Chapter 1. Introduction

This document describes the Cisco NX-OS configuration limits for Cisco Nexus 9000 Series switches.

The values provided in this guide should not be interpreted as theoretical system limits for Cisco Nexus 9000 Series hardware or Cisco NX-OS software. These limits refer to values that have been validated by Cisco. They can increase over time as more testing and validation is done.

- Verified Scalability Limits - Unidimensional

- Verified Scalability Limits - Multidimensional

- Deployment Case Studies

Verified Scalability Limits - Unidimensional

The tables in this section list the verified scalability limits for the Cisco Nexus 9000 Series switches for Cisco NX-OS Release 10.3(5)M.

These limits are validated with a unidimensional configuration. The values are provided in these tables focus on the scalability of one particular feature at a time.

Each number is the absolute maximum that is currently supported by this Cisco NX-OS release for the corresponding feature. If the hardware is capable of a higher scale, future software releases could increase this verified maximum limit. Results might differ from the values that are listed in this guide when you try to achieve maximum scalability with multiple features enabled.

Note

1. If only one number is provided, the verified limit applies to all supported platforms and line cards.

2. Verified limits are provided only for supported platforms.

3. If a feature is not supported for a particular platform, the verified limit is not provided.

Note

You can deploy up to 500 commands under config-profile.

Cisco Nexus 2000 Series Fabric Extenders (FEX) Straight Through Mode Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Fabric Extenders[1] and Fabric Extender server interfaces

Nexus 9300-EX/FX/FX2/FX3 switches

16 and 768

VLANs across all Fabric Extenders

Nexus 9300-EX/FX/FX2/FX3 switches

562

VLANs per Fabric Extender server interface[2]

Nexus 9300-EX/FX/FX2/FX3 switches

75

Port channels

Nexus 9300-EX/FX/FX2/FX3 switches + FEX

511

[1] When FEX configured using "AA" mode, then the maximum number of 6 FEX on the NFE base ToR and 16 FEX for the LSE base ToR are supported.

[2] For FEX HIF port channels, Cisco recommends that you enable STP port type edge using the spanning tree port type edge [trunk] command.

ePBR Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Maximum services per switch

Nexus 9300 and 9500 switches

150[3]

Endpoints per service

Nexus 9300 and 9500 switches

64

ePBR policies per switch

Nexus 9300 and 9500 switches

150

Policies per VRF

Nexus 9300 and 9500 switches

16

Services per chain

Nexus 9300 and 9500 switches

6

Match per policy

Nexus 9300 and 9500 switches

16

Aces per match

Nexus 9300 and 9500 switches

256

[3] Only 62 unique ACLs can be configured per slice of ASIC. Each ACL takes one label. If the same ACL is configured on multiple interfaces, the same label is shared. If each ACL has unique entries, the ACL labels are not shared, and the label limit is 62. In order to achieve 150 services per switch with the limitation of 62 ACLs per slice, the ingress interfaces should be spread across multiple slices of ASIC.

Note

1. For a list of platforms on which ePBR is supported, see the Cisco Nexus 9000 Series NX-OS ePBR Configuration Guide.

2. For the ACL limitations, see the Cisco Nexus 9000 Series NX-OS Security Configuration Guide.

FC and FCoE Switch Level Configuration Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

FLOGI per port

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

256

FLOGI per switch

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

1000

Port channels

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

8[4]

Maximum number of member ports in a port channel

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

16

NPV switches per NPIV core switch

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

8[5]

Maximum number of FC ports supported

Nexus 93180YC-FX switches

48

Nexus 93360YC-FX2 switches

96

Nexus 9336C-FX2-E switches

112

VFCs

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

512[6]

VSANs

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

32

[4] The number of SAN port channels and virtual FC port channels, together, can be only 8 on the Cisco Nexus 9000 Series switch.

[5] Tested with FC NPV.

[6] This is applicable only for the NPV mode.

FC and FCoE Fabric Level Configuration Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Zones

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

8000

Zone members

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

16,000

Zone sets

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

32

Zone database size

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

2 MB

FCNS entries in the fabric

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

10,000

Device Alias

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

8000

Switch hops from server to storage

Nexus 93180YC-FX, 93360YC-FX2, and 9336C-FX2-E switches

7

Intelligent Traffic Director Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Nodes per device group

Nexus 9300-FX switches

64

N9K-X96136YC-R, N9K-X9636Q-R, N9K-X9636C-R, and N9K-X9636C-RX line cards

16

ITD services per switch

Nexus 9300-FX switches

150 [7]

Buckets per ITD service

N9K-X96136YC-R, N9K-X9636Q-R, N9K-X9636C-R, and N9K-X9636C-RX line cards

64

Nexus 9300-FX switches

256

[7] Only 62 unique ACLs can be configured per slice of ASIC. Each ACL takes one label. If the same ACL is configured on multiple interfaces, the same label is shared. If each ACL has unique entries, the ACL labels are not shared, and the label limit is 62. In order to achieve 150 ITD services per switch with the limitation of 62 ACLs per slice, the ingress interfaces should be spread across multiple slices of ASIC.

Note

1. For a list of platforms on which ITD is supported, see the Cisco Nexus 9000 Series NX-OS Intelligent Traffic Director Configuration Guide.

2. For the ACL limitations, see the Cisco Nexus 9000 Series NX-OS Security Configuration Guide.

Interfaces Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

DHCP clients per switch

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

10 (IPv4) + 10 (IPv6)

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

Flex link

Nexus 9300-EX/FX/FX2, and 9364C switches

12 pairs

One pair consists of one each of active and backup interface. The active and backup interface can be either a physical port or port channel.

IP DHCP relay addresses (helper addresses) per interface

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 and Nexus 9808 switches

32 (IPv4) + 32 (IPv6)

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

Generic routing encapsulation (GRE) tunnels

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

16

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

LACP rate fast support during system switchover

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

606 ports in total on Nexus 9516 with 16 line cards

Port channel links

Nexus 9300-EX/FX/FX2/FX3 switches and Nexus 9600-R, 9600-RX, and 9700-EX line cards

32

SVIs

Nexus 9300-EX/FX/FX2/GX/GX2 switches and Nexus 9408 switches

1000 (with HSRP)

1000 HSRP groups

Nexus 9300-FX3 switches

510

N9K-X9716D-GX and Nexus 9700-EX/FX Line cards

1000 (with HSRP), 1500 (without HSRP)

Nexus 9600-R and 9600-RX line cards

3967

Nexus N9K-X9636C-R, N9K-X9636Q-R, N9K-X9636C-RX and N9K-X96136YC-R line cards

350 (with HSRP), 3967 (without HSRP)

Selective Q-in-Q with Multiprovider tag

Nexus 9300-EX/FX/FX2/FX3 switches and Nexus 9600-R/RX line cards

4000 mappings, 10 provider VLANs; System wide: 48,000 mappings, 512 Provider VLANs

SVI Unnumbered

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

Primary (50); Secondary (450), 1 primary SVI can have a maximum of 50 secondary SVIs

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

vPCs

Nexus 9300-FX/FX3 switches

80

Nexus 9300-EX switches

48

Nexus 9300-FX2 switches

98

Nexus 9300-GX2 switches

128

Nexus 9300-GX switches

60 (for flat Layer 2 Network)

56 (for L2/L3 Network)

N9K-X9716D-GX and Nexus 9700-EX/FX line cards

300

Nexus 9600-R/RX line cards

255

Nexus N9K-X9636C-R, N9K-X9636Q-R, N9K-X9636C-RX and N9K-X96136YC-R line cards

110

Static Network Address Translation (NAT)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

Non-Atomic mode: 1023

Atomic mode: 60% of Non-Atomic scale number is supported.

Dynamic Network Address Translation (NAT)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

Non-Atomic mode: 1023

Atomic mode: 60% of Non-Atomic scale number is supported.

Static twice Network Address Translation (NAT)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

Non-Atomic mode: 580

Atomic mode: 60% of Non-Atomic scale number is supported.

Dynamic twice Network Address Translation (NAT)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

Non-Atomic mode: 875

Atomic mode: 60% of Non-Atomic scale number is supported.

Sub-interfaces

Nexus 9808 switches

2000

Nexus 9300-FX2/FX3/GX/GX2 and Nexus 9408 switches

3900

Note

It is recommended to configure 60% of the mentioned limits with higher route scale deployments.

Nexus 9300-FX, 9332C, and 9364C switches

1900

Note

It is recommended to configure 60% of the mentioned limits with higher route scale deployments.

Nexus 9300-EX platform switches

900

Note

It is recommended to configure 60% of the mentioned limits with higher route scale deployments.

Port VLAN translations under an interface

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

3967

Port VLAN translations in a switch

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

24,000

Note

You must have TCAM space carved at 2048 for NAT to achieve this scale.

Label Switching Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Forwarding Equivalence Classes (FECs) (Node/Prefix/Adj/Binding SID)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

MPLS Heavy Template: 4096; Default: 1024

Nexus 9600-R and 9600-RX line cards

1000

Equal-cost multipaths (ECMPs)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9700-EX/FX/GX line cards

32

Nexus 9600-R and 9600-RX line cards

8 - way

Equal-cost multipaths Groups (ECMPs)

Nexus 9300-EX/FX2/FX3, and 9364C switches

MPLS Heavy Template: 7,166 (with 4-way ECMP) and 4096 (with 8-way ECMP)

Default: 1024

Note

After the ECMP objects are exhausted, there is a fallback to the adjacency for all further routes.

Nexus 9300-FX/GX/GX2 switches

MPLS Heavy Template and Default Routing Mode: 7166 (with a 4-way ECMP) and 4096 (with 8-way ECMP)

Note

After the ECMP objects are exhausted, there is a fallback to the adjacency for all further routes.

Nexus 9600-RX line cards

24,000 ECMP Groups 2 paths per ECMP

Note

Supported only on Cisco NX-OS Release 9.2(4).

FECs * ECMPs

Nexus 9600-R and 9600-RX line cards

8000

Flex counters for segment-routing in ingress direction

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9300C switches and Nexus 9700-EX/FX/GX line cards

Total ingress label stats: 4000; VRF ingress label stats: 1000; (MPLS Heavy Template)

Flex counters for segment-routing in Egress direction

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9300C switches and Nexus 9700-EX/FX/GX line cards

Total ingress label stats: 48,000 (MPLS Heavy Template)

Egress Peer Engineering

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9300C switches and Nexus 9700-EX/FX/GX line cards

64

IAS option B labels

Nexus 9600-R and 9600-RX line cards

450,000

Label-switched paths (LSPs) for label stack imposition[8]

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

256 (with 32 - way ECMP and 5 label stack push)

Layer 3 VPN routes

Nexus 9600-R and 9600-RX line cards

450,000

Layer 3 EVPN Labels

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

1000 (With MPLS Heavy Template)

LDP session

Nexus 9600-R and 9600-RX line cards[9]

200

Node Sid/Prefix SID

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

4000

Adjacency SID

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

112

Binding SID

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX/GX line cards

1000

SRTE Policy

SRTE policy with PBR

Nexus 9300-FX/FX2/FX3/GX/GX2 and 9364C switches

512 per slice with 4 way ECMP/1024 per slice with 2 way ECMP

Number of route-maps with SRTE policy (IPv4/IPv6)

Nexus 9300-FX/FX2/FX3/GX/GX2 and 9364C switches

256 (IPv4) + 256 (IPv6) per slice with 4 way ECMP

[8] For Cisco Nexus 9300 and 9500 Series switches, LSPs *ECMP* label stack push cannot exceed 1500.

