Inhalt

Einführung

Bevor Sie beginnen

Konventionen

Voraussetzungen

Verwendete Komponenten

Hintergrundtheorie

Konfigurieren

Erstellen eines Port-Channels

Netzwerkdiagramm

Konfigurationen

Überprüfen

Befehle für Catalyst 2950 anzeigen

Befehle für Catalyst 2948G-L3 anzeigen

Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument beschreibt die Einrichtung eines EtherChannel und 802.1Q-Trunking zwischen Catalyst 2950 und Catalyst 2948G-L3 Switches. EtherChannel kann je nach Geschwindigkeit der Schnittstellen oder Ports, die zum Erstellen des EtherChannels verwendet werden, auch als Fast EtherChannel (FEC) oder Gigabit EtherChannel (GEC) bezeichnet werden.

Hinweis: Der Catalyst 2950-Switch unterstützt nur 802.1Q-Trunking und kein ISL-Trunking (Inter-Switch Link Protocol). Die Switches Catalyst 2948G-L3 und Catalyst 4908G-L3 verwenden dasselbe Software-Image. Die in diesem Dokument verwendete Catalyst 2948G-L3 Konfiguration gilt auch für den Catalyst 4908G-L3 Switch.

In diesem Konfigurationsbeispiel werden zwei Fast Ethernet-Schnittstellen eines Catalyst 2950-Switches in einem FEC mit zwei Fast Ethernet-Schnittstellen eines Catalyst 2948G-L3-Switches gebündelt. FEC, GEC, Port-Channel und Channel-Gruppe beziehen sich in diesem Dokument auf EtherChannel.

Bevor Sie beginnen

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Voraussetzungen

In diesem Dokument werden die Beispielkonfiguration der Switches und die Ausgabe der zugehörigen show-Befehle beschrieben. Einzelheiten und spezifische Hinweise oder Richtlinien zu einzelnen Switches finden Sie in den folgenden Dokumenten:

- Catalyst 2950-Switch - Konfigurieren des EtherChannels

- Catalyst 2950 Switch - Konfiguration von VLAN-Trunks

- Catalyst 2948G-L3-Switch für die Konfiguration des EtherChannels

- Catalyst 2948G-L3 Switch Konfigurieren der VLAN-Kapselung

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den unten stehenden Software- und Hardwareversionen.

- Catalyst 2948G-L3 Switch mit Cisco IOS® Software 12.0(14)W5(20)

- Catalyst 2950 Switch mit Cisco IOS Software 12.1(12c)EA1

Die in diesem Dokument enthaltenen Informationen wurden aus Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Sie in einem Live-Netzwerk arbeiten, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen, bevor Sie es verwenden.

Hintergrundtheorie

Aus Konfigurationssicht ist der Catalyst 2948G-L3 Switch ein Router. Dabei wird eine Cisco IOS-Befehlszeile verwendet. Standardmäßig sind alle Schnittstellen geroutete Schnittstellen.

Der Catalyst 2948G-L3 Switch erweitert Ihre VLANs nicht standardmäßig. Da alle Schnittstellen geroutete Schnittstellen sind, muss jede Schnittstelle einem anderen Netzwerk oder Subnetz angehören. Wenn zwei oder mehr Schnittstellen demselben Subnetz angehören sollen, muss für diese Schnittstellen das Bridging konfiguriert werden.

Der Catalyst 2948G-L3-Switch unterstützt keine Verhandlungsprotokolle für andere Catalyst-Switches, wie VLAN Trunk Protocol (VTP), Dynamic Trunking Protocol (DTP) und Port Aggression Protocol (PAgP). Es wird empfohlen, diese Protokolle an den Catalyst 2950-Schnittstellen auszuschalten, die mit dem Catalyst 2948G-L3-Switch verbunden sind.

