohita maajohdinta tai käytä laitteita ilman oikein asennettua maajohdinta. Ota yhteys sähkötarkastusviranomaiseen tai sähköasentajaan, jos olet epävarma maadoituksen sopivuudesta.

Cet équipement doit être mis à la masse. Ne jamais rendre inopérant le conducteur de masse ni utiliser l'équipement sans un conducteur de masse adéquatement installé. En cas de doute sur la mise à la masse appropriée disponible, s'adresser à l'organisme responsable de la sécurité électrique ou à un électricien.

Dieses Gerät muss geerdet sein. Auf keinen Fall den Erdungsleiter unwirksam machen oder das Gerät ohne einen sachgerecht installierten Erdungsleiter verwenden. Wenn Sie sich nicht sicher sind, ob eine sachgerechte Erdung vorhanden ist, wenden Sie sich an die zuständige Inspektionsbehörde oder einen Elektriker.

Figyelem!

A berendezés csak megfelelõ védõföldeléssel mûködtethetõ. Ne iktassa ki a földelés csatlakozóját, és ne üzemeltesse a berendezést szabályosan felszerelt földelõ vezeték nélkül! Ha nem biztos benne, hogy megfelelõ földelés áll rendelkezésbe, forduljon a helyi elektromos hatóságokhoz vagy egy villanyszerelõhöz.

Questa apparecchiatura deve essere dotata di messa a terra. Non escludere mai il conduttore di protezione né usare l'apparecchiatura in assenza di un conduttore di protezione installato in modo corretto. Se non si è certi della disponibilità di un adeguato collegamento di messa a terra, richiedere un controllo elettrico presso le autorità competenti o rivolgersi a un elettricista.

Dette utstyret må jordes. Omgå aldri jordingslederen og bruk aldri utstyret uten riktig montert jordingsleder. Ta kontakt med fagfolk innen elektrisk inspeksjon eller med en elektriker hvis du er usikker på om det finnes velegnet jordning.

Este equipamento deve ser aterrado. Nunca anule o fio terra nem opere o equipamento sem um aterramento adequadamente instalado. Em caso de dúvida com relação ao sistema de aterramento disponível, entre em contato com os serviços locais de inspeção elétrica ou um eletricista qualificado.

Este equipo debe estar conectado a tierra. No inhabilite el conductor de tierra ni haga funcionar el equipo si no hay un conductor de tierra instalado correctamente. Póngase en contacto con la autoridad correspondiente de inspección eléctrica o con un electricista si no está seguro de que haya una conexión a tierra adecuada.

Denna utrustning måste jordas. Koppla aldrig från jordledningen och använd aldrig utrustningen utan en på lämpligt sätt installerad jordledning. Om det föreligger osäkerhet huruvida lämplig jordning finns skall elektrisk besiktningsauktoritet eller elektriker kontaktas.

Statement 1026 — WAN Port Static Shock

Warning

Hazardous network voltages are present in WAN ports regardless of whether power to the unit is OFF or ON. To avoid electric shock, use caution when working near WAN ports. When detaching cables, detach the end away from the unit first.

Waarschuwing

Er is gevaarlijke netwerkspanning aanwezig in WAN poorten ongeacht of de stroom naar de router INGESCHAKELD of UITGESCHAKELD is. Om elektrische schokken te vermijden, dient u voorzichtig te werk te gaan wanneer u in de nabijheid van WAN poorten werkt. Wanneer u kabels losmaakt, dient u eerst het uiteinde dat zich het verst van de eenheid vandaan bevindt, te verwijderen.

Varoitus

WAN-porteissa on vaarallisia verkkojännitteitä riippumatta siitä, onko yksikön virta kytketty vai ei. Välttyäksesi sähköiskulta ole varovainen työskennellessäsi WAN-porttien lähettyvillä. Kun irrotat kaapeleita, irrota yksiköstä kauimpana sijaitseva pää ensiksi.