[9] N9K-X9636C-RX, N9K-X9636C-R, N9K-X9636Q-R, and N9K-96136YC-R

Note

- For network scalability, Cisco recommends using a hierarchical routing design with multi-hop BGP for advertising the attached prefixes from a top-of-rack (ToR) or border leaf switch.

Private VLANs (PVLANs) Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Primary VLANs

Note

The 400 PVLAN-mapping scale per PVLAN port is only applicable when port is configured as promiscuous trunk port.

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

16

Nexus 9300-EX/FX/FX2/FX3/GX switches

400

Secondary VLANs

Note

The 400 PVLAN-mapping scale per PVLAN port is only applicable when port is configured as promiscuous trunk port.

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

20

Nexus 9300-EX/FX/FX2/FX3/GX switches

400

Ports in Community host mode

Nexus 9300-EX/FX/FX2/FX3/GX

40

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

Ports in isolated host mode

Nexus 9300-EX/FX/FX2/FX3/GX switches

40

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

Ports in isolated trunk host mode

Nexus 9300-EX/FX/FX2/FX3/GX switches

40

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

Ports in promiscuous mode

Nexus 9300-EX and 9300-FX switches

10

Nexus 9300-FX2/FX3/GX switches, Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

5

Ports in promiscuous trunk mode

Nexus 9300-EX and 9300-FX switches

10

Nexus 9300-FX2/FX3/GX switches, Nexus N9K-X9716D-GX, and Nexus 9700-EX/FX line cards

5

PVLANs allowed on a PVLAN port

Note

The 400 PVLAN-mapping scale per PVLAN port is only applicable when port is configured as promiscuous trunk port.

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

16

Nexus 9300-EX/FX/FX2/FX3/GX switches

400

Layer 2 Switching Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

MAC addresses

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

92,000 (default system routing mode)

200,000 [10]

Nexus 9364C switches

90,000 (default system routing mode without system routing layer 3 scale)

32,000 (default system routing mode with system routing layer 3 scale)

Nexus N9K-X9716D-GX and Nexus 9700-EX/FX line cards

92,000

Nexus 9600-R and 9600-RX line cards

192,000

N9K-C9264PQ and 9300-EX switches

200,000 [10]

Nexus 92348GC-X switches

97,000

MST instances

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9600-R, 9600-RX, N9K-X9716D-GX, and 9700-EX/FX line cards

64

MST PV count with single instances 0

Nexus 9300-FX/FX2/FX3/GX/GX2 switches

190,000

MST virtual ports with more than 1 MST instance

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

48,000

Nexus N9K-X9716D-GX and 9700-EX/FX line cards

85,000

Nexus 9600-R and 9600-RX line cards

236,000

RPVST virtual ports (physical ports * vlans)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

48,000

Nexus N9K-X9716D-GX and 9700-EX/FX line cards

65,000

Nexus 9600-R and 9600-RX line cards

13,750

RPVST logical ports (logical ports * vlans)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

22,000

Nexus N9K-X9716D-GX and 9700-EX/FX line cards

45,000

Nexus 9600-R and 9600-RX line cards

13,750

VLANs in MST mode

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus N9K-X9716D-GX, 9600-R/RX, and 9700-EX/FX line cards

3967 (the remaining 127 VLANs are reserved)

Nexus 92348GC-X switches

3967

VLANs in RPVST mode

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

3967

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

3967[11]

Nexus 9600-R and 9600-RX line cards

250

Total number of VLANs × ports with switch port isolated (3967 VLANs x 48 ports)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

190,000

Total number of VLANs × ports with switch port isolated (3967 VLANs x 144 ports)

Nexus N9K-X9636C-R, N9K-X9636Q-R, N9K-X9636C-RX, and N9K-X96136YC-R line cards

571,248

10 Layer 2 unidimensional scale only. SVI, Layer 3 interface, and VXLAN VLANs are not supported. 200K MAC is enabled only when " system routing template-l2-heavy" is configured and the system is reloaded.

[11] On EOR, support is for 12,000 PV count with 3967 vlans and RPVST with default timers. If 22,000 PV count is needed with 3968 vlans and RPVST, recommended hello timer value is 4 or higher. It is also recommended to tune forward delay and max age accordingly.

Note

- The number of supported VLANs per vPC should be within the MST or RPVST virtual port count that is specified in this table, depending on the topology.

- The number of supported STP VLAN port instances, for Fabric Extender host interface ports, should be less than 13000.

- The ports with switch port isolated are only supported on Layer 2 ports. However, on Layer 2 the following port types are not supported:

- FEX host interfaces

- FEX host interface port channels

- PVLAN ports

Multicast Routing Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Egress NAT

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

2000

Ingress NAT

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

2000

Egress and Ingress NAT

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

2000

IPv4 multicast routes

Note

The limits are for a combination of IPv4 and IPv6 multicast routes. Layer 2 multicast entries are a part of the total 120K limits. For example, 110K IPv4 + 2K IPv6 multicast routes + 8K Layer 2 multicast entries.

Nexus 9348GC-FXP switches

8192 (Layer 2 + Layer 3)

Nexus 9300-EX switches and Nexus 9700-EX line cards

8192 (Layer 2 + Layer 3); 32,768 (layer 2 + Layer 3 with system routing template - multicast -heavy mode); 8192 (with system routing template - lpm - heavy mode)

Nexus 9332C and 9364C switches

16,384 (Layer 2 + Layer 3) with the default template and the system routing layer 3 scale configuration.

Nexus 9300-FX2 switches

8192 (Layer 2 + Layer 3); 32,768 (Layer 2 + Layer 3 with system routing template -multicast -heavy mode); 131,072 (with system routing template -multicast - ext - heavy mode)

Nexus 9300-FX3 switches

128,000 (64,000 *, G + 64,000 S,G)

Nexus 9700-FX line cards

8192 (Layer 2 + Layer 3); 32,768 (layer 2 + Layer 3 with system routing template - multicast -heavy mode); 131,072 (with system routing template - multicast - ext - heavy mode) [12]

Nexus 9408 switches

8192 (Layer 2 + Layer 3); 32,768 (layer 2 + Layer 3 with system routing template - multicast -heavy mode); 131,072 (with system routing template - multicast - ext - heavy mode) [13]

Nexus 9300-FX/GX/GX2

32,768 (layer 2 + Layer 3 with system routing template - default, multicast -heavy mode); 131,072 (with system routing template - multicast - ext - heavy mode)

Nexus 9600-R and 9600-line cards

32,768 (Layer 3)

Nexus N9K-X9716D-GX line card

131,072 (65,536 *,G + 65,536 S,G)

Nexus 9808 switches

32,768 (Layer 3)

IPv6 multicast routes

Nexus 92160YC-X, 9300-EX/FX, and 9500 switches

8192 (Layer 3 with system routing template - default, multicast - heavy, multicast - ext - heavy and multicast - heavy, multicast - ext - heavy, dual - stack - multicast)

Nexus 9300-FX2 and 9364C switches

8192 (Layer 3 with system routing template -multicast -heavy mode)

Nexus 9300-FX3 switches and N9K-X9716D-GX line card

8192 (4096 - *, G + 4096 - S,G)

Nexus 9332C and 9364C switches

8192 (Layer 2 + Layer 3 with system routing template -multicast -heavy mode)

Nexus 9348GC-FXP switches

8192 (layer 2 + Layer 3 with system routing template - multicast -heavy -multicast - ext - heavy mode)

Nexus 9300-GX/GX2 and Nexus 9408 switches

8192

MLD snooping groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

8192

Multicast FPV

Nexus 9300-EX/FX2 switches

8000 (with system routing template - default), 32,000 (with system routing template - multicast -heavy - multicast - ext - heavy mode)

Nexus 9300-FX/FX3/GX/GX2, and Nexus 9408 switches

IPv4 32,000 (Layer 2 + Layer 3) multicast routes

Outgoing interfaces (OIFs)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

40 (SVI + physical layer 3) or 256 (physical layer 3)

Nexus 9600-R and 9600-RX line cards

16 OIFs for 32K mroutes or 287 OIFs for 1000 mroutes

Nexus 9808 switches

256 (physical layer 3)

IGMP snooping groups

Nexus 9300-EX switches and Nexus 9700-EX line cards

8000

Nexus 9300-FX2 switches and Nexus 9700-FX line cards

8000 (with system routing template - default), 16000 (with system routing template - multicast -heavy - multicast - ext - heavy mode)

Nexus 9600-R, 9600-RX, and 9600-R2 line cards

8000

Nexus 9300-FX/FX3/GX/GX2 switches and N9K-X9716D-GX line card

16,000

PIM neighbors

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

250

Nexus 9808 switches

500

Nexus 9600-R, 9600-RX, N9K-X9716D-GX and 9700-EX/FX line cards

500

MVPN - unidimensional

Multicast VRFs

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

300

Default MDT groups

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

300

MVPN Peers (PIM neighbors) per device

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

900

Maximum number of PEs per VRF

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

200 PEs per VRF with up to 3 VRFs (600 PIM neighbors)

Maximum number of Data MDT groups per VRF on a PE

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

1000

Maximum number of Data MDT groups across all VRFs on a PE

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

10,000

Maximum number of MDT groups across all VRFs on PE

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

10,300 (10,000 Data + 300 default DMT)

Maximum number of Multicast routes on a PE node

Nexus 9600-R and 9600-RX line cards (except the N9K-X96136YC-R line card)

32,000

[12] All line cards must have the FX type.

[13] All line cards must have the FX type.

Note

- The IPv4 multicast routes and the IPv4/IPv6 host routes share the same hardware table. Limits are provided for both the default line card mode and the max host line card mode.

- High availability (graceful restart and stateful switchover) is not supported when unicast or multicast aggressive timers are configured at any scale.

IP Fabric for Media Solution Verified Scalability Limits (Unidimensional)

Description

Verified Limit

NBM-Active Mode Only

NBM-Passive Mode Only

Mixed Mode

NBM-Active VRF

NBM-Passive VRF

Switches

120

32

32

Number of flows

32000

32000

32000

VRFs

16

16

16

Host Policy - Sender

16000

N/A

16000

N/A

Host Policy - Receiver

16000

N/A

16000

N/A

Host Policy - PIM

2000

N/A

2000

N/A

Flow Policy

32000

N/A

32000

N/A

ASM group-range

20

N/A

20

N/A

NBM Static Receiver

Per Switch Maximum (receiver leaf where the static OIF will be programmed)

1500

8000

1500

Per Fabric Maximum

8000

32000

8000

NBM IGMP Receivers

Per Switch Maximum

8000

N/A

8000

N/A

Per Fabric Maximum

24000

N/A

24000

N/A

NBM NAT Flows

Egress-NAT (E-NAT)

2000

2000

1000

1000

Ingress-NAT (I-NAT)

2000

2000

1000

1000

Multicast-Unicast NAT (MU-NAT)

2000

2000

1000

1000

Unicast-Multicast NAT (UM-NAT)

2000

2000

1000

1000

Mixed Mode (E-NAT, I-NAT, MU-NAT, UM-NAT together)

2000

2000

1000

1000

RTP Flow Monitoring with ACL

ACL

128 IPv4 ACL entries or 64 IPv6 ACL entries (total 128 TCAM spaces)

Note

With combined IPv4 and IPv6 ACL entries, the scale limit cannot exceed 128 TCAM spaces.

IP Fabric for Media Solution Policer Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

IPFM

NBM Flow Policers (Slice/System)

Nexus 9300-EX switches

1536/3072

Nexus 9300-FX/FX3 switches

1536/1536

Nexus 9300-FX2 switches

1536/3072

Nexus 9300-GX/GX2B switches

1536/6144

Nexus 9300-GX2A switches

1536/12288

Nexus N9K-X9636C-R Line Card

2048/12288

Nexus N9K-X9636Q-R Line Card

2048/6144

Nexus N9K-X9636C-RX Line Card

2048/8192

Nexus N9K-X9624D-R2 Line Card

2048/8192

Nexus N9K-X9836DM-A Line Card

700/6300

Note

When storm control is enabled on Nexus 9300-FX3/GX/GX2 Platform Series switches, the maximum supported scale for NBM flow policers is limited to 1534.

