Introduction

Switches and directors in the Cisco MDS 9000 Series contain several electrical programmable logical devices (EPLDs) that provide hardware functionalities in all the modules. EPLD upgrades are periodically provided to include enhanced hardware functionality or to resolve known issues.

EPLD bundles are released as part of a Cisco MDS NX-OS release. Therefore, the EPLD bundles have a version number that matches the Cisco MDS NX-OS release they are part of.

An EPLD bundle is a package containing updates for multiple EPLDs. Each EPLD update has its own version number, which is independent of the Cisco MDS NX-OS release. As EPLD changes are infrequent, an EPLD bundle may contain new updates for only some EPLDs. The remaining EPLD updates will be the same version as the previous EPLD bundle.

You need not update switch EPLDs unless otherwise advised by Cisco TAC. For detailed functional image upgrade instructions, refer to the Cisco MDS 9000 NX-OS Fundamentals Configuration Guide, Release 9.x. To download EPLD bundles, go to the URL: https://software.cisco.com/download/navigator.html.

EPLD Bundle Support Matrix

The version of the EPLD bundle must match the version of the Cisco MDS NX-OS release that is running when the EPLD upgrades are installed. This requirement only applies during EPLD code upgrades or downgrades. Cisco MDS NX-OS can be subsequently upgraded or downgraded without changing the EPLD versions.

The following table shows the EPLD bundles that are compatible with specific NX-OS releases.

Table 1.        Release Compatibility Matrix

NX-OS Releases

EPLD Bundle

NX-OS 9.4(3)

m9000-pkg1-9.4.3.epld

m9000-pkg2-9.4.3.epld

m9000-pkg3-9.4.3.epld

The following table lists the Cisco MDS 9000 components and the EPLD bundle versions that are supported for the components.

Table 2.        EPLD Support Matrix

EPLD Bundle

Cisco MDS 9000 Components

Product Identifier (PID)

m9000-pkg1.9.4.3.epld

MDS 9148S 48-Port 16-Gbps Fabric Switch

DS-C9148S-K9-SUP

MDS 9250i 40-Port 16-Gbps Fabric Switch

DS-C9250I-K9-SUP

m9000-pkg2.9.4.3.epld [1]

MDS 9396S 16-Gbps Multilayer Fabric Switch

DS-C9396S-K9-SUP

MDS 9700 Supervisor Module 1

DS-X97-SF1-K9

MDS 9700 Supervisor Module 1E

DS-X97-SF1E-K9

MDS 9700 Supervisor Module 4

DS-X97-SF4-K9

48-Port 16-Gbps Advanced Fibre Channel Module

DS-X9448-768K9

48-Port 32-Gbps Advanced Fibre Channel Module

DS-X9648-1536K9

48-Port 64-Gbps Advanced Fibre Channel Module

DS-X9748-3072K9

24-Port 40-Gbps FCoE Module

DS-X9824-960K9

48-Port 10-Gbps FCoE Module

DS-X9848-480K9

MDS 9706 Fabric Module 1

DS-X9706-FAB1

MDS 9706 Fabric Module 3

DS-X9706-FAB3

MDS 9710 Fabric Module 1

DS-X9710-FAB1

MDS 9718 Fabric Module 1

DS-X9718-FAB1

MDS 9710 Fabric Module 3

DS-X9710-FAB3

MDS 9718 Fabric Module 3

DS-X9718-FAB3

MDS 9706 Fan Module

DS-C9706-FAN

MDS 9710 Fan Module

DS-C9710-FAN

MDS 9718 Fan Module

DS-C9718-FAN

m9000-pkg3.9.4.3.epld

MDS 9132T Fibre Channel Switch

DS-C9132T-K9-SUP

MDS 9124V Fibre Channel Switch

DS-C9124V-K9-SUP

MDS 9148T Fibre Channel Switch

DS-C9148T-K9-SUP

MDS 9148V Fibre Channel Switch

DS-C9148V-K9-SUP

MDS 9220i Fibre Channel Switch

DS-C9220I-K9

MDS 9396T Fibre Channel Switch

DS-C9396T-K9-SUP

MDS 9396V Fibre Channel Switch

DS-C9396V-K9

Guidelines and Limitations

When you upgrade or downgrade the EPLDs, observe the following guidelines and limitations:

●      You can upgrade each module only when it is online. The EPLD upgrade is only disruptive to the module being upgraded.

