Table of Contents

VMware Fusion

VMware vSphere Client

VMware Workstation Pro

Configure the Deployed FindIT Network Manager

Configure the Deployed FindIT Network Probe

Back to Top

Objective

The Cisco FindIT Network Management provides tools that help you easily monitor, manage, and configure your Cisco 100 to 500 Series network devices such as switches, routers, and wireless access points (WAPs) using your web browser. It also notifies you about device and Cisco Support notifications such as the availability of new firmware, device status, network settings updates, and any connected devices that are no longer under warranty or covered by a support contract.

The FindIT Network Management is a distributed application which is comprised of two separate components or interfaces: one or more Probes referred to as FindIT Network Probe and a single Manager called FindIT Network Manager.

An instance of FindIT Network Probe installed at each site in the network performs network discovery and communicates directly with each Cisco device. In a single site network, you may choose to run a standalone instance of FindIT Network Probe. However, if your network comprises multiple sites, you may install FindIT Network Manager at a convenient location and associate each Probe with the Manager. From the Manager interface, you can get a high-level view of the status of all the sites in your network, and connect to the Probe installed at a particular site when you wish to view detailed information for that site.

This article provides instructions on how to install and configure FindIT Network Manager and FindIT Network Probe using a VMware virtual machine (VM).

Note: If you prefer to install and configure FindIT Network Manager and Probe on a different platform, click here for Oracle VM VirtualBox Manager, or click here for Microsoft Hyper-V Manager.

Install FindIT Network Manager on VMware

For the FindIT Network Manager, an Open Virtual Appliance (OVA) format VM image can be deployed to VMware products.

Install FindIT Network Manager using any of the available virtual machines below and then configure its deployment:

VMware Fusion

VMware vSphere Client

VMware Workstation Pro

Configure the Deployed FindIT Network Manager

Install FindIT Network Probe using any of the available virtual machines:

VMware Fusion

VMware vSphere Client

VMware Workstation Pro

Configure the Deployed FindIT Network Probe

Install FindIT Network Manager using VMware Fusion

Follow these steps to deploy the OVA VM image to VMware Fusion.

Step 1. Download the FindIT Network Manager OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware Fusion application on your server or computer.

Note: In this example, Mac OS X El Capitan is used.

Step 3. Click Import an existing virtual machine, then click Continue.

Note: Alternatively, you can click the Add button then click Import.

Step 4. Click Choose File.

Step 5. Click the downloaded OVA image in Step 1, then click Open.

Step 6. Click Continue.

Step 7. (Optional) Enter a name for the FindIT Network Manager.

Note: In this example, FindIT Network Manager.wmwarevm is used.

Step 8. Click Save.

Step 9. Review the Virtual Machine Summary then click Finish.

Step 10. Once the deployed VM appears, click the Play button.

Note: Once the VMware has completed the deployment, the FindIT Network Manager will be displayed in the Virtual Machine Library under VIRTUAL MACHINES.

Step 11. Proceed to the Configure the Deployed FindIT Network Manager section to configure the deployed appliance.

[Back to Top]

Install FindIT Network Manager using VMware vSphere Client

Follow these steps to deploy the OVA VM image to VMware vSphere Client.

Important: Before proceeding with the installation steps, make sure you have the following:

- vCenter or ESXi server credentials:

– Name or IP address

– User name

– Password

- Pre-configured datastore in the server

- Pre-configured VM Network

Step 1. Download the FindIT Network Manager OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware vSphere Client on your server or computer.

Note: In this example, Windows 2012 Server R2 operating system is used.

Step 3. Enter the vCenter or ESXi server name or IP address in the IP address / Name field.

Note: In this example, the ESXi server IP address of 10.2.0.10 is used.

Step 4. Enter the user name and password of the server in the User name and Password fields.

Step 5. Click Login.

Step 6. (Optional) If a datastore has not been created in the server, add a new storage in the Configuration tab.

Step 7. Click File > Deploy OVF Template.

Step 8. Click Browse.

Step 9. Click the downloaded OVA image in Step 1, then click Open.

Step 10. Click Next to continue.

Step 11. Click Next.

Step 12. Enter a name for the FindIT Network Manager in the Name field, then click Next.

Note: In this example, FindIT Network Manager is used.