For a list of supported platforms, see Cisco Nexus 9000 Series NX-OS IP Fabric for Media Solution Guide.

Programmability Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

gNMI

VRF - Default

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

16 concurrent subscriptions

VRF - Management

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

16 concurrent subscriptions

VRF - Default and Management

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

32 concurrent subscriptions

Paths

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

48 paths in a single subscription

Message size

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

Less than 12 MB

Aggregate MO's

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-FX line cards

150,000

NX-API

See Guidelines and Limitations for NX-API limitations.

Maximum Number of concurrent VSH session

Nexus 9000 switches and line cards

5 concurrent VSH sessions and 5 persistent VSH sessions per worker process.

Number of worker processes in Nginx

Nexus 9000 switches and line cards

4 worker processes

Number of VSH sessions per worker process

Nexus 9000 switches and line cards

A maximum of 5 persistent VSH sessions are supported for each worker process

Maximum response size supported in output

Nexus 9000 switches and line cards

10 MB

Maximum number of concurrent session supported for chunk mode. See Configuring the Message Format and Command Type to know more about chunk mode

Nexus 9000 switches and line cards

2

Maximum size of response supported in chunk mode

Nexus 9000 switches and line cards

After 10.3(1) release, the maximum size supported in chunk mode is the same as the amount of space available in volatile.

QoS Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Class maps per policy map

Nexus 9300-GX/GX2/FX2/FX3, Nexus 9408, and Nexus 9808 switches

128

AFD

Nexus 9300-GX/GX2/FX2/FX3, and Nexus 9408 switches

30 profiles

WRED

Nexus 9300-GX/GX2/FX2/FX3, and Nexus 9408 switches

30 profiles

Nexus 9808 switches

14 Profiles

Ingress 1R2C

Nexus 9300-GX/GX2/FX2/FX3, Nexus 9408, and Nexus 9808 switches

1280

Ingress

Nexus 9808 switches

- 3150 Policer / LC – PMN use case

- QoS on physical or SI – Limited by 128 unique ACLs / ASIC

Egress 1R2C

Nexus 9300-GX/GX2/FX2/FX3, and Nexus 9408 switches

256

Ingress 2R3C

Nexus 9300-GX/GX2/FX2/FX3, and Nexus 9408 switches

766

Total policy maps

Nexus 9300-GX/GX2/FX2/FX3, Nexus 9408, and Nexus 9808 switches

4000

QoS unique burst profiles

Nexus 9808 switches

4/ASIC

TCAM label

Nexus 9300-FX3

64

Security Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Egress ACLs

Nexus 9600-R line cards

20,000

System ACLs

Nexus 9600-R line cards

4000 TCAM entries in internal TCAM

64,000 TCAM entries in external TCAM

ACL

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

Ingress - 3584 IPv4, 1792 IPv6

Nexus 9808 switches

- 9216 IPv4/4.5K IPv6 overall Ingress/Egress/Features

- RACL on physical or SI – Limited by 128 unique ACLs / ASIC

- Unique feature combinations (Example: RACL1 + QoS1) / ASIC – 252

- IPv6 single ACL can be a maximum of 1K entries

RACL Labels (maximum)

Nexus 9504 and 9508 switches

4000

ACL LOU Threshold Support

Nexus 9500-R line cards

24 LOUs per line card

DHCP snooping bindings

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

2048

IPv4 ingress access control entries (ACEs)

Nexus 9600-R and 9600-RX line cards

- RACL on LC N9K-X9636C-RX: 100,000

- PACL on LC N9K-X9636C-RX: 12,000

- RACL-2048, PACL-1024 (without TCAM Carving) IPv4 52,640 ACEs per system

- PACL IPv4: 1024 TCAM entries in internal TCAM

- PACL MAC: 2048 TCAM entries in internal TCAM

- RACL IPv4: 2048 TCAM entries in internal TCAM

IPv6 ingress access control entries (ACEs)

Nexus 9600-R and 9600-RX line cards

- RACL-1024, PACL-1024 (without TCAM Carving) IPv6 25,200 ACEs per system

- PACL IPv6: 1024 TCAM entries in internal TCAM

- RACL IPv6: 1024 TCAM entries in internal TCAM

IPv4 ingress TCAM entries

Nexus 9300-EX/FX/FX2/FX3 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

3582 (per slice of the forwarding engine)

Nexus 9300-GX/GX2 switches

4608

IPv4 egress TCAM entries

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

1792 (per slice of the forwarding engine)

Nexus 92348GC-X switches

Ingress - 3072 IPv4, 1792 IPv6

IPv6 ingress TCAM entries

Nexus 9300-EX/FX/FX2/FX3 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

1792 (per slice of the forwarding engine)

Nexus 9300-GX/GX2 switches

2302 (per slice of the forwarding engine)

IPv6 egress TCAM entries

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, N9K-X9716D-GX and Nexus 9700-EX/FX line cards

896 (per slice of the forwarding engine)

Nexus 92348GC-X switches

Ingress - 3072 IPv4, 1792 IPv6

Ingress RACLv4

Nexus 9808 switches

9216

Ingress QoSv4

Ingress SPAN filter v4

Egress RACLv4

Ingress RACLv6

Nexus 9808 switches

4608

[14]

Ingress QoSv6

Ingress SPAN filter v6

Egress RACL v6

Number of unique ACLs each for RACLv4, RACLv6, QoS, ACL SPAN

Nexus 9808 switches

- 127 (per unit) each for ingress and QoS

- 15 (per unit) each for egress (IPv4 and IPv6 RACL)

Number of unique ACL combinations

Nexus 9808 switches

- 252 (per unit) for ingress

- 60 (per unit) for egress

Key Chain Keys Verified Scalability Limits (Unidimensional)

Type-6 Keys

Nexus 9000 Series switches

5000

[14] Each IPv6 ACL is limited to 1000 ACEs. This applies to all IPv6 ACLs (RACL, QoS or SPAN filter). No such limitation applies for IPv4 ACL.

Note

- The TCAM entries scalability limits also apply to policy-based TCAM entries (PBACLs).

- Only 62 unique ACLs can be configured. Each ACL takes one label. If the same ACL is configured on multiple interfaces, the same label is shared. If each ACL has unique entries, the ACL labels are not shared, and the label limit is 62.

SRv6 Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

ARP

Nexus 9300-GX/GX2, and Nexus 9408 switches

48,000

Host and LPM IPv4 routes

Nexus 9300-GX/GX2, and Nexus 9408 switches

470,000

Host and LPM IPv6 routes

Nexus 9300-GX/GX2, and Nexus 9408 switches

256,000

Leaf

Nexus 9300-GX/GX2, and Nexus 9408 switches

256

SID DB

Nexus 9300-GX/GX2, and Nexus 9408 switches

2000

SRv6 and VXLAN Peer

Nexus 9300-GX/GX2, and Nexus 9408 switches

256

VRF

Nexus 9300-GX/GX2, and Nexus 9408 switches

1000

ND

Nexus 9300-GX/GX2, and Nexus 9408 switches

24,000

SRv6 Traffic Engineering policies

Nexus 9300-GX/GX2, and Nexus 9408 switches

1000

Number of prefixes (IPv4 and IPv6) that use SRv6 Traffic Engineering policies

Nexus 9300-GX/GX2, and Nexus 9408 switches

50,000

Maximum number of preferences per policy

Nexus 9300-GX/GX2, and Nexus 9408 switches

3

Maximum number of segment lists

Nexus 9300-GX/GX2, and Nexus 9408 switches

3000

System Management Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

PTP

PTP ports

Nexus 9300-EX/FX/GX switches

64 per system

N9K-C93180YC-FX3 and N9K-C93180YC-FX3S switches

64 per system

N9K-C93108TC-FX3P switch

25 per system

Nexus 9300-FX2/GX2 switches

144 per system

Nexus 9408 switches

144 per system

32 per LEM

Nexus 9500 switches with 9700-EX/FX line cards

1305 per chassis

The per line card limit is based on the maximum physical ports supported.

Note

PTP Offload is supported on 9700-EX/FX line cards.

Nexus 9508 switches with -R line cards

64 per line card

300 per chassis

Note

PTP Offload is supported on 9508-R line cards.

Nexus 9500 switches with 9600-RX line cards

128 per line card

512 per chassis

Nexus 9508 switches with -R2 line cards

173 per chassis

Nexus 9808 switches

64 per line card

512 per chassis

PTP clients per port

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, 9408 and 9808 switches and Nexus 9500 switches with 9700-EX/FX, 9508-R and 9600-RX line cards

2

sFlow

sFlow ports

Nexus 9300-EX/FX/FX2/GX switches

64

Nexus 9300-FX3 switches

30

Nexus 9700-EX/FX line cards

256

Nexus N9K-X9716D-GX line card

16

SPAN and ERSPAN

Configurable SPAN or ERSPAN sessions

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, the Nexus 9600-R, 9600-RX, and N9K-X9716D-GX line cards

32

Nexus 9808 switches

10

Active SPAN or ERSPAN sessions[15]

Nexus 9300-EX/FX/FX2/FX3/GX switches, and Nexus 9600-R, 9600-RX, and 9700-EX line cards

4 sessions (per chassis/ToR or based on the number of the line cards in the EoR.[16]

Nexus 9808 switches

10

Active localized SPAN or ERSPAN sessions per line card[17]

Nexus 9300-EX/FX/FX2/FX3 switches, and Nexus 9700-EX line cards

4

Nexus 9600-R and 9600-RX line cards

32 sessions across ports on single-line card

Active localized SPAN or ERSPAN session (Rx and Tx, Rx, or Tx)

Nexus 9600-R and 9600-RX line cards

32 sessions, 128 sources, and 1 destination

Source interfaces per SPAN or ERSPAN session (Rx and Tx, Rx, or Tx)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9808 switches, and Nexus 9700-EX and N9K-X9716D-GX line cards

48

Destination interfaces per SPAN session

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9600-R, 9600-RX, N9K-X9716D-GX, and 9700-EX line cards

1 (physical/PO interface)

Note

Destination as PO interface is not supported for N9K-X9716D-GX line card.

Nexus 9808 switches

1 Physical only (no PO support).

Source VLANs per SPAN or ERSPAN session

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9600-R, 9600-RX, N9K-X9716D-GX, and 9700-EX line cards

32

Tap Aggregation

Redirect interfaces in the redirect port list

Nexus 9300-EX/FX/FX2/FX3/GX

18

Nexus 9500 Merchant Silicon platform switches

12

Nexus N9K-X9716D-GX line card

12

Redirect port lists per system

Nexus 9300-FX3 switches

100

Nexus N9K-X9716D-GX line card

12

NetFlow

Flow monitors

Nexus 9300-EX switches and Nexus 9500 switches with 9700-EX and FM-E fabric line cards

2 flow monitors per type (2 IPv4 flow monitors and 2 IPv6 flow monitors).

1 flow monitor for CE flows

2 exporters for each flow monitor. Hence, a total of 4 different exporters can be configured.

Nexus 9300-FX/FX2/GX/GX2 switches and 9500 with FX/GX line cards

30 IPv4 flow monitor and each flow monitor with two exporters

28 IPv6 flow monitor and each flow monitor with two exporters

32 Layer2 Flow monitor and each flow monitor with two exporters

Maximum number of exporters supported per flow monitor is 2

Layer 3 interfaces (Layer 3 ports, port channels, and SVIs) to which IPv4 flow monitors can be applied

Nexus 9300-EX switches

1024 (with members on just one ASIC slice): 922 for IPv4/IPv6 flow monitors, while 32 are reserved for the Layer 2 flow monitors.

