Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Theory

PVLAN Implementation in UCS

Goal

Configure

Network Diagrams

PVLAN on vSwitch: Isolated PVLAN with Promiscuous Port on an Upstream Device

Configuration in UCS

Configuration of Upstream Devices

Troubleshooting

Isolated PVLAN on N1K with Promiscuous Port on an Upstream Device

Configuration in UCS

Configuration of Upstream Devices

Configuration of N1K

Troubleshooting

Isolated PVLAN on N1K with Promiscuous Port on the N1K Uplink Port-Profile

Configuration in UCS

Configuration of Upstream Devices

Configuration of N1K

Troubleshooting

Community PVLAN on N1K with Promiscuous Port on the N1K Uplink Port-Profile

Troubleshooting

Isolated PVLAN and Community PVLAN on VMware DVS Promiscuous Port on the DVS

Verify

Troubleshoot

Introduction

This document describes private VLAN (PVLAN) support in the Cisco Unified Computing System (UCS), a feature introduced in Release 1.4 of the Cisco UCS Manager (UCSM). It also details the features, the caveats, and the configuration when PVLANs are used in a UCS environment.

THIS DOCUMENT IS FOR USE WITH UCSM VERSION 2.2(2C) AND EARLIER VERSIONS. In versions later than Version 2.2(2C), changes have been made to UCSM and ESXi DVS is supported. There are also changes in how tagging works for the PVLAN NIC.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- UCS

- Cisco Nexus 1000 V (N1K)

- VMware

- Layer 2 (L2) switching

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Background Information

Theory

A private VLAN is a VLAN configured for L2 isolation from other ports within the same private VLAN. Ports that belong to a PVLAN are associated with a common set of support VLANs, which are used in order to create the PVLAN structure.

There are three types of PVLAN ports:

- A promiscuous port communicates with all other PVLAN ports and is the port used in order to communicate with devices outside of the PVLAN.

- An isolated port has complete L2 separation (including broadcasts) from other ports within the same PVLAN with the exception of the promiscuous port.

- A community port can communicate with other ports in the same PVLAN as well as the promiscuous port. Community ports are isolated at L2 from ports in other communities or isolated PVLAN ports. Broadcasts are only propagated to other ports in the community and the promiscuous port.

Refer to RFC 5517, Cisco Systems' Private VLANs: Scalable Security in a Multi-Client Environment  in order to understand the theory, operation, and concepts of PVLANs.

PVLAN Implementation in UCS

UCS closely resembles the Nexus 5000/2000 architecture, where the Nexus 5000 is analogous to the UCS 6100 and the Nexus 2000 to the UCS 2104 Fabric Extenders.

Many limitations of PVLAN functionality in UCS are caused by the limitations found in the Nexus 5000/2000 implementation.

Important points to remember are:

- Only isolated ports are supported in UCS. With the N1K incorporated, you can use community VLANs, but the promiscuous port must be on the N1K as well.

- There is no support for promiscuous ports/trunks, community ports/trunks, or isolated trunks.

- Promiscuous ports need to be outside the UCS domain, such as an upstream switch/router or a downstream N1K.

Goal

This document covers several different configurations available for PVLAN with UCS:

1. Isolated PVLAN with promiscuous port on an upstream device.

2. Isolated PVLAN on N1K with promiscuous port on an upstream device.

3. Isolated PVLAN on N1K with promiscuous port on the N1K uplink port-profile

4. Community PVLAN on N1K with promiscuous port on the N1K uplink port-profile.

5. Isolated PVLAN on VMware Distributed Virtual Switch (DVS) promiscuous port on the DVS.

6. Community PVLAN on VMware DVS switch promiscuous port on the DVS.

Configure

Network Diagrams

The topology for all examples with a distributed switch is:

The topology for all examples with no distributed switch is:

PVLAN on vSwitch: Isolated PVLAN with Promiscuous Port on an Upstream Device

In this configuration, you are passing PVLAN traffic through UCS to a promiscuous port that is upstream. Because you cannot send both primary and secondary VLANs on the same vNIC, you need one vNIC for each blade for each PVLAN, in order to carry the PVLAN traffic.

