Introduction

This article aims to provide a "back of the box" style product specifications about the RV345 Dual-WAN VPN Router. For a more in depth look, click here to view the RV34X series consolidated Data Sheet.

The RV345 Dual-WAN VPN Router, part of the RV34x Series, is an easy-to-use, flexible, high-performance, and durable which makes this well suited for small businesses. Now with several added security features such as Web Filtering, Application Control, and IP Source Guard, the new RV345 deliver highly secure, broadband, wired connectivity to small offices and remote employees. These new security features also provide the ease of fine-tuning permitted activity on the network.

Note: To view a "what's in the box?" style article about the RV345 Dual-WAN VPN Router, click here.

Product Specifications

Specifications

Description

Standards

IEEE, 802.3, 802.3u, 802.1Q (VLAN), 802.11e (wireless QoS), Routing Information Protocol (RIP) v1 (RFC 1058), RIP v2 (RFC 1723), IPv4 (RFC 791), IPv6 (RFC 2460)

Operating System

Linux

Cabling Type

Category 5e or better

Ports

LAN, WAN, USB, Console

Physical Interfaces

Specifications

Description

Ports

16 10/100/1000 Ethernet, with support for 802.3af

1 Console port

12V DC 2.5 A power adapter port

2 WAN

2 USB ports

Buttons

Reset button

Switch

Power switch

Lock Slot

Slot for Kensington lock

Mounting and Physical Security

Mounting Options

2 rack-mount brackets are provided including 8 screws.

Physical Specifications

Physical dimensions

(W x D x H)

280 x 44 x 170 mm (11 x 1.75 x 6.75 in)

Weight

1.2 kg (2.5 lb)

Network Capabilities

Specifications

Specifications

VLAN Support

Yes

Network Protocols

Dynamic Host Configuration Protocol (DHCP) server

Point-to-Point Protocol over Ethernet (PPPoE)

Point-to-Point Tunneling Protocol (PPTP)

DNS proxy

Internet Group Management Protocol (IGMP) proxy and multicast forwarding

Dynamic Domain Name System (DynDNS), No Internet Protocol (NOIP)

Network Address Translation (NAT), Port Address Translation (PAT)

One-to-one NAT

Port management

Port mirroring

Bonjour

Number of VLANs

1 active VLAN (2-4096 range)

Routing Protocols

Static routing

Dynamic routing

RIP v1 and v2

Inter-VLAN routing

Network Address Translation (NAT)

PAT, Network Address Port Translation (NAPT) protocol

Network edge (DMZ)

Software-configurable to any LAN IP address

Load balancing

Yes

Quality of Service (QoS)

WAN Queuing

3 queues

Differentiated Services Code Point Support (DSCP)

Class of Service (CoS)

Bandwidth Management for service prioritization

IPv6

Dual-stack IPv4 and IPv6

6to4 tunneling

Stateless address auto-configuration

DHCPv6 Server for IPv6 Clients on LAN

DHCPv6 client for WAN connectivity

Internet Control Message Protocol (ICMP) v6

Static IPv6 Routing

Dynamic IPv6 Routing with RIPng

IPv6 host support

IPv6 RADIUS

Network Time Protocol (NTP)

Layer 2

802.1Q-based VLANs for 5 active VLANs

Security

Specifications

Description

Access control

Yes, management access control list (ACL) plus MAC ACL

Secure management

HTTPS, username/password complexity

Firewall

Stateful Packet Inspection (SPI) firewall, port forwarding and triggering, Denial-of-Service (DoS) prevention, software-based DMZ

DoS attacks prevented:

- SYN Flood

- Echo Storm

- ICMP Flood

- UDP Flood

- TCP Flood

Blocks Java, cookies, active-X, HTTP proxy

Web Filter

Filters malicious and blocks harmful websites

Content Filter

Static URL blocking or keyword blocking

Application Control

Yes

IP Source Guard

Bind IP addresses to MAC addresses

VPN

IPSec

Yes; 50 tunnels maximum

Client-to-Site

Yes

Teleworker VPN Client

Yes

PPTP Server

Yes; 25 maximum tunnels

L2TP Server

Yes; 25 maximum tunnels

SSL VPN

Yes; 50 maximum tunnels

VPN throughput (IPsec)

50 Mbps

Configuration

Specifications

Description

Web-based utility

Simple, browser-based configuration (HTTP, HTTPS)

Command-line interface (CLI)

Command line using SSH

Management protocols

Web browser, Simple Network Management Protocol (SNMP) v3, Bonjour, Universal Plug and Play (UPnP)

Remote management

Yes

Event logging

Local, remote syslog, email alerts

Network diagnostics

Logging, Ping, Traceroute, DNS lookup, and Port Mirror

Web firmware upgrade

Firmware upgradable through web browser, imported and exported configuration file

Dynamic Host Configuration Protocol (DHCP)

DHCP Client

Pv6 host

Yes

HTTP redirect

Yes

System time

Supports NTP, daylight savings manual entry

Languages

GUI support English

Environmental

Specifications

Description

Power

12V 2.5 A

Certifications

FCC, CE, IC, Wi-Fi

Operating temperature

0° to 40°C (32° to 104°F)

Storage temperature

-20° to 70°C (-4° to 158°F)

Operating humidity

10% to 85% non-condensing

View a video related to this article...

Click here to view other Tech Talks from Cisco