●      If you interrupt an EPLD upgrade or downgrade, the module must be upgraded again.

●      In Cisco MDS 9000 Director Switches, EPLD upgrade or downgrade can only be executed from the active supervisor module. To upgrade the supervisor EPLDs nondisruptively, upgrade the standby supervisor and then switchover. After the new standby supervisor is online, its EPLDs can be upgraded.

●      In Cisco MDS 9000 Series Fabric Switches, be sure to specify 1 as the module number. The switch must be power cycled for the EPLDs to start running the new code.

Determining EPLD Versions

This includes the following sections.

Module EPLD Versions

Use the show version module slot epld command to view all current EPLD versions on a specific module.

Displaying Current EPLD Versions for a Module

switch# show version module 1 epld

EPLD           Device Version

---------------------------------------

Power Manager SPI     0.002

IO             SPI     0.038

SFP            SPI     0.005

Fan Module EPLD Versions

Use show version fan slot epld command to view all current EPLD versions on a specific fan module. The following command output shows the currently installed EPLD versions on a fan module.

Displaying Current EPLD Versions for a Fan Module

switch# show version fan 1 epld

EPLD           Device Version

---------------------------------------

Fan Controller (1)     0.006

Fan Controller (2)     0.006

Fabric Module EPLD Versions

Use the show version xbar slot epld command to view all current EPLD versions on a specific fabric module. The following command output shows the currently installed EPLD versions on a fabric module.

Displaying Current EPLD Versions for a Fabric Module

switch# show version xbar 2 epld

EPLD Device             Version

---------------------------------------

Power Manager           0.008

Displaying EPLD Versions in an EPLD Bundle

Use the show version epld uri command to view all the updates contained in an EPLD package. The following example shows the EPLD versions contained in an EPLD bundle.

Displaying EPLD Versions in an EPLD Bundle

switch# show version epld m9000-pkg3.9.4.3.epld

Retrieving EPLD versions... Please wait.