Attention

Les ports de réseau longue distance (WAN) gèrent des tensions de réseau dangereuses, que l'unité soit sous tension ou pas. Pour éviter tout risque d’électrocution, prenez toutes les précautions nécessaires avant de travailler à proximité des ports WAN. Pour déconnecter les câbles, commencez par débrancher l’extrémité la plus éloignée du routeur.

Warnung

In WAN-Ports sind gefährliche Netzspannungen vorhanden, auch wenn der Strom zur Einheit abgeschaltet wurde. Zur Vermeidung von Elektroschock Vorsicht bei der Arbeit in der Nähe von WAN-Ports. Beim Abtrennen von Kabeln zuerst das vom Router entfernte Ende lösen.

Figyelem!

A WAN portokban veszélyes hálózati feszültség van jelen, függetlenül attól, hogy a készülék KI vagy BE van kapcsolva. Az áramütés elkerülése érdekében óvatosan járjon el a WAN portok közelében történõ munkavégzés során. Elõször mindig a készülék felõli végükön szüntesse meg a kábelek csatlakozását.

Avvertenza

Nelle porte WAN sono presenti tensioni di rete pericolose, sia che il sistema sia acceso o meno (ON od OFF). Per evitare scosse elettriche, fare attenzione quando si lavora in prossimità di porte WAN. Quando si scollegano cavi, staccare per primo il connettore collegato al router.

Advarsel!

Det er livsfarlig nettverksspenning i WAN-utganger, uavhengig av om strømmen til enheten er slått av (OFF) eller på (ON). Vær forsiktig når du jobber nær WAN-utganger slik at du unngår elektrisk støt. Hvis du skal løsne kabler, må du først løsne den enden som er lengst borte fra fordelingsenheten.

Aviso

Existem sempre tensões de rede perigosas nas portas WAN, independentemente da corrente para a unidade estar desligada (OFF) ou ligada (ON). Para evitar choques eléctricos, tenha o devido cuidado ao trabalhar junto das portas WAN. Ao desconectar os cabos, separe primeiro a extremidade do cabo que se encontra ligada à unidade.

¡Advertencia!

En los puertos de redes de área extendida (WAN) existen tensiones de red peligrosas, tanto si la unidad está conectada como si está desconectada. Para evitar descargas eléctricas, proceda con precaución cuando trabaje cerca de los puertos WAN. Para desconectar los cables, desconecte primero el extremo que va a la unidad.

Varning!

Farlig nätverksspänning föreligger i WAN-portarna oavsett om strömförsörjningen till enheten är bruten eller ej. För att undvika elektriska stötar ska du vara försiktig vid arbete i närheten av dessa portar. När du kopplar bort en kabel ska du först koppla bort den ände som inte är ansluten till enheten.

Statement 1027—Class 1 LED Product

Warning

Class 1 LED product

Waarschuwing

Klasse 1 LED-product

Varoitus

Luokan 1 valodiodituote

Attention

Alarme de produit LED Class I

Warnung

Class 1 LED-Produktwarnung

Figyelem!

Class 1 besorolású LED termék.

Avvertenza

Avvertenza prodotto LED di Classe 1

Advarsel

LED-produkt i klasse 1

Aviso

Produto de classe 1 com LED

¡Advertencia!

Aviso sobre producto LED de Clase 1

Varning!

Lysdiodprodukt av klass 1

Statement 1029 — Blank Faceplates and Cover Panels

Warning

Attention

Warnung

Figyelem!

Az elõlapok és burkolópanelek három fontos funkciót töltenek be: biztosítják a veszélyes feszültségû és áramerõsségû területek érintésvédelmét; elnyelik a más berendezések mûködésében mûködési zavarokat okozó elektromágneses interferenciát (EMI); a gépházon belül terelik a hûtõlevegõt. Csak úgy mûködtesse a rendszert, ha minden kártya, lemez, elülsõ és hátulsó burkolat a helyén van.

Avvertenza

Varning!

Statment 1030 — Equipment Installation

Warning

to install, replace, or service this equipment.

