Inhalt

Einleitung

Postprozedurverfahren

Einleitung

In diesem Dokument wird beschrieben, wie Sie die Konfiguration des PXE-Bootvorgangs vor dem Neustart eines der HANA-Knoten (SAP High Performance Analytic Appliance) ändern müssen, wenn Sie ein Betriebssystem-Upgrade mit einem weiteren Setup-Tool (YaST) durchführen oder neue Treiber für den Ethernet Network Interface Controller (ENIC)/Fabric Network Interface Controller (FNIC) installieren. Die Patch-/Treiberinstallation muss auf jedem SAP HANA-Knoten ausgeführt werden.

Postprozedurverfahren

Verwenden Sie dieses Verfahren, wenn Sie das Betriebssystem mit YaST aktualisieren.

1. Führen Sie das SUSE-Update mit YaST oder der ENIC/FNIC-Treiberinstallation durch.
Anmerkung: Weitere Informationen zum Upgrade von SP2 auf SP3 finden Sie im  Dokument How to upgrade to SLES/SLED 11 SP3  Micro Focus (Upgrade auf SLES/SLED 11 SP3- Micro-Fokus).

2. Kopieren Sie den aktualisierten Kernel in den mgmtsrv eines der SAP HANA-Knoten.

server01 # cd /boot

# Prepare initrd for the PXEBoot and include the nfs packages/drivers

mkinitrd -f nfs -D eth0

# Copy the initrd and vmlinuz to the tftpboot directory of the mgmtsrv

server01 # scp initrd-3.0.101-0.31-default mgmtsrv01:/tftpboot

server01 # scp vmlinuz-3.0.101-0.31-default mgmtsrv01:/tftpboot

3. Melden Sie sich bei mgmtsrv01 an, um die erste RAM-Diskette (initrd) für den PXE-Start vorzubereiten und die Pakete/Treiber für das Network File System (NFS) einzuschließen:

# Check the new run_all.sh script is available (attached to this article as well)

ll /tftboot/tmp/run_all.sh

# Change the initrd

cd /tftpboot

mkdir /tftpboot/tmp2

cp initrd-3.0.101-0.31-default  /tftpboot/tmp2/

cd /tftpboot/tmp2

mv initrd-3.0.101-0.31-default  initrd-3.0.101-0.31-default.gz

gunzip initrd-3.0.101-0.31-default.gz

# Now the initrd is in a CPIO format

cpio -idumf < initrd-3.0.101-0.31-default

rm initrd-3.0.101-0.31-default

# Udev files needs to be empty to avoid issues running different nodes with

that initrd

# During the kernel creation it captures all MAC addresses and align them to

the addresses in the UDEV rules file, so we empty the file before.

# During restart every server will create its own persistent-net rules again.

echo > etc/udev/rules.d/70-persistent-net.rules

# Copy the run_all script generic to all versions of the kernel

cp ../tmp/run_all.sh .

find . | cpio --create --format="newc" > ../initrd-3.0.101-0.31-default

cd ..

gzip -9 initrd-3.0.101-0.31-default

mv initrd-3.0.101-0.31-default.gz initrd-3.0.101-0.31-default

# For simplification …

ln -s ./initrd-3.0.101-0.31-default initrd_3.0.101

ln -s ./vmlinuz-3.0.101-0.31-default kernel_3.0.101

# Now prepare the PXE boot configuration

cd /tftpboot/pxelinux.cfg

vi <hostname|IP address>

# If there is no link available you can check with the command "gethostip

server01"

copy the current SLES11_SP2 (or Default) section and adapt the values for default

and LABEL as well as the kernel and initrd links

# SAP UCS PXE Boot Definition

display ../boot.msg

default SLES11_SP3_101

prompt 1

timeout 10

LABEL SLES11_SP3_101

KERNEL kernel_3.0.101

APPEND initrd=initrd_3.0.101 rw rootdev=192.168.xx.xx:/FS_OS_01/SLES11SP3

intel_idle.max_cstate=0 processor.max_cstate=0 ip=dhcp

OS_VOLUME="FS_OS_01/SLES4SAPSP3" MAC="00:25:B5:12:00:FF" OS_SERVER="192.168.127.11"

4. Stellen Sie beim ersten SAP HANA-Knoten sicher, dass SAP HANA als <SID>ADM gestoppt wird.

(sapcontrol -nr <InstanceNumber> -function StopSystem)

5. Starten Sie alle SAP HANA-Knoten im neuen Kernel neu.

Wenn diese Lösung weitere SAP HANA-Knoten enthält, müssen Sie das Update über YaST auf dem Knoten ausführen und die PXE-Boot-Konfiguration anpassen, um anschließend auf den richtigen Kernel bzw. die richtige initrd zu verweisen.