EPLD image file 9.4.3 built on Fri Nov 16 09:46:41 2024

Module Type Model EPLD Device Version

--------------------------------------------------------

Supervisor Module-3 DS-X97-SF1-K9 Power Manager SPI 22.000

Supervisor Module-3 DS-X97-SF1E-K9 Power Manager SPI 22.000

Supervisor Module-4 DS-X97-SF4-K9 Power Manager SPI 23.000

Fabric Module 1 DS-X9718-FAB1 Power Manager 1.002

Fabric Module 1 DS-X9710-FAB1 Power Manager 1.003

Fabric Module 1 DS-X9706-FAB1 Power Manager 1.002

Fabric Module 3 DS-X9706-FAB-3 Power Manager 0.010

Fabric Module 3 DS-X9710-FAB-3 Power Manager 0.008

Fabric Module 3 DS-X9718-FAB-3 Power Manager 0.007

16 Gbps Advanced FC Module DS-X9448-768K9 Power Manager 10.000

16 Gbps Advanced FC Module DS-X9448-768K9 IO 15.000

10 Gbps FCoE Module DS-X9848-480K9 Power Manager 0.006

10 Gbps FCoE Module DS-X9848-480K9 IO 0.005

40 Gbps FCoE Module DS-X9824-960K9 Power Manager SPI 1.005

40 Gbps FCoE Module DS-X9824-960K9 IO SPI 2 0.028

40 Gbps FCoE Module DS-X9824-960K9 IO SPI 0.031

Fan DS-C9718-FAN Fan Controller (1) 0.006

Fan DS-C9718-FAN Fan Controller (2) 0.006

Fan DS-C9710-FAN Fan Controller (1) 0.006

Fan DS-C9710-FAN Fan Controller (2) 0.006

Fan DS-C9706-FAN Fan Controller (1) 0.006

Fan DS-C9706-FAN Fan Controller (2) 0.006

2/4/8/16G Fabric Switch DS-C9396S-K9 IO SPI 2 1.002

2/4/8/16G Fabric Switch DS-C9396S-K9 IO SPI 1.003

32 Gbps Advanced FC Module DS-X9648-1536K9 Power Manager SPI 0.002

32 Gbps Advanced FC Module DS-X9648-1536K9 SFP SPI 0.005

32 Gbps Advanced FC Module DS-X9648-1536K9 IO SPI 2.000

1/10/40G IPS,2/4/8/10/16G FC ModulDS-X9334-K9 Power Manager SPI 1.001

1/10/40G IPS,2/4/8/10/16G FC ModulDS-X9334-K9 IO SPI 2.000

4/8/16/32G 1 RU Fabric Switch DS-C9132T IO SPI 2 0.024

4/8/16/32G 1 RU Fabric Switch DS-C9132T MI IO SPI 0.017

4/8/16/32G 1 RU Fabric Switch DS-C9132T LEM IO SPI 0.016

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 SFP SPI 0.007

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 IO SPI 2 0.013

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 MI IO SPI 0.006

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 LEM-1 SPI 0.016

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 LEM-2 SPI 0.016

4/8/16/32G 2 RU Fabric Switch DS-C9396T-K9 LEM-3 SPI 0.016

4/8/16/32G 1 RU Fabric Switch DS-C9148T-K9 SFP SPI 0.007

4/8/16/32G 1 RU Fabric Switch DS-C9148T-K9 IO SPI 2 0.013

4/8/16/32G 1 RU Fabric Switch DS-C9148T-K9 MI IO SPI 0.006

1/10/25/40G IPS, 4/8/16/32G FC SwiDS-C9220I-K9 IO SPI 2 0.024

1/10/25/40G IPS, 4/8/16/32G FC SwiDS-C9220I-K9 MI IO SPI 0.027

1/10/25/40G IPS, 4/8/16/32G FC SwiDS-C9220I-K9 AKFPGA SPI 1.000

8/16/32/64 Gbps Advanced FC ModuleDS-X9748-3072K9 SFP SPI 0.008

8/16/32/64 Gbps Advanced FC ModuleDS-X9748-3072K9 IO SPI 0.029

8/16/32/64G 1 RU Fabric Switch DS-C9148V-K9 IO SPI 2 0.014

8/16/32/64G 1 RU Fabric Switch DS-C9148V-K9 MI IO SPI 0.012

8/16/32/64G 1 RU Fabric Switch DS-C9124V-K9 I O SPI 2 0.014

8/16/32/64G 1 RU Fabric Switch DS-C9124V-K9 MI IO SPI 0.012

Installing EPLD Updates

Supervisors, switching, fabric, and fan modules may be upgraded in a switch. For Director switches, modules can be upgraded together or individually. For Fabric switches, modules are upgraded individually. Fabric switches do not require fabric and fan modules to be upgraded.

The modules to be upgraded are specified by the user. If the module number that is specified in the command is not present, the update is aborted. Otherwise, a warning and a prompt to continue is printed. If the user proceeds, the status of each specified module is printed followed by a table of installed and new EPLD versions. If no modules require upgrading, the command exits. If any module EPLD version is different and requires upgrading, the user is prompted to continue. All EPLDs are updated on the first specified module. The update process may take several minutes. After the update, the module is power cycled. For switching modules, this power cycle disrupts traffic on all ports of the module. If the new EPLD version is the same as the installed version or the module is present but not online, no action is taken for that module. If more than one module is specified, the download and power cycle process is repeated for the next module.

This section includes the following topics:

Installing EPLD Updates on All Modules in a Director Switch

To update all EPLDs sequentially with a single command, use the install all epld command with the module all fan-module all xbar all options. After each module is upgraded, it is power cycled to load the EPLD update. Switching module power cycles are disruptive to the traffic passing through them. If the active supervisor requires upgrading, it will be updated last and a supervisor switchover executed. Fan modules do not require to be power cycled.

Installing a Director Switch Supervisor Module EPLD Update

To update the EPLDs on supervisors of Director Switches in a nondisruptive manner, follow these steps:

Step 1.     Update the EPLD on the standby supervisor module. On the active supervisor module, enter the install all epld <filename> parallel module <module-number> command, specifying the current standby supervisor module number.

After the EPLD update is complete, the standby supervisor module will be power cycled.

Step 2.     After the standby supervisor module reaches the 'ha-standby' state, perform a switchover and wait until the new standby supervisor module reaches the 'ha-standby' state.

Step 3.     From the active supervisor module, repeat the above steps.

For information about how to update the EPLDs on supervisor modules of the Fabric switches, see Installing a Switching Module EPLD Update.