Waarschuwing

Varoitus

Attention

Il est vivement recommandé de confier l'installation, le remplacement et la maintenance de ces équipements à des personnels qualifiés et expérimentés.

Warnung

Das Installieren, Ersetzen oder Bedienen dieser Ausrüstung sollte nur geschultem, qualifiziertem Personal gestattet werden.

Figyelem!

A berendezést csak szakképzett személyek helyezhetik üzembe, cserélhetik és tarthatják karban.

Avvertenza

Questo apparato può essere installato, sostituito o mantenuto unicamente da un personale competente.

Advarsel

Aviso

¡Advertencia!

Solamente el personal calificado debe instalar, reemplazar o utilizar este equipo.

Varning!

Statement 1031—EU Public Network Port

Warning

If the symbol of suitability with an overlaid cross appears above a port, you must not connect the port to a public network that follows the European Union standards. Connecting the port to this type of public network can cause severe personal injury or can damage the unit.

n

Warnung

Wenn oberhalb des Ports das Eignungssymbol mit einem Kreuz darüber erscheint, dürfen Sie den Port nicht an ein öffentliches Netz anschließen, das den Standards der Europäischen Gemeinschaft folgt. Das Anschließen des Port an ein solches Netz kann zu schweren Verletzungen führen oder die Einheit beschädigen.

Figyelem!

Ha egy port fölött áthúzva látható az alkalmasságra utaló jel, tilos azt a portot az Európai Unió szabványainak megfelelõ nyilvános hálózathoz csatlakoztatni. Ha mégis ilyen nyilvános hálózathoz csatlakoztatják a portot, az súlyos személyi sérüléseket eredményezhet, és a berendezés károsodását vonhatja maga után.

Se sopra una porta è riportato il simbolo di idoneità sbarrato, significa che la porta non può essere collegata a una rete pubblica a norma UE. Collegando la porta a tale rete pubblica si possono correre seri rischi e provocare danni all'unità.

Hvis symbolet for anvendelse med et kryss over vises over en utgang, skal utgangen ikke tilkobles et offentlig nettverk som følger EU-standardene. Hvis utgangen kobles til denne typen offentlig nettverk, kan det medføre alvorlig personskade eller skade på enheten.

Se o símbolo de adequação com uma cruz sobreposta aparecer acima de uma porta, não conecte a porta a uma rede pública que obedece aos padrões da União Européia. A conexão da porta a este tipo de rede pública pode causar danos físicos ao operador ou danificar a unidade.

Si aparece el símbolo de idoneidad con una cruz sobrepuesta encima de un puerto, no debe conectarlo a una red pública que siga los estándares de la Unión Europea. Si conecta el puerto a este tipo de red puede lesionarse o dañar la unidad.

Om lämplighetssymbolen med ett överlagt kors visas ovanför en port, får porten inte anslutas till ett offentligt nätverk av EU-standard. Om porten ansluts till denna typ av offentligt nätverk kan det orsaka allvarlig personskada eller skada enheten.

Statement 1036 — Telephone Jacks in Wet Locations

Warning

Waarschuwing

Varoitus

Attention

Ne jamais installer de prises téléphoniques dans un local humide, sauf si celles-ci sont spécifiquement conçues pour cet usage.

Warnung

Telefonanschlüsse niemals in feuchten Umgebungen installieren, es sei denn der Anschluß ist speziell für Feuchtumgebungen entwickelt!

Figyelem!

Ne szereljen fel nedves helyre telefoncsatlakozókat, kivéve, ha a csatlakozó kifejezetten nedves környezethez készült.

Avvertenza

Advarsel

Telefonkontakter skal aldri monteres i fuktige omgivelser, med mindre kontakten er spesielt laget for våtrom.

Aviso

Nunca instalar tomadas telefónicas em locais húmidos, a menos que a tomada tenha sido especialmente concebida para esse efeito.

¡Advertencia!

Varning!

Statement 1037 — Uninsulated Wires and Terminals

Warning

Waarschuwing

Raak ongeïsoleerde telefoondraden of contacten nooit aan tenzij de telefoonlijn van de netwerkinterface werd ontkoppeld.