Maximum number of SVIs supported:

- 492 with IPv4 flow monitors only

- 246 with IPv6 flow monitors only

- 165 with both IPv4 flow monitor and IPv6 flow monitors attached

Number of Layer 3 interfaces (Layer 3 ports, port channels, and SVIs) to which IPv4 flow monitors can be applied. You can use the show interface hardware-mappings command to check if the interface belongs to ASIC slice 0 or slice 1.

Maximum number of flows in the software table (IPv4 or IPv6 or CE flows)

Nexus 9000 switches

100,000 flows using the show flow cache command on 9500 modular chassis per line card

1,000,000 flows (1 Million) using the show flow cache command on 9300 switches

Layer 3 interfaces (Layer 3 ports, port channels, and SVIs) to which IPv6 flow monitors can be applied

Nexus 9300-EX switches

252 (with members on just one ASIC slice) or 126 (with members on both ASIC slices). You can use the show interface hardware-mappings command to check if the interface belongs to ASIC slice 0 or slice 1.

Maximum number of concurrent flows supported (IPv4 or IPv6 or CE flows)

Nexus 9300-EX/FX/FX2 switches

6000 traffic flows.

By increasing LCPU-PG-SIZE using the following command one can achieve Max 18000 concurrent flows, after modifying LCPU-PG-SIZE, the switch needs reboot after saving configuration

switch(config)# hardware qos lcpu-pg-size ?
<200-10000>  Pool Group size

switch(config)# hard qos lcpu-pg-size  5000
Warning:Reload required for configured PG size to take effect. Save configuration and reload the system.
switch(config)# copy running-config startup-config

In Cisco Nexus Release 9.3(3), the hardware qos command is not supported.

Netflow ingress VRF-id export support

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9300C and 9408 switches and Nexus 9500 switches with EX/FX/GX line cards

500 different VRFs

Flow visibility in Nexus Dashboard Insights and NetFlow

Flow monitors

Nexus 9300-FX/FX2/GX/GX2, Nexus 9408 switches and 9500 with FX/GX line cards

28 IPv4 flow monitor and each flow monitor with two exporters

26 IPv6 flow monitor and each flow monitor with two exporters

Maximum number of flows in the software table (IPv4 or IPv6 flows)

Nexus 9000 switches

20,000 flows using the show flow cache command

[15] A single forwarding engine instance supports four SPAN or ERSPAN sessions. For Cisco Nexus 9300 Series switches, if the first three sessions have bidirectional sources, the fourth session has hardware resources only for Rx sources. This limitation might also apply to Cisco Nexus 9500 Series switches, depending on the SPAN or ERSPAN source's forwarding engine instance mappings.

[16] If the source interface configured for a monitor session is on the same line card, the maximum supported active SPAN sessions are 4. Based on the number of line cards in the EoR, the total number of active SPAN sessions are 4 x n, where n is the number of line cards on EoR, provided the source and destination interface are on the same line module.

[17] The number of SPAN or ERSPAN sessions per line card reduces to two if the same interface is configured as the bidirectional source in more than one session.

NetFlow Scalability Support (Flows)

Feature

Platform

Port Speed

Scale Limit per Slice (Flows)

Export Interval (seconds)

Packets / Flow

Layer 2 Flow monitor

Nexus 9300-EX switches

10G

3800

60

89,000

40G

3800

60

356,000

100G

3800

60

885,000

Nexus 9300-FX/FX2/FX3 switches

10G

6000

60

89,000

40G

6000

60

356,000

100G

6000

60

885,000

Nexus 9300-GX switches

10G

6000

60

89,000

40G

6000

60

356,000

100G

6000

60

885,000

Layer 3 Flow monitor (IPv4)

Nexus 9300-EX

10G

27,000

60

12,000

40G

27,000

60

54,000

100G

27,000

60

160,000

Nexus 9300-FX/FX2/FX3

10G

24,000

60

12,000

40G

24,000

60

54,000

100G

24,000

60

160,000

Nexus 9300-GX switches

10G

24,000

60

12,000

40G

24,000

60

54,000

100G

24,000

60

1,60,000

Layer 3 Flow monitor (IPv6)

Nexus 9300-EX

10G

15,000

60

12,000

40G

15,000

60

54,000

100G

15,000

60

160,000

Nexus 9300-FX/FX2/FX3

10G

11,000

60

12,000

40G

11,000

60

54,000

100G

11,000

60

160,000

Nexus 9300-GX

10G

11,000

60

12,000

40G

11,000

60

54,000

100G

11,000

60

160,000

NetFlow Scalability Support (Flows) for Cisco Nexus 9500 Family Switches

Feature

Platform

Scale Limit per Slice (Flows)

IP flow monitor

Nexus 9500-EX Line cards

2

IPv6 flow monitor

2

Layer 2 Flow monitor

1

Maximum number of exporters per each flow monitor

2

Flow Scale

24,000 per ASIC slice

IP flow monitor

Nexus 9500-FX Line cards

30

IPv6 flow monitor

28

Layer 2 Flow monitor

1

Maximum number of exporters per each flow monitor

2

Flow Scale

24,000 per ASIC slice

NetFlow SVI Verified Scalability Limits (Unidimensional)

Platform (VLAN Ports)

SVI

VLAN

SVI + VLAN

IPv4

IPv6

IPv4 + IPv6

IPv4

IPv6

IPv4 + IPv6

IPv4

IPv6

IPv4 + IPv6

Member ports from Cisco Nexus 9300-EX switches

474

118

94

474

118

94

237

61

38

Member ports from Cisco Nexus 9300-FX switches

Total interfaces supported in the system

Member ports from Cisco Nexus 9300-EX and Nexus 9300-FX switches (EOR chassis)

474

118

94

474

118

94

237

61

38

Note

The scale numbers are based on the TCAM space available on the Cisco Nexus 9300-EX and Nexus 9300-FX switches. A IPv4 flow monitor uses 2 and 4 TCAM space for the Cisco Nexus 9300-EX and Nexus 9300-FX switches respectively. Similarly, a IPv6 flow monitor uses 8 and 2 TCAM space for the Cisco Nexus 9300-EX and Cisco Nexus 9300-FX switches respectively.

For port channels, SVIs, and VLANs that have port from both 9300-EX and 9300-FX switches, the lower common denominator limit of the 9300-EX and 9300-FX switches is applied.

Table 20: Unicast Routing Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Unicast Routing

BFD sessions (echo mode)

Nexus 9364C switches

128 when the BFD intervals are set to default, which is 50 ms

2048 when the BFD intervals are relaxed to 300 ms

Nexus 9300-EX/FX/FX2/GX/GX2, and Nexus 9408 switches

128 when the BFD intervals are set to default, which is 50 ms

2048 sessions when the BFD intervals are relaxed to 300 ms

Nexus 9300-FX3 switch

512

Nexus 9700-EX/FX line cards

128 when the BFD intervals are set to default, which is 50 ms

2048 sessions when the BFD intervals are relaxed to 300 ms

Note

On EoR, per line card session limit will be 256.

N9K-X9716D-GX line card

512 when the BFD intervals are set to default, which is 50 ms

1024 when the BFD intervals are relaxed to 300 ms

Note

On EoR, per line card session limit will be 256.

Nexus 9600-R and 9600-RX line cards

288

Nexus 9808 switch (single hop)

1000 BFD (IPv4 and IPv6) sessions

BGP neighbors

Nexus 92348GC-X switches

141

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

1024

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

Nexus 9600-R and 9600-RX line cards

960

Nexus 9808 switches

1000 (IPv4 and IPv6)

EIGRP routes

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and 9808 switches

20,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

50,000

EIGRP neighbors

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and 9808 switches

256

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

HSRP groups

Nexus 9600-R/RX switches and N9K-X9716D-GX line card

490

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

1000 [18]

Nexus 9700-EX/FX switches and N9K-X9716D-GX line cards

1000 (virtual MAC address support) [19]

Nexus 9600-R and 9600-RX line cards

16 (Maximum 16 groups because 16 is the unique virtual MAC address limit)

IPv4 ARP

Nexus 9364C switches

32,000

Nexus 9600-R, 9600-RX, and 9700-EX/FX line cards

48,000

Nexus 9300-EX/FX2 switches

48,000 (without URPF)

32,000 (with URPF enabled)

Nexus 9300-FX/GX/GX2 switches

98,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP)

Nexus 9408 switches

49,152

Nexus 9300-FX3 switches

98,000

Nexus N9K-X9716D-GX line card

98,304

Nexus 9808 switches

4000

IPv4 host routes [20]

Nexus 9364C switches

96,000 (default system routing mode without system routing layer 3 scale)

128,000 (default system routing mode with system routing layer 3 scale)

Nexus 9300-EX switches

458,000 (default); 786,000 / 720,000 (with system routing template - lpm - heavy mode)

Nexus 9300-FX2 switches

524,000 / 471,000 (without / with urpf enabled) (default); 786,000 / 734,000 (without / with urpf enabled) (with system routing template - lpm -heavy mode)

Nexus 9300-FX/GX/GX2 switches

1,153,000 (default); 786,000 / 734,000 (without / with urpf enabled) (with system routing template - lpm -heavy mode)

Nexus 9408 switches

734,003

Nexus 9300-FX3 switches

1,119,000

Nexus 9700-EX and N9K-X9716D-GX line cards

1,000,000 (default); 786,000 (with system routing template - lpm -heavy mode)

589,000 (default); 786,000 (with system routing template - lpm -heavy mode)

Nexus 9600-R/RX line cards

1,000,000 (default routing template)

Nexus 9808 switches

256,000

IPv6 host routes [21]

Nexus 9364C switches

48,000 (default system routing mode without system routing layer 3 scale)

64,000 (default system routing mode with system routing layer 3 scale)

Nexus 9300-EX switches

24,000 / 16,000 (without/with urpf enabled)

Nexus 9300-FX2 switches

265,000 (default), 442,000 / 412,000 (without / with urpf enabled) (with system routing template -lpm - heavy mode)

Nexus 9300-FX/GX/GX2 switches

628,000 (default), 442,000 / 412,000 (without / with urpf enabled) (with system routing template -lpm - heavy mode)

Nexus 9408 switches

412,876

Nexus 9300-FX3 switches

600,000

442,000 (LPM heavy mode)

Nexus 9700-EX/FX line cards

FM-E: 32,000

FM-E2: 235,000

FM-G: 235,000

Nexus 9600-RX line cards

256,000 (default routing template)

Nexus N9K-X9716D-GX line card

235,000

Nexus 9808 switches

64,000

IPv6 ND

Nexus 9364C, 9300-EX/FX2 switches

32,000 (default), 16,000 (lpm heavy)

Nexus 9300-FX/GX/GX2 switches

98,000 (in default routing mode, Hash Table: Shared between IPv6 ND, IPv4 ARP)

Nexus 9408 switches

32,768

Nexus 9300-FX3 switches

98,000 (default), 16,000 (lpm heavy) (Hash Table: Shared between IPv6 ND, IPv4 ARP)

Nexus 9600-R, 9600-RX, and 9700-EX/FX line cards

32,000

Nexus 9808 switches

4000

IPv4 unicast routes (LPM)*

Nexus 9364C switches

Default system routing mode without system routing layer 3 scale:

- Default values: 8000 (IPv4), 1900 (IPv6), and 2000 (multicast)

- With hardware profile multicast max-limit lpm-entries 0 configured: 10,000 (IPv4), 1900 (IPv6), and 0 (multicast)

- With hardware profile ipv6 lpm-entries maximum 0 configured: 14,000 (IPv4), 0 (IPv6), and 2000 (multicast)

- With hardware profile ipv6 lpm-entries maximum 4096 and hardware profile multicast max - limit lpm - entries 0 configured: 4000 (IPv4), 4096 (IPv6), and 0 (multicast)

- When you allocate the entire table for IPv4 or IPv6 LPM unicast routes, the other address family cannot be used.