Updating the Standby Supervisor Module EPLDs on a Cisco MDS 9700 Series Switch

switch# show module

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

1    48     4/8/16/32 Gbps Advanced FC Module   DS-X9648-1536K9    ok

2    48     8/16/32/64 Gbps Advanced FC Module  DS-X9748-3072K9    powered-dn

4    48     8/16/32/64 Gbps Advanced FC Module  DS-X9748-3072K9    ok

5    0      Supervisor Module-4                 DS-X97-SF4-K9      active *

6    0      Supervisor Module-4                 DS-X97-SF4-K9      ha-standby

switch# install all epld bootflash:m9000-pkg2-9.4.3.epld parallel module 6

Copy complete, now saving to disk (please wait)...

EPLD image signature verification passed

Compatibility check:

Module Type Upgradable Impact     Reason

------ ---- ---------- ---------- ------

6      SUP Yes        disruptive Module Upgradable

Retrieving EPLD versions... Please wait.

Images will be upgraded according to following table:

Module Type EPLD         Running-Version New-Version Upg-Required

------ ---- ------------- --------------- ----------- ------------

6      SUP  Power Manager SPI   18.000    19.000     Yes

The above modules require upgrade.

Do you want to continue (y/n) ? [n] y

Starting Module 6 EPLD Upgrade

Module 6 : Power Manager SPI [Upgrade Started ]

Module 6 : Power Manager SPI [Erasing ] : 100.00%

Module 6 : Power Manager SPI [Programming ] : 100.00% (6020818 of 6020818 total bytes)

Module 6 Upgrade Done.

Waiting for Module 6 to come online.

Module 6 EPLD upgrade is successful.

EPLD Upgrade Completed.

Module Type Upgrade-Result

------ ---- --------------

6      SUP   Success

Installing a Switching Module EPLD Update

For Director Switches, use the install all epld <uri> parallel module <slot> command to update the EPLDs on an individual module. Use the module all option to update the EPLDs of both supervisors and all switching modules.

Updating Module EPLDs on a Director Switch

switch# install all epld bootflash:m9000-pkg2.9.4.3.epld parallel module 1

WARNING!!!: Executing the "install all epld" command

may result in multiple modules going offline and

affect redundant links.

For EPLD upgrade best practices, please refer below link:

http://www.cisco.com/c/en/us/td/docs/switches/datacenter/mds9000/sw/7_3/upgrade/upgrade.html

Do you want to continue (y/n) ? [n] y

Copy complete, now saving to disk (please wait)...

EPLD image signature verification passed

Compatibility check:

Module Type Upgradable Impact Reason

------ ---- ---------- ---------- ------

1      LC   Yes        disruptive Module Upgradable

Retrieving EPLD versions... Please wait.

Images will be upgraded according to following table:

Module Type EPLD         Running-Version New-Version Upg-Required

------ ---- ------------- --------------- ----------- -----------

1      LC   Power Manager 10.000          10.000        No

1      LC   IO            15.000          15.000      No

All Modules are up to date.

*************************************

Installing a Fabric Switch Supervisor EPLD Update

Note:      An EPLD update of the supervisor module of Fabric Switches (Cisco MDS 9100, Cisco MDS 9200, and Cisco MDS 9300 Series switches) is disruptive since there is no redundant supervisor to take over while the update is in progress. All traffic through the system is stopped while updating and the switch is power cycled after the upgrade has been completed. The update may take up to 30 minutes to complete. The following message is displayed:

Data traffic on the switch will be affected!!

The switch will reload after the upgrade process.

Do you want to continue (y/n) ?

For more information about upgrading supervisor modules in Director Switches, see Installing a Director Switch Supervisor Module EPLD Update.

Updating Supervisor EPLDs on a Fabric Switch

switch# install module 1 epld bootflash:m9000-pkg2-9.4.3.epld

Retrieving EPLD versions... Please wait.

Images will be upgraded according to following table:

Module Type EPLD          Running-Version New-Version Upg-Required

------ ---- ------------- --------------- ----------- ------------

1      SUP  IO SPI        0.034           1.003      Yes

1      SUP  IO SPI 2      0.005           1.002      Yes

Data traffic on the switch will be affected!!

The switch will reload after the upgrade process.

Do you want to continue (y/n) ? [n] y

Module 1 : IO SPI [Programming ] : 100.00% ( 12970 of 12970 total bytes)

Module 1 : IO SPI 2 [Programming ] : 100.00% ( 3137 of 3137 total bytes)

Waiting for Module to come online.

Module 1 EPLD upgrade is successful.

Reconfiguring Active Supervisor EPLDs.

