Date Identified

May 23, 2017

Date Resolved

N/A

Product Affected

Model

Firmware Version

SG350XG

2.2.0.x

Problem Description

When defining a time range for a Power over Ethernet (PoE) operation and the time range does not include the hour (00:00) as the active time, the PoE consumption values for hours, days, and weeks show 0 even when there is a consumption during the displayed period. The time in minutes display correct values.

Current Status

There is no known workaround.