Auf dem Catalyst 2948G-L3-Switch wird der gesamte Datenverkehr, der im nativen VLAN eines Trunks empfangen wird, softwarebasiert weitergeleitet. Dies bedeutet, dass dieser Datenverkehr an die CPU gesendet wird. Wenn ein großer Teil des Datenverkehrs über dieses VLAN gesendet wird, kann dies zu einer hohen CPU-Last auf dem Catalyst 2948G-L3-Switch führen und die Leistung des Netzwerks beeinträchtigen. Es wird empfohlen, ein Dummy-VLAN (z. B. VLAN 99) zu erstellen, das zum nativen VLAN für den Trunk gemacht werden kann. Der gesamte Benutzerdatenverkehr wird über die anderen VLANs gesendet, die in der Hardware geroutet werden, wodurch die Leistung verbessert wird.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Erstellen eines Port-Channels

Bei der Konfiguration des EtherChannels wird empfohlen, einen Port-Channel wie folgt zu erstellen: Dadurch werden mögliche Probleme mit dem Spanning Tree Protocol (STP) während des Konfigurationsprozesses vermieden. Eine STP-Schleife kann auftreten, wenn eine Seite als Kanal konfiguriert ist, bevor die andere Seite als Kanal konfiguriert wird. Als Ergebnis kann der Switch die in die Schleife involvierten Schnittstellen in den ErrorDisabled-Status setzen.Die folgenden Schritte sind Richtlinien für dieses spezifische Konfigurationsszenario.

Auf dem Catalyst 2948G-L3-Switch:

1. Konfigurieren Sie die Schnittstellen für die Port-Channeling im administrativen Herunterfahren-Modus.

2. Erstellen Sie den Port-Channel (Kanalgruppe). Der Port-Channel überträgt verschiedene VLANs. Erstellen Sie daher eine Subschnittstelle für jedes VLAN, das auf dem Trunk vorhanden ist. Auf einem 802.1Q-Trunk werden alle über den Trunk übertragenen Pakete mit Ausnahme des Datenverkehrs im nativen VLAN markiert. Aus diesem Grund müssen Sie die Subschnittstelle, die dem nativen VLAN entspricht, unterscheiden, indem Sie das Schlüsselwort "native" am Ende eingeben. Wie bereits erwähnt, empfiehlt es sich, ein Dummy-VLAN ohne Benutzerdatenverkehr zu verwenden.

3. Der Catalyst 2948G-L3 Switch verfügt standardmäßig über alle gerouteten Ports. Damit die Ports des 2948G-L3 über verschiedene VLANs des 2950 kommunizieren können, müssen Sie Bridging implementieren. Schnittstellen (und Subschnittstellen), die demselben VLAN (Netzwerk oder Subnetz) angehören, müssen so konfiguriert werden, dass sie derselben Bridge-Gruppe angehören. Für das Routing zwischen diesen verschiedenen Bridge-Gruppen muss Integrated Routing and Bridging (IRB) aktiviert sein.

Auf dem Catalyst 2950-Switch:

1. Konfigurieren Sie die Schnittstellen, die dem Kanal als Trunk angehören, und stellen Sie sicher, dass das DTP deaktiviert ist. Dies geschieht durch Ausgabe des Befehls switchport nonegotiate auf den physischen Schnittstellen. Konfigurieren Sie ein Dummy-VLAN (in diesem Beispiel VLAN 99) für die VLAN-Datenbank, die als natives VLAN auf dem Trunk verwendet wird. Sofern nicht anders angegeben, ist das native VLAN auf einem 802.1Q-Trunk VLAN 1. Sie müssen an beiden Schnittstellen angeben, dass Sie VLAN 99 als natives VLAN verwenden. Dies erfolgt durch Ausgabe des Befehls switchport trunk native vlan 99.

2. Erstellen Sie den Port-Channel, und stellen Sie sicher, dass der Channel-Modus aktiviert ist (dies deaktiviert PAgP).

3. Aktivieren Sie die Schnittstellen, die zuvor auf dem Catalyst 2948G-L3-Switch deaktiviert wurden, erneut, indem Sie den Befehl no shutdown ausführen.

Netzwerkdiagramm

In diesem Dokument wird die im Diagramm unten dargestellte Netzwerkeinrichtung verwendet.

Konfigurationen

In diesem Dokument werden die unten angegebenen Konfigurationen verwendet.

- Catalyst 2948G-L3

- Catalyst 2950

Catalyst 2948G-L3

2948G-L3#show run

!--- The following configuration shows how to configure Catalyst 2948G-L3 !--- for bridging and connect to a Catalyst 2950 with 802.1Q trunking !--- over EtherChannel. For configuring interVLAN-routing on Catalyst !--- 2948G-L3, refer to Catalyst 2948G-L3 Sample Configurations.

