Table of Contents

Sx200 Series

Sx220 Series

Sx250 Series

Sx300 Series

Sx350 Series

SG350X Series

Sx500 Series

Sx550X Series

Objective

The Simple Network Management Protocol (SNMP) is an Internet-standard protocol used to manage devices on IP networks. The SNMP messages are used to inspect and communicate information about managed objects. SNMP uses Management Information Bases (MIBs) to store available objects in a hierarchical or tree-structured namespace that contains object identifiers (OIDs). An OID identifies the information in the MIB hierarchy that can be read or set via SNMP.

SNMP Views are a subset of MIB objects that can be assigned to an SNMP access group to control write, read, and notification privileges of SNMP users over MIB object information. A view is a user-defined label for a collection of MIB subtrees. Each subtree ID is defined by the OID of the root of the relevant subtrees. Either well-known names can be used to specify the root of the desired subtree or an OID can be entered.

This article provides the list of model object identifiers of all Cisco Small Business Switches.

Applicable Devices

- Sx200 Series

- Sx220 Series

- Sx250 Series

- Sx300 Series

- Sx350 Series

- SG350X Series

- Sx500 Series

- Sx550X Series

Software Version

- 1.1.1.2 — Sx220

- 1.4.7.05 — Sx200, Sx300, Sx500

- 2.2.8.04 — Sx250, Sx350, SG350X, Sx550X

Cisco Small Business Switches Model OIDs

The following are the OIDs for the Cisco Small Business Switches.

- Sx200 Series

- Sx220 Series

- Sx250 Series

- Sx300 Series

- Sx350 Series

- SG350X Series

- Sx500 Series

- Sx550X Series

Note: The private Object IDs are placed under: enterprises(1).cisco(9).otherEnterprises(6).ciscosb(1).switch001(101).

Sx200 Series Switches

Model Name

Description

Object ID

SG200-18

16 GE ports + 2 GE special-purpose combo ports

9.6.1.88.18.1

SG200-26

24 GE ports + 2 GE special-purpose combo-ports

9.6.1.88.26.1

SG200-26P

24 GE ports + 2 GE special-purpose combo-ports

9.6.1.88.26.2

SG200-50

48 GE ports + 2 GE special-purpose combo-ports

9.6.1.88.50.1

SG200-50P

48 GE ports + 2 GE special-purpose combo-ports

9.6.1.88.50.2

SF200-24

24 FE ports + 2 GE special-purpose combo-ports

9.6.1.87.24.1

SF200-24P

24 FE ports + 2 GE special-purpose combo-ports

9.6.1.87.24.2

SF200-48

48 FE ports + 2 GE special-purpose combo-ports

9.6.1.87.48.1

SF200-48P

FE1-FE48, GE1-GE4. 48 FE ports + 2 GE special-purpose combo-ports

9.6.1.87.48.2

SG200-10FP

10-Port Gigabit PoE Smart Switch

9.6.1.88.10.3

SF200-24FP

24-Port 10/100 PoE Smart Switch

9.6.1.88.24.3

SG200-26FP

26-Port Gigabit PoE Smart Switch

9.6.1.88.26.3

SG200-50FP

50-Port Gigabit PoE Smart Switch

9.6.1.88.50.3

Sx220 Series Switches

Model Name

Description

Object ID

SF220-24

SF220-24 24-Port 10 100 Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.24.1

SF220-24P

SF220-24P 24-Port 10 100 PoE Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.24.2

SF220-48

SF220-48 48-Port 10 100 Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.48.1

SF220-48P

SF220-48P 48-Port 10 100 PoE Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.48.2

SG220-26

SG220-26 26-Port Gigabit Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.26.1

SG220-26P

SG220-26P 26-Port Gigabit PoE Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.26.2

SG220-50

SG220-50 50-Port Gigabit Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.50.1

SG220-50P

SG220-50P 50-Port Gigabit PoE Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.50.2

SG220-28

SG220-28 28-Port Gigabit Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.28.5

SG220-28MP

SG220-28MP 28-Port Gigabit PoE Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.28.3