Varoitus

Attention

Warnung

Niemals nicht-isolierte Telefonkabel berühren, außer wenn die Telefonleitung an der Netzwerkschnittstelle abgetrennt wurde!

Figyelem!

Mielõtt szigeteletlen telefonvezetékekhez és csatlakozókhoz érne, mindig szakítsa meg a telefonvonalat a hálózati csatlakozásnál.

Avvertenza

Advarsel

Aviso

¡Advertencia!

Varning!

Telefonlinjer måste frånkopplas vid nätverksgränssnittet innan oisolerad telefonledning eller -uttag vidrörs.

Statement 1038—Telephone Use During an Electrical Storm

Warning

Waarschuwing

Varoitus

Attention

Warnung

Vermeiden Sie die Benutzung eines Telefons während eines Gewitters (außer eines schnurlosen Geräts). Es besteht ein geringes Risiko eines elektrischem Schlags durch Blitze.

Figyelem!

Elektromos tevékenységekkel járó viharok idején lehetõleg ne használjon telefont (kivéve vezeték nélküli telefont)! Fennáll ugyanis annak minimális veszélye, hogy villámcsapás következtében áramütést szenved.

Avvertenza

Advarsel

Aviso

¡Advertencia!

Varning!

Statement 1039 — Telephone Use by Gas Leak

Warning

Waarschuwing

Varoitus

Jos ilmoitat kaasuvuodosta puhelimitse, älä käytä puhelinta vuodon lähettyvillä.

Attention

Pour signaler une fuite de gaz à votre société de distribution, ne jamais utiliser un téléphone à proximité de cette fuite.

Warnung

Gaslecks nicht über ein Telefon melden, das sich in der Nähe des Lecks befindet.

Figyelem!

Gázszivárgás bejelentésére ne használjon a szivárgás közelében levõ telefonkészüléket!

Avvertenza

Advarsel

Aviso

¡Advertencia!

No utilice el teléfono para informar de un escape de gas en la zona.

Varning!

Statement 1040 — Product Disposal

Warning

Ultimate disposal of this product should be handled according to all national laws and regulations.

Waarschuwing

Varoitus

Tämä tuote on hävitettävä kansallisten lakien ja määräysten mukaisesti.

Attention

Warnung

Figyelem!

A készülék végsõ elhelyezésérõl az adott országban érvényes törvények és elõírások szerint kell intézkedni.

Avvertenza

Advarsel

Aviso

¡Advertencia!

Varning!

Statement 1041 — Disconnecting Telephone-Network Cables

Warning

Waarschuwing

Varoitus

Attention

Warnung

Figyelem!

Mielõtt kinyitná a készüléket, a telefonhálózati feszültséggel való érintkezés elkerülése érdekében távolítsa el a csatlakozókból a telefonhálózati kábeleket.

Avvertenza

Advarsel

Aviso

¡Advertencia!

Varning!

Statement 1042—Ring Signal Generator

Warning

Waarschuwing

Varoitus

Attention

Warnung

Figyelem!

A berendezés csengõjel-generátort (csengõt) tartalmaz, amely veszélyes feszültségforrásnak minõsül. Ha aktív a csengõ, ne érjen az RJ-11 (telefon) csatlakozó huzaljaihoz (vezetékeihez), az RJ-11 porthoz csatlakozó kábelekhez és az azokhoz kapcsolódó áramköri laphoz. A csengõt a bejövõ hívások aktiválják.

Avvertenza

Advarsel

Aviso

¡Advertencia!

Varning!

Statement 1043—Installation Hazard

Warning

This equipment must be installed and maintained by service personnel as defined by AS/NZS 3260. Incorrectly connecting this equipment to a general-purpose outlet could be hazardous. The telecommunications lines must be disconnected 1) before unplugging the main power connector or 2) while the housing is open, or both.