Step 13. Choose a destination storage for the FindIT Network Manager VM, then click Next.

Note: In this example, Virtual Machine DataStore is chosen.

Step 14. Click a storage provision then click Next.

The options are:

- Thick Provision Lazy Zeroed — This option creates a virtual disk in a default thick format.

- Thick Provision Eager Zeroed — This creates a type of thick virtual disk that supports clustering features.

- Thin Provision — You can use this format to save storage space.

Note: In this example, Thick Provision Lazy Zeroed is chosen.

Step 15. Choose a network then click Next.

Note: In this example, VM Network is used.

Step 16. Review the configured settings.

Step 17. (Optional) Check the Power on after deployment check box to launch the VM after deployment.

Step 18. Click Finish to complete the installation.

Step 19. Once deployment has been completed, click Close.

Step 20. Click the deployed VM then click Power on the virtual machine.

Note: Alternatively, you can click the Play button to power on the VM.

Step 21. (Optional) To access the console, right-click on the FindIT Network Manager VM then choose Open Console.

Step 22. Proceed to the Configure the Deployed FindIT Network Manager section to configure the deployed appliance.

[Back to Top]

Install FindIT Network Manager using VMware Workstation Pro

Follow these steps to deploy the OVA VM image to VMware Workstation Pro.

Step 1. Download the FindIT Network Manager OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware Workstation Pro application on your server or computer.

Note: In this example, Windows 8 operating system is used.

Step 3. Click Open a Virtual Machine from the Home tab.

Step 4. Click the downloaded OVA image in Step 1, then click Open.

Step 5. (Optional) Enter a name for the FindIT Network Manager.

Note: In this example, FindIT Network Manager is used.

Step 6. Click Import.

Note: Once the VMware has completed the deployment, the FindIT Network Manager will be displayed in the Library under My Computer.

Step 7. On the left panel, click the deployed FindIT Network Manager appliance.

Step 8. Click Power on this virtual machineo access the console of the VM.

Step 9. Proceed to the Configure the Deployed FindIT Network Manager section to configure the deployed appliance.

[Back to Top]

Configure the Deployed FindIT Network Manager

Once deployment of the FindIT Network Manager is completed using your preferred virtual machine, follow the steps below to configure the VM.

Step 1. Access the console of the FindIT Network Manager VM.

Step 2. Log in to the console using the default username and password: cisco/cisco.

Step 3. Once you are prompted to change the password for the cisco account, enter the current password.

Step 4. Enter and retype the new password for the cisco account.

The DHCP IP Address and Administration GUI address will be displayed.

Note: In this example, the IP Address of FindIT Network Manager is 192.168.1.101 and the Administration GUI address is https://192.168.1.101.

Step 5. Enter the sudo config_vm command to start the initial setup wizard.

Step 6. Enter the password for sudo. The default password is cisco. If you changed it, enter the new password.

Step 7. Enter y for Yes or n for No in the setup wizard to configure the Hostname, Network, NTP server, and Time Zone.

Step 8. (Optional) If DHCP is specified when configuring network, enter the ifconfig command to check the assigned IP address and remember it. A static IP can also be configured.

You should now have completed the FindIT Network Manager installation on your VM.

To learn how to access and configure the initial settings of the FindIT Network Manager, click here for instructions.

[Back to Top]

Install FindIT Network Probe

Install FindIT Network Probe using VMware Fusion

Follow these steps to deploy the OVA VM image to VMware Fusion.

Step 1. Download the FindIT Network Probe OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware Fusion application on your server or computer.

Note: In this example, Mac OS X El Capitan is used.

Step 3. Click the Add button then click Import.

Step 4. Click Choose File.

Step 5. Click the downloaded OVA image in Step 1, then click Open.

Step 6. Click Continue.

Step 7. (Optional) Enter a name for the FindIT Network Probe.

Note: In this example, FindIT Network Probe.wmwarevm is used.

Step 8. Click Save.

Step 9. Review the Virtual Machine Summary then click Finish. The deployed VM will automatically start.

Note: Once the VMware has completed the deployment, the FindIT Network Probe will be displayed in the Virtual Machine Library under VIRTUAL MACHINES.

Step 9. Proceed to the Configure the Deployed FindIT Network Probe section to configure the deployed appliance.

