Objectives

When a phone has been configured and some settings conflict or are too complex, the phone can be reset to its original settings.

This document explains how to reset the SPA504G to factory defaults.

Applicable Devices

• SPA500 Series

• SPA300 Series

Factory Reset

Step 1. Press the Setup button to open the Setup menu.

Step 2. Press 7 or navigate to Factory Reset.

Step 3. Press Ok to activate the factory reset and wait for the phone to finish reset.