Waarschuwing

Deze apparatuur dient geïnstalleerd en onderhouden te worden door onderhoudspersoneel zoals gedefinieerd door AS/NZS 3260. Als deze uitrusting onjuist op een stopcontact voor algemeen gebruik wordt aangesloten, kan dit gevaarlijk zijn. De telecommunicatielijnen dienen ontkoppeld te worden 1) voordat de stekker naar de hoofdstroomtoevoer eruit genomen wordt of 2) terwijl de behuizing open is, of in beide gevallen.

Varoitus

Huoltohenkilöstön on asennettava ja huollettava tämä laite AS/NZS 3260:n määräysten mukaisesti. Laitteen virheellinen kytkeminen yleispistorasiaan voi aiheuttaa vaaratilanteen. Tietoliikennejohdot on irrotettava 1) ennen kuin päävirtaliitin irrotetaan pistorasiasta ja/tai 2) kun kotelo on auki.

Attention

Cet équipement ne doit être installé et entretenu que par du personnel d'entretien conformément à la réglementation AS/NZS 3260. Un branchement incorrect de cet équipement à une prise de courant peut créer une situation dangereuse. Les lignes de télécommunications doivent être déconnectées soit 1) avant de débrancher le connecteur d'alimentation principal, soit 2) lorsque le boîtier est ouvert, soit les deux les deux à la fois.

Warnung

Dieses Gerät darf nur von ausgebildetem Personal installiert und gewartet werden (lt. Definition in AS/NZS 3260). Fälschliches Anschließen des Geräts an eine normale Steckdose kann gefährlich sein. Die Telekommunikationsleitungen dürfen nicht angeschlossen sein, wenn 1. der Netzstecker herausgezogen wird oder 2. das Gehäuse geöffnet ist oder beides zutrifft.

Figyelem!

A berendezést az AS/NZS 3260 elõírás értelmében csak hozzáértõ szakemberek helyezhetik üzembe és tarthatják karban. Veszélyes lehet, ha helytelenül csatlakoztatják a készüléket egy általános rendeltetésû csatlakozóhoz. Meg kell szüntetni a távközlési vonalak csatlakozását, 1) mielõtt megszüntetnék a készülék áramellátását és/vagy 2) ha nyitva van a készülék burkolata.

Avvertenza

Questo apparecchio deve essere installato e mantenuto in efficienza esclusivamente da personale tecnico che soddisfi i requisiti specificati nelle norme AS/NZS 3260. Il collegamento errato di questo apparecchio ad una presa di uso generale può essere pericoloso. Le linee di telecomunicazione vanno scollegate prima di scollegare la spina dell'alimentazione di rete e/o mentre l'involucro è aperto.

Advarsel

Dette utstyret må monteres og vedlikeholdes av vedlikeholdspersonell i henhold til AS/NZS 3260. Feil tilkobling av dette utstyret til et vanlig strømuttak kan medføre fare. Telekommunikasjonslinjene må være frakoblet 1) før strømledningen trekkes ut av kontakten eller 2) mens huset er åpent, eller begge deler.

Aviso

A instalação e a manutenção deste equipamento devem ser realizadas por pessoal da assistência, conforme definido na norma AS/NZS 3260. A ligação incorreta deste equipamento a uma tomada de utilização geral poderá ser perigosa. As linhas de telecomunicações têm de estar desligadas 1) antes de desligar a ligação da corrente principal, e/ou 2) enquanto a caixa de eletricidade estiver aberta.

Advertencia!

Sólo el personal de servicio puede instalar y mantener este equipo, según lo estipulado en AS/NZS 3260. La conexión incorrecta de este equipo a una toma o receptáculo de tipo general podría resultar peligrosa. Las líneas de telecomunicaciones deben desconectarse 1) antes de desenchufar el conector principal de energía, 2) mientras la caja esté abierta o en ambos casos.

Varning!

Denna utrustning måste installeras och underhållas av servicepersonal enligt AS/NZS 3260. Felaktig anslutning av denna utrustning till ett vanligt vägguttag kan medföra fara. Teleledningarna måste kopplas från innan väggkontakten dras ut eller innan höljet tas av eller i båda fallen.