128,000 (default system routing mode with system routing layer 3 scale)

Nexus 9300-EX switches

458,000 (default)

Nexus 9300-FX switches

1,153,000 / 996,000 (without / with urpf enabled) (default), 786,000 / 734,000 (without / with urpf enabled) (with system routing template - lpm - heavy - mode)

Nexus 9300-FX2 switches

524,000 / 471,000 (default); 786,000 / 734,000 (without / with urpf enabled) (with system routing template - lpm - heavy mode)

Nexus 9300-GX/GX2 switches

1,153,000 (default), 786,000 / 734,000 (without / with urpf enabled) (with system routing template - lpm - heavy mode)

Nexus 9408 switches

734,003

Nexus 9300-FX3 switches

1,119,000

Nexus 9300 switches

128,000 (default system routing mode)

16,000 (max-host routing mode)

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

589,000 (default)

Nexus 9600-R line cards

192,000 (Default system routing template)

Nexus 9600-RX line cards

1,000,000 (Default system routing template)

Nexus 9808 switches

400,000 (Default system routing template)

IPv6 unicast routes (LPM)*

Nexus 9364C switches

Default system routing mode without system routing layer 3 scale:

- Default values: 8000 (IPv4), 1900 (IPv6), and 2000 (multicast)

- With hardware profile multicast max-limit lpm-entries 0 configured: 10,000 (IPv4), 1900 (IPv6), and 0 (multicast)

- With hardware profile ipv6 lpm-entries maximum 0 configured: 14,000 (IPv4), 0 (IPv6), and 2000 (multicast)

- With hardware profile ipv6 lpm-entries maximum 4096 and hardware profile multicast max - limit lpm - entries 0 configured: 4000 (IPv4), 4096 (IPv6), and 0 (multicast)

- When you allocate the entire table for IPv4 or IPv6 LPM unicast routes, the other address family cannot be used

64,000 (default system routing mode with system routing layer 3 scale)

Nexus 9300-EX switches

206,000 (/64 prefix length); 1900 (non /64 prefix length)

Nexus 9300-FX switches

628,000 / 560,000 (without / with urpf enabled) (default) ; 442,000 / 412,000 (without / with urpf enabled) (with system routing template - lpm - heavy mode)

Nexus 9300-FX2 switches

294,000 / 265,000 (without / with urpf enabled) (default) ; 442,000 / 412,000 (without / with urpf enabled) (with system routing template - lpm - heavy mode)

Nexus 9300-GX/GX2 switches

628,000 / 628,000 (without/with urpf enabled) (default) ; 442,000 / 412,000 (without / with urpf enabled) (with system routing template - lpm - heavy mode)

Nexus 9408 switches

412,876

Nexus 9300-FX3 switches

600,000

Nexus 9500 switches

20,000 (default system routing mode)

4000 (max-host routing mode)

80,000 with no IPv4 routes (64-bit ALPM routing mode)

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

FM-E: 176,000 (/64 prefix length); 3900 (non /64 prefix length)

FM-E2: 235,000 (any prefix length)

FM-G: 235,000

Nexus 9600-R line cards

62,000 (Default system routing template)

Nexus 9600-RX line cards

256,000 (Default system routing template)

Nexus 9808 switches

250,000

IPv4 host routes (LPM heavy mode)

Nexus 9236C, 9272Q, and 92304QC switches

262,000

Nexus 92160YC-X switches

650,000

Nexus 9364C switches

262,000

Nexus 9300-EX switches

786,000 / 720,000 (without/with urpf enabled)

Nexus 9300-FX switches

786,000 / 734,000 (without/with urpf enabled)

Nexus 9300-FX2/FX3/GX/GX2 switches

786,000 / 734,000 (without/with urpf enabled)

Nexus 9408 switches

1,048,576

Nexus 9700-EX /FX and N9K-X9716D-GX line cards

786,000

Nexus 9808 switches

256,000

IPv6 host routes (LPM heavy mode)

Nexus 9364 switches

131,000

Nexus 9300-EX switches

24,000 / 16,000 (without/with urpf enabled) (protocol learned host)

Nexus 9300-FX/FX2/FX3/GX/GX2 switches

442,000 / 412,000 (without/with urpf enabled) (protocol learned host)

Nexus 9408 switches

589,824

Nexus 9700-EX/FX line cards

FM-E: 32,000 (shared between IPv6 ND and protocol learned host)

FM-E2: 235,000

FM-G: 235,000

Nexus N9K-X9716D-GX line card

235,000

Nexus 9808 switches

64,000

IPv4 LPM routes (LPM heavy mode)

Nexus 9236C, 9272Q, and 92304QC switches

262,000

Nexus 92160YC-X switches

650,000

Nexus 9364C switches

262,000

Nexus 9300-EX switches

786,000 / 720,000 (without/with urpf enabled)

Nexus 9300-FX switches

786,000 / 734,000 (without/with urpf enabled)

Nexus 9300-FX2/GX/GX2 switches

786,000 / 734,000 (without/with urpf enabled)

Nexus 9408 switches

1,048,576

Nexus 9300-FX3 switches

786,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

786,000

Nexus 9808 switches

900,000

IPv6 LPM routes (LPM heavy mode)

Nexus 9236C, 9272Q, and 92304QC switches

131,000 (/64 prefix length); 1900 (non /64 LPM scale)

Nexus 92160YC-X switches

294,000 (/64 prefix length); 1900 (non /64 LPM scale)

Nexus 9364C switches

131,000

Nexus 9300-EX switches

353,000 / 324,000 (without/with urpf enabled) (/64 prefix length)

1900 (non /64 prefix length)

Nexus 9300-FX/FX2/GX/GX2 switches

442,000 / 412,000 (without/with urpf enabled)

Nexus 9408 switches

589,824

Nexus 9300-FX3 switches

442,000 / 412,000 (without / with urpf enabled) (protocol learned host)

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

FM-E: 235,000 (/64 prefix length); 3900 (non /64 prefix length)

FM-E2: 235,000 (any prefix len)

FM-G: 235,000

Nexus 9808 switches

250,000

IPv4 host routes (dual-host mode)

Nexus 9364C switches

163,000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

262,000

Nexus 9808 switches

256,000

IPv6 host routes (dual-host mode)

Nexus 9364C switches

81,000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

131,000

Nexus 9808 switches

64,000

IPv4 LPM routes (dual-host mode)

Nexus 9300-EX switches

6000

Nexus 9300-FX and 9364C switches

8000

Nexus 9300-FX2/GX/GX2, and Nexus 9408 switches

10,000

Nexus 9300-FX3 switches

7000

IPv6 LPM routes (dual-host mode)

Nexus 9300-EX/FX/FX3, and Nexus 9364C switches

1900

Nexus 9300-FX2/GX/GX2, and Nexus 9408 switches

3900

IPv4 LPM routes (l3-heavy mode)

Nexus 9600-RX line cards

1,800,000

IPv6 LPM routes (l3-heavy mode)

Nexus 9600-RX line cards

750,000

IPv4 ARP (dual-host mode)

Nexus 9364C and 9300-EX switches

64,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

98,000

IPv6 ND (dual-host mode)

Nexus 9364C and 9300-EX switches

64,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

98,000

IPv4 host routes (internet-peering mode)

Note

The combined IPv4 and IPv6 route prefixes of internet-peer which was working in the internet-peering routing mode may not work forever because the global internet tables are growing. This occurs as hardware resource to accommodate IPv4 and IPv6 route prefixes do not change once the hardware/software is shipped.

Nexus 9300-EX/FX2 switches

1 Million (protocol learned host)

Nexus 9300-FX/FX3 switches

1,256,000 ( protocol learned host)

Nexus 9300-GX/GX2 switches

2 Million (protocol learned)

Nexus 9408 switches

1,468,006

Nexus 9700-EX/FX and 9700-GX line cards

1 Million (protocol learned host)

IPv6 host routes (internet-peering mode)

Note

The combined IPv4 and IPv6 route prefixes of internet-peer which was working in the internet-peering routing mode may not work forever because the global internet tables are growing. This occurs as hardware resource to accommodate IPv4 and IPv6 route prefixes do not change once the hardware/software is shipped.

Nexus 9300-EX switches

16,000 (Hash Table: Shared between IPv6 ND and protocol learned IPv6 host)

Nexus 9300-EX/FX2 switches

500,000 (protocol learned host)

Nexus 9300-FX/FX3/GX/GX2 switches

628,224 (protocol learned)

Nexus 9408 switches

412,876

Nexus 9700-EX line cards

16,000 (Hash Table: Shared between IPv6 ND and protocol learned IPv6 host)

Nexus 9700-FX/GX line cards

500,000 (protocol learned)

IPv4 LPM routes (internet-peering mode)

Note

The combined IPv4 and IPv6 route prefixes of internet-peer which was working in the internet-peering routing mode may not work forever because the global internet tables are growing. This occurs as hardware resource to accommodate IPv4 and IPv6 route prefixes do not change once the hardware/software is shipped.

Nexus 9300-EX/FX2 switches

1 Million (protocol learned)

Nexus 9300-FX switches

1,256,000 ( protocol learned host)

Nexus 9300-FX3 switches, and Nexus 9700 GX line cards

1,800,000 (protocol learned)

Note

Nexus 9300-FX3 switches, and Nexus 9700 GX line cards also supports 200,000 IPv6 LPM routes along with 1,800,000 IPv4 LPM routes using 16-way ECMP.

Nexus 9300-GX/GX2 switches

2 Million (protocol learned)

Nexus 9408 switches

1,468,006

Nexus 9700-EX/FX line cards

1 Million (protocol learned)

IPv6 LPM routes (internet-peering mode)

Note

The combined IPv4 and IPv6 route prefixes of internet-peer which was working in the internet-peering routing mode may not work forever because the global internet tables are growing. This occurs as hardware resource to accommodate IPv4 and IPv6 route prefixes do not change once the hardware/software is shipped.