SG220-52

SG220-52 52-Port Gigabit Smart Plus Switch

1.3.6.1.4.1.9.6.1.84.52.5

Sx250 Series Switches

Model Name

Description

Object ID

SF250-48

SF250-48 48-Port 10/100 Smart Switch

9.6.1.98.24.1

SF250-48HP

SF250-48HP 48-Port 10/100 PoE Smart Switch

9.6.1.98.24.4

SG250-10P

SG250-10P 8-Port Gigabit PoE Smart Switch

9.6.1.97.10.5

SG250-26

SG250-26 26-Port Gigabit Smart Switch

9.6.1.97.26.1

SG250-26HP

SG250-26HP 26-Port Gigabit PoE Smart Switch

9.6.1.97.26.4

SG250-26P

SG250-26P 26-Port Gigabit PoE Smart Switch

9.6.1.97.26.5

Sx300 Series Switches

Model Name

Description

Object ID

SG300-10

8 GE ports, and 2 special-purpose combo ports (GE/SFP)

9.6.1.83.10.1

SG300-10MP

8 GE ports, and 2 special-purpose combo ports (GE/SFP)

9.6.1.83.10.3

SG300-10P

8 GE ports, and 2 special-purpose combo ports (GE/SFP)

9.6.1.83.10.2

SG300-20

16 GE ports, and 4 special purpose ports - 2 uplinks and 2 combo ports

9.6.1.83.20.1

SG300-28

24 GE ports, and 4 special-purpose ports - 2 uplinks and 2 combo-ports

9.6.1.83.28.1

SG300-28P

24 GE ports, and 4 special-purpose ports - 2 uplinks and 2 combo-ports.

9.6.1.83.28.2

SG300-52

48 GE ports, and 4 special-purpose ports - 2 uplinks and 2 combo-ports

9.6.1.83.52.1

SF300-08

8 FE ports.

9.6.1.82.08.4

SF302-08

8 FE ports plus 2 GE ports

9.6.1.82.08.1

SF302-08MP

8 FE ports plus 2 GE ports

9.6.1.82.08.3

SF302-08P

8 FE ports plus 2 GE ports

9.6.1.82.08.2

SF300-24

24 FE ports plus 4 GE special-purpose ports - 2 uplinks and 2 combo-ports.

9.6.1.82.24.1

SF300-24P

24 FE ports plus 4 GE special-purpose ports - 2 uplinks and 2 combo-ports.

9.6.1.82.24.2

SF300-48

48 FE ports plus 4 GE special-purpose ports - 2 uplinks and 2 combo-ports

9.6.1.82.48.1

SF300-48P

48 FE ports plus 4 GE special-purpose ports - 2 uplinks and 2 combo-ports

9.6.1.82.48.2

SG300-52P

52-Port Gigabit PoE Managed Switch

9.6.1.83.52.2

SG300-52MP

52-Port Gigabit PoE Managed Switch

9.6.1.83.52.3

SG300-10SFP

10-Port Gigabit Managed SFP Switch

9.6.1.83.10.5

ESW2-350G- 52

52-Port Gigabit Managed Switch

9.6.1.86.52.1

ESW2-350G- 52DC

52-Port Gigabit Managed Switch

9.6.1.86.52.6

SF300-24MP

24-Port 10/100 PoE Managed Switch

9.6.1.82.24.3

SG300-28MP

28-Port Gigabit PoE Managed Switch

9.6.1.83.28.3

SF302-08P

8 FE ports plus 2 GE ports

9.6.1.82.08.2

SF302-08PP

8-Port 10/100 PoE Managed Switch

9.6.1.82.08.2

SF302-08MPP

8-Port 10/100 PoE Managed Switch

9.6.1.82.08.3

SG300-10PP

8-Port 10/100 PoE Managed Switch

9.6.1.83.10.2

SF300-24PP

8-Port 10/100 PoE Managed Switch

9.6.1.82.24.1

SG300-28PP

10-Port Gigabit PoE Managed Switch

9.6.1.83.28.2

SF300-24PP

24-Port 10/100 PoE Managed Switch

9.6.1.82.24.1

SG300-28PP

28-Port Gigabit PoE Managed Switch

9.6.1.83.28.2

SF300-48PP

48-Port 10/100 PoE Managed Switch

9.6.1.82.48.2

SG300-28SFP

28-Port Gigabit Managed SFP Switch

9.6.1.83.28.5

Sx350 Series Switches

Model Name

Description

Object ID

SF350-48

SF350-48 48-Port 10/100 Managed Switch

9.6.1.96.48.1

SF350-48P

SF350-48P 48-Port 10/100 PoE Managed Switch

9.6.1.96.48.5

SF350-48MP

SF350-48MP 48-Port 10/100 PoE Managed Switch

9.6.1.96.48.6

SG350XG-24F

SG350XG-24F 24-Port 10G SFP+ Stackable Managed Switch

9.6.1.91.24.8

SG350XG-24T

SG350XG-24T 24-Port 10GBase-T Stackable Managed Switch

9.6.1.91.24.9

