Contents

Table of Contents

1. RP-E USB Boot Procedure using BIOS Menu

2. Standby RP-E Bringup

3. LC Bringup (if required)

Table of Contents

1: Route Processor (RP-E) Universal Serial Bus (USB) Boot Procedure using Basic Input/Output System (BIOS) Menu (To be followed till CSCvm77427 is fixed)

2: Standby RP-E Bringup (To be followed till CSCvk33106 is fixed)

3: LC Bringup (if required)

1. RP-E USB Boot Procedure using BIOS Menu

Please note, this procedure is applicable from release 6.3.1 onwards (where RP-E support was introduced).

This is not specific to any chassis type, but is relevant to RP-E specific chassis, for example, any modular chassis like 5504, 5508, 5516 with RP-E.

Also, not applicable for fixed platforms.

Step 1: Prepare the USB with image using this procedure

Step 2: Also verify the MD5 of the files to make sure the contents are the same.

Step 3: In a single RP system which has the USB inserted, perform a power cycle.

Step 4:Press Escape to break into the BIOS menu. We should see something like below.

Step 5: Select “Boot Manager” option and press Enter.

Step 6: Select UEFI: Built-in Shell option from the below Menu

Step 7: Either press any key to drop to the Shell> prompt or by default, the console will drop to the Shell prompt.

** Please note that delete/backspace doesn’t work here. If anything incorrect is typed, do not hesitate to press Enter, since it doesn’t impact the current procedure.

Step 8: Type “fs1:” and press Enter

** Please pay attention to which slot the USB is inserted in, based on which, the below file system could vary - between fs0 and fs1) **

In this example, the USB is inserted in slot1.

Step 9: Type “ls” to list the contents of “boot” and “EFI” (Entire snapshot is provided below)

Step 10: cd EFI

Step 11: ls

Step12: cd boot

Step 13: Upon listing the contents, we should be seeing grub.cfg and bootx64.efi

Step 14: Type “bootx64.efi” and press enter. (Tab works to auto complete)

Step 15: Based on the above log, RP-E is booting from the USB.

Step 16: Once the RP comes up, configure the username/password and follow the remaining steps.

2. Standby RP-E Bringup

Step 1: Insert the standby RP-E into the system (In this example, RP1 has been inserted)

Step 2: This step depends on the state of the standby RP-E. Please follow whichever is applicable.

Note: Spare RP will be shipped with the latest image by default, if there is no image picked by placing the order.

In order to sync it with the active RP-E, execute the below command from RP0 sysadmin, once the standby is detected in the inventory.

Execute the below command from RP0 sysadmin to bring up the standby RP.

sysadmin-vm:0_RP0# hw-module location 0/RP1 bootmedia network reload

One can monitor the console of RP1 to make sure internal PXE has triggered. This should bring up the standby RP.

Note: If image is corrupted/deleted from Standby RP-E it syncs with Active RP or may use USB booting according to "RP-E USB boot Procedure using BIOS Menu" above

3. LC Bringup (if required)

Step 1: Execute the below command from RP0 sysadmin to bring up any line card. (0/0 for example)

sysadmin-vm:0_RP0# hw-module location 0/0 bootmedia network reload