Objective

Distinctive ring settings help you customize ring tone patterns for different numbers. There are nine ring types to configure with distinctive ring patterns. These distinctive ring setups are used to distinguish different telephone numbers on the same phone line. This document outlines the procedures to set distinctive ring settings on a SPA8000.

Applicable Device

- SPA8000

Software Version

- 6.1.12

Distinctive Ring Settings

Step 1. Log in to the web configuration utility and choose Advanced > Voice > L1-L8. The Line page opens:

Note: There are 9 lines available for configuration. The user indicates which line needs to be configured for distinctive ring settings in Step 1 by the selection one of the desired line number.

Step 2. On the Line page, scroll down to the Distinctive Ring Settings section.

Step 3. Enter a caller number pattern to play Distinctive Ring/Call Waiting Tone (CWT) 1, 2, 3, 4, 5, 6, 7, 8, or 9 in the Ring(1-9) Caller field. It is blank by default.

Note: To modify the distinctive rings and CWT refer to the articles, Call Forward Settings on the SPA8000 Phone Adapter and Configure Ring Settings on the SPA8000 Phone Adapter.

Step 4. Click Submit All Changes.