[Back to Top]

Install FindIT Network Probe using VMware vSphere Client

Follow these steps to deploy the OVA VM image to VMware vSphere Client.

Important: Before proceeding with the installation steps, make sure you have the following:

- vCenter or ESXi server credentials:

– Name or IP address

– User name

– Password

- Pre-configured datastore in the server

- Pre-configured VM Network

Step 1. Download the FindIT Network Probe OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware vSphere Client on your server or computer.

Note: In this example, Windows 2012 Server R2 operating system is used.

Step 3. Enter the vCenter or ESXi server name or IP address in the IP address / Name field.

Note: In this example, the ESXi server IP address 10.2.0.10 is used.

Step 4. Enter the user name and password of the server in the User name and Password fields.

Step 5. Click Login.

Step 6. (Optional) If a datastore has not been created in the server, add a new storage in the Configuration tab.

Step 7. Click File > Deploy OVF Template.

Step 8. Click Browse.

Step 9. Click the downloaded OVA image in Step 1, then click Open.

Step 10. Click Next to continue.

Step 11. Click Next again.

Step 12. Enter a name for the FindIT Network Probe in the Name field, then click Next.

Note: In this example, FindIT Network Probe is used.

Step 13. Choose a destination storage for the FindIT Network Probe VM, then click Next.

Note: In this example, Virtual Machine DataStore is chosen.

Step 14. Click a storage provision then click Next.

The options are:

- Thick Provision Lazy Zeroed — This option creates a virtual disk in a default thick format.

- Thick Provision Eager Zeroed — This creates a type of thick virtual disk that supports clustering features.

- Thin Provision — You can use this format to save storage space.

Note: In this example, Thick Provision Lazy Zeroed is chosen.

Step 15. Choose a network then click Next.

Note: In this example, VM Network is chosen.

Step 16. Review the configured settings.

Step 17. (Optional) Check the Power on after deployment check box to launch the VM after deployment.

Step 18. Click Finish to complete the deployment.

Step 19. Once deployment has been completed, click Close.

Step 20. Click the deployed VM then click Power on the virtual machine.

Note: Alternatively, you can click the Play button to power on the VM.

Step 21. (Optional) To access the console, right-click on the FindIT Network Probe VM, then choose Open Console.

Step 22. Proceed to the Configure the Deployed FindIT Network Probe section to configure the deployed appliance.

[Back to Top]

Install FindIT Network Probe using VMware Workstation Pro

Follow these steps to deploy the OVA VM image to VMware Workstation Pro.

Step 1. Download the FindIT Network Probe OVA VM image from the Cisco Small Business Site.

Step 2. Launch the VMware Workstation Pro application on your server or computer.

Note: In this example, Windows 8 operating system is used.

Step 3. Click Open a Virtual Machine from the Home tab.

Step 4. Click the downloaded OVA image in Step 1, then click Open.

Step 5. (Optional) Enter a name for the FindIT Network Probe.

Note: In this example, FindIT Network Probe is used.

Step 6. Click Import.

Note: Once the VMware has completed the deployment, the FindIT Network Probe will be displayed in the Library under My Computer.

Step 7. On the left panel, click to choose the deployed FindIT Network Probe appliance.

Step 8. Click Power on this virtual machine to access the console of the VM.

Step 9. Proceed to the Configure the Deployed FindIT Network Probe section to configure the deployed appliance.

[Back to Top]

Configure the Deployed FindIT Network Probe

Once deployment is finished, follow the steps below to configure the VM.

Step 1. Access the console of the FindIT Network Probe VM.

Step 2. Log in to the console using the default username and password: cisco/cisco.

You will be prompted to change the password for the cisco account. The DHCP IP Address and Administration GUI address will be displayed.

Note: In this example, the IP Address of FindIT Network Probe is 192.168.1.102 and the Administration GUI address is https://192.168.1.102.

Step 3. Enter and retype the new password for the cisco account.

Step 4. (Optional) Enter the ifconfig command to find the IP address of FindIT Network Probe.

You should now have configured FindIT Network Probe on your machine.

[Back to Top]

To learn how to access and configure the initial settings of the FindIT Network Probe, click here for instructions. To learn how to associate the FindIT Network Probe to the FindIT Network Manager, click here for instructions.