Building configuration...

Current configuration:

!

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log datetime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

!

!--- Enable IRB when routing between different !--- bridge groups is needed.

bridge irb

!

!--- Configure a logical interface for the EtherChannel.

interface Port-channel1

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Create a subinterface for each VLAN on the port channel.

!

interface Port-channel1.1

!--- Specify the encapsulation and VLAN number.

encapsulation dot1Q 1

no ip redirects

no ip directed-broadcast

!--- Add the subinterface to the appropriate bridge group. !--- All the interfaces (and subinterfaces) that belong to the !--- same VLAN (network or subnet) should be configured to fall !--- in the same bridge group.

bridge-group 1

!

!--- Configure a subinterface for the second VLAN. !--- This procedure must be repeated for every VLAN.

!

interface Port-channel1.2

encapsulation dot1Q 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

!--- Configure a subinterface for the native VLAN.

!

interface Port-channel1.99

encapsulation dot1Q 99 native

no ip redirects

no ip directed-broadcast

!--- Note in this case you do not put any bridge group !--- statements under this subinterface. A dummy VLAN has been chosen !--- as the native VLAN on which you do not put any traffic, !--- so there is no need to have this routed.

!

interface FastEthernet1

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

!--- The device connected on this interface belongs !--- to the same subnet (VLAN 1) as subinterface 1 on !--- the port channel, so this interface has to be added to !--- bridge-group 1.

bridge-group 1

!

!--- If there are any other interfaces that belong to !--- the same VLAN (subnet), they all have to be added to !--- the respective bridge group.

( .... Output is suppressed)

!

!

! a routed interface for bridge-group 1

interface BVI1

ip address 1.1.1.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

! a routed interface for bridge-group 2

interface BVI2

ip address 2.2.2.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

! bridge 1 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 1 protocol ieee

! The bridge 1 route ip command specifies that IP will be routed

bridge 1 route ip

! bridge 2 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 2 protocol ieee

! bridge 2 route ip command specifies that IP will be routed

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

Catalyst 2950

5-2950-24##show run

Building configuration...

Current configuration : 1986 bytes

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 5-2950-24#

!

!

!

!--- VLAN 2 is created for this lab set up, !--- and VLAN 1 is created by default.

vlan 2

ip subnet-zero

!--- For information on VTP, refer to !--- Understanding and Configuring VLAN Trunk Protocol (VTP)

vtp domain cisco

vtp mode transparent

!

spanning-tree extend system-id

!

!--- A logical port-channel interface is automatically created !--- when ports are grouped into a channel group.

!

interface Port-channel1

!--- The switchport trunk native vlan 99 command is !--- issued on the Fast Ethernet interface.

switchport trunk native vlan 99

!--- The switchport mode trunk command is !--- issued on the Fast Ethernet interface.

switchport mode trunk

!-- The switchport nonegotiate command is !--- issued on the Fast Ethernet interface.

switchport nonegotiate

no ip address

flowcontrol send off

!

interface FastEthernet0/1

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/2

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/3

!--- The PC2 on this interface belongs to VLAN 2.

switchport access vlan 2

switchport mode access

no ip address

!--- On the userports, enable portfast to increase !--- the STP convergence time.

spanning-tree portfast

!

( .... Output is suppressed)

!

interface Vlan1

ip address 1.1.1.2 255.255.255.0

no ip route-cache

!

ip http server

!

!

line con 0

line vty 5 15

!

end

Überprüfen

Dieser Abschnitt enthält Informationen, mit denen Sie überprüfen können, ob Ihre Konfigurationen ordnungsgemäß funktionieren.

Bestimmte show-Befehle werden vom Output Interpreter Tool unterstützt (nur registrierte Kunden), mit dem Sie eine Analyse der show-Befehlsausgabe anzeigen können.

Befehle für Catalyst 2950 anzeigen

Die folgenden show-Befehle überprüfen die Konfiguration für den Catalyst 2950-Switch, wie in der unten stehenden Ausgabe gezeigt.