Nexus 9300-EX switches

500000 (Prefix length 0-83) protocol learned

1900 (Prefix length /84-127)

Nexus 9300-FX2 switches

500,000 (protocol learned)

Nexus 9300-FX/FX3/GX/GX2 switches

628,224 (protocol learned)

Nexus 9408 switches

412,876

Nexus 9700-EX line cards

500,000 (Prefix length 48-83) protocol learned

1900 (Prefix length /84-127)

Nexus 9700-FX/GX line cards

500,000 (Prefix length 48-128) protocol learned

Nexus 9500 switches with the FM-E2 fabric line cards

176,000 (Prefix length 0–47 ) protocol learned host

Nexus 9500 switches with the FM-G fabric line cards

500,000

Routes (internet-peering mode)

Nexus 9600-R and 9600-RX line cards

1 Million[22]

IPv4 routes (internet-peering mode)

Nexus 9600-R and 9600-RX line cards

852,000[23]

IPv6 routes (internet-peering mode)

Nexus 9600-R line cards

175,000[24]

Routes (internet-peering mode)

Nexus 9600-R line cards

852,000

IPv4 routes (internet-peering mode)

Nexus 9600-R line cards

781,000

IPv6 routes (internet-peering mode)

Nexus 9600-R line cards

71,000

IPv4 ARP (internet peering mode)

Nexus 9300-EX switches and Nexus 9700-EX/FX/GX line cards

32,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP, and protocol learned IPv6 host)

Nexus 9300-FX/FX2/FX3/GX/GX2 switches

32,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP, and protocol learned IPv6 host) over L3 interface and 16,000 over a SVI/VLAN (as the upper limit of the dynamic learnt MAC address in the "internet Peering" mode is 16,000

Nexus 9408 switches

32768

IPv6 ND (internet-peering mode)

Nexus 9300-EX switches and Nexus 9700-EX/FX line cards

16,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP, and protocol learned IPv6 host)

Nexus 9300-FX2 switches

16,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP, and protocol learned IPv6 host)

Nexus 9300-FX/GX/GX2 switches

32,000 (Hash Table: Shared between IPv6 ND, IPv4 ARP, and protocol learned IPv6 host) over L3 interface and 16,000 over a SVI/VLAN (as the upper limit of the dynamic learnt MAC address in the "internet Peering" mode is 16,000

Nexus 9408 switches

16384

Nexus 9300-FX3 switches and N9K-X9716D-GX line cards

32,000 over an L3 interface and 16,384 over an SVI / VLAN (as the upper limit of the dynamically learned MAC address upper limit in "Internet Peering" mode is 16,384)

IS-ISv4 adjacencies (either L1, L2, or sum of L1 and L2 with default timers)

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

255

IS-ISv4 BFD sessions (with default timers)

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

255

IS-ISv4 routes

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

10,000

IS-ISv4 network type

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and Nexus 9700-EX/FX line cards

Point to point, broadcast

Groups with default timers (3s/10s) and multiple group optimizations. [There are 2 primary, one for IPv4 and the other for IPv6, and 7926 secondary]

X9636C-R/RX and X9636Q-R line cards

7928

Groups with aggressive timers (1s/3s) and multiple groups optimization. [There are 2 primary, one for IPv4 and the other for IPv6, and 7926 secondary][25]

X9636C-R/RX and X9636Q-R line cards

7928

Groups per interface or I/ module

X9636C-R/RX and X9636Q-R line cards

Maximum 16 (Because 16 is the unique virtual MAC address limit)

OSPF/OSPFv3 LSA/LSDB size

Nexus 9600-R and 9600-RX line cards

250,000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

100,000

OSPF/OSPFv3 areas

Nexus 9600-R and 9600-RX line cards

15

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and N9K-X9716D-GX line card

100

OSPFv2 neighbors

Nexus 9600-R, 9600-RX, N9K-X9716D-GX, and 9700-EX/FX line cards

1000

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2, and 9808 switches

256

Note

Beginning with 10.3(2)F, 650 neighbors are supported on Nexus 9300-FX, 9300-FX2, and 9300-GX switches.

OSPFv3 neighbors

Nexus 9600-R, 9600-RX, N9K-X9716D-GX, and 9700-EX/FX line cards

1000

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2, and 9808 switches

256

Note

Beginning with 10.3(2)F, 650 neighbors are supported on Nexus 9300-FX, 9300-FX2, and 9300-GX switches.

OSPF/OSPFv3 LSA/LSDB size

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, and 9808 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100,000

OSPF/OSPFv3 areas

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, and 9808 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100

Static routes

Nexus 9364C, 9300-EX/FX/FX2/FX3/GX/GX2, and 9808 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

8000

VRFs

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

1000

Nexus 9600-R and 9600-RX line cards

3967

Nexus 9808 switches

1000

VRRP groups per interface or I/O module

Nexus 9364C, and 9300-EX/FX/FX2/FX3/GX/GX2 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

250

Policy-based routing (PBR)

Configured sequences per policy

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9408 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

128

Next-hop addresses per policy

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9408 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

32

IPv4 ACEs (unidimensional)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9408 switches, and Nexus 9700-EX/FX and N9K-X9716D-GX line cards

3582 (per network forwarding engine)

IPv6 ACEs (unidimensional)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9408 switches

1792 (per network forwarding engine)

IPv4 and IPv6 ACEs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and 9408 switches

1024 IPv4 + 128 IPv6

Nexus 9700-EX/FX/GX line cards

1024 IPv4

Interfaces with PBR policy

Nexus 9300-EX, 9300-FX/FX2/FX3/GX/GX2 and 9408 switches and Nexus 9700-EX/FX line cards

512

Nexus N9K-X9716D-GX line card

256

VRRPv3

VRRPv3 groups per interface

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX line cards

255

Nexus N9K-X9716D-GX line card

250

VRRPv3 groups with default timers (1 s)

Nexus 9300-EX switches and Nexus 9700-EX/FX line cards

490

Nexus 9300-FX/FX2/FX3 switches

255

Nexus 9300-GX/GX2 switches and Nexus 9700-GX line cards

250

VRRPv3 groups with relaxed timers (3 s)

Nexus 9300-EX switches and Nexus 9700-EX/FX line cards

490

Nexus 9300-FX/FX2/FX3 switches

255

Nexus 9300-GX/GX2 switches and Nexus 9700-GX line cards

250

Pathways with one VRRPv3 group with default timer (1 s)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX line cards

489

VRRPv3 groups and pathways combined

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches and Nexus 9700-EX/FX line cards

490

Nexus N9K-X9716D-GX line card

250

ECMP

ECMP Paths - IPv4 (internet-peering mode)

Nexus 9300-FX/FX3/GX/GX2, and Nexus 9408 switches

16

ECMP Paths - IPv6 (internet-peering mode)

Nexus 9300-FX/FX3/GX/GX2, and Nexus 9408 switches

16

ECMP Paths (IPv4 and IPv6 Unicast Address-family)

Nexus 9300-EX/FX/FX2/FX3/FXP/GX/GX2, 9408, and 9808 switches and N9K-X9716D-GX line cards

128[26]

Nexus 9504/9508 switches with -R/RX line cards

64

ECMP Groups

Nexus 9808 switches

4000

[18] If you have more than 490 groups, then only one group per SVI. SVIs cannot have a user defined MAC or any VRRP group with it.

[19] If you have more than 490 groups, then only one group per SVI. SVIs cannot have a user defined MAC or any VRRP group with it.

[20] The hash table is subject to collisions. Depending on the host route pattern, collisions might occur.

[21] The hash table is subject to collisions. Depending on the host route pattern, collisions might occur.

[22] Contains internet peering profile with additional IPv4 and IPv6 routes.

[23] Internet profile with additional IPv4 routes (total of 914K routes consisting of IPv4 and 62K of IPv6)

[24] Internet profile with additional IPv6 routes (total of 871K routes consisting of IPv6 and 696K of IPv4)

[25] If the user has Multi-protocol configuration, user should configure appropriate CoPP policies to avoid any control plane traffic drops.

[26] 128-way ECMP paths are not supported for MPLS, VXLAN, and L3 tunnels.Resilient hashing is not supported on Cisco Nexus 9808 switch for routing, PBR and Port-channel.

Note

With IPv6 scale, traffic loss could be there for a few seconds during switchover.

Note

The maximum number of PBR next-hops based on 4 FM-E supported is 192 per slice of the forwarding engine

- The IPv4/IPv6 host routes and the IPv4 multicast routes share the same hardware table. Limits are provided for both the default line card mode and the max host line card mode.

- The IPv4 and IPv6 unicast routes share the same hardware table. Limits are provided for both the default line card mode and the max host line card mode.

- High availability (graceful restart and stateful switchover) is not supported when unicast or multicast aggressive timers are configured at any scale.

Guidelines and Limitations for OSPF Verified Scalability Limits

- To achieve the highest scale, we recommend that you use a single OSPF instance instead of multiple instances.

- Each OSPFv2 and OSPFv3 scale value might vary when combined with other parameters.

- The graceful restart timeout value might be increased in multidimensional scenarios.

PVLAN VXLAN Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

Primary VLANs

Nexus 9300-EX/FX/FX2/FX3 switches

16

Secondary VLANs

Nexus 9300-EX/FX/FX2/FX3 switches

20

Ports in community host mode

Nexus 9300-EX/FX/FX2/FX3 switches

40

Port in Isolated host mode

Nexus 9300-EX/FX/FX2/FX3 switches

40

Ports in isolated trunk mode

Nexus 9300-EX/FX/FX2/FX3 switches

40

Ports in promiscuous mode

Nexus 9300-EX/FX/FX2/FX3 switches

5

PVLANs allowed on a PVLAN port

Nexus 9300-EX/FX/FX2/FX3 switches

16

Note

The above scale numbers are applicable for both IPv4 and IPv6 Underlay.

VXLAN Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

VTEP Peers[27]

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9600-R, 9600-RX, 9700-EX/FX, and N9K-X9716D-GX line cards

512

Underlay multicast groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

512

Maximum policy scale or number of VNIs to which a policy can be applied

Nexus 9300-FX2/FX3/GX/GX2 switches, and Nexus 9408 switches

510

Note

The default scale is 60 on Nexus 9300-FX2 ToR switches. To increase the scale to 510, use the hardware access-list tcam label ing-racl 9 command.

Nexus 9300-FX platform switches and Nexus 9700-FX and 9700-GX line cards

60

IGMP snooping over VXLAN

VXLAN VLANs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

1000

Multi-Site

[28]

Asymmetric VNIs per peer

Nexus 9332C, 9364C, 9300-EX/FX/FX2/FX3/FXP/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

3900

Number of Tunnel Encryption sessions

Nexus 9300, 9336C-FX2, 93240YC-FX2, 93360YC-FX2, 93216TC-FX2, 93180YC-FX3, and 93108TC-FX3P

128[29]

Number of BGWs per site for Secure VXLAN EVPN Multi-Site using CloudSec

Nexus 9336C-FX2/FX3, 93240YC-FX2/FX3, 93360YC-FX2/FX3, and 93216TC-FX2/FX3 switches

6 per 10 sites

Number of sites

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, 9332C, 9364C, 9500 switches and Nexus 9700-EX/FX/GX line cards

128

Number of sites for Secure VXLAN EVPN Multi-Site using CloudSec

Nexus 9300-FX2/FX3, and Nexus 9408 switches

10 sites

Number of sites for TRM

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, 9332C, 9364C switches and Nexus 9700-EX/FX/GX line cards

16 sites

Number of BGWs per site[30]

Nexus 9332C and 9364C switches and Nexus 9700-EX/FX/GX line cards

4 (Anycast), 2(vPC)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

6 (Anycast), 2 (vPC)

Number of BGWs per site with TRM enabled

Nexus 9332C, 9364C, 9500 switches and Nexus 9700-EX/FX/GX line cards

2 (Anycast), 2 (vPC)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

6 (Anycast), 2 (vPC)

Number of Cloudsec Security Associations for Secure VXLAN EVPN Multi-Site using CloudSec sessions

Nexus 9300-FX2/FX3, and Nexus 9408 switches

128 [31]

Multisite-PIP ECMP

Nexus 9300-FX2/FX3/GX/GX2 switches

1000[32]

VTEPs per Site

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

512

Tenant Route Multicast Layer 3 Mode with VXLAN BGP eVPN

VXLAN Layer 2 VNI

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

1000

VXLAN Layer 3 VNI/VRFs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

250

VTEP Peers

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

254

Underlay Multicast Group (PIM ASM Underlay)

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-EX/FX/GX line cards

512[33]

Total Multicast routes (PIM ASM & PIM SSM)

Nexus 9300-FX/FX2/FX3/GX/GX2, Nexus 9408 switches and Nexus 9700-FX/GX line cards