Statement 1044—Port Connections

Warning

T1, E1, T3, E3, FXS, SFP Statement 1044

Waarschuwing

T1, E1, T3, E3, FXS, SFP

Varoitus

T1, E1, T3, E3, FXS, SFP

Attention

T1, E1, T3, E3, FXS, SFP

Warnung

T1, E1, T3, E3, FXS, SFP

Avvertenza

T1, E1, T3, E3, FXS, SFP

Advarsel

T1, E1, T3, E3, FXS, SFP

Aviso

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

Varning!

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

T1, E1, T3, E3, FXS, SFP

Statement 1051—Laser Radiation

Warning

Invisible laser radiation may be emitted from disconnected fibers or connectors. Do not stare into beams or view directly with optical instruments. Statement 1051

Losgekoppelde of losgeraakte glasvezels of aansluitingen kunnen onzichtbare laserstraling produceren. Kijk niet rechtstreeks in de straling en gebruik geen optische instrumenten rond deze glasvezels of aansluitingen.

Irrotetuista kuiduista tai liittimistä voi tulla näkymätöntä lasersäteilyä. Älä tuijota säteitä tai katso niitä suoraan optisilla välineillä.

Les fibres ou connecteurs débranchés risquent d'émettre des rayonnements laser invisibles à l'œil. Ne regardez jamais directement les faisceaux laser à l'œil nu, ni d'ailleurs avec des instruments optiques.

Unterbrochene Fasern oder Steckerverbindungenkönnen unsichtbare Laserstrahlung abgeben. Blicken Sie weder mit bloßem Auge noch mit optischen Instrumenten direkt in Laserstrahlen.

Le fibre ottiche ed i relativi connettori possono emettere radiazioni laser. I fasci di luce non devono mai essere osservati direttamente o attraverso strumenti ottici.

Det kan forekomme usynlig laserstråling fra fiber eller kontakter som er frakoblet. Stirr ikke direkte inn i strålene eller se på dem direkte gjennom et optisk instrument.

Radiação laser invisível pode ser emitida de conectores ou fibras desconectadas. Não olhe diretamente para os feixes ou com instrumentos ópticos.

Es posible que las fibras desconectadas emitan radiación láser invisible. No fije la vista en los rayos ni examine éstos con instrumentos ópticos.

Osynlig laserstrålning kan avges från frånkopplade fibrer eller kontaktdon. Rikta inte blicken in i strålar och titta aldrig direkt på dem med hjälp av optiska instrument.

Aviso

Radiação laser invisível pode ser emitida a partir de fibras ou conectores desconectados. Não fixe o olhar nos feixes e nem olhe diretamente com instrumentos ópticos.

Advarsel

Usynlig laserstråling kan forekomme fra brugte fibre eller stik. Stir ikke ind i stråler eller direkte med optiske instrumenter.

Statement 1055—Class I and Class 1M Laser

Warning

Class I (CDRH) and Class 1M (IEC) laser products. Statement 1055

Laserproducten van Klasse I (CDRH) en Klasse 1M (IEC).

Luokan I (CDRH) ja luokan 1M (IEC) lasertuotteita.

Produits laser catégorie I (CDRH) et catégorie 1M (IEC).

Laserprodukte der Klasse I (CDRH) und Klasse 1M (IEC).

Prodotti laser di Classe I (CDRH) e Classe 1M (IEC).

Klasse I (CDRH) og klasse 1M (IEC) laserprodukter.

Produtos laser Classe I (CDRH) e Classe 1M (IEC).

Productos láser de Clase I (CDRH) y Clase 1M (IEC).

Laserprodukter av Klass I (CDRH) och Klass 1M (IEC).

Obtaining Documentation, Obtaining Support, and Security Guidelines

, which also lists all new and revised Cisco technical documentation, at:

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses used in this document are not intended to be actual addresses. Any examples, command display output, and figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses in illustrative content is unintentional and coincidental.

© 2016 Cisco Systems, Inc. All rights reserved.