Configuration in UCS

This procedure describes how to create both the primary and any isolated VLANS.

Note: This example uses 266 as the primary and 166 as the isolated; the VLAN IDs will be determined by the site.

1. In order to create the primary VLAN, click Primary as the Sharing Type, and enter a VLAN ID of 266:

2. In order to create the isolated VLAN, click Isolated as the Sharing Type, enter a VLAN ID of 166, and choose VLAN 266 (266) as the Primary VLAN:

3. In order to add the VLAN to the vNIC, click the Select checkbox for VLAN 166, and click the associated Native VLAN radio button.

Only the isolated VLAN is added, it must be set as primary, and there can only be one for each vNIC. Because the Native VLAN is defined here, do not configure VLAN tagging on the VMware port groups.

Configuration of Upstream Devices

These procedures describe how to configure a Nexus 5K to pass the PVLAN through to an upstream 4900 switch where the promiscuous port is. While this might not be necessary in all environments, use this configuration in the event that you must pass the PVLAN through another switch.

On the Nexus 5K, enter these commands, and check uplink configuration:

1. Turn on the PVLAN feature:

Nexus5000-5(config)# feature private-vlan

2. Add the VLANs as primary and isolated:

Nexus5000-5(config)# vlan 166

Nexus5000-5(config-vlan)# private-vlan isolated

Nexus5000-5(config-vlan)# vlan 266

Nexus5000-5(config-vlan)# private-vlan primary

3. Associate VLAN 266 with the isolated VLAN 166:

Nexus5000-5(config-vlan)# private-vlan association 166

4. Make sure that all uplinks are configured in order to trunk the VLANs:

1. interface Ethernet1/1

2. description Connection to 4900

3. switchport mode trunk

4. speed 1000

5. interface Ethernet1/3

6. description Connection to FIB Port 5

7. switchport mode trunk

8. speed 1000

9. interface Ethernet1/4

10. description Connection to FIA port 5

11. switchport mode trunk

12. speed 1000

On the 4900 switch, take these steps, and set up the promiscuous port. The PVLAN ends at the promiscuous port.

1. Turn on PVLAN feature if required.

2. Create and associate the VLANs as done on the Nexus 5K.

3. Create the promiscuous port on the egress port of the 4900 switch. From this point on, the packets from VLAN 166 are seen on VLAN 266 in this case.

Switch(config-if)#switchport mode trunk

switchport private-vlan mapping 266 166

switchport mode private-vlan promiscuous

On the upstream router, create a subinterface for the VLAN 266 only. At this level, the requirements depend upon the network configuration you are using:

1. interface GigabitEthernet0/1.1

2. encapsulation dot1Q 266

3. IP address 209.165.200.225 255.255.255.224

Troubleshooting

This procedure describes how to test the configuration.

1. Configure the switch virtual interface (SVI) on each switch, which allows you to ping the SVI from the PVLAN:

(config)# interface vlan 266

(config-if)# ip address 209.165.200.225 255.255.255.224

(config-if)# private-vlan mapping 166

(config-if)# no shut

2. Check the MAC address tables in order to see where your MAC is being learned. On all switches, the MAC should be in the isolated VLAN except on the switch with the promiscuous port. On the promiscuous switch, note that the MAC is in the primary VLAN.

1. On the Fabric Interconnect, MAC address 0050.56bd.7bef is learned on Veth1491:

2. On the Nexus 5K, MAC address 0050.56bd.7bef is learned on Eth1/4:

3. On the 4900 switch, MAC address 0050.56bd.7bef is learned on GigabitEthernet1/1:

In this configuration, the systems in this isolated VLAN cannot communicate with each other, but can communicate with other systems through the promiscuous port on the 4900 switch. One issue is how to configure downsteam devices. In this case, you are using VMware and two hosts.

Remember that you must use one vNIC for each PVLAN. These vNICs are presented to VMware vSphere ESXi, and you can then create port groups and have guests to these port groups.

If two systems are added to the same port group on the same switch, they can communicate with each other because their communications are switched locally on the vSwitch. In this system, there are two blades with two hosts each.