31,200

Nexus 9300-EX and Nexus 9700-EX line card

7200

VXLAN Flood and Learn

Virtual network identifiers (VNIs) or VXLAN-mapped VLANs

Nexus 9600-R and 9600-RX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, Nexus 9700-EX/FX switches, and N9K-X9716D-GX line cards

3900

Underlay multicast groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

512

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

Overlay MAC addresses

Nexus 9300-EX/FX switches

90,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

Nexus 9300-FX2/FX3/GX/GX2, and Nexus 9408 switches

60,000

Ingress replication peers [34]

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

512

Nexus 9700-EX/FX and Nexus N9K-X9716D-GX line card

Ingress replication Layer 2 VNIs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

1000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

MAC addresses for ingress replication

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

90,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

1000

Port VLAN translations under an interface

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

3967

Port VLAN translations in a switch

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

24,000

Static MAC addresses pointing to a remote VTEP

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 switches

1000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

VXLAN VLANs per FEX port (host interface)

Nexus 9300-FX2/FX3/GX/GX2, and Nexus 9408 switches

75

Nexus 93180YC-EX

75[35]

Layer 2 routed VNIs for vPC-centralized gateway

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

450

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

IGMP groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

8192

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

Port Multi-VLAN Mapping[36]

Nexus 9300-FX2/GX/GX2 switches

510[37]

Nexus 9300-EX/FX switches

368[38]

VXLAN BGP eVPN

Layer 2 VNIs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

3900 [39], [40]

Nexus 9600-R and 9600-RX line cards

2000

Xconnect VLANs

Nexus 9332C, 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

40

SVI with Distributed Anycast Gateway; Layer 2 VNI extended

Nexus 9300-EX switches

3900[41]

Nexus 9300-FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and N9K-X9716D-GX line cards

3900

Nexus 9700-EX/FX switches

1000

Layer 3 VNIs / VRFs[42]

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches and N9K-X9716D-GX line cards

2000 [43]

Nexus 9600-R and 9600-RX line cards

900

Nexus 9700-EX/FX line cards

750

Underlay multicast groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

512

VTEPs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9600-R, 9600-RX, 9700-EX/FX and N9K-X9716D-GX line cards

512

ARP

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

96,000

Note

To scale ARP, use system routing template-dual-stack-host-scale command and reload the switch.

ND

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

96,000

Note

To scale ND, use system routing template-dual-stack-host-scale command and reload the switch.

MAC addresses

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

96,000

Note

To scale MAC addresses, use system routing template-dual-stack-host-scale command and reload the switch.

Port VLAN translations under an interface (IPv4 and IPv6 Underlay)

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

3967

Port VLAN translations in a switch (IPv4 and IPv6 Underlay)

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

24,000

IPv4 host routes

Nexus 9300-EX switches

458,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

471,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

656,000

Nexus 9600-R and 9600-RX line cards

128,000

IPv6 host routes

Nexus 9300-EX switches

24,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

265,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

34,000

Nexus 9600-R and 9600-RX line cards

32,000

Overlay IPv4 LPM routes

Nexus 9300-EX switches

458,000

Nexus 9300-FX/FX2/FX3/GX/GX2 switches

471,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

656,000

Overlay IPv6 LPM routes

Nexus 9300-EX switches

206,000[44]

Nexus 9300-FX/FX2/FX3/GX/GX2 switches

265,000[45]

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

174,000[46]

Overlay IPv6 ND Suppression cache

Nexus 9300-X Cloud Scale switches

64,000

VXLAN VLANs per FEX port (host interface)

Nexus 9300-FX3/GX/GX2, and Nexus 9408 switches

75

IGMP groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

8192

BGP sessions at BGW

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

4000

VXLAN BGP eVPN Ingress Replication

Layer 2 VNIs

Nexus 9600-R and 9600-RX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, 9700-EX/FX switches and N9K-X9716D-GX line cards

3900

Xconnect VLANs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

40

Selective Qinvni with multiprovider tag (IPv4 and IPv6 Underlay)

Nexus 93180YC-EX, 93180YC-FX, 9336C-FX2, Nexus 9300-FX3/GX/GX2, and Nexus 9408 switches

Port level: 4000 mappings, 10 provider VLANs;

System wide: 48,000 mappings, 512 Provider VLANs

SVI with Distributed Anycast Gateway; Layer 2 VNI extended

Nexus 9300-EX switches

2000[47]

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

3900

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

1000

Layer 3 VNIs / VRFs[48]

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, and N9K-X9716D-GX line cards

2000

Nexus 9600-R and 9600-RX line cards

900

Nexus 9700-EX/FX line cards

750

VTEPs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

512

MAC addresses

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

90,000

Port VLAN translations under an interface

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

100

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

3967

Port VLAN translations in a switch

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

2000

Nexus 9300-EX/FX/FX2/FX3/GX/GX2 and Nexus 9408 switches

24,000

IPv4 host routes

Nexus 9300-EX switches

458,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

471,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

656,000

IPv6 host routes

Nexus 9300-EX switches

24,000

Nexus 9300-FX/FX2/GX/GX2, and Nexus 9408 switches

265,000

Nexus 9300-FX3 switches

500,000

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

34,000

Overlay IPv4 LPM routes

Nexus 9300-EX switches

458,000

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

471,500

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

656,000

Overlay IPv6 LPM routes

Nexus 9300-EX switches

206,000[49]

Nexus 9300-FX/FX2/FX3/GX/GX2, and Nexus 9408 switches

265,000[50]

Nexus 9700-EX/FX and N9K-X9716D-GX line cards

174,000[51]

VXLAN VLANs per FEX port (host interface)

Nexus 9300-FX2/FX3/GX/GX2, and Nexus 9408 switches

75

IGMP groups

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408 switches, Nexus 9700-EX/FX and N9K-X9716D-GX line cards

8192

VXLAN and IP-in-IP Tunneling

IP-in-IP tunnels

Nexus 9300-FX2 switches

16

VXLAN Static Tunnels

VNIs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, and 9364C switches

100

VRFs

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, and 9364C switches

100

VTEP peers

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, and 9364C switches

254

V4 routes

Nexus 9300-EX/FX/FX2/FX3/GX/GX2, Nexus 9408, and 9364C switches

10,000

[27] In case of IR, each VNI can have a max of 64 peers.

[28] All the other BGW numbers (number of supported L2VNIs, L3VNIs, MAC addresses, IP addresses, and so on) match the values supported on a generic VXLAN EVPN VTEP node.

[29] Total number of Cloudsec Security Associations in hardware = 128 (M *N*L) where (M = no. of Cloudsec peers, N = no. of uplinks on each Cloudsec endpoint, L is number of border gateway nodes)

[30] Multi-Site enabled with TRM supported number of L2VNIs –1000 and L3VNIs –100. Maximum supported multicast underlay and overlay route is 8000. From Cisco NX-OS Release 10.2(3), Multi-Site enabled with TRM supported number of L3VNIs –250. Maximum supported multicast underlay and overlay route is 32000 for Nexus 9700-FX/FX3/GX/GX2 and 8000 for Nexus 9700-EX/FX2 and N9K-C9508.

[31] Total number of Cloudsec Security Associations in hardware = 128 (M *N*L) where (M = no. of Cloudsec peers, N = no. of uplinks on each Cloudsec endpoint, L is number of border gateway nodes)

[32] Number of vrfs * number of sites = 1000

[33] VXLAN underlay and overlay multicast routes shares the same hardware table. Maximum Multicast routes is 8000 in the default mode. If you want more overlay route scale, reduce the underlay multicast control group.

[34] In case of IR, each VNI can have a maximum number of 64 peers; 512 peers supported on 100 VNIs only.

[35] This is the limit for the Cisco Nexus 93180YC-EX and other fiber based switches. All copper based 9300-EX switches are not applicable.

[36] Only one provider VLAN is supported.

[37] The maximum number of Layer-2 subinterfaces is based on the available entries allocated for ing-pacl-sb tcam region.

[38] Since Nexus 9300-EX and 9300-FX have only one slice, the maximum number of Layer-2 subinterfaces that can be created is lower than the limit for NExus 9300-FX2.

[39] The full scale of 3900 L3VNI is only supported on the platforms with >24G memory. Nexus 93240YC-FX2, 93360YC-FX2, 93216TC-FX2, 93108TC-FX3P, 93180YC-FX3 would require add-on memory to support extended 3900 L3VNI scale. Nexus N9K-C9358GY-FXP and N9K-C92348GC-X can not support extended scale.

[40]
Switches running scaled deployment, including scaled BGP EVPN VxLAN VNI, the memory alert may be seen during Non-Disruptive ISSU as the default system memory threshold has been lowered beginning with Cisco NX-OS Release 10.3(3)F release. To avoid system reacting to critical memory alert, before upgrade configure higher value for system memory thresholds. For example: Set system memory thresholds as 90 for minor, 94 for severe, and 95 for critical.

[41] Only 1900 SVI are supported if dual stack is used/IPv6 is used.

[42] ECMP objects are not shared across multiple VRFs.

[43] The full scale of 2000 L3VNI is only supported on the platforms with >24G memory. Nexus 93240YC-FX2, 93360YC-FX2, 93216TC-FX2, 93108TC-FX3P, 93180YC-FX3 would require add-on memory to support extended 2000 L3VNI scale. Nexus N9K-C9358GY-FXP and N9K-C92348GC-X can not support extended scale.

[44] All /64 routes + 4000 for non /64 routes.

[45] All /64 routes + 4000 for non /64 routes.

[46] All /64 routes + 4000 for non /64 routes.

[47] Only 1900 SVI are supported if dual stack is used/IPv6 is used.

[48] ECMP objects are not shared across multiple VRFs.

[49] All /64 routes + 4000 for non /64 routes.

[50] All /64 routes + 4000 for non /64 routes.

[51] All /64 routes + 4000 for non /64 routes.

Tetration Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limit

TCAM size

Nexus 92160YC-X, 9300-EX/FX switches

1024 entries

Nexus 92160YC-X switches

IPv4 –4 entries per rule (TCP, UDP, ICMP, and IP)

Nexus 9300-EX/FX switches

IPv4 –2 entries per rule (ICMP and IP)

Nexus 92160YC-X switches

IPv6 –8 entries per rule (4 entries per ICMP and IPv6 for a total of 8 entries)

Nexus 9300-EX/FX switches

IPv6 –8 entries per rule (4 entries per ICMP and IPv6 for a total of 8 entries)

Nexus 92160YC-X, 9300-EX/FX switches

24 entries out of 1000 is consumed for default.

TCAM

Nexus 92160YC-X switches

250 (IPv4) or 62 (IPv6)

Nexus 9300-EX/FX switches

500 (IPv4) or 125 (IPv6)

The entire Cisco Tetration Analytics documentation set is available at the following URL: https://www.cisco.com/c/en/us/support/data-center-analytics/tetration-analytics/tsd-products-support-series-home.html

RIPng Verified Scalability Limits (Unidimensional)

Feature

Supported Platforms

Verified Limits

RIPng Neighbors

Nexus 9300 and 9500 switches

250

RIPng Routes

Nexus 9300 and 9500 switches

1500

Verified Scalability Limits - Multidimensional

The tables in this section list the verified scalability limits for the Cisco Nexus 9000 Series platform switches. These limits are validated with a multidimensional configuration. The values provided in these tables focus on the scalability of all listed features at the same time.

For each corresponding feature, the number given is the absolute maximum currently supported in this release. If the hardware is capable of a higher scale, future software releases might increase this verified maximum limit. Results might differ from the values listed here when trying to achieve maximum scalability with multiple features enabled.