The Supervisor will reset.

Module 1 : IO SPI 2 [Programming ] : 0.70% ( 22 of 3137 total bytes)

Module 1 EPLD upgrade is successful.

Installing a Fan Module EPLD Update

Use the install all epld <uri> parallel fan-module <slot> command to upgrade the EPLDs on the fan modules. The EPLD update for a fan module is nondisruptive and a power cycle is not required after the update.

Upgrading Fan Module EPLDs on a Cisco MDS 9700 Series Switch

switch# install all epld bootflash:m9000-pkg2.9.4.3.epld parallel fan-module 1

WARNING!!!: Executing the "install all epld" command

may result in multiple modules going offline and

affect redundant links.

It is strongly recommended to use one of the following

when EPLD upgrade is attempted on a system carrying

production traffic or Module EPLDs".

1) "install module <mod#> epld"

2) "install all epld <uri> parallel module <mod#>"

where <mod#> is on a single module

For EPLD upgrade best practices, please refer to the link-

http://www.cisco.com/en/US/docs/switches/datacenter/

sw/best_practices/cli_mgmt_guide/epld_upgrade.html

Do you want to continue (y/n) ? [n] y

Copy complete, now saving to disk (please wait)...

EPLD image signature verification passed

Retrieving EPLD versions... Please wait.

Images will be upgraded according to following table:

Module Type EPLD         Running-Version New-Version Upg-Required

------ ---- ------------- --------------- ----------- ------------

1 FAN Fan Controller (1) 0.002          0.006       Yes

1 FAN Fan Controller (2) 0.002          0.006       Yes

Programming Fan Module 1

Do you want to continue (y/n) ? [n] y

Fan 1 (1 of 2) : Fan Controller [Verifying ] : 100.00% ( 135658 of 135658 total bytes)

Fan 1 (2 of 2) : Fan Controller [Verifying ] : 100.00% ( 135658 of 135658 total bytes)

Waiting for Module to come online.

Fan Module 1 EPLD upgrade is successful.

Installing a Fabric Module EPLD Update

The Cisco MDS 9700 Series switches have dedicated fabric modules. These modules contain EPLDs, which can be upgraded as described in this section. All other Cisco MDS switches do not have these modules, so this process is not applicable to them.

For Cisco MDS 9700 Series switches, use the install all epld <uri> parallel xbar-module <slot> command to update the EPLDs on the fabric modules. This process power cycles the updated module. To ensure that the data traffic performance is not affected while the module is power cycled, check the fabric bandwidth utilization by using the show hardware fabric-utilization detail command. If there is adequate reserve fabric bandwidth available before the update starts, then the update will be nondisruptive.

Upgrading Fabric Module EPLDs for a Cisco MDS 9700 Series Switch

switch# install all epld bootflash:m9000-pkg2.9.4.3.epld parallel xbar-module 1

WARNING!!!: Executing the "install all epld" command

may result in multiple modules going offline and

affect redundant links.

It is strongly recommended to use one of the following

when EPLD upgrade is attempted on a system carrying

production traffic.

1) "install module <mod#> epld"

2) "install all epld <uri> parallel module <mod#>"

where <mod#> is on a single module

For EPLD upgrade best practices, please refer to the link-

http://www.cisco.com/en/US/docs/switches/datacenter/

sw/best_practices/cli_mgmt_guide/epld_upgrade.html

Do you want to continue (y/n) ? [n] y

Copy complete, now saving to disk (please wait)...

EPLD image signature verification passed

Compatibility check:

Module Type Upgradable Impact     Reason

------ ---- ---------- ---------- ------

1 Xbar Yes disruptive Module    Upgradable

Retrieving EPLD versions... Please wait.

Images will be upgraded according to following table:

Module Type EPLD          Running-Version New-Version Upg-Required

------ ---- ------------- --------------- ----------- ------------

1      Xbar Power Manager 1.003           1.004       Yes

The above modules require upgrade.

Do you want to continue (y/n) ? [n] y

Starting Xbar Module 1 EPLD Upgrade

Xbar Module 1 EPLD upgrade is successful.

EPLD Upgrade Completed.

Module Type Upgrade-Result

------ ---- --------------

1      Xbar  Success

EPLD Versions in Cisco MDS 9000 EPLD Bundle

Each EPLD bundle that you can download from http://www.cisco.com is a bundle of EPLD upgrades. The following table lists the EPLD versions for Cisco MDS 9000 series platforms for Cisco MDS NX-OS Release 9.4(3).