On the first system, two different port groups have been created - one called 166, and one called 166A. Each is connected to a single NIC, which is configured in the isolated VLAN on UCS. There is currently only one guest for each port group. In this case, because these are separated on ESXi, they cannot talk to each other.

On the second system, there is only one port group called 166. There are two guests in this port group. In this configuration, VM3 and VM4 can communicate with each other even though you do not want this to happen. In order to correct this, you need to configure a single NIC for each virtual machine (VM) that is in the isolated VLAN, and then create a port group attached to that vNIC. Once this is configured, put only one guest into the port group. This is not a problem with a bare metal Windows install because you do not have these underlying vSwitches.

Isolated PVLAN on N1K with Promiscuous Port on an Upstream Device

In this configuration, you are passing PVLAN traffic through an N1K then the UCS to a promiscuous port that is upstream. Because you cannot send both primary and secondary VLANs on the same vNIC, you need one vNIC for each PVLAN uplink in order to carry the PVLAN traffic.

Configuration in UCS

This procedure describes how to create both the primary and any isolated VLANS.

Note: This example uses 266 as the primary and 166 as the isolated; the VLAN IDs will be determined by the site.

1. In order to create the primary VLAN, click Primary as the Sharing Type:

2. In order to create the isolated VLAN, click Isolated as the Sharing Type:

3. In order to add the VLAN to the vNIC, click the Select checkbox for VLAN 166. VLAN 166 does not have Native VLAN selected.

Only the isolated VLAN is added, it must not be set as native, and there can only be one for each vNIC. Because the Native VLAN is not defined here, tag the native VLAN on the N1K. The option to tag a Native VLAN is not available in the VMware DVS, so this is not supported on DVS.

Configuration of Upstream Devices

These procedures describe how to configure a Nexus 5K in order to pass the PVLAN through to an upstream 4900 switch where the promiscuous port is. While this might not be necessary in all environments, use this configuration in the event that you must pass the PVLAN through another switch.

On the Nexus 5K, enter these commands, and check uplink configuration:

1. Turn on the PVLAN feature:

Nexus5000-5(config)# feature private-vlan

2. Add the VLANs as primary and isolated:

Nexus5000-5(config)# vlan 166

Nexus5000-5(config-vlan)# private-vlan isolated

Nexus5000-5(config-vlan)# vlan 266

Nexus5000-5(config-vlan)# private-vlan primary

3. Associate VLAN 266 with the isolated VLAN 166:

Nexus5000-5(config-vlan)# private-vlan association 166

4. Make sure that all uplinks are configured in order to trunk the VLANs:

1. interface Ethernet1/1

2. description Connection to 4900

3. switchport mode trunk

4. speed 1000

5. interface Ethernet1/3

6. description Connection to FIB Port 5

7. switchport mode trunk

8. speed 1000

9. interface Ethernet1/4

10. description Connection to FIA port 5

11. switchport mode trunk

12. speed 1000

On the 4900 switch, take these steps, and set up the promiscuous port. The PVLAN ends at the promiscuous port.

1. Turn on PVLAN feature if required.

2. Create and associate the VLANs as done on the Nexus 5K.

3. Create the promiscuous port on the egress port of the 4900 switch. From this point on, the packets from VLAN 166 are seen on VLAN 266 in this case.

Switch(config-if)#switchport mode trunk

switchport private-vlan mapping 266 166

switchport mode private-vlan promiscuous

On the upstream router, create a subinterface for the VLAN 266 only. At this level, the requirements depend upon the network configuration that you use:

1. interface GigabitEthernet0/1.1

2. encapsulation dot1Q 266

3. IP address 209.165.200.225 255.255.255.224

Configuration of N1K

This procedure describes how to configure the N1K as a standard trunk, not a PVLAN trunk.

1. Create and associate the VLANs as done on the Nexus 5K. Refer to the Configuration of Upstream Devices section for more information.

2. Create an uplink port-profile for the PVLAN traffic:

Switch(config)#port-profile type ethernet pvlan_uplink

Switch(config-port-prof)# vmware port-group

Switch(config-port-prof)# switchport mode trunk

Switch(config-port-prof)# switchport trunk allowed vlan 166,266

Switch(config-port-prof)# switchport trunk native vlan 266 <-- This is necessary to handle

traffic coming back from the promiscuous port.

