Contents

Introduction

This document describes OS compatibility information for the Cisco Secure Endpoint iOS connector.

Supported Versions

Some versions listed are no longer supported and are included for historical reference. Please look at the Secure Endpoint Connector Support Policy for details on supported connector versions.

SE iOS Connector versions

iOS release

1.6.9

1.6.8

1.6.7

17

16

15

14

13

12

Compatible

Compatible, not supported

Not supported

See Also

- Secure Endpoint Windows Connector OS Compatibility

- Cisco Security Connector Apple iOS Compatibility

- Cisco Secure Endpoint Linux Connector OS Compatibility

- Cisco Secure Endpoint Linux Connector Update Reboot Requirements

- Cisco Orbital System Requirements