Module Type

EPLD Device

Model Number/Applicable Models

MDS 9000 Release

Fan

Fan Controller (1)

DS-C9718-FAN

0.006

Fan Controller (2)

Fan

Fan Controller (1)

DS-C9710-FAN

0.006

Fan Controller (2)

Fan

Fan Controller (1)

DS-C9706-FAN

0.006

Fan Controller (2)

Fabric Module 1

Power Manager

DS-X9718-FAB1

1.002

DS-X9710-FAB1

1.003

DS-X9706-FAB1

1.002

Fabric Module 3

Power Manager

DS-X9706-FAB-3

0.01

DS-X9710-FAB-3

0.008

DS-X9718-FAB-3

0.007

Supervisor Module 3

Power Manager SPI

DS-X97-SF1-K9

22

DS-X97-SF1E-K9

22

Supervisor Module 4

Power Manager SPI

DS-X97-SF4-K9

23

10-Gbps FCoE Module

Power Manager

DS-X9848-480K9

0.006

IO

DS-X9848-480K9

0.005

40-Gbps FCoE Module

Power Manager SPI

DS-X9824-960K9

1.005

IO SPI 2

DS-X9824-960K9

0.028

IO SPI

DS-X9824-960K9

0.031

16-Gbps Advanced Fibre Channel Module

Power Manager

DS-X9448-768K9

10.000

IO

DS-X9448-768K9

15.000

96-Port 2/4/8/16-Gbps Fabric Switch

IO SPI 2

DS-C9396S-K9

1.002

IO SPI

DS-C9396S-K9

1.003

48-Port 2/4/8/16-Gbps Fabric Switch

Power Manager

DS-C9148S-K9

0x1f

40-Port 2/4/8/16-Gbps Fabric Switch

Power Manager

DS-C9250I-K9

0x1a

DB Power Manager

DS-C9250I-K9

0x0b

32-Gbps Advanced Fibre Channel Module

Power Manager SPI

DS-X9648-1536K9

0.002

SFP SPI

DS-X9648-1536K9

0.005

IO SPI

DS-X9648-1536K9

2

24/10-Port SAN Extension Module

Power Manager SPI

DS-X9334-K9

1.001

IO SPI

DS-X9334-K9

2

32-Port 4/8/16/32-Gbps 1-RU Fabric Switch

IO SPI 2

DS-C9132T

0.024

MI IO SPI

DS-C9132T

0.017

LEM IO SPI

DS-C9132T

0.016

96-Port 4/8/16/32-Gbps 2-RU Fabric Switch

SFP SPI

DS-C9396T-K9

0.007

IO SPI 2

DS-C9396T-K9

0.013

MI IO SPI

DS-C9396T-K9

0.006

LEM-1 SPI

DS-C9396T-K9

0.016

LEM-2 SPI

DS-C9396T-K9

0.016

LEM-3 SPI

DS-C9396T-K9

0.016

48-Port 4/8/16/32-Gbps 1-RU Fabric Switch

SFP SPI

DS-C9148T-K9

0.007

IO SPI 2

DS-C9148T-K9

0.013

MI IO SPI

DS-C9148T-K9

0.006

24-Port 8/16/32/64-Gbps 1-RU Fabric Switch

MI IO SPI

DS-C9124V-K9-SUP

0.012

IO SPI 2

DS-C9124V-K9-SUP

0.014

48-Port 8/16/32/64-Gbps 1-RU Fabric Switch

MI IO SPI

DS-C9148V-K9-SUP

0.012

IO SPI 2

DS-C9148V-K9-SUP

0.014

4/8/16/32-Gbps 1-RU Fabric Switch

IO SPI 2

DS-C9220I-K9

0.024

MI IO SPI

DS-C9220I-K9

0.027

AKFPGA SPI

DS-C9220I-K9

1

64-Gbps Advanced Fibre Channel Module

SFP SPI

DS-X9748-3072K9

0.008

IO SPI

DS-X9748-3072K9

0.029

Legal Information

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2024 Cisco Systems, Inc. All rights reserved.

[1] Although the show version epld command displays Cisco MDS 9132T, MDS 9148T, and MDS 9396T platforms as supported in this bundle, they are not supported. Instead, they are supported in the m9000-pk3 bundle as indicated in this table.