Switch(config-port-prof)# channel-group auto mode on mac-pinning

Switch(config-port-prof)# no shut

Switch(config-port-prof)# state enabled

3. Create the port-group for the isolated VLAN; create a PVLAN host port with the host association for the primary and isolated VLANs:

Switch(config)# port-profile type vethernet pvlan_guest

Switch(config-port-prof)# vmware port-group

Switch(config-port-prof)# switchport mode private-vlan host

Switch(config-port-prof)# switchport private-vlan host-association 266 166

Switch(config-port-prof)# no shut

Switch(config-port-prof)# state enabled

4. In the vCenter, add the proper vNIC to the PVLAN uplink. This is the vNIC to which you added the Isolated VLAN under the Configuration in UCS settings.

5. Add the VM to the correct port-group:

1. In the Hardware tab, click Network adapter 1.

2. Choose pvlan_guest (pvlan) for the Network label under Network Connection:

Troubleshooting

This procedure describes how to test the configuration.

1. Run pings to other systems configured in the port-group as well as the router or other device at the promiscuous port. Pings to the device past the promiscuous port should work, while those to other devices in the isolated VLAN should fail.

2. On the N1K, the VMs are listed on the primary VLAN; this occurs because you are in PVLAN host ports that are associated to the PVLAN. Because of how the VMs are learned, ensure that you do not set the PVLAN as native on the UCS system. Also note that you learn the upstream device from the port channel and that the upstream device is learned on the primary VLAN as well. This must be learned in this method, which is why you have the primary VLAN as the native VLAN on the PVLAN uplink.

In this screen shot, the two devices on Veth3 and Veth 4 are the VMs. The device on Po1 is the upstream router that is past the promiscuous port.

3. On the UCS system, you should be learning all MACs, for this communication, in the isolated VLAN. You should not see the upstream here:

4. On the Nexus 5K, the two VMs are on the isolated VLAN, while the upstream device is on the primary VLAN:

5. On the 4900 switch, where the promiscuous port is, everything is on the primary VLAN:

Isolated PVLAN on N1K with Promiscuous Port on the N1K Uplink Port-Profile

In this configuration, you contain PVLAN traffic to the N1K with only the primary VLAN used upstream.

Configuration in UCS

This procedure describes how to add the primary VLAN to the vNIC. There is no need for PVLAN configuration because you only need the primary VLAN.

Note: This example uses 266 as the primary and 166 as the isolated; the VLAN IDs will be determined by the site.

1. Note that the Sharing Type is None.

2. Click the Select checkbox for VLAN 266 in order to add the primary VLAN to the vNIC. Do not set it as Native.

Configuration of Upstream Devices

These procedures describe how to configure the upstream devices. In this case, the upstream switches only need trunk ports, and they only need to trunk VLAN 266 because it is the only VLAN the upstream switches see.

On the Nexus 5K, enter these commands, and check uplink configuration:

1. Add the VLAN as primary:

Nexus5000-5(config-vlan)# vlan 266

2. Make sure that all uplinks are configured in order to trunk the VLANs:

1. interface Ethernet1/1

2. description Connection to 4900

3. switchport mode trunk

4. speed 1000

5. interface Ethernet1/3

6. description Connection to FIB Port 5

7. switchport mode trunk

8. speed 1000

9. interface Ethernet1/4

10. description Connection to FIA port 5

11. switchport mode trunk

12. speed 1000

On the 4900 switch, take these steps:

1. Create the VLANs used as primary on the N1K.

2. Trunk all interfaces to and from the 4900 switch so that the VLAN is passed.

On the upstream router, create a subinterface for the VLAN 266 only. At this level, the requirements depend upon the network configuration that you use.

1. interface GigabitEthernet0/1.1

2. encapsulation dot1Q 266

3. IP address 209.165.200.225 255.255.255.224

Configuration of N1K

This procedure describes how to configure the N1K.

