Objective

This article explains how to configure ring patterns in regional voice parameters on the SPA 100 Series Analog Telephone Adapter. The distinctive ring determines the sound a phone will make when a certain ringer is chosen. This setting helps you customize ring tone patterns for different numbers and is useful for adjusting ring cadences.

Applicable Devices

• SPA112

• SPA122

Software Version

• 1.3.2-XU (014)

Distinctive Ring Patterns

Step 1. Log into the Phone Configuration Utility and choose Voice > User 1 or User 2. The User 1 page opens:

Note: The distinctive ring patterns configured on User 1 are similar to the configurations to be made on User 2.

Step 2. Enter a value for the Ring1 Cadence field. This is the cadence script for distinctive ring 1. The default is 60(2/4).

Step 3. Enter a value for the Ring2 Cadence field. This is the cadence script for distinctive ring 2. The default is 60(.8/.4,.8/4).

Step 4. Enter a value for the Ring3 Cadence field. This is the cadence script for distinctive ring 3. The default is 60(.4/.2,.4/.2,.8/4).

Step 5. Enter a value for the Ring4 Cadence field. This is the cadence script for distinctive ring 4. The default is 60(.3/.2,1/.2,.3/4).

Step 6. Enter a value for the Ring5 Cadence field. This is the cadence script for distinctive ring 5. The default is 1(.5/.5).

Step 7. Enter a value for the Ring6 Cadence field. This is the cadence script for distinctive ring 6. The default is 60(.2/.4,.2/.4,.2/4).

Step 8. Enter a value for the Ring7 Cadence field. This is the cadence script for distinctive ring 7. The default is 60(.4/.2,.4/.2,.4/4).

Step 9. Enter a value for the Ring8 Cadence field. This is the cadence script for distinctive ring 8. The default is 60(0.25/9.75).

Step 10. Click Submit to save the changes.