Note

These numbers are not the maximum verified values if each feature is viewed in isolation. For these numbers, see the corresponding "Verified Scalability Limits" section.

eBGP/IS-IS Profile Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

Number of 100G ports

288

ECMP

16-way (Upstream)

BGP neighbors

960

BGP IPv4 /32 unicast routes

30,000

BGP IPv4 VLSM unicast routes

18,000

BGP IPv6 /128 unicast routes

16,000

BGP IPv6 VLSM unicast routes

1000

IS-IS v2 neighbors

255

IS-IS v3 neighbors

255

IS-IS Layer 2 adjacency

16

IS-IS IPv4 /32 unicast routes

20,000

IS-IS IPv4 VLSM unicast routes

1000

IS-IS IPv6 /128 unicast routes

20,000

IS-IS IPv6 VLSM unicast routes

1000

BFD sessions

272

PIM neighbors

256

ACL ACEs

15,000

500

Sub-interfaces

712

SPAN sessions

1 local SPAN session

Multicast SSM

20,000

iBGP/OSPF Profile Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

Number of 100G ports

180

Number of 40G ports

108

ECMP

8-way (Upstream)

BGP neighbors

8

BGP IPv4 VLSM unicast routes

40,000

BGP IPv6 VLSM unicast routes

10,000

OSPFv2 neighbors

108

OSPFv3 neighbors

30

OSPF IPv4 /32 unicast routes

100,000

OSPF IPv4 VLSM unicast routes

155,000

OSPFv3 IPv6 /128 unicast routes

1000

OSPFv3 IPv6 VLSM unicast routes

9000

BFD sessions

108

VRF

250

PIM neighbors

108

IPv4 (*,G) multicast routes

2000

IPv4 (S,G) multicast routes

10,000

ACL ACEs

500 (IPv4)

500 (IPv6)

SPAN sessions

1 local SPAN session

iBGP/EIGRP Profile Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

Number of 100G ports

180

Number of 40G ports

108

ECMP

16-way (Upstream)

BGP neighbors

8

BGP IPv4 VLSM unicast routes

40,000

BGP IPv6 VLSM unicast routes

10,000

EIGRP v4 neighbors

276

EIGRP v6 neighbors

276

EIGRP IPv4 /32 unicast routes

30,000

EIGRP IPv4 VLSM unicast routes

1000

EIGRP IPv6 /128 unicast routes

30,000

EIGRP IPv6 VLSM unicast routes

1000

BFD sessions

276

VRF

250

PIM neighbors

276

IPv4 (*,G) multicast routes

6000

IPv4 (S,G) multicast routes

16,000

ACL ACEs

500 (IPv4)

500 (IPv6)

SPAN sessions

1 local SPAN session

MPLS Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

MPLS L3VPN

3967

VPE

3967

PE nodes

3

PE routes

20,000

X9636C-RX line card: ACL scale-IPv4

95,000

X9636C-RX line card: ACL scale-IPv6

20,000

HSRP, HSRP VIP

3967 each for v4 and v6

vPC uRPF

3967

Strict uRPF

Yes

VRF

3967

SVI

3967

Layer 3 VPN routes IP ECMP

2000

MPLS LSR ECMP

2000

VPNv4 routes

400,000

VPNv6 routes

90,000

EBGP neighbors

750

Layer 2/Layer 3 Boundary Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

MAC addresses

19,000

vPC Port channels

46

ECMP

16-way (Upstream)

OSPFv2 neighbors

47

OSPFv3 neighbors

47

OSPF IPv4 /32 unicast routes

45,000

OSPF IPv4 VLSM unicast routes

1000

OSPF IPv6 /128 unicast routes

20,000

OSPF IPv6 VLSM unicast routes

1000

BFD sessions

49

VRF

250

VLAN

3750

SVI

3750

VRRP v4 groups

1996 VRRS / 4 VRRPv3

VRRP v6 groups

1996 VRRS / 4 VRRPv3

HSRP IPv4

1743 Secondary groups / 7 Primary groups

HSRP IPv6

1743 Secondary groups / 7 Primary groups

PIM neighbors

396

IPv4 (*,G) multicast routes

3080

IPv4 (S,G) multicast routes

26,600

IGMP snooping database entries

6400

sFlow enabled interfaces

83

UDLD enabled interfaces

93

SPAN sessions

1 local SPAN session

Segment Routing Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

VLAN

100

SVI

100

MAC entries

10,000

ARP entries

70

HSRPv4 VIPs

100

HSRpv6 VIPs

100

LACP

11

LACP members

4

eBGP IPv6 neighbors

9

eBGP IPv4 LU neighbors

9

IPv4 (LU) routes

6888

IPv4 (LU) paths

17580

IPv6 routes

6663

6PE routes

17,338

SR ECMP

18 (dual-homed)

MPLS HW entries

11,957

VXLAN Profile Verified Scalability Limits (Multidimensional)

Feature

Verified Limits

Ports

16

ECMP

8-way (Upstream)

BGP neighbors

200

BGP EVPN Layer 2 VPN host routes

64,000

BGP IPv4 VLSM unicast routes or OSPF

10,000

BGP IPv6 VLSM unicast routes or OSPF

6000

BFD sessions

20

PIM neighbors

20

IPv4 (*, G) multicast routes (co-existing)

4000

IPv4 (S,G) multicast routes (co-existing)

2000

Layer 3 VNI

900

Layer 2 VNI

2000

Local VTEP

1

Remote VTEPs

256

VLAN

3600

SVI

900

MAC

90,000

Deployment Case Studies

This section provides sample topologies for some common deployments. For each topology, the scalability numbers are the limits with all of the listed features enabled at the same time.

Attention

These numbers are not the maximum verified values if each feature is viewed in isolation. For these numbers, see the "Verified Scalability Limits" section.

- VXLAN BGP/eVPN iBGP Centric Topology

VXLAN BGP/eVPN iBGP Centric Topology

This VXLAN BGP/eVPN iBGP centric topology consists of Cisco Nexus 9300 and 9500 Platform switches acting as VXLAN vPC tunnel endpoints (VTEPs) and VXLAN non-vPC VTEPs. VXLAN VTEPs establish iBGP sessions to a Cisco Nexus 9508 switch (route reflector) acting as a spine node. VXLAN-distributed anycast gateway SVIs are configured for dual stack, and the traffic is dual stack.

The focus of this topology is to test VXLAN overlay network scale and underlay Layer 2 switching and other routing, multicast, and Layer 4 through Layer 7 features for management and operations. Underlay PIM neighbors and IS-IS adjacency were tested with the default timer and Bidirectional Forwarding Detection (BFD) enabled on all links.

In the following table, the Verified Limit column lists the verified scaling capabilities with all listed features enabled at the same time. These numbers are not the maximum verified values if each feature is viewed in isolation.

VXLAN BGP/eVPN iBGP Centric Topology

Feature

Supported Platform

Verified Limit

System Routing Template

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

default

Nexus 9364C switches

Not applicable

VXLAN VTEPs

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

128

VXLAN Layer 2 VNIs

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

2000

VXLAN Layer 3 VNIs/VRFs

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

500

VXLAN multicast groups

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

128

VXLAN overlay MAC addresses

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

64,000

VXLAN overlay IPv4 host routes

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

60,000

VXLAN overlay IPv6 host routes

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

16,000

Nexus 9364C switches

Not applicable

VXLAN overlay IGMP Snooping groups

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C and 9500 switches and the X9700-EX/FX line cards

1000

VXLAN IPv4 LPM routes

Nexus 9200, 9300-EX, 9300-FX, and 9364C switches and the X9700-EX/FX line cards

5120

VXLAN IPv6 LPM routes

Nexus 9200, 9300-EX, and 9300-FX switches and the X9700-EX/FX line cards

1500

Nexus 9364C switches

Not applicable

VXLAN VLAN logical port VP count

Nexus 9364C switches

Not applicable

VLANs on VTEP node

Nexus 9200, 9300, 9300-EX, 9300-FX, 9364C, and 9500 switches and the X9700-EX/FX line cards

1700 (total VLANs)

1500 (VXLAN VLANs)

200 (non-VXLAN VLANs)

MST instances

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

20

Nexus 9364C switches

Not applicable

STP logical ports

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

3500

Nexus 9364C switches

Not applicable

vPC port channels

Nexus 9200, 9300, 9300-EX, and 9300-FX switches and the X9700-EX/FX line cards

40

Nexus 9364C switches

Not applicable

Underlay IS-IS neighbors

Nexus 9200, 9300, 9300-EX, and 9300-FX switches and the X9700-EX/FX line cards

32

Nexus 9364C switches

Not applicable

Underlay PIM neighbors

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

12

Nexus 9364C switches

Not applicable

Underlay HSRP groups for regular VLANs

Nexus 9364C switches

Not applicable

Underlay vPC SVIs

Nexus 9200, 9300, 9300-EX, 9300-FX, and 9500 switches and the X9700-EX/FX line cards

200

Nexus 9364C switches

Not applicable

Preface

The preface contains the following sections:

- Audience

- Document Conventions

- Documentation Feedback

Audience

This publication is for network administrators who configure and maintain Cisco Nexus devices.

Document Conventions

Note

As part of our constant endeavor to remodel our documents to meet our customers' requirements, we have modified the manner in which we document configuration tasks. As a result of this, you may find a deviation in the style used to describe these tasks, with the newly included sections of the document following the new format.

Command descriptions use the following conventions:

Convention

Description

bold

Bold text indicates the commands and keywords that you enter literally as shown.

Italic

Italic text indicates arguments for which the user supplies the values.

[x]

Square brackets enclose an optional element (keyword or argument).

[x | y]

Square brackets enclosing keywords or arguments separated by a vertical bar indicate an optional choice.

{x | y}

Braces enclosing keywords or arguments separated by a vertical bar indicate a required choice.

[x {y | z}]

Nested set of square brackets or braces indicate optional or required choices within optional or required elements. Braces and a vertical bar within square brackets indicate a required choice within an optional element.

variable

Indicates a variable for which you supply values, in context where italics cannot be used.

string

A nonquoted set of characters. Do not use quotation marks around the string or the string will include the quotation marks.

Examples use the following conventions:

Convention

Description

screen font

Terminal sessions and information the switch displays are in screen font.

boldface screen font

Information you must enter is in boldface screen font.

italic screen font

Arguments for which you supply values are in italic screen font.

< >

Nonprinting characters, such as passwords, are in angle brackets.

[ ]

Default responses to system prompts are in square brackets.

!, #

An exclamation point (!) or a pound sign (#) at the beginning of a line of code indicates a comment line.

This document uses the following conventions:

Note

Means reader take note. Notes contain helpful suggestions or references to material not covered in the manual.

Caution

Means reader be careful. In this situation, you might do something that could result in equipment damage or loss of data.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, please send your comments to: .

We appreciate your feedback.

Trademarks

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS REFERENCED IN THIS DOCUMENTATION ARE SUBJECT TO CHANGE WITHOUT NOTICE. EXCEPT AS MAY OTHERWISE BE AGREED BY CISCO IN WRITING, ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS DOCUMENTATION ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED.

The Cisco End User License Agreement and any supplemental license terms govern your use of any Cisco software, including this product documentation, and are located at: https://www.cisco.com/go/softwareterms.Cisco product warranty information is available at https://www.cisco.com/go/warranty. US Federal Communications Commission Notices are found here https://www.cisco.com/c/en/us/products/us-fcc-notice.html.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Any products and features described herein as in development or available at a future date remain in varying stages of development and will be offered on a when-and if-available basis. Any such product or feature roadmaps are subject to change at the sole discretion of Cisco and Cisco will have no liability for delay in the delivery or failure to deliver any products or feature roadmap items that may be set forth in this document.

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

The documentation set for this product strives to use bias-free language. For the purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on RFP documentation, or language that is used by a referenced third-party product.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com go trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)