1. Create and associate the VLANs:

Switch(config)# vlan 166

Switch(config-vlan)# private-vlan isolated

Switch(config-vlan)# vlan 266

Switch(config-vlan)# private-vlan primary

Switch(config-vlan)# private-vlan association 166

2. Create an uplink port-profile for the PVLAN traffic with the promiscuous port noted:

Switch(config)#port-profile type ethernet pvlan_uplink

Switch(config-port-prof)# vmware port-group

Switch(config-port-prof)# switchport mode private-vlan trunk promiscuous

Switch(config-port-prof)# switchport private-vlan trunk allowed vlan 266 <-- Only need to

allow the primary VLAN

Switch(config-port-prof)# switchport private-vlan mapping trunk 266 166 <-- The VLANS must

be mapped at this point

Switch(config-port-prof)# channel-group auto mode on mac-pinning

Switch(config-port-prof)# no shut

Switch(config-port-prof)# state enabled

3. Create the port-group for the isolated VLAN; create a PVLAN host port with the host association for the primary and isolated VLANs:

Switch(config)# port-profile type vethernet pvlan_guest

Switch(config-port-prof)# vmware port-group

Switch(config-port-prof)# switchport mode private-vlan host

Switch(config-port-prof)# switchport private-vlan host-association 266 166

Switch(config-port-prof)# no shut

Switch(config-port-prof)# state enabled

4. In the vCenter, add the proper vNIC to the PVLAN uplink. This is the vNIC to which you added the Isolated VLAN under the Configuration in UCS settings.

5. Add the VM to the correct port-group.

1. In the Hardware tab, click Network adapter 1.

2. Choose pvlan_guest (pvlan) for the Network label under Network Connection.

Troubleshooting

This procedure describes how to test the configuration.

1. Run pings to other systems configured in the port-group as well as the router or other device at the promiscuous port. Pings to the device past the promiscuous port should work, while those to other devices in the isolated VLAN should fail.

2. On the N1K, the VMs are listed on the primary VLAN; this occurs because you are in PVLAN host ports that are associated to the PVLAN. Also note that you learn the upstream device from the port channel and that the upstream device is learned on the primary VLAN as well.

In this screen shot, the two devices on Veth3 and Veth 4 are the VMs. The device on Po1 is the upstream device that is past the promiscuous port.

3. On the UCS system, you should be learning all MACs, for this communication, in the primary VLAN you use on the N1K. You should not be learning the upstream here:

4. On the Nexus 5K, all MACs are in the primary VLAN you selected:

5. On the 4900 switch, everything is on the primary VLAN you have selected:

Community PVLAN on N1K with Promiscuous Port on the N1K Uplink Port-Profile

This is the only supported configuration for community VLAN with UCS.

This configuration is the same as that set up in the Isolated PVLAN on N1K with Promiscuous Port on the N1K Uplink Port-Profile section. The only difference between community and isolated is the configuration of the PVLAN.

In order to configure the N1K, create and associate the VLANs as you did on the Nexus 5K:

Switch(config)# vlan 166

Switch(config-vlan)# private-vlan community

Switch(config-vlan)# vlan 266

Switch(config-vlan)# private-vlan primary

Switch(config-vlan)# private-vlan association 16

All other configuration is the same as the isolated PVLAN on N1K with promiscuous port on the N1K uplink port-profile.

Once this is configured, you can communicate with all VMs connected to the vEthernet port-profile used for your PVLAN.

Troubleshooting

This procedure describes how to test the configuration.

1. Run pings to other systems configured in the port-group as well as the router or other device at the promiscuous port. Pings past the promiscuous port and to other systems in the community should work.

2. All other troubleshooting is the same as the isolated PVLAN.

Isolated PVLAN and Community PVLAN on VMware DVS Promiscuous Port on the DVS

Because of the configuration issues on both the DVS and the UCS system, PVLANs with DVS and UCS are not supported prior to Version 2.2(2c).

Verify

There are currently no verification procedures available for these configurations.

Troubleshoot

The previous sections provided information you can use in order to troubleshoot your configurations.

The Output Interpreter Tool (registered customers only) supports certain show commands. Use the Output Interpreter Tool in order to view an analysis of show command output.