Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfiguration

Überprüfen

Fehlerbehebung

Zugehörige Informationen

Einführung

Diese Beispielkonfiguration funktioniert in einem sehr kleinen Büro, das direkt mit dem Internet verbunden ist. Dabei wird davon ausgegangen, dass der Domain Name Service (DNS), das Simple Mail Transfer Protocol (SMTP) und die Webdienste von einem Remote-System bereitgestellt werden, das vom Internet Service Provider (ISP) ausgeführt wird. Innerhalb des Netzwerks gibt es keine Services und nur zwei Schnittstellen. Es wird auch keine Protokollierung durchgeführt, da kein Host für Protokollierungsdienste verfügbar ist.

Da bei dieser Konfiguration nur Zugriffslisten für die Eingabe verwendet werden, werden Spoofing- und Datenverkehrsfilter mit derselben Zugriffsliste ausgeführt. Diese Konfiguration funktioniert nur bei Routern mit zwei Ports. Ethernet 0 ist das "interne" Netzwerk. Serial 0 ist ein Frame Relay-Link zum ISP.

Unter Konfiguration der NAT-Cisco IOS-Firewall mit Zweischnittstelle-Router können Sie einen Zwei-Schnittstellen-Router mit NAT mithilfe einer Cisco IOS®-Firewall konfigurieren.

Informationen zur Konfiguration eines Routers mit drei Schnittstellen ohne NAT unter Verwendung einer Cisco IOS Firewall finden Sie unter Drei-Schnittstellen-Router ohne NAT.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument gelten für die folgenden Software- und Hardwareversionen:

- Cisco IOS® Softwareversion 12.2(15)T13, unterstützt von der Cisco IOS Softwareversion 11.3.3.T

- Cisco 2611-Router

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Abschnitt verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfiguration

In diesem Dokument wird diese Konfiguration verwendet:

Router 2514

version 12.2

!

service password-encryption

no service udp-small-servers

no service tcp-small-servers

no cdp run

!

hostname cbac-cisco

!

no ip source-route

!

enable secret 5 $1$FrMn$wBu0Xgv/Igy5Y.DarCmrm/

!

username cisco privilege 15 password 7 0822455D0A16

no ip source-route

ip domain-name cisco.com

ip name-server 172.16.150.5

!

!--- Set up inspection list "myfw". !--- Inspect for the protocols that actually get used.

!

ip inspect name myfw cuseeme timeout 3600

ip inspect name myfw ftp timeout 3600

ip inspect name myfw http timeout 3600

ip inspect name myfw rcmd timeout 3600

ip inspect name myfw realaudio timeout 3600

ip inspect name myfw smtp timeout 3600

ip inspect name myfw tftp timeout 30

ip inspect name myfw udp timeout 15

ip inspect name myfw tcp timeout 3600

!

interface Ethernet0/0

description Cisco Ethernet RTP

ip address 10.20.20.20 255.255.255.0

no ip directed-broadcast

!

!--- Apply the access list in order to allow all legitimate traffic !--- from the inside network but prevent spoofing.

!

ip access-group 101 in

!

no ip proxy-arp

!

!--- Apply inspection list "myfw" to Ethernet 0 inbound. !--- When conversations are initiated from the internal network !--- to the outside, this inspection list causes temporary additions !--- to the traffic allowed in by serial interface 0 acl 111 when !--- traffic returns in response to the initiation.

!

ip inspect myfw in

no ip route-cache

!

no cdp enable

!

interface Serial0/0

description Cisco FR

ip address 172.16.150.1 255.255.255.0

encapsulation frame-relay IETF

no ip route-cache

no arp frame-relay

bandwidth 56

service-module 56 clock source line

service-module 56k network-type dds

frame-relay lmi-type ansi

!

!--- Access list 111 allows some ICMP traffic and administrative Telnet, !--- and does anti-spoofing. There is no inspection on Serial 0. !--- However, the inspection on the Ethernet interface adds temporary entries !--- to this list when hosts on the internal network make connections !--- out through the Frame Relay.

!

ip access-group 111 in

no ip directed-broadcast

no ip route-cache

bandwidth 56

no cdp enable

frame-relay interface-dlci 16

!

ip classless

ip route 0.0.0.0 0.0.0.0 Serial0

!

!--- Access list 20 is used to control which network management stations !--- can access through SNMP.

!

access-list 20 permit 172.16.150.8

!

!--- The access list allows all legitimate traffic from the inside network !--- but prevents spoofing.

!

access-list 101 permit tcp 172.16.150.0 0.0.0.255 any

access-list 101 permit udp 172.16.150.0 0.0.0.255 any

access-list 101 permit icmp 172.16.150.0 0.0.0.255 any

!--- This deny is the default.

access-list 101 deny ip any any

!

!--- Access list 111 controls what can come from the outside world !--- and it is anti-spoofing.

!

access-list 111 deny ip 127.0.0.0 0.255.255.255 any

access-list 111 deny ip 172.16.150.0 0.0.0.255 any

!

!--- Perform an ICMP stuff first. There is some danger in these lists. !--- They are control packets, and allowing *any* packet opens !--- you up to some possible attacks. For example, teardrop-style !--- fragmentation attacks can come through this list.

!

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 administratively-prohibited

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 echo

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 echo-reply

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 packet-too-big

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 time-exceeded

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 traceroute

access-list 111 permit icmp any 172.16.150.0 0.0.0.255 unreachable

!

!--- Allow Telnet access from 10.11.11.0 corporate network administration people.

!

access-list 111 permit tcp 10.11.11.0 0.0.0.255 host 172.16.150.1 eq telnet

!

!--- This deny is the default.

!

access-list 111 deny ip any any

!

!--- Apply access list 20 for SNMP process.

!

snmp-server community secret RO 20

!

line con 0

exec-timeout 5 0

password 7 14191D1815023F2036

login local

line vty 0 4

exec-timeout 5 0

password 7 14191D1815023F2036

login local

length 35

end

Überprüfen

Für diese Konfiguration ist derzeit kein Überprüfungsverfahren verfügbar.

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Wenn Sie den IOS-Firewall-Router konfiguriert haben und die Verbindungen nicht funktionieren, stellen Sie sicher, dass die Überprüfung mit dem Befehl ip inspect (name defined) in oder out auf der Schnittstelle aktiviert ist. In dieser Konfiguration wird ip inspect myfw in für die Schnittstelle Ethernet0/0 angewendet.

Weitere Informationen zu diesen Befehlen sowie weitere Informationen zur Fehlerbehebung finden Sie unter Troubleshooting Authentication Proxy.

Hinweis: Lesen Sie vor dem Ausgabe von Debug-Befehlen unter Wichtige Informationen zu Debug-Befehlen nach.

Zugehörige Informationen

- Support-Seite für IOS-Firewall

- Technischer Support und Dokumentation - Cisco Systems