5-2950-24##show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/3

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Remote SPAN VLANs

------------------------------------------------------------------------------

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

5-2950-24##show interfaces port-channel 1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Po1       on           802.1q         trunking      99

Port      Vlans allowed on trunk

Po1       1-4094

Port      Vlans allowed and active in management domain

Po1       1-2

Port      Vlans in spanning tree forwarding state and not pruned

Po1       1-2

5-2950-24##show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0005.7428.0e02 (bia 0005.7428.0e02)

MTU 1500 bytes, BW 200000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s

input flow-control is off, output flow-control is off

Members in this channel: Fa0/1 Fa0/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 25000 bits/sec, 39 packets/sec

5 minute output rate 39000 bits/sec, 59 packets/sec

11609 packets input, 955786 bytes, 0 no buffer

Received 11590 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 11583 multicast, 0 pause input

0 input packets with dribble condition detected

17396 packets output, 1442093 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

5-2950-24##show interface port-channel 1 switchport

Name: Po1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Off

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 99 (Inactive)

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

5-2950-24##show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

5-2948G-L3       Fas 0/1            144         R T       Cat2948G  Port-channe1

5-2948G-L3       Fas 0/2            178         R T       Cat2948G  Fas 2

5-2948G-L3       Fas 0/1            178         R T       Cat2948G  Fas 1

PC2#ping 1.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

Befehle für Catalyst 2948G-L3 anzeigen

Die folgenden show-Befehle überprüfen die Konfiguration für den Catalyst 2948-L3-Switch, wie in der unten stehenden Ausgabe gezeigt.

5-2948G-L3#show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.43ff.1407 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet1

Member 1 : FastEthernet2

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 2000 bits/sec, 4 packets/sec

5 minute output rate 1000 bits/sec, 1 packets/sec

27033 packets input, 2083710 bytes, 0 no buffer

Received 6194 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

12808 packets output, 1945983 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

5-2948G-L3#show vlan

Virtual LAN ID:  1 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet49

GigabitEthernet50.1

Port-channel1.1

This is configured as native Vlan for the following interface(s) :

GigabitEthernet49

GigabitEthernet50

Protocols Configured:   Address:              Received:        Transmitted:

IP              10.10.10.1                   0                   0

Bridging        Bridge Group 1               3418                   5

Virtual LAN ID:  2 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet50.2

Port-channel1.2

Protocols Configured:   Address:              Received:        Transmitted:

IP              20.20.20.1                   0                   0

Bridging        Bridge Group 2               3952                   9

Virtual LAN ID:  21 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   GigabitEthernet49.1

Protocols Configured:   Address:              Received:        Transmitted:

Virtual LAN ID:  99 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   Port-channel1.99

This is configured as native Vlan for the following interface(s) :

Port-channel1

Protocols Configured:   Address:              Received:        Transmitted:

5-2948G-L3#show spanning-tree

Bridge group 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0001.43ff.1409

Configured hello time 2, max age 20, forward delay 15

We are the root of the spanning tree

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 6 (FastEthernet3) of Bridge group 1 is forwarding

Port path cost 19, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 6, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 4107, received 2

Port 58 (Port-channel1.1 DOT1Q) of Bridge group 1 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 58, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 5240, received 502

Bridge group 2 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0000.0c00.d08c

Configured hello time 2, max age 20, forward delay 15

Current root has priority 0, address 0010.0db1.804f

Root port is 59 (Port-channel1.2), cost of root path is 50

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 59 (Port-channel1.2 DOT1Q) of Bridge group 2 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 0, address 0010.0db1.804f

Designated bridge has priority 32770, address 0005.7428.0e00

Designated port is 65, path cost 38

Timers: message age 3, forward delay 0, hold 0

BPDU: sent 1790, received 3964

PC1#ping 2.2.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2.2.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

Fehlerbehebung

Für diese Konfiguration sind derzeit keine spezifischen Informationen zur Fehlerbehebung verfügbar.

Zugehörige Informationen

- VTP (VLAN Trunk Protocol)

- Catalyst 2948G-L3 - Beispielkonfigurationen

- Produktsupport für Switches

- Unterstützung der LAN Switching-Technologie

- Technischer Support und Dokumentation - Cisco Systems