Contents

Introduction

Steps

Introduction

This article describes how to collect the System Event log bundle from a Cisco C880 M4 server.

Steps

1) Connect to the C880 M4 MMB browser graphical user interface (GUI).

2) Click on System Event Log on the left menu and then click on Download.

3) A progress bar will get displayed as the firmware collects the logs and compress them.

4) Once complete, a link will be provided with the System Event Log bundle. The file name will be in the format sel_YYYYMMDDHHMMSS.tgz.