SG350XG-48T

SG350XG-48T 48-Port 10Gbase-T Stackable Managed Switch

9.6.1.91.48.9

SG350XG-2F10

SG350XG-2F10 12-Port 10G Stackable Managed Switch

9.6.1.91.12.9

SG350-10

SG350-10 10-Port Gigabit Managed Switch

9.6.1.95.10.3

SG350-10P

SG350-10P 10-Port Gigabit PoE Managed Switch

9.6.1.95.10.5

SG355-10P

SG355-10P 10-Port Gigabit PoE Managed Switch

9.6.1.95.10.10

SG350-10MP

SG350-10MP 10-Port Gigabit PoE Managed Switch

9.6.1.95.10.6

SG350-28

SG350-28 28-Port Gigabit Managed Switch

9.6.1.95.28.1

SG350-28P

SG350-28P 28-Port Gigabit PoE Managed Switch

9.6.1.95.28.5

SG350-28MP

SG350-28MP 28-Port Gigabit PoE Managed Switch

9.6.1.95.28.6

SG350X Series Switches

Model Name

Description

Object ID

SG350X-24

24-Port Gigabit Stackable Managed Switch

9.6.1.94.24.1

SG350X-24P

24-Port Gigabit PoE Stackable Managed Switch

9.6.1.94.24.5

SG350X-24MP

24-Port Gigabit PoE Stackable Managed Switch

9.6.1.94.24.6

SG350X-48

48-Port Gigabit Stackable Managed Switch

9.6.1.94.48.1

SG350X-48P

48-Port Gigabit PoE Stackable Managed Switch

9.6.1.94.48.5

SG350X-48MP

48-Port Gigabit PoE Stackable Managed Switch

9.6.1.94.48.6

Sx500 Series Switches

Model Name

Description

Object ID

SF500-24

24-Port 10/ 100 Stackable Managed Switch

9.6.1.80.24.1

SF500-24P

24-Port 10/ 100 PoE Stackable Managed Switch

9.6.1.80.24.2

SF500-48

48-Port 10/ 100 Stackable Managed Switch

9.6.1.80.48.1

SF500-48P

48-Port 10/ 100 PoE Stackable Managed Switch

9.6.1.80.48.2

SG500-28

28-Port Gigabit Stackable Managed Switch

9.6.1.81.28.1

SG500-28P

28-Port Gigabit PoE Stackable Managed Switch

9.6.1.81.28.2

SG500-52

52-Port Gigabit Stackable Managed Switch

9.6.1.81.52.1

SG500-52P

52-Port Gigabit PoE Stackable Managed Switch

9.6.1.81.52.2

SG500X-24

24-Port Gigabit with 4-Port 10-Gigabit Stackable Managed Switch

9.6.1.85.24.1

SG500X 24P

24-Port Gigabit with 4-Port 10-Gigabit PoE Stackable Managed Switch

9.6.1.85.24.2

SG500X-48

48-Port Gigabit with 4-Port 10-Gigabit Stackable Managed Switch

9.6.1.85.48.1

SG500X-48P

48-Port Gigabit with 4-Port 10-Gigabit PoE Stackable Managed Switch

9.6.1.85.48.2

ESW2-550X- 48

48-Port Gigabit with 4-Port 10-Gigabit Stackable Managed Switch

9.6.1.86.48.1

ESW2-550X- 48DC

48-Port Gigabit with 4-Port 10-Gigabit Stackable Managed Switch

9.6.1.86.48.6

SG500-52MP

52-Port Gigabit Max-PoE Managed Switch

9.6.1.81.5.3.0

ESW2-550X- 48DC

48-Port Gigabit with 4-Port 10-Gigabit Stackable Managed Switch

9.6.1.86.48.6

Sx550X Series Switches

Model Name

Description

Object ID

SF550X-24

24-Port 10/100 Stackable Managed Switch

9.6.1.92.24.1

SF550X-24P

24-Port 10/100 PoE Stackable Managed Switch

9.6.1.92.24.5

SF550X-24MP

24-Port 10/100 PoE Stackable Managed Switch

9.6.1.92.24.6

SF550X-48

48-Port 10/100 Stackable Managed Switch

9.6.1.92.48.1

SF550X-48P

48-Port 10/100 PoE Stackable Managed Switch

9.6.1.92.48.5

SF550X-48MP

48-Port 10/100 PoE Stackable Managed Switch

9.6.1.92.48.6

SG550XG-8F8T

SG550XG-8F8T 16-Port 10G Stackable Managed Switch

9.6.1.90.16.9

SG550XG-24T

SG550XG-24T 24-Port 10GBase-T Stackable Managed Switch

9.6.1.90.24.9

SG550XG-24F

24-port SFP+ Ten Gigabit Stackable Switch (2 combo) with RPS support

9.6.1.90.24.8

SG550XG-48T

SG550XG-48T 48-Port 10GBase-T Stackable Managed Switch

9.6.1.90.48.9